%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%    table2.tex      Moellenhoff                12.11.2003
%    disk parameter
%
%    Remark: this latex-file rather long lines, 
%            make your window very wide, then the columns appear clearly 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\documentclass{article}  
\setlength{\topmargin}{-1.0cm}
\setlength{\oddsidemargin}{-1.0cm}
\begin{document}   
%
\begin{table}
\setcounter{table}{1}
\caption{Structural parameters of the disks}
\small
\[
\begin{array}{|rr|ccccc|rrrrr|ccccc|rrrrr|ccccc|}
\hline
{\rm No}&{\rm NGC}& &SB_c&(mag&/sas)& & & R_d&(arc&sec)& & \quad&R_d&(kpc)& & & & PA_d & (deg) & & & & Q_d&=&b/a & \\ 
        &         &{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&
                   {\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}\\
%
\hline
%-----------------------------------------------------------------------------------------------------------------------------------------------------------------------------------
% No  NGC|      SBc (mag/square arcsec)     |          Rd (arcsec)             |        Rd (kpc)             |          PAd (deg)               |        Qd = b/a                  |
%        |   U      B      V      R      I  |   U      B      V      R      I  |  U     B     V     R     I  |   U      B      V      R      I  |   U      B      V      R      I  |
%-----------------------------------------------------------------------------------------------------------------------------------------------------------------------------------
  1  &278 &17.94 &18.27 &17.86 &17.55 &17.23  &12.4  &13.0  &13.5  &13.9  &15.5 &0.83 &0.88 &0.90 &0.93 &1.04 &175.9  &10.7  &18.3  &24.1  &27.5  &0.98  &0.95  &0.95  &0.96  &0.95\\
  2  &628 &21.62 &21.52 &20.65 &20.20 &19.54  &99.7  &89.1  &82.4  &76.2  &73.4 &3.77 &3.37 &3.12 &2.88 &2.78 &131.2 &123.9 &124.5 &141.2  &71.1  &0.96  &0.96  &0.96  &0.96  &0.97\\
  3 &1232 &21.76 &21.58 &20.81 &20.21 &19.59  &81.6  &71.4  &61.0  &56.7  &53.6 &7.92 &6.92 &5.91 &5.50 &5.20  &91.6  &89.8  &91.8  &91.0  &89.7  &0.85  &0.87  &0.89  &0.91  &0.92\\
  4 &1288   &-   &21.61 &20.78   &-   &19.64    &-   &25.4  &22.6    &-   &21.6   & - &8.89 &7.91   & - &7.54  &   -   &4.8   &4.3  & -     &3.5  & -    &0.82  &0.82  & -    &0.82\\
  5 &2196 &20.95 &21.01 &20.42 &20.28 &19.53  &27.7  &30.2  &28.9  &29.6  &28.4 &3.95 &4.31 &4.12 &4.22 &4.06  &60.0  &55.1  &51.9  &50.0  &57.6  &0.79  &0.79  &0.79  &0.80  &0.83\\
  6 &2460 &20.82 &20.85 &19.92 &19.60 &18.70  &12.9  &12.2  &10.9  &11.1  &10.9 &1.69 &1.59 &1.42 &1.45 &1.43  &37.3  &40.6  &41.9  &43.9  &45.4  &0.59  &0.55  &0.56  &0.54  &0.59\\
