# RA(1950) Dec(1950) V V � R R � I IHff 1 22 33 11.1 +75 2 38 15.42 1.54 1.08 s 2 22 35 3.0 +75 2 58 16.35 1.37 1.40 w 3 22 36 43.4 +74 48 30 14.98 1.50 0.55 s 39 22 34 14.8 +75 3 14 15.68 1.35 0.95 w 40 22 35 0.9 +75 0 53 14.60 1.15 0.45 w 41 22 35 50.9 +75 1 39 15.08 1.08 1.00 m 42 22 36 16.0 +74 59 50 16.28 1.20 0.85 w 43 22 36 23.4 +74 59 49 16.20 1.50 1.37 m 44 22 37 36.5 +74 56 6 15.88 1.30 1.03 w 45 22 38 20.3 +74 54 49 16.03 1.23 1.30 m 46 22 38 33.5 +74 57 42 16.75 1.82 1.58 w 47 22 39 57.4 +74 47 6 16.25 1.68 0.68 w