Table 1. VLA Radio Survey for 0.09 < z < 0.25

Abell Redshift IAU Name RA(1950) DEC(1950)Flux(mJy) A_c2E(B − V ) Status

0023 0.1052S None – – – – 0.04 0024 0.1338S(1) 0019+230 00 19 48.1 23 00 52.3 207 0.08 0.04 Bright Star,Rejected 0040 0.0999H None – – – – 0.05 0045 None None – – – – 0.04 0055 0.1334(OLK) 0031+060 00 31 30.90 06 04 04.1 250 0.10 0.06 In Sample 0069 0.1448(OLK) 0035+180 00 35 17.19 18 04 23.9 209 0.34 0.06 In Sample 0084 0.1030S(>1) 0039+211 00 39 03.09 21 07 43.0 670 0.10 0.04 In Sample 0098 0.1053S(24) 0043+201 00 43 50.78 20 11 41.6 563 0.02 0.04 In Sample 0103 None None – – – – 0.12 0115 0.1971S(8) 0053+261A 00 53 09.09 26 08 21.9 1327 0.39 0.08 In Sample – – 0053+261B 00 53 20.71 26 11 14.1 250 0.58 – Rejected^5 0137 None None – – – – 0.11 0196 None None – – – – 0.12 0201 0.1105H None – – – – 0.07 0207 None None – – – – 0.09 0216 0.1158S(1) None – – – – 0.07 0217 0.1126S(2) 0134–083 01 34 05.67 –08 21 22.9 320 0.13 0.02 In Sample 0224 0.1617S(2) 0135–071 01 35 48.48 –07 10 35.0 184 0.17 0.02 In Sample 0285 None None – – – – 0.01 0293 0.1631S(1) None – – – – 0.05 0323 None 0211–031 02 11 15.22 –03 10 30.4 284 0.31 0.00 Background,Rejected 0357 None None – – – – 0.17 0362 None None – – – – 0.02 0363 None 0230+092 02 30 05.49 09 14 55.2 670 0.01 0.14 Rejected^6 0372 0.1073S(1) None – – – – 0.15 0409 None None – – – – 0.11 0413 None None – – – – 0.09 0436 None 0323+090 03 23 53.16 09 00 38.3 213 0.10 0.36 Rejected^6 0439 0.1063S(1) 0327+246 03 27 32.25 24 37 36.0 320 0.03 0.20 Rejected^6 0443 None None – – – – 0.05 0468 0.1325S(1) 0349+212 03 49 45.14 21 17 16.5 588 0.04 0.36 Rejected^6 0473 None None – – – – 0.00 0475 None None – – – – 0.06 0476 None None – – – – 0.04 0493 0.1152S(1) None – – – – 0.25 0501 0.1517(OLK) 0439+083 04 39 09.21 08 21 31.7 445 0.23 0.24 In Sample^1 0519 None 0451+005 04 51 15.14 00 35 52.4 307 0.08 0.14 Rejected^6 0531 None 0458–036 04 58 50.31 –03 36 57.7 309 0.02 0.12 Rejected^6 0534 None None – – – – 0.20 0545 0.1540S(2) None – – – – 0.28

Table 1. (continued)

