Appendix E to the VPC: The Summary of the Catalogue, Page 13 VPC (α�12h,δ)1950_.0 VCC type B_J25 σ_{BJ} 25 BJ t Bt n μ0 r0 U-BJ BJ -RC v/kms�1 961 - 32 00.6 +10 49 26 1573M E[1] 17.13 - 16.78 16.95 1.38 22.98 0.866E+01 0.22 1.06 - 962 - 32 00.6 +11 13 45 - - 18.40 - 18.09 18.52 1.51 22.92 0.480E+01 0.50 1.40 - 963 - 32 00.8 +15 10 16 - - 18.73 0.05 18.42 18.37 2.32 23.54 0.612E+01 0.15 0.77 - 964 - 32 00.8 +15 27 19 1574P ?[1] 17.88 0.05 17.32 17.49 1.09 22.83 0.542E+01 0.40 1.06 - 965 - 32 06.5 +11 42 40 - - 17.92 - 17.01 17.37 0.57 21.79 0.149E+01 0.41 1.31 - 966 - 32 07.0 +14 45 54 - - 18.00 0.11 17.85 18.04 1.58 22.78 0.511E+01 0.04 1.08 - 967 - 32 07.0 +15 22 22 - - 18.08 0.13 17.97 18.30 1.53 22.68 0.455E+01 0.20 1.26 - 968 - 32 08.0 +14 17 32 - - 17.30 0.03 17.06 17.35 2.01 23.12 0.921E+01 0.25 1.21 - 969 - 32 08.8 +12 49 12 - - 17.84 - 17.40 17.94 0.90 22.24 0.333E+01 0.58 1.54 - 970 - 32 10.3 +12 34 44 - - 18.60 - 18.12 18.62 0.93 22.31 0.256E+01 0.55 1.49 -

971 - 32 12.1 +10 59 41 - - 18.40 - 18.11 18.23 1.49 22.70 0.426E+01 �0.49 0.99 - 972 - 32 14.0 +14 49 56 - - 17.28 0.01 16.77 17.10 0.89 22.29 0.448E+01 0.35 1.26 13720[7] 973 * 32 14.8 +15 29 46 1585M I[1] 15.2 [8] 0.2 R - - - - - � � 668[5] 974 - 32 16.7 +13 55 55 - - 18.10 0.07 17.92 18.45 1.46 22.70 0.461E+01 0.59 1.53 - 975 - 32 18.1 +13 31 50 - pec[2] 16.81 0.10 16.78 17.05 1.46 22.00 0.565E+01 0.00 1.19 16798[7] 976 - 32 21.0 +15 15 12 - S[2] 16.26 0.17 16.29 16.50 2.11 22.71 0.110E+02 0.35 1.10 13612[7] 977 - 32 22.0 +11 19 34 - - 17.87 - 17.74 18.12 1.81 22.31 0.453E+01 �0.22 1.33 20710[7] 978 - 32 24.5 +12 54 56 - - 18.41 - 18.23 18.68 2.06 23.02 0.514E+01 0.26 1.42 - 979 - 32 25.5 +13 05 34 - - 18.63 - 18.41 18.80 1.73 23.03 0.458E+01 �0.19 1.34 - 980 - 32 26.0 +11 48 17 - - 17.67 - 17.40 17.96 1.37 22.62 0.550E+01 0.70 1.57 20122[7]

981 - 32 33.2 +14 20 50 - - 18.80 0.07 18.71 19.15 2.54 23.37 0.501E+01 0.47 1.41 - 982 - 32 33.5 +12 13 39 - - 17.76 - 17.50 17.77 1.88 23.29 0.798E+01 0.17 1.19 - 983 - 32 33.7 +11 53 53 - - 17.15 - 16.87 17.46 1.16 22.23 0.530E+01 0.43 1.61 24386[7] 984 - 32 34.7 +13 03 45 - - 17.70 - 17.45 17.84 1.24 22.37 0.452E+01 0.08 1.34 - 985 - 32 36.2 +13 50 23 1603M E[1] 18.46 0.16 17.89 18.13 1.74 23.39 0.687E+01 0.43 1.14 - 986 - 32 38.5 +15 04 42 - - 18.61 0.03 18.38 18.77 1.52 22.81 0.399E+01 0.36 1.34 - 987 - 32 39.0 +14 15 42 1604M E[1] 18.14 0.27 17.14 17.38 1.43 23.80 0.109E+02 0.20 1.15 - 988 - 32 42.0 +13 07 04 - - 18.36 0.04 18.11 18.66 1.46 22.81 0.445E+01 0.35 1.55 - 989 - 32 43.9 +12 45 41 - - 18.35 - 18.15 18.67 1.61 22.74 0.439E+01 � 1.52 - 990 - 32 44.5 +12 45 47 - - 18.21 - 18.00 - 1.95 23.03 0.570E+01 � � -

