%\documentstyle[referee,psfig]{laaold}
\documentstyle[psfig]{l-aa}
\begin{document}
\title{Spectroscopy and IR photometry for giant stars in obscured
globular clusters: NGC~6325, NGC~6401, NGC~6440, NGC~6517, 
NGC~6642, HP~1 and PAL~6 }
\author{Dante Minniti}

Table 3 of Minniti (1995, A\&A, 303, 468) 
contains colors, velocities and spectroscopic indices for giants
in the globular clusters NGC~6325, NGC~6401, NGC~6440, NGC~6517, NGC~6642,
HP~1 and PAL~6. Column 1 gives the cluster name; column 2 gives the star
ID; column 3 gives the measured $J-K$ color; column 4 gives the measured
heliocentric radial velocity; and columns 5 to 12 give the spectroscopic
indices defined in the text.
\begin{table*}
\caption[]{Colors, Velocities and Spectral Indices}
\begin{flushleft}
\begin{tabular}{lllcllllllllllll}
\hline\noalign{\smallskip}
Cluster& Star& J-K& Vr& Mg& H$\beta$& F492& F498& Fe501& Fe527& Fe533& Fe540& Mg1& Mg2& Mgb& MgH\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
HP1&   b&     0.52&    46.2&    1.12&    0.81&    0.83 &    0.84&    0.84&    0.82&    0.75&    0.51&    1.08 &    1.03&    0.89&    0.99\\
HP1&   cen&    0.62&    63.4&    0.90&    0.76&    0.66 &    0.99&    0.85&    0.82&    0.82&    0.49&    0.76 &    0.83&    0.88&    0.64\\
HP1&   a&     1.07&    76.3&    0.91&    0.83&    0.48 &    0.64&    0.78&    0.84&    0.82&    0.53&    0.89 &    0.89&    0.86&    0.84\\
HP1&   c&     0.87&   -56.5&    1.11&    0.85&    0.61 &    0.81&    0.83&    0.86&    0.76&    0.58&    1.05 &    1.08&    0.98&    1.05\\
HP1&   d&     0.81&   -59.4&    0.94&    0.83&    0.76 &    0.89&    0.83&    0.85&    0.81&    0.54&    0.88 &    0.83&    0.89&    0.79\\
HP1&   cen&    0.62&    55.1&    0.94&    0.78&    0.71 &    0.78&    0.83&    0.86&    0.84&    0.62&    0.82 &    0.91&    0.81&    0.69\\
N6356& x&    0.89&    52.6&    1.05&    0.82&    0.52 &    0.89&    0.82&    0.85&    0.87&    0.64&    1.04 &    0.92&    0.97&    1.00\\
N6356& 115&    1.14&    54.6&    0.96&    0.82&    0.27 &    1.25&    1.06&    0.87&    0.79&    0.51&    1.11 &    0.81&    1.13&    1.06\\
N6356& ---&    0.61&    98.6&    0.90&    0.87&    0.68 &    0.67&    0.75&    0.81&    0.75&    0.56&    0.70 &    0.74&    0.77&    0.49\\
N6356& 113&    0.66&    54.6&    0.98&    0.88&    0.66 &    0.89&    0.79&    0.89&    0.87&    0.65&    0.89 &    0.85&    0.92&    0.78\\
N6356& 111&    0.90&    36.9&    1.05&    0.77&    0.59 &    0.79&    0.79&    0.85&    0.78&    0.52&    0.99 &    0.97&    0.91&    1.03\\
N6356& y&    0.81&    54.7&    0.99&    0.79&    0.67 &    0.86&    0.82&    0.87&    0.85&    0.65&    0.89 &    0.87&    0.88&    0.81\\