  7 &2742 &22.76 &22.60 &21.93 &21.58 &20.82  &40.4  &35.6  &33.7  &32.1  &29.8 &3.97 &3.50 &3.31 &3.16 &2.93  &87.1  &86.3  &85.9  &86.5  &86.2  &0.47  &0.50  &0.49  &0.49  &0.49\\
  8 &2775 &21.42 &21.52 &20.72 &20.00 &18.92  &36.7  &39.2  &39.2  &35.5  &33.2 &3.03 &3.23 &3.23 &2.92 &2.74 &161.1 &163.2 &162.8 &162.8 &160.9  &0.79  &0.75  &0.74  &0.74  &0.78\\
  9 &2776 &20.71 &20.77 &20.23 &19.83 &19.57  &21.2  &20.2  &19.2  &18.9  &18.1 &3.24 &3.08 &2.93 &2.88 &2.76 &125.0 &130.8 &129.5 &135.6 &128.0  &0.96  &0.95  &0.95  &0.95  &0.95\\
 10 &2841 &21.53 &21.36 &20.65 &20.26 &19.41  &81.9  &79.0  &77.9  &77.0  &72.0 &5.60 &5.40 &5.32 &5.26 &4.92 &149.9 &149.4 &149.5 &149.7 &149.6  &0.41  &0.40  &0.38  &0.36  &0.38\\
 11 &2855 &21.91 &21.48 &20.71 &20.67 &19.88  &30.5  &31.4  &31.4  &34.6  &31.7 &3.89 &4.00 &4.01 &4.41 &4.04 &124.2 &127.6 &127.5 &129.8 &129.8  &0.79  &0.81  &0.79  &0.78  &0.79\\
 12 &2997 &21.25 &20.98 &20.33 &19.91 &19.30 &121.2 &103.5  &96.0  &87.2  &80.3 &6.38 &5.45 &5.06 &4.59 &4.23  &83.0  &85.6  &86.2  &85.1  &78.9  &0.61  &0.66  &0.69  &0.72  &0.71\\
 13 &3031   &-   &21.20 &19.76 &19.05 &18.19    & - &197.7 &143.7 &129.5 &124.0   & - &3.48 &2.53 &2.28 &2.18  &  -  &152.1 &151.6 &152.3 &152.3  & -    &0.47  &0.52  &0.53  &0.54\\
 14 &3147 &20.88 &20.68 &19.97 &19.46 &18.73  &30.7  &30.2  &30.0  &29.2  &29.3 &4.81 &4.74 &4.70 &4.57 &4.59 &136.9 &142.6 &146.8 &148.9 &151.8  &0.85  &0.84  &0.83  &0.82  &0.83\\
 15 &3430 &21.20 &21.13 &20.34 &19.77 &19.17  &31.9  &27.7  &24.0  &23.9  &23.1 &3.68 &3.20 &2.77 &2.77 &2.67  &33.1  &32.8  &32.9  &32.5  &33.1  &0.52  &0.51  &0.51  &0.53  &0.54\\
 16 &3486 &20.80 &20.72 &19.92 &19.45 &18.90  &41.2  &32.9  &27.6  &26.3  &26.4 &2.46 &1.96 &1.64 &1.57 &1.58  &79.5  &78.4  &77.9  &78.0  &77.0  &0.77  &0.77  &0.77  &0.77  &0.79\\
 17 &3521 &20.27 &19.95 &19.08 &18.47 &17.73  &62.0  &51.9  &45.5  &41.1  &41.1 &3.24 &2.72 &2.38 &2.15 &2.15 &161.3 &161.4 &161.6 &161.9 &162.0  &0.53  &0.54  &0.54  &0.54  &0.56\\
 18 &3631 &21.52 &21.48 &20.96 &20.59 &19.90  &49.0  &47.7  &46.1  &46.0  &43.3 &5.13 &5.00 &4.83 &4.82 &4.54  &51.5  &66.4  &50.7  &42.9  &42.7  &0.98  &0.99  &0.98  &0.98  &0.97\\
 19 &3938 &21.09 &21.03 &20.31 &19.82 &19.14  &48.1  &42.4  &39.2  &37.5  &36.0 &3.96 &3.49 &3.23 &3.09 &2.97  &37.3  &19.9  &14.7  &11.2  &11.5  &0.94  &0.95  &0.95  &0.96  &0.95\\
 20 &4254 &20.57 &20.75 &20.23 &19.83 &19.17  &48.8  &48.2  &45.7  &43.7  &39.3 &3.62 &3.58 &3.39 &3.24 &2.91  &56.9  &53.8  &51.4  &50.3  &46.8  &0.76  &0.77  &0.78  &0.79  &0.83\\
 21 &4274 &21.96 &21.65 &20.81 &20.22 &19.11  &56.0  &53.6  &51.3  &48.8  &43.5 &3.24 &3.10 &2.97 &2.82 &2.51 &100.2 &100.5 &100.0  &99.9  &99.0  &0.42  &0.42  &0.43  &0.45  &0.53\\