991 - 32 44.5 +11 17 43 - - 18.53 - 18.38 18.64 2.17 22.97 0.474E+01 0.07 1.17 - 992 - 32 48.2 +10 58 09 - - 18.25 - 17.88 18.04 1.32 22.87 0.485E+01 0.16 1.04 - 993 - 32 51.7 +14 50 07 - - 18.02 0.03 17.62 17.68 1.12 22.54 0.423E+01 0.14 0.91 - 994 - 32 53.5 +15 11 32 - - 17.67 0.11 17.17 17.60 0.57 20.69 0.834E+00 0.50 1.39 19143[7] 995 * 32 55.0 +14 46 20 1615M S[1] 10.9 [1] 0.2 R - - - - - 0.57 � 486[5] 996 * 32 55.7 +13 01 31 1614M S0[1] 14.0 [2] 0.3 R - - - - - � � 733[5] 997 - 32 56.0 +15 25 47 - - 18.18 0.01 17.90 18.21 1.58 23.01 0.555E+01 0.31 1.24 - 998 - 32 56.7 +14 32 12 1616M E[1] 17.69 0.18 16.74 17.02 0.95 23.09 0.706E+01 0.38 1.20 - 999 - 32 57.5 +12 50 09 - - 17.41 - 16.57 16.85 1.00 22.85 0.720E+01 0.26 1.20 - 1000 - 32 57.5 +14 43 16 - - 17.86 0.01 17.52 17.69 1.44 22.98 0.627E+01 0.02 1.06 -

1001 - 32 59.0 +11 46 24 - - 18.33 - 18.12 18.40 1.66 22.92 0.488E+01 0.08 1.20 - 1002 * 32 59.2 +12 29 48 1619M E?[1] 12.4 [1] 0.2 R - - - - - 0.72 � 381[5] 1003 - 32 59.5 +13 28 33 - - 18.45 0.03 18.13 18.15 1.21 22.25 0.308E+01 �0.54 0.85 - 1004 - 32 59.7 +11 49 27 - - 18.22 - 17.79 18.31 1.19 22.88 0.477E+01 0.73 1.52 - 1005 - 33 00.1 +12 41 55 - - 18.07 - 17.83 18.03 2.08 23.39 0.736E+01 0.33 1.09 - 1006 - 33 04.6 +15 16 05 - - 18.75 0.06 18.49 18.91 1.44 22.94 0.394E+01 0.85 1.38 - 1007 - 33 05.5 +14 06 30 - - 18.60 0.11 17.99 18.59 1.30 23.17 0.526E+01 0.50 1.62 - 1008 * 33 05.6 +12 39 26 1627M E[1] 15.4 [4] 0.4 R - - - - - � � 249[3] 1009 - 33 06.0 +11 22 43 - - 17.46 - 17.15 17.64 1.00 22.01 0.374E+01 0.33 1.48 28279[7] 1010 * 33 06.5 +12 32 27 1630M E[1] 12.8 [1] 0.2 R - - - - - 0.85 � 1470[5]

1011 - 33 06.8 +12 45 29 - - 17.13 - 16.42 16.56 0.56 21.26 0.146E+01 0.14 1.01 12505[7] 1012 * 33 08.3 +12 49 56 1632M S0[1] 10.7 [1] 0.2 R - - - - - 0.90 � 311[5] 1013 - 33 09.5 +11 56 33 1633B S[1] 16.33 - 16.11 16.52 1.31 22.16 0.784E+01 0.13 1.37 16252[7] 1014 - 33 11.6 +11 05 50 - - 18.40 - 18.21 18.38 1.79 22.81 0.456E+01 �0.27 1.06 - 1015 * 33 12.6 +14 41 15 1636B S[1] 15.0 [2] 0.3 R - - - - - � � - 1016 - 33 13.3 +12 52 35 - - 17.87 - 14.83 15.08 0.20 18.73 0.178E�02 0.18 1.16 - 1017 - 33 14.5 +11 57 00 - - 17.32 - 17.20 17.47 1.79 22.30 0.575E+01 �0.29 1.18 18725[7] 1018 - 33 17.8 +11 14 48 - - 18.12 - 17.88 18.41 1.29 22.43 0.391E+01 0.37 1.53 - 1019 - 33 18.0 +13 51 40 - - 18.75 0.05 18.48 18.83 1.96 23.23 0.500E+01 �0.22 1.29 - 1020 - 33 18.5 +14 38 01 - - 18.58 0.09 18.02 18.42 1.45 23.41 0.611E+01 0.15 1.36 -