N6356& 104&    0.72&    87.5&    1.00&    0.76&    0.69 &    0.79&    0.79&    0.87&    0.83&    0.62&    0.95 &    0.84&    0.83&    0.87\\
N6356& 1&    0.93&    57.2&    0.89&    0.91&    0.66 &    0.91&    0.82&    0.87&    0.82&    0.60&    0.78 &    0.78&    0.90&    0.72\\
N6356& 162&    0.35&   -94.4&    0.75&    0.81&    0.65 &    0.79&    0.74&    0.73&    0.70&    0.54&    0.63 &    0.70&    0.78&    0.55\\
N6356& 3&    0.59&    16.6&    0.82&    0.79&    0.76 &    0.77&    0.77&    0.82&    0.82&    0.72&    0.71 &    0.71&    0.85&    0.74\\
N6356& 4&    0.58&    38.3&    0.82&    0.81&    0.78 &    0.90&    0.81&    0.88&    0.78&    0.58&    0.75 &    0.78&    0.92&    0.67\\
N6356& 5&    3.63&    55.2&    0.88&    0.75&    0.70 &    0.85&    0.83&    0.88&    0.88&    0.61&    0.75 &    0.71&    0.93&    0.67\\
N6356& 37 &   0.65 &   42.5 &   1.04 &   0.84 &   0.25  &    1.06&    1.03&    0.80&    0.77&    0.54&    1.15 &    0.89&    1.17&    1.13\\
N6356& ---&    0.59&    57.9&    0.80&    0.79&    0.64 &    0.78&    0.79&    0.78&    0.75&    0.45&    0.65 &    0.71&    0.78&    0.64\\
N6356&  80 &   0.79 &   67.1 &   1.14 &   0.76 &   0.52 &   0.91 &    0.85&    0.87&    0.88&    0.62&    1.13 &    1.07&    0.93&    1.08\\
N6401& b&    0.92&  -101.2&    0.97&    0.84&    0.63 &    0.93&    0.82&    0.77&    0.74&    0.56&    0.87 &    0.87&    0.88&    0.79\\
N6401& a&    1.14&  -111.1&    0.95&    0.78&    0.68 &    0.85&    0.79&    0.79&    0.84&    0.66&    0.86 &    0.89&    0.84&    0.84\\
N6401& c&    0.98&   -70.3&    0.93&    0.78&    0.77 &    0.77&    0.77&    0.81&    0.85&    0.61&    0.83 &    0.87&    0.73&    0.75\\
N6401& 4&    0.81&   -65.8&    0.89&    0.91&    0.70 &    0.95&    0.80&    0.82&    0.81&    0.65&    0.82 &    0.83&    0.84&    0.78\\
N6401& 5&    0.92&   -14.6&    0.93&    0.83&    0.71 &    0.84&    0.82&    0.90&    0.91&    0.69&    0.86 &    0.85&    0.71&    0.85\\
N6401& 2&    0.99&  -107.2&    0.96&    0.84&    0.68 &    0.89&    0.80&    0.78&    0.85&    0.68&    0.86 &    0.93&    0.85&    0.81\\
N6401& 3&   -----&  -113.5&    1.02&    0.79&    0.55 &    0.92&    0.89&    0.74&    0.84&    0.70&    0.99 &    1.01&    0.90&    0.94\\
\noalign{\smallskip}
\hline
\end{tabular}
\end{flushleft}
\end{table*}

\addtocounter{table}{-1}

\begin{table*}
\caption[]{Colors, Velocities and Spectral Indices (continued)}
\begin{flushleft}
\begin{tabular}{lllcllllllllllll}
\hline\noalign{\smallskip}
Cluster& Star& J-K& Vr& Mg& H$\beta$& F492& F498& Fe501& Fe527& Fe533& Fe540& Mg1& Mg2& Mgb& MgH\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
N6401& 40&   -----&    41.5&    0.17&    0.88&    0.91 &    0.89&    0.74&    0.87&    0.89&    0.59&    0.79 &    0.74&    0.84&    0.57\\