 22 &4303 &20.58 &20.49 &19.76 &19.30 &18.59  &57.1  &48.6  &44.9  &43.2  &41.7 &4.24 &3.60 &3.33 &3.21 &3.09  &13.9  &15.0  &15.9  &15.8  &17.4  &0.80  &0.83  &0.82  &0.80  &0.81\\
 23 &4321 &21.38 &21.24 &20.49 &19.97 &19.14  &77.7  &73.3  &71.6  &70.7  &68.9 &5.73 &5.41 &5.28 &5.21 &5.08 &109.7 &110.5 &110.8 &112.7 &109.0  &0.79  &0.80  &0.80  &0.81  &0.81\\
 24 &4725 &22.42 &22.02 &21.17 &20.64 &19.79 &120.0 &106.0  &97.0  &92.8  &87.8 &7.19 &6.35 &5.81 &5.56 &5.26  &42.5  &43.1  &44.0  &44.1  &44.4  &0.47  &0.47  &0.46  &0.45  &0.46\\
 25 &4736 &18.80 &19.25 &19.00 &18.40 &17.78  &31.0  &38.2  &46.4  &44.5  &47.2 &0.67 &0.83 &1.00 &0.96 &1.02 &115.9 &113.8 &110.2 &108.9 &106.5  &0.81  &0.76  &0.71  &0.73  &0.74\\
 26 &5055 &20.36 &20.22 &19.41 &18.70 &17.85  &62.9  &61.7  &56.2  &49.4  &46.2 &2.12 &2.08 &1.89 &1.66 &1.56 &101.8 &101.6 &100.6  &99.7  &98.8  &0.52  &0.54  &0.56  &0.58  &0.61\\
%-----------------------------------------------------------------------------------------------------------------------------------------------------------------------------------
\hline
\end{array}
\]
\end{table}
%
%\end{document}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%    table3.tex      Moellenhoff                12.11.2003
%    bulge parameter
%
%    Remark: this latex-file rather long lines, 
%            make your window very wide, then the columns appear clearly 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%\documentclass{article}  
%\setlength{\topmargin}{-1.0cm}
%\setlength{\oddsidemargin}{-1.0cm}
%\begin{document}   
%
\begin{table}
\caption{Structural parameters of the bulges}
\small
\[
\begin{array}{|rr|ccccc|rrrrr|ccccc|rrrrr|ccccc|}
\hline
{\rm No}&{\rm NGC}& &SB_{eff}&(mag&/sas)& & & R_{eff}&(kpc)& &  &  & {\beta}  & = & 1/n & & & PA_b & (deg)& & & &Q_b&=&b/a & \\ 
        &         &{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I} 
                  &{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I} \\
%
\hline
%-----------------------------------------------------------------------------------------------------------------------------------------------------------------------------
% No  NGC|     SBeff (mag/square arcsec)    |       Reff (kpc)            |       beta = 1/n            |          PAb (deg)               |       Qb = b/a                  |
%        |   U      B      V      R      I  |  U     B     V     R     I  |  U     B     V     R     I  |   U      B      V      R      I  |  U      B      V      R      I  |
%-----------------------------------------------------------------------------------------------------------------------------------------------------------------------------