1021 - 33 20.6 +14 08 02 1644M S[1] 18.11 0.18 17.36 17.33 1.29 23.34 0.755E+01 �0.16 0.79 756[5] 1022 - 33 21.2 +11 09 36 - - 18.13 - 18.01 18.18 1.96 22.78 0.506E+01 0.15 1.06 - 1023 - 33 21.2 +11 53 09 - - 18.15 - 17.73 18.21 1.09 22.54 0.394E+01 0.61 1.46 - 1024 - 33 23.6 +12 38 44 - - 17.37 - 16.97 17.37 0.70 21.07 0.166E+01 0.33 1.36 13594[7] 1025 - 33 24.2 +11 35 55 - - 17.48 - 17.10 17.65 0.92 22.06 0.360E+01 0.51 1.55 - 1026 - 33 24.7 +11 12 43 1647M E[1] 16.59 - 16.16 16.34 1.31 23.11 0.119E+02 0.39 1.07 - 1027 - 33 25.7 +11 51 10 - - 17.99 - 17.83 18.00 1.87 22.61 0.503E+01 �0.15 1.06 20126[7] 1028 - 33 26.6 +13 45 27 - - 18.66 0.06 18.05 18.32 1.61 23.21 0.572E+01 0.28 1.18 - 1029 - 33 28.6 +12 40 29 - - 17.82 - 17.65 18.09 1.52 22.41 0.467E+01 0.33 1.41 12904[7] 1030 - 33 29.3 +13 12 40 - - 17.91 0.03 17.65 18.14 1.37 22.43 0.449E+01 0.33 1.48 28077[7]

1031 - 33 30.7 +11 50 03 - - 17.90 - 17.57 18.18 1.06 22.26 0.364E+01 0.30 1.63 19831[7] 1032 - 33 31.1 +12 07 29 - - 17.68 - 17.48 18.03 2.01 23.05 0.734E+01 � 1.56 28279[7] 1033 - 33 32.0 +12 49 55 - - 17.34 - 17.09 17.55 1.18 22.32 0.504E+01 0.57 1.44 13530[7] 1034 - 33 33.5 +13 12 01 - - 18.66 0.21 17.73 18.28 0.79 22.49 0.273E+01 0.23 1.56 - 1035 - 33 35.0 +13 52 46 - - 18.26 0.02 18.10 18.52 1.74 22.57 0.427E+01 0.14 1.38 - 1036 - 33 36.2 +13 35 04 - - 18.78 0.05 18.47 18.81 1.81 23.11 0.467E+01 0.04 1.28 - 1037 - 33 36.4 +11 18 42 - - 18.10 - 17.83 18.12 1.65 23.00 0.579E+01 0.40 1.21 - 1038 - 33 36.5 +11 31 37 - - 18.28 - 18.18 18.53 2.29 22.91 0.511E+01 �0.07 1.29 - 1039 - 33 43.5 +14 17 19 - - 17.90 0.10 17.59 17.70 2.10 23.12 0.724E+01 �0.06 0.97 - 1040 - 33 43.7 +11 47 58 - - 18.18 - 17.94 18.50 1.49 22.76 0.474E+01 0.27 1.57 -