N6401& g&    0.73&    75.0&    0.78&    0.95&    0.74 &    0.80&    0.84&    0.83&    0.83&    0.45&    0.68 &    0.74&    0.71&    0.77\\
N6401& d&    0.97&   -27.4&    0.84&    0.71&    0.56 &    0.75&    0.77&    0.76&    0.69&    0.46&    0.72 &    0.82&    0.69&    0.64\\
N6401& e&    0.84&  -103.6&    0.83&    0.82&    0.71 &    0.93&    0.82&    0.79&    0.71&    0.48&    0.73 &    0.80&    0.82&    0.68\\
N6401& f&    0.85&   -95.6&    0.92&    0.84&    0.70 &    0.93&    0.82&    0.72&    0.76&    0.50&    0.79 &    0.84&    0.84&    0.64\\
N6401& 9&   -----&   -54.2&    0.75&    0.91&    0.68 &    0.60&    0.75&    0.67&    0.67&    0.19&    0.70 &    0.72&    0.72&    0.70\\
N6401& 1&   -----&   -79.6&    1.03&    0.60&    0.56 &    0.78&    0.77&    0.76&    0.57&    0.41&    0.94 &    0.83&    0.97&    0.66\\
N6440& a&    1.12&    -9.6&    1.03&    0.88&    0.31 &    1.12&    0.91&    0.86&    0.76&    0.39&    1.01 &    1.02&    0.85&    1.12\\
N6440& c&    1.10&    -2.7&    0.98&    0.89&    0.01 &    0.97&    0.93&    0.93&    0.77&    0.39&    1.20 &    0.85&    1.42&    1.23\\
N6440& y&    0.42&    -0.9&    0.81&    0.76&    0.59 &    0.85&    0.72&    0.80&    0.77&    0.47&    0.67 &    0.75&    0.90&    0.56\\
N6440& b&    0.89&   -30.1&    1.02&    0.60&    0.63 &    0.85&    0.87&    0.86&    0.92&    0.47&    1.05 &    0.99&    1.24&    1.00\\
N6440& x&    1.13&    28.4&    0.92&    1.19&    0.39 &    0.75&    0.71&    0.93&    0.63&    0.50&    0.87 &    0.99&    0.78&    0.96\\
N6440& 1&    0.60&   -69.9&    0.98&    0.74&    0.58 &    1.02&    0.83&    0.80&    0.79&    0.32&    0.91 &    0.92&    0.89&    0.87\\
N6440& cen&    0.75&   -60.6&    0.97&    0.85&    0.59 &    0.88&    0.82&    0.78&    0.73&    0.36&    0.87 &    0.85&    0.88&    0.73\\
N6440& 3&    0.71&   -40.3&    0.89&    0.79&    0.54 &    0.90&    0.83&    0.81&    0.83&    0.45&    0.77 &    0.81&    0.89&    0.67\\
N6440& f&    1.17&    12.0&    0.94&    0.46&    0.27 &    1.23&    1.01&    0.83&    0.75&    0.42&    1.11 &    0.92&    1.20&    1.14\\
N6440& e&    1.30&    26.3&    1.00&    0.88&    0.57 &    1.03&    1.05&    1.01&    0.76&    0.41&    1.24 &    0.83&    1.50&    0.86\\
N6440& d&    1.07&   -46.5&    1.15&    0.72&    0.43 &    0.92&    0.77&    0.86&    0.86&    0.45&    1.10 &    1.11&    1.29&    1.13\\
Pal6&  b&    1.19&    56.4&    1.00&    0.69&    0.58 &    0.76&    0.89&    0.92&    0.84&    0.50&    0.91 &    1.06&    0.83&    0.88\\
Pal6&  d&    0.71&   201.2&    1.15&    0.64&    0.51 &    1.88&    1.16&    0.74&    0.85&    0.96&    0.93 &    0.95&    0.96&    0.61\\
Pal6&  c&    0.67&   243.3&    1.23&    1.02&    0.76 &    1.05&    0.86&    0.95&    0.77&    0.46&    1.06 &    0.99&    1.14&    0.57\\