  1  &278 &17.87 &18.27 &18.09 &18.00 &18.06 &0.12 &0.15 &0.17 &0.19 &0.25 &1.22 &0.86 &0.75 &0.72 &0.60  &92.7 &104.2 &106.1 &104.1 &106.1 &0.80  &0.84  &0.83  &0.83  &0.81\\
  2  &628 &21.59 &21.57 &20.85 &20.47 &20.14 &0.37 &0.42 &0.52 &0.55 &0.70 &0.97 &0.73 &0.62 &0.61 &0.55  &16.4  &26.8  &29.6  &34.2  &33.1 &0.92  &0.93  &0.94  &0.94  &0.95\\
  3 &1232 &21.68 &21.60 &20.94 &20.44 &19.92 &0.57 &0.78 &1.02 &1.10 &1.17 &0.99 &0.75 &0.61 &0.57 &0.55  &89.4  &87.1  &84.5  &83.0  &82.2 &0.67  &0.62  &0.60  &0.59  &0.58\\
  4 &1288   &-   &20.93 &20.49   &-   &19.85  &-   &0.82 &1.16  &-   &1.57  &-   &0.58 &0.44  &-   &0.36  & -     &1.1   &4.8  & -     &9.2 & -    &0.87  &0.85  & -    &0.83\\
  5 &2196 &20.35 &20.66 &20.15 &20.26 &19.72 &0.84 &1.46 &1.82 &2.63 &2.75 &0.52 &0.39 &0.35 &0.29 &0.30  &59.6  &58.1  &59.6  &58.9  &55.7 &0.76  &0.75  &0.75  &0.76  &0.77\\
  6 &2460 &26.53 &24.03 &22.53 &21.23 &20.96&13.51 &5.23 &4.19 &3.11 &3.92 &0.11 &0.18 &0.22 &0.27 &0.23 &156.9 &168.0 &177.9   &2.7   &1.4 &0.85  &0.85  &0.84  &0.82  &0.78\\
  7 &2742 &22.00 &21.84 &21.18 &20.88 &20.23 &0.14 &0.16 &0.18 &0.19 &0.19 &3.47 &1.89 &1.49 &1.17 &0.98  &83.6  &79.0  &82.9  &82.5  &84.5 &0.77  &0.71  &0.72  &0.71  &0.75\\
  8 &2775 &21.81 &22.17 &21.14 &20.90 &20.18 &1.36 &2.67 &2.53 &2.84 &2.60 &0.35 &0.27 &0.28 &0.24 &0.25 &156.7 &155.6 &155.4 &155.4 &158.1 &0.89  &0.88  &0.89  &0.89  &0.89\\
  9 &2776 &20.28 &20.71 &21.22 &21.54 &22.00 &0.32 &0.37 &0.78 &1.42 &2.33 &2.36 &0.85 &0.39 &0.31 &0.25 &167.1 &145.0 &142.7 &140.2 &142.5 &0.90  &0.91  &0.89  &0.90  &0.89\\
 10 &2841 &20.27 &20.21 &19.41 &19.46 &19.17 &0.90 &1.18 &1.25 &1.68 &2.09 &0.43 &0.35 &0.34 &0.27 &0.25 &153.8 &154.1 &154.1 &153.8 &154.4 &0.72  &0.69  &0.70  &0.71  &0.70\\
 11 &2855 &21.23 &20.66 &19.96 &20.20 &19.92 &1.06 &1.07 &1.26 &2.10 &2.71 &0.40 &0.45 &0.44 &0.33 &0.31 &123.1 &121.8 &122.2 &121.8 &121.9 &0.84  &0.83  &0.84  &0.84  &0.84\\
 12 &2997 &18.53 &18.88 &18.61 &18.40 &18.18 &0.17 &0.28 &0.31 &0.34 &0.39 &6.03 &1.86 &0.91 &0.74 &0.56 &111.8 &109.4  &99.1  &98.1 &101.2 &0.83  &0.88  &0.87  &0.88  &0.90\\
 13 &3031   &-   &20.79 &19.13 &18.38 &17.64  &-   &1.28 &0.75 &0.63 &0.63  &-   &0.29 &0.33 &0.34 &0.36  & -   &143.5 &142.9 &141.4 &144.6 & -    &0.74  &0.74  &0.77  &0.78\\
 14 &3147 &21.30 &19.93 &19.21 &18.78 &18.39 &1.27 &0.88 &1.02 &1.09 &1.27 &0.32 &0.50 &0.40 &0.37 &0.32  &69.9  &78.8  &83.0  &87.4  &90.3 &0.83  &0.84  &0.85  &0.86  &0.87\\
 15 &3430 &19.33 &19.74 &19.21 &18.87 &18.59 &0.14 &0.17 &0.21 &0.25 &0.30 &4.37 &1.44 &1.06 &0.86 &0.75  &29.7  &25.7  &25.9  &26.2  &25.1 &0.49  &0.54  &0.54  &0.56  &0.54\\
 16 &3486 &20.02 &19.91 &19.06 &18.63 &18.41 &0.16 &0.21 &0.22 &0.24 &0.31 &1.25 &0.78 &0.77 &0.68 &0.51  &69.6  &73.0  &73.8  &73.5  &76.2 &0.83  &0.79  &0.79  &0.80  &0.78\\