Abell Redshift IAU Name RA(1950) DEC(1950)Flux(mJy) A_c2E(B − V ) Status

None None – – – – 0.12 0557 None None – – – – 0.15 0562 0.1100S 0647+693 06 47 54.58 69 23 31.5 800 0.43 0.16 Rejected^6 40567 None 0658+330 06 58 52.48 33 01 47.2 339 0.58 0.24 Rejected^{5,6} – – 0658+329A 06 58 14.58 32 59 10.6 326 0.25 – Rejected^6 – – 0658+329B 06 58 31.32 32 58 09.3 206 0.25 – Rejected^6 0579 None None – – – – 0.12 0584 None 0725+267 07 25 34.68 26 44 14.2 498 0.25 0.12 Rejected^6 0585 None 0727+409 07 27 24.13 40 56 11.5 510 0.03 0.12 Rejected^6 0591 0.1170S(1) 0738+441 07 38 06.10 44 11 08.3 539 0.43 0.10 In Sample 0604 None None – – – – 0.09 0605 None None – – – – 0.05 0608 None 0757+640 07 57 30.43 64 01 23.7 966 0.39 0.10 Background,Rejected 0609 None None – – – – 0.06 0610 0.0956P(2) 0756+272 07 56 13.40 27 17 29.7 493 0.07 0.04 In Sample 0614 0.1436(OLK) 0758+181 07 58 14.0 18 07 15.0 346 0.08 0.02 In Sample 0618 0.1193(OLK) 0803+676 08 03 59.58 67 37 18.0 480 0.32 0.08 No ID,Rejected 0629 0.138S(1) 0810+665 08 10 10.08 66 35 58.3 2020 0.22 0.06 In Sample 0643 0.1890S(1) 0816+526 08 16 01.65 52 41 54.6 1677 0.46 0.08 In Sample 0693 None 0837+012 08 37 14.83 01 15 06.7 547 0.14 0.06 Background,Rejected 0708 None None – – – – 0.04 0725 0.0900(OLK) 0857+628 08 57 04.39 62 49 05.6 199 0.04 0.06 In Sample 0731 0.1709(OLK) 0854–034 08 54 40.93 –03 28 04.5 1087 0.24 0.04 In Sample 0739 0.1700KI(1) 0901+474 09 01 10.05 47 27 38.9 300 0.05 0.06 In Sample 0756 0.1177KI(1) 0908+487 09 08 53.49 48 43 05.7 194 0.13 0.06 In Sample 0761 0.0921(OLK) 0908–103 09 08 10.58 –10 22 39.8 365 0.11 0.06 In Sample 0765 0.1330L None – – – – 0.01 0795 0.1357S(1) None – – – – 0.04 0796 None 0924+606 09 24 50.89 60 38 27.6 281 0.26 0.04 Background,Rejected 0809 0.1250L 0935+775 09 35 09.10 77 34 20.5 243 0.30 0.06 Background,Rejected 0849 0.2590(OLK) 0938+215 09 38 36.18 21 34 42.5 215 0.08 0.04 In Sample 0860 None None – – – – 0.08 0869 0.1180(OLK) 0943+026 09 43 38.42 02 36 39.6 195 0.06 0.06 In Sample 0876 None None – – – – 0.00 0920 None None – – – – 0.00 0944 None 1008–017A 10 08 18.96 –01 47 37.3 508 0.26 0.04 Too Faint,Rejected – – 1008–017B 10 08 19.01 –01 45 31.3 726 0.29 – Too Faint,Rejected 0945 0.0917S(1) 1012+692 10 12 14.33 69 14 47.7 421 0.29 0.06 Too Faint,Rejected 0950 0.2081(OLK) 1011+500 10 11 26.68 50 00 27.6 394 0.28 0.04 In Sample 0951 0.1427S(1) None – – – – 0.00

Table 1. (continued)

