\documentstyle[referee]{l-aa}
\begin{document}
\begin{table*}
\caption{Results of Fitting ROSAT PSPC Spectrum}
\begin{tabular}{lccccrl}\\ \hline\hline
AGN & $N_H$ &$\Gamma_{x}$  &Norm$^a$  & dof & $\chi^2$ &  comment \\
 & $10^{20}cm^{-2}$ & &      & & \\ \hline
0003+199 & 3.96$\pm$0.19 & 2.92$\pm$0.04 & 67.9$\pm$1.0 & 134& 4.97 & soft excess \\ %43.20  
0007+106 & 7.51$\pm$0.42 & 1.89$\pm$0.18 & 17.9$\pm$3.6 &  32& 0.91 &  \\ %44.04
0026+129 & 5.41$\pm$1.22 & 2.31$\pm$0.30 & 19.5$\pm$1.4 &  22& 0.39 &\\  % 44.37
0050+124 & 6.96$\pm$0.77 & 3.05$\pm$0.14 & 35.5$\pm$1.6 &  51& 0.80 &  \\ % 43.66
0052+124 & 4.79$\pm$0.58 & 2.39$\pm$0.16 & 24.6$\pm$0.9 &  45& 1.84 & Soft excess \\ % 44.52  
0137+060 & 4.26$\pm$1.09  & 4.21$\pm$0.25& 2.61$\pm$0.32 & 27& 1.18  &  \\ %43.86
0157+001 & 2.57$\pm$0.94 & 2.82$\pm$0.29 & 4.38$\pm$0.42 &  29& 0.42&   \\  %43.70
0450$-$299 & 1.21$\pm$0.56  & 2.91$\pm$0.29 & 3.29$\pm$0.501  & 25& 0.65 &  \\ %44.05
0759+651 &            &           &        &      &    & not detected \\
0804+761 & 3.58$\pm$0.48 & 2.59$\pm$0.12 & 38.9$\pm$1.5 &  47& 0.81&   \\ % 44.27
         & 3.72$\pm$0.68 & 2.56$\pm$0.17 & 38.7$\pm$2.1 &  26& 0.66&   \\ % 44.28
0838+770 & 1.93$\pm$0.76 & 2.75$\pm$0.30 & 5.23$\pm$0.47 &  26& 0.65&  \\ % 43.59
0844+349 & 4.94$\pm$3.40 & 2.82$\pm$0.95 & 1.93$\pm$0.39 &   4& 1.05 & \\ % 42.50
0919+515 & 2.26$\pm$1.01  & 3.43$\pm$0.34 &1.99$\pm$0.27  & 17& 0.92  & \\ % 43.15
0921+525 & 1.56$\pm$0.12 & 2.35$\pm$0.05 & 111$\pm$2 & 149& 6.24 &  soft excess\\ %43.88
0923+129 & 3.51$\pm$0.47 & 2.27$\pm$0.14 & 45.0$\pm$1.6&  52& 1.92 & soft excess \\ %43.34
0947+396 & 1.58$\pm$1.00 & 2.12$\pm$0.30 & 8.87$\pm$0.79&  18& 0.95 &  \\  %44.42
0953+414 & 1.31$\pm$0.43 & 2.66$\pm$0.21 & 13.2$\pm$0.7&  31& 0.79 &  \\ % 44.56
0955+326 & 3.34$\pm$4.12  & 2.60$\pm$1.29& 0.97$\pm$0.27 &  3& 0.24  & \\ % 44.18
1001+054 & 2.33           & 4.12$\pm$1.26 & 0.046$\pm$0.098 &   6& 0.70  & Fixed $N_H$\\ % 41.31
1048+342 & 2.00$\pm$0.67 & 2.46$\pm$0.25&  4.42$\pm$0.35  &  26 & 0.74 & \\   %43.82
1100+772 & 3.45$\pm$1.69 & 2.64$\pm$0.68 & 10.9$\pm$1.7 &  10& 0.71 &  \\ %44.73
1114+445 & 1.50$\pm$1.20 & 2.36$\pm$0.49&  2.12$\pm$0.30 &  12& 4.35 & weak absorption \\  %43.40
1115+407 & 1.90$\pm$0.67 & 2.89 $\pm$0.27&  4.31$\pm$0.40 &  22& 0.70& \\ % 43.61
1116+215 & 1.22$\pm$0.16 & 2.62$\pm$0.07  & 13.3$\pm$0.3 &  81& 1.22  & \\ % 44.31