Appendix E to the VPC: The Summary of the Catalogue, Page 14 VPC (α�12h,δ)1950_.0 VCC type B_J25 σ_{BJ} 25 BJ t Bt n μ0 r0 U-BJ BJ -RC v/kms�1 1041 - 33 46.2 +14 27 01 - - 18.14 0.05 17.90 18.20 1.37 22.57 0.427E+01 �0.05 1.23 - 1042 - 33 46.5 +13 51 01 1658M E[1] 18.20 0.49 16.81 17.02 1.55 24.08 0.149E+02 � 1.11 - 1043 - 33 48.5 +12 43 58 - - 18.33 - 17.93 18.34 1.11 22.37 0.336E+01 0.70 1.37 - 1044 - 33 50.2 +12 51 20 - - 18.31 - 17.98 18.53 1.29 22.71 0.425E+01 0.61 1.55 - 1045 - 33 50.7 +13 11 13 - - 18.73 0.05 18.43 18.98 1.75 23.08 0.464E+01 0.50 1.56 - 1046 - 33 51.0 +12 43 49 - - 18.05 - 17.76 18.16 1.41 22.74 0.498E+01 0.67 1.35 - 1047 - 33 51.4 +13 52 41 1660B S[1] 15.98 0.02 15.80 15.98 1.19 21.92 0.768E+01 0.12 1.07 9092[7] 1048 - 33 54.0 +13 15 15 - - 17.85 0.05 17.57 18.09 1.60 22.83 0.596E+01 0.33 1.52 - 1049 - 33 54.7 +12 41 59 - - 18.40 - 18.12 18.55 1.41 22.65 0.405E+01 0.44 1.39 - 1050 * 33 55.2 +11 42 51 1664M E[1] 11.9 [1] 0.2 R - - - - - 0.79 � 1119[5]

1051 - 33 55.5 +12 02 05 - S[2] 16.88 - 16.67 17.05 1.24 21.97 0.538E+01 0.19 1.33 19815[7] 1052 * 33 56.2 +12 40 50 - E[2] 14.9 [9] 0.6 - - - - - � � - 1053 - 33 57.5 +12 52 54 - - 17.71 - 17.44 17.91 1.28 22.33 0.455E+01 0.41 1.45 13100[7] 1054 - 33 59.2 +13 54 46 1669M E[1] 17.16 0.22 16.62 16.95 1.84 23.41 0.126E+02 0.26 1.27 600[6] 1055 - 33 59.7 +14 54 13 - - 18.80 0.04 18.44 18.90 1.72 23.23 0.491E+01 0.30 1.44 - 1056 - 33 59.9 +13 16 14 - - 18.09 0.10 17.64 18.27 0.97 22.12 0.306E+01 0.64 1.66 - 1057 - 34 00.6 +14 15 02 - - 18.02 0.10 17.71 18.01 1.98 23.13 0.683E+01 0.28 1.22 - 1058 * 34 01.1 +11 32 01 1673M S[1] 12.0 [1] 0.2 R - - - - - 0.45 � 2268[5] 1059 - 34 01.1 +14 01 24 1674M E[1] 17.03 0.33 16.00 16.36 1.08 23.25 0.120E+02 0.31 1.31 - 1060 - 34 01.2 +10 44 36 - - 17.50 - 17.33 17.51 1.90 22.85 0.707E+01 0.26 1.07 -

1061 - 34 02.0 +12 39 23 - - 18.17 - 17.96 18.48 1.89 22.58 0.466E+01 0.23 1.52 - 1062 - 34 02.2 +14 55 52 - - 18.16 0.01 17.74 18.33 1.02 22.49 0.361E+01 0.68 1.60 - 1063 - 34 02.7 +11 52 04 - - 18.18 - 18.02 18.42 1.92 22.80 0.505E+01 0.04 1.35 - 1064 * 34 03.0 +11 30 45 1676M S[1] 11.6 [1] 0.2 R - - - - - � � 2255[5] 1065 - 34 04.0 +14 58 09 - - 17.90 0.05 17.74 18.04 1.67 22.77 0.544E+01 0.11 1.23 - 1066 - 34 04.8 +11 46 31 - - 18.56 - 18.41 18.74 2.02 22.89 0.445E+01 �0.14 1.27 - 1067 - 34 05.5 +14 30 02 1682M E[1] 18.04 0.22 17.34 17.64 1.38 23.35 0.792E+01 0.37 1.23 - 1068 - 34 05.8 +10 49 23 - - 17.53 - 17.42 17.34 2.04 22.65 0.629E+01 �0.22 0.72 21513[7] 1069 - 34 05.9 +13 12 19 - - 18.61 0.19 17.97 18.52 0.99 22.40 0.304E+01 0.49 1.56 - 1070 - 34 06.9 +14 56 51 - - 18.17 0.09 18.09 18.64 1.71 22.78 0.472E+01 0.44 1.56 -

