\documentstyle[11pt]{article}
\oddsidemargin -0.5in
\topmargin -0.5in
\textheight 9.0in
\textwidth 6.25in
\pagestyle{empty}
\setlength{\baselineskip}{24pt}

\begin{document}


\begin{table*}
\begin{tabular}{lrrrrcrcrc}
\multicolumn{1}{c}{Name}&
\multicolumn{1}{r}{$\Delta \alpha_{\rm rad - opt}$}&\multicolumn{1}{r}{$\Delta \delta_{\rm rad - opt}$}&
\multicolumn{1}{r}{$\sqrt{(\Delta \alpha)^2 + (\Delta \delta)^2}$}& $E$-class & $E$ & $O$-class & $O$ &
\multicolumn{1}{c}{$O-E$}& Notes \\
             &        &        &        &     &     &   &     &       & \\
 7C1741+6704 &    5.0\hspace{5mm} &     .4\hspace{5mm} &    5.1\hspace{10mm} &   -1\hspace{5mm} &19.92& -\hspace{5mm} &  -  &$>$2.21& 2 \\    
 7C1742+6641 &   10.7\hspace{5mm} &    5.8\hspace{5mm} &   12.1\hspace{10mm} &   -1\hspace{5mm} &19.96& -\hspace{5mm} &  -  &$>$2.17& \\    
 7C1743+6606 &   -4.4\hspace{5mm} &  -13.3\hspace{5mm} &   14.1\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.82&$<$1.82&\\    
 7C1743+6843a&     .3\hspace{5mm} &  -10.8\hspace{5mm} &   10.8\hspace{10mm} &    1\hspace{5mm} &17.80&-1\hspace{5mm} &21.29&   3.49&\\    
 7C1743+6843b&    2.0\hspace{5mm} &    -.5\hspace{5mm} &    2.1\hspace{10mm} &    1\hspace{5mm} &19.43& -\hspace{5mm} &  -  &$>$2.70&\\    
 7C1743+6431a&    3.6\hspace{5mm} &    1.1\hspace{5mm} &    3.7\hspace{10mm} &   -1\hspace{5mm} &19.55& -\hspace{5mm} &  -  &$>$2.58& 2 \\    
 7C1743+6431b&   12.5\hspace{5mm} &    4.3\hspace{5mm} &   13.2\hspace{10mm} &   -1\hspace{5mm} &19.75& -\hspace{5mm} &  -  &$>$2.38& 2 \\    
 7C1743+6639 &    1.0\hspace{5mm} &    1.3\hspace{5mm} &    1.6\hspace{10mm} &    1\hspace{5mm} &17.31& 1\hspace{5mm} &20.58&   3.27& 1 \\    
 7C1745+6624 &    8.7\hspace{5mm} &  -10.5\hspace{5mm} &   13.6\hspace{10mm} &   -1\hspace{5mm} &17.66&-1\hspace{5mm} &20.21&   2.55&\\    
 7C1746+6544 &    -.8\hspace{5mm} &    7.2\hspace{5mm} &    7.3\hspace{10mm} &   -1\hspace{5mm} &19.87& -\hspace{5mm} &  -  &$>$2.26&\\    
 7C1747+6346 &   -4.6\hspace{5mm} &    7.1\hspace{5mm} &    8.4\hspace{10mm} &    1\hspace{5mm} &18.19& -\hspace{5mm} &  -  &$>$3.94&\\    
 7C1747+6727 &  -11.4\hspace{5mm} &    3.5\hspace{5mm} &   12.0\hspace{10mm} &    1\hspace{5mm} &17.21&-1\hspace{5mm} &19.51&   2.30&\\    
 7C1747+6810 &   -2.5\hspace{5mm} &   -7.6\hspace{5mm} &    8.0\hspace{10mm} &    1\hspace{5mm} &15.33& 1\hspace{5mm} &18.34&   3.02&\\    
 7C1748+6703 &    6.2\hspace{5mm} &   13.1\hspace{5mm} &   14.5\hspace{10mm} &   -1\hspace{5mm} &19.14& -\hspace{5mm} &  -  &$>$2.99& 2 \\    
 7C1748+6341 &   -2.8\hspace{5mm} &    2.8\hspace{5mm} &    4.0\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.40&$<$1.40&\\    
 7C1749+6413 &    1.2\hspace{5mm} &   -5.1\hspace{5mm} &    5.2\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.64&$<$1.64&\\    
 7C1750+6825 &    -.9\hspace{5mm} &    1.7\hspace{5mm} &    1.9\hspace{10mm} &    1\hspace{5mm} &11.35& 1\hspace{5mm} &12.94&   1.59&\\    
 7C1750+6643 &  -14.6\hspace{5mm} &    1.9\hspace{5mm} &   14.8\hspace{10mm} &   -1\hspace{5mm} &17.91&-1\hspace{5mm} &20.67&   2.75&\\    
 7C1751+6809 &   12.3\hspace{5mm} &    6.4\hspace{5mm} &   13.8\hspace{10mm} &    1\hspace{5mm} &19.94& -\hspace{5mm} &  -  &$>$2.19& 2 \\    
 7C1751+6741 &   -8.2\hspace{5mm} &    -.8\hspace{5mm} &    8.2\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.73&$<$1.73& 2 \\    
 7C1751+6719 &   12.2\hspace{5mm} &   -6.6\hspace{5mm} &   13.9\hspace{10mm} &    1\hspace{5mm} &19.05& -\hspace{5mm} &  -  &$>$3.08&\\    
 7C1751+6455 &     .4\hspace{5mm} &    1.5\hspace{5mm} &    1.5\hspace{10mm} &    1\hspace{5mm} &17.23& 2\hspace{5mm} &20.56&   3.34& 1 \\    
 7C1751+6551 &     .8\hspace{5mm} &     .5\hspace{5mm} &     .9\hspace{10mm} &   -1\hspace{5mm} &19.47& -\hspace{5mm} &  -  &$>$2.66&\\    