Pal6&  f&    0.72&   200.0&    1.55&    0.71&    1.87 &    1.73&    0.84&    0.84&    1.09&    0.59&    1.51 &    0.90&    1.26&    1.91\\
N6325& a&    0.92&   119.0&    1.12&    0.80&    0.62 &    0.74&    0.78&    0.85&    0.84&    0.78&    1.06 &    1.12&    0.83&    0.92\\
N6325& cen&    0.84&   169.1&    0.90&    0.80&    0.71 &    0.84&    0.80&    0.81&    0.75&    0.79&    0.80 &    0.91&    0.75&    0.75\\
N6325& 3&   -----&   -----&    0.82&    1.11&    0.66 &    0.71&    0.72&    0.79&    0.72&    0.79&    0.72 &    0.84&    0.75&    0.67\\
N6325& 4&   -----&   -94.2&    0.89&    0.90&    0.72 &    0.91&    0.90&    0.80&    0.89&    0.80&    0.84 &    0.83&    0.90&    0.56\\
N6325& 5&   -----&   -----&    0.78&    0.90&    0.84 &    0.84&    0.83&    0.71&    0.79&    0.81&    0.69 &    0.95&    0.74&    0.74\\
\noalign{\smallskip}
\hline
\end{tabular}
\end{flushleft}
\end{table*}

\addtocounter{table}{-1}

\begin{table*}
\caption[]{Colors, Velocities and Spectral Indices (continued)}
\begin{flushleft}
\begin{tabular}{lllcllllllllllll}
\hline\noalign{\smallskip}
Cluster& Star& J-K& Vr& Mg& H$\beta$& F492& F498& Fe501& Fe527& Fe533& Fe540& Mg1& Mg2& Mgb& MgH\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
N6517& a&    0.58&   -19.0&    0.93&    0.77&    0.72 &    0.83&    0.80&    0.82&    0.76&    0.68&    0.81 &    0.94&    0.85&    0.74\\
N6517& b&    0.88&    42.6&    0.90&    0.78&    0.70 &    0.88&    0.79&    0.84&    0.78&    0.75&    0.83 &    0.95&    0.74&    0.79\\
N6517& 3&    0.40&   -44.0&    0.80&    0.78&    0.70 &    0.81&    0.77&    0.80&    0.85&    0.80&    0.72 &    0.87&    0.75&    0.68\\
N6517& 4&    0.59&    91.5&    0.79&    0.87&    0.74 &    1.03&    0.82&    0.75&    0.76&    0.67&    0.76 &    0.74&    0.89&    0.78\\
N6517& cen&    0.34&    13.2&    0.85&    0.84&    0.69 &    0.85&    0.78&    0.78&    0.84&    0.77&    0.77 &    0.90&    0.79&    0.72\\
N6517& ---&   -----&  -282.3&    0.83&    0.87&    0.66 &    0.93&    0.85&    0.82&    0.73&    0.69&    0.75 &    0.93&    0.79&    0.70\\
N6517& ---&   -----&    46.8&    0.81&    0.81&    0.80 &    0.77&    0.64&    0.77&    0.75&    0.82&    0.67 &    0.98&    0.65&    0.77\\
N6642& ---&   -----&  -126.6&    0.95&    0.89&    0.78 &    0.84&    0.82&    0.85&    0.83&    0.80&    0.88 &    0.90&    0.80&    0.81\\
N6642& a&    0.92&    61.2&    0.98&    0.78&    0.72 &    0.79&    0.80&    0.83&    0.81&    0.86&    0.92 &    0.97&    0.85&    0.87\\
N6642& b&    0.29&   -11.9&    0.94&    0.94&    0.79 &    0.78&    0.79&    0.82&    0.78&    0.77&    0.87 &    0.91&    0.75&    0.82\\