1071 - 34 09.6 +13 25 16 - - 17.89 0.22 17.21 17.53 1.44 22.87 0.687E+01 0.02 1.25 - 1072 - 34 11.8 +14 32 40 - S[2] 16.83 0.01 16.48 16.64 1.07 22.41 0.650E+01 0.14 1.04 13788[7] 1073 * 34 12.5 +13 32 01 1686M S[1] 13.8 [1] 0.2 R - - - - - � � 1122[5] 1074 - 34 12.8 +14 55 12 - - 17.26 0.08 - - - - - � � 13767[7] 1075 - 34 13.1 +11 05 29 - - 18.26 - 18.03 18.36 1.42 22.56 0.406E+01 �0.23 1.27 - 1076 - 34 15.1 +13 12 39 - - 18.35 0.19 17.72 18.37 1.15 22.90 0.485E+01 0.57 1.68 - 1077 - 34 16.0 +15 00 52 - - 17.49 0.06 16.96 17.17 1.13 22.82 0.656E+01 0.31 1.10 - 1078 - 34 16.0 +15 28 36 - - 17.92 0.07 17.84 18.20 1.79 22.60 0.492E+01 0.13 1.30 - 1079 - 34 16.1 +15 12 03 - - 18.58 0.14 18.49 18.98 1.72 22.88 0.410E+01 0.43 1.48 - 1080 - 34 18.3 +14 48 05 - - 18.81 0.02 18.51 18.71 1.60 22.96 0.413E+01 0.13 1.09 -

1081 - 34 18.6 +15 31 27 - - 18.03 0.09 17.91 17.89 1.83 22.87 0.542E+01 0.07 0.81 - 1082 * 34 18.7 +13 26 18 1690M S[1] 10.1 [1] 0.2 R - - - - - 0.55 � �235[5] 1083 - 34 20.2 +13 12 14 - - 18.27 0.09 17.99 18.45 1.72 22.79 0.495E+01 0.18 1.44 - 1084 - 34 21.3 +11 40 48 - - 17.44 - 17.26 17.36 1.49 22.37 0.544E+01 �0.14 0.96 16425[7] 1085 * 34 23.5 +12 47 42 1695M S0?[1] 14.5 [7] 0.3 R - - - - - � � 1547[3] 1086 - 34 24.2 +12 21 18 - - 18.32 - 18.09 18.19 1.81 23.11 0.556E+01 0.25 0.96 - 1087 - 34 25.3 +11 32 25 - - 18.31 - 18.10 18.23 2.06 23.29 0.619E+01 �0.03 1.00 - 1088 * 34 25.6 +14 29 33 1696M S[1] 11.7 [1] 0.2 R - - - - - � � 342[5] 1089 - 34 26.3 +13 31 01 - - 18.39 0.13 17.78 18.25 2.26 23.52 0.812E+01 0.23 1.45 - 1090 - 34 28.1 +15 24 48 - - 17.29 0.01 16.87 17.30 0.73 21.43 0.221E+01 0.62 1.40 -

1091 - 34 28.2 +14 36 18 - - 18.27 0.02 17.76 18.22 0.90 22.32 0.292E+01 0.41 1.44 - 1092 - 34 29.2 +14 52 46 - - 18.86 0.09 18.47 19.00 1.71 23.15 0.467E+01 0.28 1.53 - 1093 - 34 31.2 +11 00 55 - - 18.11 - 17.79 18.04 1.28 22.66 0.451E+01 0.27 1.16 - 1094 - 34 31.8 +13 58 56 - - 17.98 0.04 17.76 18.12 1.99 22.96 0.617E+01 0.16 1.31 - 1095 - 34 33.4 +13 12 55 - - 17.67 0.15 17.32 17.65 1.93 23.02 0.775E+01 0.00 1.26 - 1096 - 34 33.9 +15 31 59 - - 17.19 0.02 16.82 17.29 0.81 21.75 0.305E+01 0.69 1.45 22855[7] 1097 - 34 37.0 +14 40 56 - - 17.28 0.16 17.24 17.57 1.26 21.84 0.395E+01 0.29 1.27 9202[7] 1098 - 34 37.2 +15 24 48 - - 17.71 0.06 17.55 17.94 1.40 22.45 0.479E+01 0.42 1.34 22124[7] 1099 - 34 44.5 +15 16 45 - - 18.43 0.02 18.29 18.31 1.95 23.04 0.500E+01 �0.07 0.86 - 1100 - 34 45.2 +11 48 43 - - 18.18 - 18.04 18.33 1.72 22.50 0.423E+01 �0.28 1.21 -