 7C1753+6747 &    -.2\hspace{5mm} &    1.2\hspace{5mm} &    1.3\hspace{10mm} &    1\hspace{5mm} &18.25&-1\hspace{5mm} &19.63&   1.38&\\    
 7C1753+6543 &     .2\hspace{5mm} &     .9\hspace{5mm} &     .9\hspace{10mm} &    1\hspace{5mm} &17.41& 1\hspace{5mm} &19.89&   2.48& 1 \\    
 7C1753+6635 &   -4.7\hspace{5mm} &   -9.4\hspace{5mm} &   10.5\hspace{10mm} &   -1\hspace{5mm} &14.79& 1\hspace{5mm} &15.96&   1.16&\\    
 7C1754+6420 &  -12.0\hspace{5mm} &    9.0\hspace{5mm} &   15.0\hspace{10mm} &   -1\hspace{5mm} &19.86& -\hspace{5mm} &  -  &$>$2.27&\\    
 7C1754+6328 &   -2.1\hspace{5mm} &   -4.5\hspace{5mm} &    5.0\hspace{10mm} &    2\hspace{5mm} &16.39& -\hspace{5mm} &  -  &$>$5.74&\\
 7C1754+6737 &    6.6\hspace{5mm} &   -9.3\hspace{5mm} &   11.4\hspace{10mm} &   -1\hspace{5mm} &19.86& -\hspace{5mm} &  -  &$>$2.27&\\    
 7C1754+6311 &     .6\hspace{5mm} &   -1.5\hspace{5mm} &    1.6\hspace{10mm} &    0\hspace{5mm} &  -  &-1\hspace{5mm} &21.56&$<$1.56& 1 \\    
 7C1755+6314 &   -1.5\hspace{5mm} &    4.1\hspace{5mm} &    4.4\hspace{10mm} &    1\hspace{5mm} &18.76& -\hspace{5mm} &  -  &$>$3.37& 1 \\    
 7C1755+6838a&   -2.9\hspace{5mm} &  -11.1\hspace{5mm} &   11.5\hspace{10mm} &   -1\hspace{5mm} &19.02& -\hspace{5mm} &  -  &$>$3.11&\\    
 7C1755+6838b&    5.5\hspace{5mm} &   -5.8\hspace{5mm} &    8.0\hspace{10mm} &   -1\hspace{5mm} &15.67&-1\hspace{5mm} &16.95&   1.28&\\    
 7C1755+6450 &   12.6\hspace{5mm} &    -.4\hspace{5mm} &   12.6\hspace{10mm} &   -1\hspace{5mm} &19.47& 1\hspace{5mm} &22.02&   2.55&\\    
 7C1755+6830 &    1.7\hspace{5mm} &   -1.4\hspace{5mm} &    2.2\hspace{10mm} &    1\hspace{5mm} &19.95& -\hspace{5mm} &  -  &$>$2.18& 1 \\    
 7C1756+6541 &     .7\hspace{5mm} &    4.8\hspace{5mm} &    4.9\hspace{10mm} &    1\hspace{5mm} &  -  &-1\hspace{5mm} &21.50&$<$1.50&\\    
 7C1756+6633 &    6.3\hspace{5mm} &  -11.3\hspace{5mm} &   12.9\hspace{10mm} &   -1\hspace{5mm} &15.97&-1\hspace{5mm} &17.24&   1.27&\\    
 7C1756+6520 &   -7.9\hspace{5mm} &   -8.9\hspace{5mm} &   11.9\hspace{10mm} &    0\hspace{5mm} &  -  & 1\hspace{5mm} &18.80&$<$1.20&\\    
 7C1757+6747 &    3.2\hspace{5mm} &     .0\hspace{5mm} &    3.2\hspace{10mm} &    0\hspace{5mm} &  -  &-1\hspace{5mm} &21.36&$<$1.36&\\    
 7C1757+6424 &   -2.1\hspace{5mm} &    3.0\hspace{5mm} &    3.7\hspace{10mm} &   -1\hspace{5mm} &18.22&-1\hspace{5mm} &20.82&   2.60&\\    
 7C1757+6654 &   -7.7\hspace{5mm} &    1.1\hspace{5mm} &    7.8\hspace{10mm} &   -1\hspace{5mm} &19.83& -\hspace{5mm} &  -  &$>$2.30&\\    
 7C1757+6536 &   -4.2\hspace{5mm} &    4.8\hspace{5mm} &    6.4\hspace{10mm} &   -1\hspace{5mm} &19.31&-1\hspace{5mm} &22.03&   2.72&\\    
 7C1757+6414 &   -2.4\hspace{5mm} &    9.6\hspace{5mm} &    9.9\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &20.74&$<$ .74&\\    
 7C1757+6515 &   -1.5\hspace{5mm} &     .9\hspace{5mm} &    1.8\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.32&$<$1.32&\\    
 7C1757+6417a&   -7.0\hspace{5mm} &    4.7\hspace{5mm} &    8.5\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.89&$<$1.89&\\    
 7C1757+6417b&    2.0\hspace{5mm} &    -.1\hspace{5mm} &    2.0\hspace{10mm} &   -1\hspace{5mm} &17.96&-1\hspace{5mm} &20.82&   2.86&\\    
 7C1757+6741 &    5.0\hspace{5mm} &    1.2\hspace{5mm} &    5.1\hspace{10mm} &   -1\hspace{5mm} &19.30& -\hspace{5mm} &  -  &$>$2.83& 2 \\    
 7C1758+6554 &   -2.4\hspace{5mm} &    6.8\hspace{5mm} &    7.2\hspace{10mm} &   -1\hspace{5mm} &18.71&-1\hspace{5mm} &21.91&   3.20& 2 \\    
 7C1759+6531 &   -1.5\hspace{5mm} &   -9.0\hspace{5mm} &    9.1\hspace{10mm} &   -1\hspace{5mm} &19.99& -\hspace{5mm} &  -  &$>$2.14&\\    