Abell Redshift IAU Name RA(1950) DEC(1950)Flux(mJy) A_c2E(B − V ) Status

0.2060S(16) 1014+392 10 14 16.63 39 16 21.8 1250 0.03 0.06 Grav Lens,Rejected 0985 None None – – – – 0.00 1024 0.0733(OLK) 1025+040 10 25 47.94 04 00 52.1 272 0.09 0.02 In Sample^2 1030 0.1782(OLK) 1028+313 10 28 09.91 31 18 20.8 254 0.43 0.02 In Sample 1041 None None – – – – 0.05 1064 0.1308(OLK) 1036+015 10 36 02.32 01 33 26.2 269 0.17 0.04 In Sample 1097 0.1176P(1) None – – – – 0.00 1098 None None – – – – 0.05 1099 None None – – – – 0.00 1132 0.1363S(2) None – – – – 0.00 1168 None None – – – – 0.00 1189 None None – – – – 0.05 1234 0.1663S(2) 1119+216 11 19 51.78 21 40 49.1 540 0.09 0.00 In Sample 1246 0.2160S(1) None – – – – 0.00 1254 0.1525S(1) None – – – – 0.02 1262 None 1124+109 11 24 09.83 10 59 34.0 286 0.44 0.02 ID is Star,Rejected 1303 None None – – – – 0.00 1305 None None – – – – 0.01 1319 0.2880S(2) None – – – – 0.00 1329 0.1458S(1) None – – – – 0.02 1336 0.1318P(2) None – – – – 0.00 1346 0.0970S(1) 1138+060 11 38 37.58 06 00 42.4 469 0.13 0.02 In Sample 1354 0.1178S(2) None – – – – 0.06 1357 0.1711S(3) None – – – – 0.00 1360 0.1535S(3) None – – – – 0.05 1361 0.1162(OLK) 1141+466 11 41 00.45 46 37 59.6 814 0.06 0.00 In Sample 1366 0.1164S(1) 1141+676 11 41 50.80 67 41 00.2 196 0.15 0.04 In Sample 1368 0.1291L None – – – – 0.00 1374 None None – – – – 0.00 1376 None None – – – – 0.01 1380 0.1082L None – – – – 0.02 1407 None None – – – – 0.02 1425 0.1120(OLK) 1155+266 11 55 45.90 26 37 53.9 880 0.34 0.02 In Sample 1443 None None – – – – 0.02 1446 0.1035S(2) 1159+583 11 59 31.07 58 18 50.1 765 0.09 0.04 In Sample 1455 0.1390(OLK) 1201+282 12 01 03.28 28 13 33.0 215 0.26 0.02 In Sample 1456 None 1200+045 12 00 48.24 04 31 00.7 1114 0.42 0.00 Too Faint,Rejected 1457 None 1202+527 12 02 04.21 52 45 23.4 287 0.33 0.00 Background,Rejected 1459 0.0844(OLK) 1201+026 12 01 32.65 02 41 23.5 244 0.36 0.00 In Sample^2 1462 0.1443(OLK) 1202+153 12 02 13.20 15 18 04.6 614 0.12 0.02 In Sample

Table 1. (continued)

Abell Redshift IAU Name RA(1950) DEC(1950)Flux(mJy)A_c2E(B − V ) Status

0.1226S(3) 1207+722 12 07 53.75 72 16 39.6 256 0.36 0.04 In Sample 1494 None None – – – – 0.05 1512 None None – – – – 0.00 1516 0.0754(OLK) 1216+055 12 16 19.08 05 31 23.0 521 0.06 0.00 In Sample^2 1517 None None – – – – 0.04 1529 0.2324S(1) 1221+615 12 21 07.38 61 31 29.6 321 0.17 0.00 In Sample 1544 0.1459S(1) 1225+636 12 25 33.20 63 39 37.8 210 0.16 0.00 In Sample 1559 0.1071S(2) 1231+674 12 31 03.88 67 24 17.2 879 0.07 0.02 In Sample 1562 0.1910OWT 1232+414 12 32 04.97 41 26 05.9 689 0.26 0.02 In Sample 1563 None None – – – – 0.02 1597 0.1102S(1) 1238+725 12 38 24.49 72 35 30.4 207 0.29 0.02 No-ID,Rejected 1608 0.1318(OLK) 1243+336 12 43 16.74 33 40 51.6 260 0.07 0.00 In Sample 1610 None None – – – – 0.02 1614 0.2326S(1) 1243+699 12 43 55.46 69 55 50.4 220 0.26 0.02 In Sample 1620 0.0825(OLK) 1247–012 12 47 29.75 –01 16 06.1 286 0.31 0.00 In Sample^2 – – 1248–012 12 48 25.24 –01 12 42.6 14 0.34 – In Sample^2 1632 0.1962S(1) None – – – – 0.01 1658 None None – – – – 0.00 1667 0.1648S(2) 1300+321 13 00 54.54 32 06 08.1 325 0.10 0.02 In Sample 1674 0.1055S(1) 1300+677 13 00 49.85 67 44 47.3 298 0.23 0.02 In Sample 1681 0.0912S(1) 1303+722 13 03 03.18 72 13 44.8 242 0.26 0.02 Background,Rejected 1682 0.2339L None – – – – 0.00 1684 0.0864(OLK) 1306+107A 13 06 34.40 10 45 32.8 405 0.28 0.02 In Sample^2 – – 1306+107B 13 06 37.68 10 45 52.9 25 0.03 – In Sample^2 1715 None None – – – – 0.00 1731 0.1932S(3) 1320+584 13 20 58.62 58 25 41.3 325 0.11 0.00 In Sample 1761 0.2272(OLK) 1330+579 13 30 58.27 57 55 03.1 221 0.09 0.02 In Sample 1763 0.2290OWT 1333+412 13 33 09.57 41 15 23.2 797 0.13 0.02 In Sample 1786 None None – – – – 0.00 1787 None None – – – – 0.00 1790 0.1210(OLK) 1344+543 13 44 04.84 54 18 15.3 247 0.22 0.00 In Sample 1797 None None – – – – 0.00 1799 0.2451L None – – – – 0.00 1851 0.2149S(3) None – – – – 0.02 1880 0.1413S(2) 1410+227 14 10 54.10 22 42 00.8 292 0.25 0.00 In Sample 1893 0.2072S(2) 1412+745 14 12 02.97 74 34 18.4 194 0.18 0.02 In Sample 1909 0.1456S(2) None – – – – 0.00 1920 0.1310S(1) None – – – – 0.00 1940 0.1396S(12) 1433+553 14 33 54.92 55 20 53.2 447 0.07 0.00 In Sample 1942 0.2240S(2) 1435+038 14 35 50.87 03 53 09.6 801 0.33 0.00 In Sample