1101 - 34 45.5 +11 09 46 - - 18.01 - 17.61 17.71 1.36 23.06 0.609E+01 0.20 0.96 - 1102 - 34 46.0 +14 33 19 - - 17.32 0.14 17.35 17.30 1.76 22.14 0.496E+01 �0.35 0.77 13883[7] 1103 - 34 46.0 +15 27 47 - - 18.48 0.01 18.24 18.60 1.70 22.97 0.478E+01 0.20 1.30 - 1104 - 34 46.2 +15 09 59 - - 18.90 0.05 18.46 19.06 1.45 23.10 0.433E+01 0.92 1.62 - 1105 - 34 48.5 +11 14 50 - S?[2] 16.88 - 16.78 17.00 1.88 22.34 0.719E+01 0.00 1.12 17937[7] 1106 - 34 50.7 +12 33 43 1711M E[1] 16.81 - 16.44 16.62 1.48 23.13 0.112E+02 0.37 1.07 - 1107 - 34 55.0 +15 21 36 - - 17.70 0.11 17.55 18.05 1.32 22.48 0.471E+01 0.76 1.49 21589[7] 1108 - 34 56.2 +13 52 59 - - 17.36 0.04 17.14 17.53 1.82 22.81 0.752E+01 0.23 1.34 21296[7] 1109 - 34 57.5 +10 50 42 - - 17.25 - 16.92 17.05 0.92 21.78 0.343E+01 �0.31 1.00 16158[7] 1110 - 34 58.5 +14 04 59 - - 18.84 0.04 18.70 19.23 2.21 23.20 0.457E+01 0.17 1.53 -

1111 - 35 00.3 +15 15 51 - - 18.90 0.07 18.71 18.95 1.94 23.16 0.435E+01 0.15 1.14 - 1112 - 35 02.7 +13 04 09 - - 18.55 - 18.37 18.59 1.87 22.84 0.435E+01 �0.20 1.12 - 1113 - 35 04.5 +12 56 12 - - 17.29 - 16.75 17.08 1.26 22.99 0.837E+01 0.43 1.27 - 1114 - 35 05.5 +12 59 15 - - 18.14 - 17.88 18.37 1.87 23.20 0.645E+01 0.54 1.48 - 1115 - 35 06.6 +11 46 50 - - 18.18 - 18.03 18.44 1.66 22.29 0.381E+01 �0.99 1.37 - 1116 - 35 07.0 +14 05 47 - - 17.70 0.01 17.45 17.88 1.01 21.87 0.308E+01 0.22 1.39 13701[7] 1117 - 35 08.1 +12 46 51 - - 18.21 - 18.01 18.32 1.56 22.55 0.425E+01 0.04 1.24 - 1118 - 35 10.3 +11 41 31 - - 17.77 - 17.57 17.55 1.85 23.03 0.686E+01 �0.13 0.80 - 1119 * 35 12.6 +12 05 40 1727M S[1] 10.5 [1] 0.2 R - - - - - 0.61 � 1519[5] 1120 - 35 15.6 +11 01 45 - - 18.05 - 17.82 17.63 1.70 22.84 0.546E+01 �0.16 0.58 -

Appendix E to the VPC: The Summary of the Catalogue, Page 15 VPC (α�12h,δ)1950_.0 VCC type B_J25 σ_{BJ} 25 BJ t Bt n μ0 r0 U-BJ BJ -RC v/kms�1 1121 - 35 15.8 +12 17 17 - - 17.86 - 17.70 18.08 1.55 22.29 0.434E+01 �0.20 1.33 24142[7] 1122 * 35 22.1 +14 33 22 1737B E[1] 14.7 [7] 0.3 R - - - - - � � 9174[3] 1123 - 35 22.3 +12 22 40 - - 18.16 - 17.91 18.42 1.41 22.58 0.433E+01 0.57 1.50 - 1124 - 35 22.7 +15 29 57 - S?[2] 16.18 0.02 15.66 16.15 0.62 21.28 0.265E+01 0.75 1.48 21449[7] 1125 - 35 23.5 +15 29 27 - - 18.19 0.07 17.65 18.17 1.13 22.70 0.452E+01 0.53 1.52 - 1126 - 35 23.6 +15 30 08 - - 17.62 0.09 17.06 - 1.17 22.61 0.584E+01 � � - 1127 - 35 24.1 +15 21 58 - - 18.31 0.04 18.09 18.50 2.29 23.17 0.601E+01 0.37 1.37 - 1128 - 35 25.0 +13 47 53 - - 18.85 0.12 18.40 18.98 1.31 22.87 0.379E+01 0.39 1.59 - 1129 - 35 29.7 +14 39 18 - - 18.64 0.09 18.35 18.51 2.17 23.31 0.560E+01 �0.05 1.04 -