 7C1800+6619 &   -3.7\hspace{5mm} &  -12.8\hspace{5mm} &   13.3\hspace{10mm} &   -1\hspace{5mm} &19.84& -\hspace{5mm} &  -  &$>$2.29&\\    
\end{tabular}
\end{table*}

\begin{table*}
\begin{tabular}{lrrrrcrcrc}
\multicolumn{1}{c}{Name}&
\multicolumn{1}{r}{$\Delta \alpha_{\rm rad - opt}$}&\multicolumn{1}{r}{$\Delta \delta_{\rm rad - opt}$}&
\multicolumn{1}{r}{$\sqrt{(\Delta \alpha)^2 + (\Delta \delta)^2}$}& $E$-class & $E$ & $O$-class & $O$ &
\multicolumn{1}{c}{$O-E$}& Notes\\
             &        &        &        &     &     &   &     &       & \\
 7C1800+6415 &     .2\hspace{5mm} &     .2\hspace{5mm} &     .3\hspace{10mm} &   -1\hspace{5mm} &17.30&-1\hspace{5mm} &20.61&   3.31&\\    
 7C1800+6317 &   -5.2\hspace{5mm} &    3.4\hspace{5mm} &    6.2\hspace{10mm} &    1\hspace{5mm} &19.99& -\hspace{5mm} &  -  &$>$2.14&\\    
 7C1800+6505 &    -.7\hspace{5mm} &    9.5\hspace{5mm} &    9.6\hspace{10mm} &   -1\hspace{5mm} &19.33&-1\hspace{5mm} &22.09&   2.76&\\    
 7C1801+6902 &    -.7\hspace{5mm} &   -4.0\hspace{5mm} &    4.0\hspace{10mm} &    2\hspace{5mm} &18.56&-1\hspace{5mm} &20.43&   1.87& 1 \\    
 7C1801+6819 &    2.3\hspace{5mm} &    7.3\hspace{5mm} &    7.7\hspace{10mm} &   -1\hspace{5mm} &18.73&-1\hspace{5mm} &19.91&   1.18&\\    
 7C1802+6527 &    4.8\hspace{5mm} &   -2.9\hspace{5mm} &    5.6\hspace{10mm} &   -1\hspace{5mm} &19.09&-1\hspace{5mm} &21.19&   2.11&\\    
 7C1803+6817 &    2.1\hspace{5mm} &   -3.9\hspace{5mm} &    4.4\hspace{10mm} &   -1\hspace{5mm} &17.42&-1\hspace{5mm} &20.57&   3.15&\\    
 7C1803+6605a&   -9.9\hspace{5mm} &     .1\hspace{5mm} &    9.9\hspace{10mm} &   -1\hspace{5mm} &18.70&-1\hspace{5mm} &21.31&   2.61& 2 \\    
 7C1803+6605b&    6.9\hspace{5mm} &   10.0\hspace{5mm} &   12.2\hspace{10mm} &   -1\hspace{5mm} &16.18&-1\hspace{5mm} &17.46&   1.28& 2 \\    
 7C1803+6548 &   -1.2\hspace{5mm} &    -.4\hspace{5mm} &    1.3\hspace{10mm} &    1\hspace{5mm} &18.97&-1\hspace{5mm} &20.43&   1.47&\\    
 7C1804+6806 &   10.2\hspace{5mm} &   10.0\hspace{5mm} &   14.3\hspace{10mm} &   -1\hspace{5mm} &17.14&-1\hspace{5mm} &18.35&   1.21&\\    
 7C1804+6550a&    6.6\hspace{5mm} &   -9.5\hspace{5mm} &   11.6\hspace{10mm} &    1\hspace{5mm} &19.75& -\hspace{5mm} &  -  &$>$2.38&\\    
 7C1804+6550b&  -11.9\hspace{5mm} &   -5.2\hspace{5mm} &   13.0\hspace{10mm} &   -1\hspace{5mm} &19.56& -\hspace{5mm} &  -  &$>$2.57&\\    
 7C1804+6550c&    5.8\hspace{5mm} &    7.9\hspace{5mm} &    9.7\hspace{10mm} &    1\hspace{5mm} &17.23& 1\hspace{5mm} &20.71&   3.48&\\    
 7C1804+6300 &   -3.9\hspace{5mm} &   10.0\hspace{5mm} &   10.7\hspace{10mm} &   -1\hspace{5mm} &19.83& -\hspace{5mm} &  -  &$>$2.30&\\    
 7C1804+6625a&    5.4\hspace{5mm} &   -8.9\hspace{5mm} &   10.4\hspace{10mm} &   -1\hspace{5mm} &19.48& -\hspace{5mm} &  -  &$>$2.65& 2 \\    
 7C1804+6625b&     .3\hspace{5mm} &     .1\hspace{5mm} &     .3\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &20.96&$<$ .96& 1 \\    
 7C1804+6625c&   -3.8\hspace{5mm} &    9.0\hspace{5mm} &    9.8\hspace{10mm} &    1\hspace{5mm} &19.98& -\hspace{5mm} &  -  &$>$2.15& 2 \\    
 7C1804+6313 &    9.6\hspace{5mm} &    3.8\hspace{5mm} &   10.3\hspace{10mm} &   -1\hspace{5mm} &17.65&-1\hspace{5mm} &21.16&   3.51& 2 \\    
 7C1804+6308 &   -2.0\hspace{5mm} &    -.7\hspace{5mm} &    2.1\hspace{10mm} &   -1\hspace{5mm} &17.46&-1\hspace{5mm} &17.90&    .44&\\    
 7C1804+6857 &    2.2\hspace{5mm} &   -5.5\hspace{5mm} &    5.9\hspace{10mm} &   -1\hspace{5mm} &19.97& -\hspace{5mm} &  -  &$>$2.16&\\    
 7C1805+6709 &  -13.0\hspace{5mm} &    -.4\hspace{5mm} &   13.0\hspace{10mm} &   -1\hspace{5mm} &18.60&-1\hspace{5mm} &20.63&   2.03&\\    
 7C1805+6255 &   -1.7\hspace{5mm} &   -8.9\hspace{5mm} &    9.0\hspace{10mm} &    1\hspace{5mm} &19.50&-1\hspace{5mm} &20.87&   1.37&\\    