 17 &3521 &18.24 &17.60 &16.61 &15.92 &15.53 &0.24 &0.21 &0.19 &0.16 &0.18 &0.81 &0.86 &0.79 &0.83 &0.74 &165.9 &165.7 &165.3 &164.5 &167.3 &0.80  &0.79  &0.79  &0.82  &0.81\\
 18 &3631 &20.73 &20.66 &19.99 &19.56 &18.97 &0.85 &0.84 &0.84 &0.84 &0.85 &0.85 &0.58 &0.52 &0.51 &0.50 &117.5 &125.6 &136.6 &147.4 &151.3 &0.88  &0.93  &0.96  &0.97  &0.96\\
 19 &3938 &21.26 &21.08 &20.38 &19.90 &19.38 &0.43 &0.43 &0.49 &0.51 &0.55 &1.32 &0.95 &0.77 &0.75 &0.70  &47.5  &56.3  &59.6  &67.0  &67.7 &0.84  &0.93  &0.96  &0.97  &0.96\\
 20 &4254 &22.56 &22.87 &22.12 &21.62 &21.29 &1.80 &2.67 &3.12 &3.33 &4.52 &0.42 &0.37 &0.35 &0.35 &0.31 &141.8 &112.7  &93.2  &83.0  &76.6 &0.68  &0.86  &0.87  &0.86  &0.83\\
 21 &4274 &21.76 &22.10 &21.30 &20.70 &19.43 &1.07 &1.57 &1.58 &1.44 &0.97 &0.37 &0.30 &0.29 &0.29 &0.33  &77.3  &73.9  &78.1  &80.3  &90.3 &0.73  &0.77  &0.80  &0.81  &0.76\\
 22 &4303 &17.85 &18.00 &17.37 &17.05 &16.69 &0.18 &0.18 &0.19 &0.20 &0.23 &2.31 &1.39 &0.99 &0.86 &0.69 &116.6 &119.1 &127.8 &124.6 &158.6 &0.83  &0.89  &0.92  &0.94  &0.94\\
 23 &4321 &18.91 &19.06 &18.78 &18.79 &18.63 &0.33 &0.45 &0.59 &0.71 &0.97 &6.04 &5.59 &1.53 &0.73 &0.46 &131.6 &125.1 &116.4 &113.4 &114.7 &0.80  &0.73  &0.74  &0.74  &0.72\\
 24 &4725 &20.71 &20.29 &19.45 &19.01 &18.49 &0.59 &0.62 &0.65 &0.69 &0.77 &0.42 &0.39 &0.37 &0.35 &0.34   &5.1   &2.8   &2.5   &3.2   &4.0 &0.94  &0.93  &0.92  &0.92  &0.90\\
 25 &4736 &18.41 &18.31 &17.54 &16.87 &16.34 &0.19 &0.25 &0.28 &0.26 &0.29 &0.60 &0.57 &0.54 &0.60 &0.56  &31.5  &33.2  &32.2  &31.0  &28.2 &0.79  &0.85  &0.88  &0.88  &0.89\\
 26 &5055 &18.56 &18.65 &18.30 &16.86 &16.02 &0.07 &0.10 &0.16 &0.10 &0.10 &0.84 &0.61 &0.53 &0.89 &0.83  &91.1  &87.8  &89.8  &92.9  &95.2 &0.86  &0.89  &0.84  &0.83  &0.82\\
%-----------------------------------------------------------------------------------------------------------------------------------------------------------------------------
\hline
\end{array}
\]
\end{table}
%
%\end{document}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%    table4.tex      Moellenhoff                12.11.2003
%    photometric parameter
%
%    Remark: this latex-file rather long lines, 
%            make your window very wide, then the columns appear clearly 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%\documentclass{article}  
%\setlength{\topmargin}{-1.0cm}
%\setlength{\oddsidemargin}{-1.5cm}
%\begin{document}   
%
%
\begin{table}
\caption{Absolute luminosities}
\small
\[
\begin{array}{|rr|ccccc|ccccc|ccccc|ccccc|}
\hline
{\rm No}&{\rm NGC}&&{\rm M_{tot}}&(mag) &&&& \rm M_{disk}&(mag) &&&& \rm M_{bulge} & (mag) &&&& Bulge & /Disk & Ratio & \\
%
        &         &{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}