Table 1. (continued)

Abell Redshift IAU Name RA(1950) DEC(1950)Flux(mJy) A_c2E(B − V ) Status

0.1876S(1) 1442+195 14 42 15.36 19 33 59.0 329 0.10 0.00 In Sample 1964 None 1443–085 14 43 55.13 -08 33 35.0 1039 0.15 0.12 Rejected^6 1971 0.2084(OLK) 1445+149 14 45 40.62 14 59 19.5 419 0.08 0.00 In Sample 2011 0.1697L None – – – – 0.00 2034 None None – – – – 0.02 2036 0.1163S(1) 1508+182 15 08 51.31 18 13 08.4 346 0.29 0.00 In Sample 2059 0.1305S(1) None – – – – 0.02 2064 0.1076S(2) None – – – – 0.02 2072 None None – – – – 0.08 2083 0.1143S(1) None – – – – 0.02 2091 0.1333(OLK) 1531+104 15 31 54.69 10 26 45.8 297 0.19 0.02 In Sample 2094 None None – – – – 0.18 2105 None None – – – – 0.03 2135 None None – – – – 0.03 2141 0.1579(OLK) 1555+356 15 55 49.58 35 39 02.1 216 0.18 0.04 In Sample 2145 None None – – – – 0.03 2153 None None – – – – 0.04 2165 0.1286S(3) None – – – – 0.04 2178 0.0928S(2) None – – – – 0.06 2204 0.1523S(2) None – – – – 0.17 2214 0.1610S(1) 1636+379 16 36 15.71 37 58 53.7 617 0.23 0.00 In Sample 2219 0.2070(OLK) 1638+468 16 38 55.14 46 48 29.3 212 0.05 0.00 In Sample 2220 0.1106S(1) 1638+538 16 38 24.50 53 52 30.8 626 0.09 0.08 In Sample 2224 0.1504S(1) None – – – – 0.12 2225 0.2426(OLK) 1638+558 16 38 48.92 55 51 56.1 271 0.07 0.00 In Sample 2226 None None – – – – 0.06 2236 None None – – – – 0.09 2243 None None – – – – 0.02 2244 0.0968S(27) None – – – – 0.03 2273 None None – – – – 0.05 2274 None None – – – – 0.08 2279 None None – – – – 0.17 2289 0.2276(OLK) 1753+580 17 53 12.18 58 05 33.7 179 0.05 0.09 In Sample^3 2297 None None – – – – 0.06 2306 0.1271(OLK) 1826+747 18 26 23.40 74 42 05.8 244 0.08 0.12 In Sample 2316 0.2139(OLK) 1857+799 18 57 26.53 79 58 49.4 180 0.24 0.00 In Sample 2332 None None – – – – 0.09 2343 None 2119–056 21 19 40.59 -05 38 31.8 328 0.14 0.12 Rejected^6 2345 0.1760(OLK) 2124–124 21 24 14.31 -12 25 53.6 251 0.25 0.08 In Sample 2350 None None – – – – 0.04