 7C1805+6829 &   -3.7\hspace{5mm} &   10.4\hspace{5mm} &   11.0\hspace{10mm} &   -1\hspace{5mm} &19.67& -\hspace{5mm} &  -  &$>$2.46&\\    
 7C1806+6409a&   -7.7\hspace{5mm} &  -11.1\hspace{5mm} &   13.5\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &20.18&$<$ .18&\\    
 7C1806+6409b&    8.4\hspace{5mm} &  -10.8\hspace{5mm} &   13.7\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &22.11&$<$2.11&\\    
 7C1806+6456 &   14.0\hspace{5mm} &    4.9\hspace{5mm} &   14.8\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.90&$<$1.90&\\    
 7C1806+6529 &    5.9\hspace{5mm} &   -2.9\hspace{5mm} &    6.6\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.99&$<$1.99&\\    
 7C1807+6831 &    3.4\hspace{5mm} &   -1.6\hspace{5mm} &    3.7\hspace{10mm} &    1\hspace{5mm} &19.73& -\hspace{5mm} &  -  &$>$2.40& 1 \\    
 7C1807+6618 &   -6.0\hspace{5mm} &  -10.0\hspace{5mm} &   11.6\hspace{10mm} &    0\hspace{5mm} &19.31& -\hspace{5mm} &  -  &$>$2.82&\\    
 7C1807+6428 &     .7\hspace{5mm} &    4.3\hspace{5mm} &    4.4\hspace{10mm} &   -1\hspace{5mm} &17.36&-1\hspace{5mm} &19.45&   2.09&\\    
 7C1807+6719a&    -.6\hspace{5mm} &   10.3\hspace{5mm} &   10.3\hspace{10mm} &    1\hspace{5mm} &19.97& -\hspace{5mm} &  -  &$>$2.16&\\    
 7C1807+6719b&    1.6\hspace{5mm} &   -4.0\hspace{5mm} &    4.3\hspace{10mm} &   -1\hspace{5mm} &19.95& -\hspace{5mm} &  -  &$>$2.18&\\    
 7C1807+6627 &   10.1\hspace{5mm} &   -9.4\hspace{5mm} &   13.8\hspace{10mm} &   -1\hspace{5mm} &18.69&-1\hspace{5mm} &21.84&   3.15&\\    
 7C1807+6841 &    6.4\hspace{5mm} &  -12.8\hspace{5mm} &   14.3\hspace{10mm} &   -1\hspace{5mm} &15.18&-1\hspace{5mm} &16.62&   1.43& 2 \\    
 7C1807+6743 &    7.2\hspace{5mm} &   -5.6\hspace{5mm} &    9.1\hspace{10mm} &   -1\hspace{5mm} &19.51& -\hspace{5mm} &  -  &$>$2.62& 2 \\    
 7C1807+6604 &  -10.2\hspace{5mm} &     .6\hspace{5mm} &   10.3\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.81&$<$1.81&\\    
 7C1809+6259 &    3.2\hspace{5mm} &  -11.2\hspace{5mm} &   11.6\hspace{10mm} &   -1\hspace{5mm} &18.41&-1\hspace{5mm} &19.80&   1.39&\\    
 7C1809+6330 &   -5.7\hspace{5mm} &  -13.5\hspace{5mm} &   14.6\hspace{10mm} &   -1\hspace{5mm} &15.95&-1\hspace{5mm} &18.33&   2.38&\\    
 7C1809+6344 &   12.2\hspace{5mm} &     .4\hspace{5mm} &   12.2\hspace{10mm} &   -1\hspace{5mm} &17.12&-1\hspace{5mm} &18.46&   1.35&\\    
 7C1810+6634 &    6.3\hspace{5mm} &    5.5\hspace{5mm} &    8.4\hspace{10mm} &    1\hspace{5mm} &19.97& -\hspace{5mm} &  -  &$>$2.16&\\    
 7C1810+6831 &     .3\hspace{5mm} &   -5.3\hspace{5mm} &    5.3\hspace{10mm} &    1\hspace{5mm} &18.00&-1\hspace{5mm} &21.77&   3.76&\\    
 7C1811+6313 &   -2.0\hspace{5mm} &    5.4\hspace{5mm} &    5.8\hspace{10mm} &   -1\hspace{5mm} &19.89&-1\hspace{5mm} &21.62&   1.73&\\    
 7C1811+6321 &  -11.6\hspace{5mm} &    4.5\hspace{5mm} &   12.4\hspace{10mm} &    2\hspace{5mm} &19.51& -\hspace{5mm} &  -  &$>$2.62& 1 \\    
 7C1811+6748 &   -9.9\hspace{5mm} &   -2.8\hspace{5mm} &   10.3\hspace{10mm} &   -1\hspace{5mm} &16.20&-1\hspace{5mm} &17.72&   1.52&\\    
 7C1811+6446a&   12.0\hspace{5mm} &    7.8\hspace{5mm} &   14.3\hspace{10mm} &   -1\hspace{5mm} &15.94&-1\hspace{5mm} &16.89&    .95&\\    
 7C1811+6446b&     .9\hspace{5mm} &  -15.0\hspace{5mm} &   15.0\hspace{10mm} &   -1\hspace{5mm} &18.21&-1\hspace{5mm} &19.54&   1.32&\\    
 7C1811+6446c&   -5.6\hspace{5mm} &   -1.4\hspace{5mm} &    5.8\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &22.08&$<$2.08&\\    
 7C1812+6321a&   -2.3\hspace{5mm} &    -.5\hspace{5mm} &    2.3\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &22.00&$<$2.00&\\    
 7C1812+6321b&   14.3\hspace{5mm} &     .0\hspace{5mm} &   14.3\hspace{10mm} &   -1\hspace{5mm} &19.96& 1\hspace{5mm} &21.95&   1.99&\\    
