\documentstyle [11pt]{article}
\topmargin=-2cm
\textwidth=18cm
\textheight=25cm
\oddsidemargin=-1.5cm
\begin{document}
\parindent=1cm

\parindent=2cm
{\Large {\bf Table 8} : Optical parameters of "dirty silicate" grains adapted 
from Jones \& Merrill (1976) (see section 5.1) \\}

\vspace*{0.5cm}
\begin{center}
\begin{small}
\begin{tabular}{cccccc}
\hline

$\lambda$ & Q$_{\rm abs}$& Q$_{\rm sca}$ & g\\
$\mu$m &     &     &     \\ 
\hline
  0.3	&      0.71 	&      0.7 	&      0.32 \\
  0.36	&      0.71 	&      0.7 	&      0.32  \\
  0.44	&      0.71 	&      0.7 	&      0.32\\
  0.55	&      0.4784 	&     0.3645    &  0.3036\\
  0.64	&      0.3551   &   0.2227      & 0.2918 \\
  0.79	&      0.2380   &   0.110       & 0.2658 \\
   1.24	&      0.1169   &   1.941E-02   & 0.1378  \\
   1.63	&      8.206E-02 & 6.718E-03    & 5.870E-02 \\
   2.19	&      5.913E-02 & 2.376E-03    & 1.286E-02 \\
   3.79	&      3.222E-02 &        0.0   &    0.0\\
   4.64	&      2.621E-02 &        0.0   &    0.0\\
   6.8	&      2.000E-02 &        0.0   &    0.0\\
   8.38	&      2.000E-02 &        0.0   &    0.0\\
   9.69 &      7.453E-02 &        0.0   &    0.0\\
   9.9	&      9.080E-02 &        0.0   &    0.0\\
   11.9	&      2.270E-02 &        0.0   &    0.0\\
   12.89 &     2.270E-02 &        0.0   &    0.0\\
   14.5	&      2.270E-02 &        0.0   &    0.0\\
   15.	&      2.444E-02 &        0.0   &    0.0\\
   18.06&      3.666E-02 &        0.0   &    0.0\\
   20	&      4.580E-02 &        0.0   &    0.0\\
   25	&      4.317E-02 &        0.0   &    0.0\\
   40	&      6.590E-03 &        0.0   &    0.0\\
   60	&      2.929E-03 &        0.0   &    0.0\\
   100	&      1.054E-03 &        0.0   &    0.0\\
   200 	&      2.636E-04 &        0.0   &    0.0\\
   300	&      1.172E-04 &        0.0   &    0.0\\
   400	&      6.590E-05 &        0.0   &    0.0\\
   450 	&      5.207E-05 &        0.0   &    0.0\\
   800 	&      1.647E-05 &        0.0   &    0.0  \\
   1100 &      8.714E-06 &        0.0   &    0.0\\
   1300 &      6.239E-06 &        0.0   &    0.0 \\
\hline

\end{tabular}
\end{small}
\end{center}
\end{document}
