Table 2. Parameters of Gaussians fitted to the first half of the dip lightcurve. Gaussians marked by an asterisk in column 1 describe the underlying continuous intensity modulation and have been held fixed in the fit. The normalization gives the depth of the Gaussian.

No. Normalization N Line Center T Width W [cps] [JD � 2450290] FWHM [s] 1 1210.91 0.74347589 145.17 2 914.62 0.74731622 91.25 3 657.47 0.74902041 45.63 4 551.26 0.74976450 49.78 5 718.96 0.75070055 62.20 6 361.19 0.75151662 66.38 7 338.83 0.75346097 58.06 8 1037.61 0.75449296 141.02 9 752.04 0.79255530 169.42 10 550.41 0.79493440 132.63 11 174.39 0.79600880 35.36 12 348.77 0.79654609 26.53 13 441.42 0.79749264 132.63 14� 1000.00 0.79826602 1300.00 15 277.93 0.79920668 30.95 16 441.42 0.80007646 92.83 17 250.68 0.80099741 66.31 18 277.93 0.80179060 22.09 19 555.86 0.80253242 150.30 20 359.67 0.80329984 66.31 21 615.80 0.80457913 114.92 22 479.56 0.80575580 61.89 23 868.36 0.80778560 76.77 24 489.84 0.80876922 115.16 25 467.58 0.80994345 60.31 26� 900.00 0.81146046 426.00 27 256.05 0.81156183 126.16 28 400.78 0.81302161 43.88 29 194.82 0.81391001 43.86 30 673.50 0.81470120 210.20 31 250.49 0.81651209 38.39 32 495.41 0.81746406 43.86 33 289.45 0.81816221 210.15 34 306.15 0.81901888 49.36 35 723.63 0.82038335 71.28 36 779.30 0.82155758 71.28 37� 700.00 0.82164565 840.00 38 706.93 0.82336621 120.64