\end{tabular}
\end{table*}

\begin{table*}
\begin{tabular}{lrrrrcrcrc}
\multicolumn{1}{c}{Name}&
\multicolumn{1}{r}{$\Delta \alpha_{\rm rad - opt}$}&\multicolumn{1}{r}{$\Delta \delta_{\rm rad - opt}$}&
\multicolumn{1}{r}{$\sqrt{(\Delta \alpha)^2 + (\Delta \delta)^2}$}& $E$-class & $E$ & $O$-class & $O$ &
\multicolumn{1}{c}{$O-E$}&Notes\\
             &        &        &        &     &     &   &     &       &\\
 7C1813+6846 &   -1.4\hspace{5mm} &    -.2\hspace{5mm} &    1.4\hspace{10mm} &    1\hspace{5mm} &16.92& 1\hspace{5mm} &18.12&   1.20& 2 \\    
 7C1813+6718 &   -1.9\hspace{5mm} &    8.6\hspace{5mm} &    8.8\hspace{10mm} &   -1\hspace{5mm} &15.45&-1\hspace{5mm} &17.28&   1.83&\\    
 7C1813+6439a&   -2.4\hspace{5mm} &   -7.5\hspace{5mm} &    7.9\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &21.54&$<$1.54& 2 \\    
 7C1813+6439b&    4.2\hspace{5mm} &    5.5\hspace{5mm} &    6.9\hspace{10mm} &   -1\hspace{5mm} &19.95& -\hspace{5mm} &  -  &$>$2.18& 2 \\    
 7C1814+6811 &    8.2\hspace{5mm} &    9.9\hspace{5mm} &   12.9\hspace{10mm} &   -1\hspace{5mm} &19.44& -\hspace{5mm} &  -  &$>$2.69&\\    
 7C1814+6702a&   -7.0\hspace{5mm} &    2.9\hspace{5mm} &    7.6\hspace{10mm} &   -1\hspace{5mm} &18.58& -\hspace{5mm} &  -  &$>$3.55& 2 \\    
 7C1814+6702b&    4.3\hspace{5mm} &    8.6\hspace{5mm} &    9.6\hspace{10mm} &    2\hspace{5mm} &17.94& -\hspace{5mm} &  -  &$>$4.19& 2 \\    
 7C1814+6816 &    7.0\hspace{5mm} &   -5.6\hspace{5mm} &    9.0\hspace{10mm} &   -1\hspace{5mm} &17.71&-1\hspace{5mm} &19.76&   2.05&\\    
 7C1814+6400a&   -3.7\hspace{5mm} &   -7.2\hspace{5mm} &    8.1\hspace{10mm} &   -1\hspace{5mm} &19.87&-1\hspace{5mm} &21.27&   1.40&\\    
 7C1814+6400b&    3.2\hspace{5mm} &    3.3\hspace{5mm} &    4.6\hspace{10mm} &   -1\hspace{5mm} &17.56&-1\hspace{5mm} &18.68&   1.12&\\    
 7C1814+6550 &     .1\hspace{5mm} &   -1.5\hspace{5mm} &    1.5\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.42&$<$1.42& 1 \\    
 7C1814+6557a&  -13.4\hspace{5mm} &   -2.4\hspace{5mm} &   13.6\hspace{10mm} &   -1\hspace{5mm} &19.95& -\hspace{5mm} &  -  &$>$2.18&\\    
 7C1814+6557b&   -3.0\hspace{5mm} &     .0\hspace{5mm} &    3.0\hspace{10mm} &   -1\hspace{5mm} &19.89& -\hspace{5mm} &  -  &$>$2.24&\\    
 7C1814+6557c&    1.1\hspace{5mm} &   -5.0\hspace{5mm} &    5.1\hspace{10mm} &   -1\hspace{5mm} &19.85& -\hspace{5mm} &  -  &$>$2.28&\\    
 7C1814+6557d&    4.9\hspace{5mm} &   12.8\hspace{5mm} &   13.8\hspace{10mm} &   -1\hspace{5mm} &14.94&-1\hspace{5mm} &16.26&   1.32&\\    
 7C1814+6529 &   -5.0\hspace{5mm} &    8.7\hspace{5mm} &   10.1\hspace{10mm} &    2\hspace{5mm} &18.18& -\hspace{5mm} &  -  &$>$3.95&\\    
 7C1815+6800 &   -6.3\hspace{5mm} &    8.0\hspace{5mm} &   10.2\hspace{10mm} &    -\hspace{5mm} &  -  & 0\hspace{5mm} &22.11&$<$2.11&\\    
 7C1815+6505 &   -8.3\hspace{5mm} &   -8.7\hspace{5mm} &   12.0\hspace{10mm} &   -1\hspace{5mm} &18.63&-1\hspace{5mm} &19.06&    .43&\\    
 7C1815+6530a&    -.1\hspace{5mm} &   12.3\hspace{5mm} &   12.3\hspace{10mm} &   -1\hspace{5mm} &19.88& -\hspace{5mm} &  -  &$>$2.25& 2 \\    
 7C1815+6530b&    6.7\hspace{5mm} &    3.2\hspace{5mm} &    7.5\hspace{10mm} &   -1\hspace{5mm} &19.96& -\hspace{5mm} &  -  &$>$2.17& 2 \\    
 7C1815+6530c&    7.5\hspace{5mm} &  -10.7\hspace{5mm} &   13.1\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &21.95&$<$1.95& 2 \\    
 7C1815+6411a&   -5.2\hspace{5mm} &    -.6\hspace{5mm} &    5.2\hspace{10mm} &    1\hspace{5mm} &17.66& 1\hspace{5mm} &20.84&   3.18&\\    
 7C1815+6411b&    4.3\hspace{5mm} &   13.3\hspace{5mm} &   14.0\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.80&$<$1.80&\\    