                  &{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I}&{\rm U}&{\rm B}&{\rm V}&{\rm R}&{\rm I} \\
\hline
%
%---------------------------------------------------------------------------------------------------------------------------------------------------------------------
% No  NGC|           Mtot (mag)                 |           Mdisk (mag)                 |            Mbulge (mag)               |     Bulge/Disk-Ratio               |   
%        |   U       B       V       R       I  |    U      B       V       R       I   |    U       B       V       R       I  |    U      B     V       R     I    |  
%---------------------------------------------------------------------------------------------------------------------------------------------------------------------
  1  &278 &-20.26 &-20.06 &-20.55 &-20.92 &-21.48 &-20.22 &-20.01 &-20.49 &-20.86 &-21.43 &-16.39 &-16.71 &-17.32 &-17.61 &-18.25 &0.029 &0.048 &0.054 &0.050 &0.053 \\
  2  &628 &-19.85 &-19.72 &-20.44 &-20.74 &-21.33 &-19.83 &-19.69 &-20.38 &-20.67 &-21.24 &-15.43 &-15.90 &-17.15 &-17.68 &-18.61 &0.017 &0.031 &0.051 &0.064 &0.089 \\
  3 &1232 &-21.31 &-21.21 &-21.66 &-22.11 &-22.62 &-21.30 &-21.19 &-21.62 &-22.06 &-22.56 &-15.95 &-16.76 &-18.06 &-18.74 &-19.40 &0.007 &0.017 &0.038 &0.047 &0.054 \\
  4 &1288    &-   &-21.74 &-22.34    &-   &-23.41    &-   &-21.71 &-22.27    & -  &-23.31    & -  &-18.03 &-19.32    & -  &-20.70 & -    &0.034 &0.066 & -    &0.090 \\
  5 &2196 &-20.75 &-21.05 &-21.73 &-22.17 &-22.82 &-20.60 &-20.73 &-21.23 &-21.41 &-22.08 &-18.55 &-19.58 &-20.64 &-21.42 &-22.06 &0.151 &0.349 &0.582 &1.013 &0.981 \\
  6 &2460 &-19.89 &-19.94 &-20.79 &-21.25 &-22.07 &-18.89 &-18.73 &-19.41 &-19.77 &-20.64 &-19.34 &-19.51 &-20.43 &-20.94 &-21.74 &1.517 &2.036 &2.579 &2.929 &2.752 \\
  7 &2742 &-18.81 &-18.69 &-19.24 &-19.49 &-20.09 &-18.81 &-18.69 &-19.24 &-19.48 &-20.08 &-12.14 &-12.74 &-13.76 &-14.31 &-15.12 &0.002 &0.004 &0.006 &0.008 &0.010 \\
  8 &2775 &-19.90 &-20.43 &-21.29 &-21.82 &-22.54 &-19.55 &-19.60 &-20.39 &-20.90 &-21.83 &-18.52 &-19.76 &-20.66 &-21.21 &-21.74 &0.386 &1.157 &1.281 &1.330 &0.921 \\
  9 &2776 &-20.42 &-20.28 &-20.75 &-21.18 &-21.43 &-20.41 &-20.25 &-20.67 &-21.03 &-21.20 &-15.99 &-16.38 &-17.84 &-18.95 &-19.66 &0.017 &0.028 &0.074 &0.147 &0.243 \\
 10 &2841 &-20.95 &-21.15 &-21.90 &-22.37 &-23.11 &-20.78 &-20.87 &-21.55 &-21.92 &-22.62 &-18.82 &-19.54 &-20.49 &-21.20 &-22.01 &0.165 &0.295 &0.376 &0.518 &0.570 \\
 11 &2855 &-19.93 &-20.42 &-21.28 &-21.83 &-22.57 &-19.61 &-20.10 &-20.88 &-21.12 &-21.72 &-18.44 &-18.94 &-20.02 &-21.03 &-21.90 &0.340 &0.345 &0.456 &0.915 &1.182 \\