1121+422 & 2.10$\pm$0.83 & 2.93$\pm$0.30 & 3.89$\pm$0.39 &  24&  1.58 & \\ % 43.93
1126$-$041&4.40$\pm$4.00 &2.59$\pm$1.04 & 0.41$\pm$0.11  & 11 & 5.71 &  weak absorption   \\ % 41.84
1200+448 & 1.87$\pm$0.15  & 2.86$\pm$0.06 & 22.6$\pm$0.4  &122& 1.97  & weak absorption \\ % 40.54
1202+281 & 1.73$\pm$0.29 & 2.23$\pm$0.11 & 9.55$\pm$0.28 &  61& 0.95 &   \\ % 44.22
1211+143 & 3.39$\pm$0.63 & 3.22$\pm$0.16 & 24.9$\pm$1.5 &  29&  1.01 & \\ % 43.74
         & 3.30$\pm$0.86 & 3.13$\pm$0.22 & 37.7$\pm$3.1 &  27& 0.69 &  \\ % 43.95
1216+069 & 1.65$\pm$0.72 & 2.42$\pm$0.35 & 12.4$\pm$1.1 &  23& 0.84 &  \\ % 44.91
1226+023 & 1.79$\pm$0.10  & 1.99$\pm$0.05 & 183$\pm$3 & 148& 1.42 & \\ % 45.53
1244+026 & 3.11$\pm$0.49 & 3.37$\pm$0.13 & 14.2$\pm$0.7 &  47& 0.94 &  \\ % 42.95
1247+267 & 0.88$\pm$1.65 & 2.10$\pm$0.22 & 7.31$\pm$6.52 &  10& 0.47 &  \\ % 46.50
1254+571& 5.32$\pm$3.32  & 2.74$\pm$0.84& 0.63$\pm$0.10  &  6& 1.67  & weak absorption \\ % 41.61
1302$-$102 & 3.38$\pm$1.04 &2.36$\pm$0.39 & 15.8$\pm$1.4 &  20& 1.10  &   \\  % 44.89
1307+085 & 2.35$\pm$0.48 & 2.66$\pm$0.20 & 14.1$\pm$0.68 &  37& 1.29  &  \\ % 44.20
1309+355 & 1.01$\pm$0.65 & 2.49$\pm$0.33 & 4.30$\pm$0.39 &  21& 1.05  & weak absorption? \\ % 43.89
1322+659 & 2.67$\pm$0.50 & 3.04$\pm$0.15&  8.42$\pm$0.47&  32 & 1.08 & \\ % 43.94
1351+640 & 2.54$\pm$1.80&  2.53$\pm$0.63&  2.22$\pm$0.37 &  6 & 1.16 & \\ % 42.92
1352+183 & 2.00$\pm$0.69 & 2.53$\pm$0.26 & 8.26$\pm$0.61 &  30& 1.04  & \\ % 42.92
1358+043 & 2.20$\pm$1.96 & 2.82$\pm$0.68 & 1.25$\pm$0.32 &  10& 0.77 &  \\  % 44.02
1402+261 & 1.40$\pm$0.50 & 2.89$\pm$0.20 & 10.3$\pm$0.79 &  33& 1.09  & weak absorption?\\ %44.05
1404+226 & 4.66$\pm$0.89 & 4.04$\pm$0.20 & 3.40$\pm$0.30 &  29& 1.94 & weak absorption  \\ % 42.72
1407+265 & 1.54$\pm$0.48 & 2.68$\pm$0.20 & 16.1$\pm$1.1 &  24& 0.72 & \\ %45.92
1411+442 & 1.10$\pm$1.00 & 2.97$\pm$0.46 & 0.36$\pm$0.07&  14& 0.62 & \\ %42.02
1415+451 & 1.14$\pm$0.62 & 2.80$\pm$0.28 & 3.59$\pm$0.36 &  26& 0.89 & \\ %43.29
1416$-$129 & 7.21$\pm$0.31 & 2.19$\pm$0.16 & 24.5$\pm$3.4 &  46& 0.77 & \\ %44.42
1425+267  &1.60$\pm$2.10  &  1.89$\pm$0.73 & 0.97$\pm$0.21  &  4 & 1.84 & \\ %44.05
1426+015 & 2.80$\pm$0.32 & 2.55$\pm$0.09 & 39.0$\pm$1.2 &  66& 1.25  & \\ %44.15
1440+356 & 1.61$\pm$0.50 & 3.43$\pm$0.23 & 19.3$\pm$1.9 &  26& 0.88 &  \\ % 43.48
1444+407 & 1.30$\pm$0.71 & 2.94$\pm$0.32 &  2.98$\pm$0.38 &  20& 1.31& weak absorption \\ % 43.93    ! absorption edge ?