 7C1815+6411c&    4.3\hspace{5mm} &     .5\hspace{5mm} &    4.4\hspace{10mm} &   -1\hspace{5mm} &18.49&-1\hspace{5mm} &20.77&   2.28&\\    
 7C1815+6805 &    2.5\hspace{5mm} &   -2.7\hspace{5mm} &    3.7\hspace{10mm} &    1\hspace{5mm} &17.93&-1\hspace{5mm} &21.99&   4.07& 1 \\    
 7C1816+6812a&   -5.9\hspace{5mm} &   11.3\hspace{5mm} &   12.8\hspace{10mm} &    1\hspace{5mm} &17.77&-1\hspace{5mm} &21.92&   4.16&\\    
 7C1816+6812b&   -5.4\hspace{5mm} &   -1.9\hspace{5mm} &    5.7\hspace{10mm} &   -1\hspace{5mm} &17.82&-1\hspace{5mm} &20.41&   2.59&\\    
 7C1816+6546 &   -9.1\hspace{5mm} &     .6\hspace{5mm} &    9.2\hspace{10mm} &    1\hspace{5mm} &17.91& 1\hspace{5mm} &18.82&    .91&\\    
 7C1816+6654a&    6.7\hspace{5mm} &    6.0\hspace{5mm} &    9.0\hspace{10mm} &   -1\hspace{5mm} &13.30&-1\hspace{5mm} &14.71&   1.41&\\    
 7C1816+6654b&    2.0\hspace{5mm} &  -12.7\hspace{5mm} &   12.8\hspace{10mm} &    1\hspace{5mm} &19.29&-1\hspace{5mm} &22.12&   2.83&\\    
 7C1816+6710 &   11.2\hspace{5mm} &     .5\hspace{5mm} &   11.2\hspace{10mm} &    1\hspace{5mm} &19.76& -\hspace{5mm} &  -  &$>$2.37& 2 \\    
 7C1816+6436 &    8.9\hspace{5mm} &   -9.3\hspace{5mm} &   12.8\hspace{10mm} &   -1\hspace{5mm} &18.83& 2\hspace{5mm} &21.52&   2.69&\\    
 7C1817+6611a&   -2.7\hspace{5mm} &  -14.3\hspace{5mm} &   14.6\hspace{10mm} &   -1\hspace{5mm} &19.63& -\hspace{5mm} &  -  &$>$2.50&\\    
 7C1817+6611b&    6.7\hspace{5mm} &   -8.5\hspace{5mm} &   10.8\hspace{10mm} &    0\hspace{5mm} &19.64& -\hspace{5mm} &  -  &$>$2.49&\\    
 7C1817+6823 &     .6\hspace{5mm} &    7.0\hspace{5mm} &    7.1\hspace{10mm} &    1\hspace{5mm} &17.41& 1\hspace{5mm} &20.62&   3.21&\\    
 7C1818+6339a&  -11.6\hspace{5mm} &   -7.3\hspace{5mm} &   13.7\hspace{10mm} &   -1\hspace{5mm} &17.64&-1\hspace{5mm} &18.54&    .91&\\    
 7C1818+6339b&   -6.7\hspace{5mm} &    5.4\hspace{5mm} &    8.6\hspace{10mm} &   -1\hspace{5mm} &17.07&-1\hspace{5mm} &19.94&   2.88&\\    
 7C1818+6348a&    4.1\hspace{5mm} &   -6.5\hspace{5mm} &    7.7\hspace{10mm} &    1\hspace{5mm} &19.48& -\hspace{5mm} &  -  &$>$2.65&\\    
 7C1818+6348b&    3.2\hspace{5mm} &   13.5\hspace{5mm} &   13.8\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.51&$<$1.51&\\    
 7C1818+6348c&    -.4\hspace{5mm} &    3.5\hspace{5mm} &    3.5\hspace{10mm} &    1\hspace{5mm} &18.40& 1\hspace{5mm} &21.22&   2.82&\\    
 7C1818+6553a&    8.9\hspace{5mm} &   -9.9\hspace{5mm} &   13.3\hspace{10mm} &    1\hspace{5mm} &18.31& -\hspace{5mm} &  -  &$>$3.82&\\    
 7C1818+6553b&    6.7\hspace{5mm} &   -5.0\hspace{5mm} &    8.4\hspace{10mm} &   -1\hspace{5mm} &19.91& -\hspace{5mm} &  -  &$>$2.22&\\    
 7C1818+6553c&    4.9\hspace{5mm} &   11.2\hspace{5mm} &   12.2\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &22.08&$<$2.08&\\    
 7C1818+6553d&   -5.8\hspace{5mm} &    4.5\hspace{5mm} &    7.4\hspace{10mm} &    2\hspace{5mm} &12.89& 1\hspace{5mm} &13.95&   1.06&\\    
 7C1819+6541 &    5.4\hspace{5mm} &   11.0\hspace{5mm} &   12.3\hspace{10mm} &   -1\hspace{5mm} &16.92&-1\hspace{5mm} &17.46&    .54&\\    
 7C1820+6747a&  -11.4\hspace{5mm} &    1.0\hspace{5mm} &   11.5\hspace{10mm} &    1\hspace{5mm} &17.79&-1\hspace{5mm} &21.57&   3.77&\\    
 7C1820+6747b&   -2.1\hspace{5mm} &   12.8\hspace{5mm} &   13.0\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &22.02&$<$2.02&\\    
 7C1820+6448 &     .0\hspace{5mm} &   -6.0\hspace{5mm} &    6.0\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &21.93&$<$1.93&\\    
 7C1820+6822 &  -10.9\hspace{5mm} &    1.4\hspace{5mm} &   11.0\hspace{10mm} &   -1\hspace{5mm} &17.97& -\hspace{5mm} &  -  &$>$4.16&\\    
 7C1821+6442a&   -1.2\hspace{5mm} &     .2\hspace{5mm} &    1.2\hspace{10mm} &   -1\hspace{5mm} &16.82&-1\hspace{5mm} &18.36&   1.54& 2 \\    