 12 &2997 &-21.34 &-21.29 &-21.80 &-22.01 &-22.45 &-21.34 &-21.27 &-21.76 &-21.97 &-22.40 &-15.87 &-17.17 &-18.01 &-18.52 &-19.20 &0.006 &0.023 &0.032 &0.042 &0.053 \\
 13 &3031    &-   &-20.51 &-21.16 &-21.62 &-22.38    &-   &-20.07 &-20.82 &-21.31 &-22.07    &-   &-19.31 &-19.74 &-20.12 &-20.86 & -    &0.494 &0.371 &0.336 &0.328 \\
 14 &3147 &-21.23 &-21.41 &-22.18 &-22.67 &-23.42 &-21.10 &-21.26 &-21.96 &-22.40 &-23.15 &-18.86 &-19.21 &-20.38 &-21.01 &-21.81 &0.127 &0.150 &0.233 &0.276 &0.292 \\
 15 &3430 &-20.20 &-19.97 &-20.46 &-21.03 &-21.55 &-20.20 &-19.96 &-20.45 &-21.01 &-21.52 &-14.19 &-14.86 &-15.94 &-16.81 &-17.58 &0.004 &0.009 &0.016 &0.021 &0.026 \\
 16 &3486 &-19.74 &-19.35 &-19.80 &-20.18 &-20.77 &-19.72 &-19.31 &-19.73 &-20.09 &-20.65 &-14.98 &-15.82 &-16.84 &-17.44 &-18.34 &0.013 &0.040 &0.070 &0.087 &0.119 \\
 17 &3521 &-20.92 &-20.88 &-21.48 &-21.87 &-22.59 &-20.85 &-20.79 &-21.37 &-21.76 &-22.50 &-17.77 &-18.14 &-18.94 &-19.27 &-19.93 &0.059 &0.087 &0.107 &0.101 &0.094 \\
 18 &3631 &-20.70 &-20.72 &-21.21 &-21.59 &-22.16 &-20.60 &-20.58 &-21.03 &-21.39 &-21.95 &-18.13 &-18.42 &-19.16 &-19.62 &-20.25 &0.103 &0.137 &0.179 &0.196 &0.209 \\
 19 &3938 &-20.48 &-20.29 &-20.85 &-21.25 &-21.85 &-20.47 &-20.26 &-20.81 &-21.19 &-21.79 &-15.87 &-16.32 &-17.40 &-18.01 &-18.72 &0.015 &0.027 &0.043 &0.053 &0.060 \\
 20 &4254 &-20.87 &-20.78 &-21.35 &-21.76 &-22.43 &-20.79 &-20.58 &-20.98 &-21.30 &-21.72 &-17.98 &-18.85 &-19.98 &-20.62 &-21.63 &0.075 &0.203 &0.398 &0.537 &0.924 \\
 21 &4274 &-19.43 &-19.76 &-20.55 &-21.01 &-21.71 &-19.16 &-19.37 &-20.12 &-20.60 &-21.46 &-17.81 &-18.47 &-19.33 &-19.76 &-20.02 &0.289 &0.436 &0.483 &0.461 &0.266 \\
 22 &4303 &-21.15 &-20.90 &-21.47 &-21.86 &-22.50 &-21.13 &-20.86 &-21.42 &-21.80 &-22.43 &-17.12 &-17.29 &-18.17 &-18.75 &-19.47 &0.025 &0.037 &0.050 &0.060 &0.066 \\
 23 &4321 &-21.01 &-21.03 &-21.77 &-22.27 &-23.07 &-20.98 &-20.99 &-21.69 &-22.18 &-22.96 &-16.91 &-17.38 &-18.82 &-19.56 &-20.59 &0.024 &0.036 &0.071 &0.090 &0.113 \\
 24 &4725 &-20.52 &-20.70 &-21.39 &-21.85 &-22.58 &-20.44 &-20.56 &-21.22 &-21.66 &-22.38 &-17.77 &-18.34 &-19.29 &-19.88 &-20.64 &0.086 &0.128 &0.170 &0.194 &0.200 \\
 25 &4736 &-19.12 &-19.32 &-20.14 &-20.63 &-21.39 &-18.90 &-18.90 &-19.57 &-20.09 &-20.83 &-17.28 &-18.08 &-19.16 &-19.61 &-20.41 &0.226 &0.468 &0.682 &0.641 &0.677 \\
 26 &5055 &-19.85 &-19.96 &-20.58 &-21.01 &-21.72 &-19.84 &-19.93 &-20.54 &-20.97 &-21.68 &-14.97 &-15.84 &-17.10 &-17.24 &-18.03 &0.011 &0.023 &0.042 &0.032 &0.035 \\
%---------------------------------------------------------------------------------------------------------------------------------------------------------------------
\hline
\end{array}
\]
\end{table}
%
\end{document}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%