N6642& 3&    0.25&    99.6&    1.04&    0.74&    0.71 &    0.84&    0.82&    0.88&    0.77&    0.84&    0.97 &    1.02&    0.88&    0.71\\
N6642& 4&   -----&   295.1&    1.02&    0.80&    0.70 &    0.72&    0.75&    0.77&    0.78&    0.80&    1.00 &    0.95&    0.88&    0.83\\
N6642& 5&   -----&   171.8&    0.85&    0.75&    0.64 &    0.79&    0.78&    0.82&    0.82&    0.79&    0.76 &    0.89&    0.76&    0.64\\
N6642& 6&   -----&    59.2&    0.86&    0.62&    0.71 &    0.83&    0.78&    0.81&    0.75&    0.75&    0.77 &    0.90&    0.79&    0.71\\
N6642& 7&   -----&    86.9&    0.86&    0.88&    0.73 &    0.86&    0.81&    0.81&    0.76&    0.70&    0.81 &    0.86&    0.84&    0.72\\
N6642& cen&    0.76&    37.4&    1.05&    0.83&    0.74 &    0.85&    0.83&    0.84&    0.76&    0.71&    0.99 &    1.05&    0.90&    0.96\\
N6642& c&    0.92&   -69.9&    0.71&    0.91&    0.85 &    0.76&    0.82&    0.80&    0.75&    0.81&    0.69 &    0.44&    0.86&    0.54\\
N6642& 3&   -----&   -44.2&    0.86&    0.87&    0.80 &    0.93&    0.81&    0.78&    0.81&    0.79&    0.74 &    0.80&    0.80&    0.70\\
N6642& 4&   -----&    45.3&    0.77&    0.80&    0.71 &    0.85&    0.80&    0.84&    0.79&    0.82&    0.71 &    0.71&    0.82&    0.68\\
N6642& 5&    0.46&   -38.0&    0.82&    0.99&    0.76 &    0.81&    0.81&    0.71&    0.79&    0.77&    0.72 &    0.82&    0.77&    0.59\\
N6642& 6&   -----&   103.9&    0.69&    0.96&    0.71 &    0.87&    0.82&    0.84&    0.71&    0.81&    0.65 &    0.67&    0.80&    0.60\\
M22&   203&    0.85&  -183.0&    0.85&    0.75&    0.67 &    0.83&    0.77&    0.76&    0.77&    1.06&    0.73 &    0.76&    0.77&    0.72\\
M22&   315&    1.25&  -115.2&    0.85&    1.01&    0.68 &    0.99&    0.83&    0.86&    0.84&    0.95&    0.74 &    0.62&    0.86&    0.68\\
M22&   510&    0.76&   -77.1&    0.76&    0.76&    0.70 &    0.87&    0.81&    0.81&    0.75&    1.02&    0.64 &    0.57&    0.87&    0.64\\
M22&   572&    0.25&  -112.9&    0.75&    0.85&    0.61 &    0.80&    0.73&    0.75&    0.69&    0.97&    0.63 &    0.66&    0.75&    0.60\\
M22&   478&    0.44&  -160.7&    0.77&    0.82&    0.75 &    0.88&    0.79&    0.69&    0.65&    0.98&    0.62 &    0.63&    0.74&    0.57\\
M22&   053&    0.58&   -48.3&    0.92&    0.90&    0.68 &    0.95&    0.83&    0.82&    0.75&    0.78&    0.88 &    1.09&    0.82&    0.69\\
M22&   408&    1.01&  -160.2&    0.85&    1.26&    1.06 &    0.79&    0.77&    0.75&    0.66&    0.89&    0.83 &    1.16&    0.84&    0.75\\
M22&   467&    1.00&  -138.5&    0.79&    0.85&    0.65 &    0.95&    0.80& 0.78& 0.80&    0.75&    0.76 &    1.00&    0.79&    0.76\\
\noalign{\smallskip}
\hline
\end{tabular}
\end{flushleft}
\end{table*}

\end{document}