Table 1. (continued)

Abell Redshift IAU Name RA(1950) DEC(1950)Flux(mJy)A_c2E(B − V ) Status

None None – – – – 0.15 2363 None 2138–085 21 38 44.42 -08 30 14.4 264 0.38 0.04 Too Faint,Rejected 2365 0.1873(OLK) 2140–188 21 40 20.91 -18 49 38.8 334 0.34 0.04 In Sample 2379 None None – – – – 0.14 2390 0.2310S(>1) 2151+174 21 51 14.18 17 27 33.0 203 0.10 0.14 Rejected^6 2395 0.1500(OLK) 2152+085 21 52 57.65 08 32 33.2 226 0.14 0.10 In Sample 2396 0.1924(OLK) 2153+122 21 53 15.92 12 17 12.6 411 0.11 0.14 Rejected^6 2411 None None – – – – 0.02 2421 None None – – – – 0.03 2440 0.0940S(1) None – – – – 0.07 2443 0.1080S(1) None – – – – 0.10 2449 None None – – – – 0.09 2472 None None – – – – 0.09 2475 None None – – – – 0.12 2480 None 2243–178 22 43 18.29 -17 53 20.6 364 0.22 0.00 Foreground,Rejected 2522 0.1721(OLK) 2259+137 22 59 33.89 13 45 06.7 238 0.23 0.08 In Sample 2544 None None – – – – 0.02 2564 None 2311+137 23 11 58.55 13 42 46.6 194 0.50 0.06 Too Faint,Rejected 2569 None None – – – – 0.03 2571 0.1078S None – – – – 0.07 2573 None None – – – – 0.07 2584 0.1196S(1) None – – – – 0.12 2590 None None – – – – 0.06 2594 None None – – – – 0.07 2607 0.1195(OLK) 2327+110 23 27 09.39 11 00 54.0 569 0.04 0.06 In Sample 2616 0.1832S(1) None – – – – 0.09 2617 0.1623(OLK) 2330+091 23 30 58.81 09 08 58.7 218 0.22 0.06 In Sample 2627 0.1267(OLK) 2334+236 23 34 11.52 23 38 52.5 385 0.09 0.06 In Sample 2633 None 2335+128 23 35 14.71 12 50 22.7 244 0.50 0.00 Background,Rejected 2672 0.2404(OLK) 2352+261 23 52 51.77 26 07 32.6 311 0.30 0.12 In Sample^1 2695 None None – – – – 0.04

1Cluster has High R-Extinction, but kept because source is FR2.

2Cluster found to have z < 0.09. Left in sample, but not included in statistical analysis. 3Radio flux slightly below 200mJy cutoff, but left in sample. 4ID’s on finder chart in O92 have sources A as B and B listed as C. 5Rejected because source is > 0.5 A_c from cluster center. 6Rejected because galactic absortption is > 0.1 magnitudes.

References for Table 1.

(H) Huchra, J.P. 1989, private communication. ; (L) Lebedev, V.S. and Lebedeva, I.A. 1986, Astron. Tsirk., #1469, 4.; (O92) Owen, F.N., White, R.A., and Burns, J.O. 1992, ApJS, 80,501.; (OLK) Owen, F.N., Ledlow, M.J., and Keel, W. 1995, AJ, ??,???. ; (OWT) Owen, F.N., White, R.A., and Thronson, H.A. 1987, AJ, 95,1.; (P) Postman, M., Huchra, J.P., and Geller, M.J. 1992 ApJ, 384,404. ; (S) Struble, M.F. and Rood, H.J. 1991, ApJS,77,363.