\end{tabular}
\end{table*}

\begin{table*}
\begin{tabular}{lrrrrcrcrc}
\multicolumn{1}{c}{Name}&
\multicolumn{1}{r}{$\Delta \alpha_{\rm rad - opt}$}&\multicolumn{1}{r}{$\Delta \delta_{\rm rad - opt}$}&
\multicolumn{1}{r}{$\sqrt{(\Delta \alpha)^2 + (\Delta \delta)^2}$}& $E$-class & $E$ & $O$-class & $O$ &
\multicolumn{1}{c}{$O-E$}&Notes\\
             &        &        &        &     &     &   &     &       &\\
 7C1821+6442b&  -12.9\hspace{5mm} &    2.5\hspace{5mm} &   13.1\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.76&$<$1.76& 2 \\    
 7C1821+6419a&     .7\hspace{5mm} &   -2.1\hspace{5mm} &    2.2\hspace{10mm} &   -1\hspace{5mm} &19.65&-1\hspace{5mm} &20.93&   1.28& 3 \\    
 7C1821+6419b&    6.8\hspace{5mm} &   -2.2\hspace{5mm} &    7.2\hspace{10mm} &   -1\hspace{5mm} &19.53& -\hspace{5mm} &  -  &$>$2.60& 3 \\    
 7C1821+6401 &   -1.1\hspace{5mm} &   -1.1\hspace{5mm} &    1.6\hspace{10mm} &    1\hspace{5mm} &17.79& 1\hspace{5mm} &19.83&   2.04&\\    
 7C1822+6324 &    9.8\hspace{5mm} &   -3.3\hspace{5mm} &   10.3\hspace{10mm} &    2\hspace{5mm} &17.97& -\hspace{5mm} &  -  &$>$4.16&\\    
 7C1822+6721 &    9.4\hspace{5mm} &    2.3\hspace{5mm} &    9.7\hspace{10mm} &    2\hspace{5mm} &16.96&-1\hspace{5mm} &20.51&   3.56&\\    
 7C1822+6817 &    -.4\hspace{5mm} &   -4.8\hspace{5mm} &    4.8\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.84&$<$1.84&\\    
 7C1822+6402a&    7.2\hspace{5mm} &   -1.0\hspace{5mm} &    7.3\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &21.96&$<$1.96&\\    
 7C1822+6402b&   -3.7\hspace{5mm} &  -11.0\hspace{5mm} &   11.6\hspace{10mm} &   -1\hspace{5mm} &18.43&-1\hspace{5mm} &21.39&   2.97&\\    
 7C1822+6458a&    2.5\hspace{5mm} &   -9.4\hspace{5mm} &    9.7\hspace{10mm} &    1\hspace{5mm} &17.13& 1\hspace{5mm} &20.04&   2.91&\\    
 7C1822+6458b&   -2.0\hspace{5mm} &   13.9\hspace{5mm} &   14.0\hspace{10mm} &   -1\hspace{5mm} &19.83& -\hspace{5mm} &  -  &$>$2.30&\\    
 7C1822+6458c&     .6\hspace{5mm} &   -2.0\hspace{5mm} &    2.1\hspace{10mm} &   -1\hspace{5mm} &19.71& -\hspace{5mm} &  -  &$>$2.42&\\    
 7C1822+6900 &   -9.3\hspace{5mm} &   -3.4\hspace{5mm} &    9.9\hspace{10mm} &   -1\hspace{5mm} &19.97& -\hspace{5mm} &  -  &$>$2.16&\\    
 7C1822+6601 &    3.2\hspace{5mm} &    4.4\hspace{5mm} &    5.4\hspace{10mm} &    1\hspace{5mm} &19.07& -\hspace{5mm} &  -  &$>$3.06& 1 \\    
 7C1823+6357a&    -.4\hspace{5mm} &    9.0\hspace{5mm} &    9.0\hspace{10mm} &   -1\hspace{5mm} &17.93&-1\hspace{5mm} &19.01&   1.09&\\    
 7C1823+6357b&   10.6\hspace{5mm} &    -.3\hspace{5mm} &   10.6\hspace{10mm} &    1\hspace{5mm} &18.78& 1\hspace{5mm} &20.04&   1.26&\\    
 7C1823+6856 &    4.3\hspace{5mm} &    2.6\hspace{5mm} &    5.0\hspace{10mm} &    1\hspace{5mm} &17.88& -\hspace{5mm} &  -  &$>$4.25&\\    
 7C1824+6334 &    2.7\hspace{5mm} &    4.4\hspace{5mm} &    5.2\hspace{10mm} &   -1\hspace{5mm} &19.30& 1\hspace{5mm} &21.80&   2.50&\\    
 7C1824+6314 &   -2.8\hspace{5mm} &   -4.3\hspace{5mm} &    5.1\hspace{10mm} &    1\hspace{5mm} &17.79& -\hspace{5mm} &  -  &$>$4.34&\\    
 7C1824+6756 &   -9.0\hspace{5mm} &    -.4\hspace{5mm} &    9.0\hspace{10mm} &   -1\hspace{5mm} &19.81& -\hspace{5mm} &  -  &$>$2.32&\\    
 7C1824+6755 &    3.8\hspace{5mm} &   -1.5\hspace{5mm} &    4.0\hspace{10mm} &   -1\hspace{5mm} &18.24&-1\hspace{5mm} &19.20&    .96&\\    
 7C1824+6814a&   -4.4\hspace{5mm} &   -3.7\hspace{5mm} &    5.8\hspace{10mm} &   -1\hspace{5mm} &17.47&-1\hspace{5mm} &20.59&   3.12&\\    
 7C1824+6814b&    2.7\hspace{5mm} &  -13.0\hspace{5mm} &   13.3\hspace{10mm} &   -1\hspace{5mm} &17.58&-1\hspace{5mm} &21.18&   3.60&\\    
 7C1825+6527 &    -.1\hspace{5mm} &    1.4\hspace{5mm} &    1.4\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &21.27&$<$1.27&\\    
 7C1825+6532a&     .9\hspace{5mm} &   12.4\hspace{5mm} &   12.4\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.84&$<$1.84&\\    
 7C1825+6532b&   -7.4\hspace{5mm} &   12.4\hspace{5mm} &   14.4\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &21.61&$<$1.61&\\    
 7C1825+6602 &   -2.4\hspace{5mm} &    3.4\hspace{5mm} &    4.1\hspace{10mm} &   -1\hspace{5mm} &17.45&-1\hspace{5mm} &18.63&   1.18& 2 \\    
 7C1826+6409 &   -6.4\hspace{5mm} &    8.1\hspace{5mm} &   10.3\hspace{10mm} &   -1\hspace{5mm} &18.50& 1\hspace{5mm} &21.12&   2.61&\\    
 7C1826+6338 &    -.5\hspace{5mm} &   -4.0\hspace{5mm} &    4.1\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &21.92&$<$1.92&\\    
 7C1826+6306 &    1.0\hspace{5mm} &    2.9\hspace{5mm} &    3.0\hspace{10mm} &   -1\hspace{5mm} &17.93&-1\hspace{5mm} &20.54&   2.62&\\    
 7C1826+6510 &   -5.9\hspace{5mm} &    2.6\hspace{5mm} &    6.5\hspace{10mm} &   -1\hspace{5mm} &18.83&-1\hspace{5mm} &21.73&   2.90&\\    
 7C1826+6704a&    5.8\hspace{5mm} &    9.1\hspace{5mm} &   10.8\hspace{10mm} &   -1\hspace{5mm} &19.56& 1\hspace{5mm} &21.71&   2.15& 2 \\    
 7C1826+6704b&    -.1\hspace{5mm} &    2.0\hspace{5mm} &    2.0\hspace{10mm} &    1\hspace{5mm} &17.30&-1\hspace{5mm} &18.49&   1.19& 1 \\    
 7C1827+6709 &    -.4\hspace{5mm} &   -8.6\hspace{5mm} &    8.6\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &19.09&$<$-.91&\\    
 7C1827+6301 &   -6.8\hspace{5mm} &    1.2\hspace{5mm} &    6.9\hspace{10mm} &    -\hspace{5mm} &  -  & 1\hspace{5mm} &21.97&$<$1.97&\\    
 7C1827+6829 &   -1.0\hspace{5mm} &    7.9\hspace{5mm} &    8.0\hspace{10mm} &   -1\hspace{5mm} &16.97&-1\hspace{5mm} &20.30&   3.32&\\    
 7C1827+6811 &    4.6\hspace{5mm} &   10.9\hspace{5mm} &   11.8\hspace{10mm} &   -1\hspace{5mm} &19.30& -\hspace{5mm} &  -  &$>$2.83&\\    
 7C1827+6432 &   -4.0\hspace{5mm} &    3.9\hspace{5mm} &    5.5\hspace{10mm} &   -1\hspace{5mm} &19.87&-1\hspace{5mm} &19.86&   -.01&\\    
 7C1827+6517a&   -1.8\hspace{5mm} &  -11.4\hspace{5mm} &   11.5\hspace{10mm} &    1\hspace{5mm} &  -  & 1\hspace{5mm} &21.56&$<$1.56&\\    
 7C1827+6517b&    3.9\hspace{5mm} &    2.7\hspace{5mm} &    4.7\hspace{10mm} &   -1\hspace{5mm} &12.05&-1\hspace{5mm} &13.26&   1.21&\\    
 7C1827+6517c&  -13.2\hspace{5mm} &    3.9\hspace{5mm} &   13.7\hspace{10mm} &    1\hspace{5mm} &19.97& -\hspace{5mm} &  -  &$>$2.16&\\    
 7C1828+6328 &   10.0\hspace{5mm} &    7.3\hspace{5mm} &   12.4\hspace{10mm} &   -1\hspace{5mm} &19.17& -\hspace{5mm} &  -  &$>$2.96&\\    
 7C1829+6407 &    9.4\hspace{5mm} &    2.8\hspace{5mm} &    9.9\hspace{10mm} &   -1\hspace{5mm} &15.43&-1\hspace{5mm} &17.76&   2.33&\\    
 7C1829+6510a&   12.3\hspace{5mm} &    8.0\hspace{5mm} &   14.7\hspace{10mm} &   -1\hspace{5mm} &19.93&-1\hspace{5mm} &20.94&   1.01&\\    
 7C1829+6510b&   -1.7\hspace{5mm} &   -3.5\hspace{5mm} &    3.9\hspace{10mm} &    1\hspace{5mm} &19.37& -\hspace{5mm} &  -  &$>$2.76&\\    
 7C1830+6548 &    6.1\hspace{5mm} &   10.5\hspace{5mm} &   12.2\hspace{10mm} &   -1\hspace{5mm} &19.80& -\hspace{5mm} &  -  &$>$2.33&\\    
 7C1831+6603 &    8.7\hspace{5mm} &   -8.1\hspace{5mm} &   11.9\hspace{10mm} &   -1\hspace{5mm} &15.51&-1\hspace{5mm} &16.74&   1.23&\\    
 7C1832+6731a&    6.0\hspace{5mm} &   12.6\hspace{5mm} &   13.9\hspace{10mm} &    2\hspace{5mm} &14.20& -\hspace{5mm} &  -  &$>$7.93&\\    
 7C1832+6731b&   10.1\hspace{5mm} &    5.4\hspace{5mm} &   11.5\hspace{10mm} &    -\hspace{5mm} &  -  &-1\hspace{5mm} &18.03&$<$1.97&\\    
 7C1832+6845 &   -4.0\hspace{5mm} &   -4.2\hspace{5mm} &    5.8\hspace{10mm} &    2\hspace{5mm} &12.79& 2\hspace{5mm} &14.31&   1.52&\\    
\end{tabular}
\end{table*}

\end{document}