1501+106 & 2.20$\pm$0.35 & 2.52$\pm$0.13 & 50.0$\pm$2.0 &  81& 1.60  & soft excess \\ %43.50  
         & 2.20$\pm$0.16 & 2.33$\pm$0.06& 52.6$\pm$0.82 &144& 2.29   & soft excess \\%43.58
1512+370 & 1.69$\pm$0.75 & 2.35$\pm$0.29 & 6.48$\pm$0.52 &  22& 0.89 & \\ \hline%43.58
\end{tabular}
\end{table*}
\setcounter{table}{1}
\begin{table*}
\caption{continued}
\begin{tabular}{lccccrl}\\ \hline\hline
AGN & $N_H$ &$\Gamma_{x}$  &Norm$^a$  & dof & $\chi^2$ &  comment \\
 & $10^{20}cm^{-2}$ & &      & & \\ \hline 
1519+226 & 4.00$\pm$1.92 & 2.93$\pm$0.46 & 3.20$\pm$0.50 &  13& 2.31  & weak absorption \\%43.37
1522+101 & 2.88$\pm$0.31 & 2.88$\pm$0.91 & 0.50$\pm$0.14 &   6& 1.64 &  \\ %44.67 
1534+580 & 2.08$\pm$0.53 & 2.17$\pm$0.19 & 25.4$\pm$1.2 &  40&  .69 &  \\ % 43.15
1543+489 & 2.34$\pm$1.92 & 3.39$\pm$0.61 & 1.04$\pm$0.25 &   8&  .80 & \\ %43.71
         & 1.68$\pm$1.29 & 3.16$\pm$0.58 & 1.20$\pm$0.25 &  12& 1.04  & \\ % 43.84
1545+210 & 3.86$\pm$0.75 & 2.36$\pm$0.22 &  21.9$\pm$1.2 &  22& 1.07  &\\ % 44.97
1557+351 & 4.72$\pm$0.89  & 3.41$\pm$0.18 & 7.64$\pm$0.50  & 36& 2.13  &  weak absorption \\ % 42.29 
1602+241 & 4.97$\pm$2.32  & 2.22$\pm$0.52 & 4.34$\pm$0.63  &  7& 1.63  & \\ % 43.31
1613+658 & 2.90$\pm$0.43 & 2.50$\pm$0.13 & 19.3$\pm$0.7 &  46& 1.03  & \\ % 44.22
1617+175 & 4.30$\pm$1.05 & 2.21$\pm$0.29 & 7.75$\pm$0.56 &  22& 1.21  &  \\ % 43.80
1626+554 & 1.99$\pm$1.09 & 2.61$\pm$0.41 & 11.7$\pm$1.4 &  16& 0.76 & \\ % 44.00
1630+377 & 1.37$\pm$1.55 & 2.79$\pm$0.67 & 1.17$\pm$0.28 &  10& 1.25  & complex \\ % 45.18 
1634+706 & 4.08$\pm$1.83 & 2.37$\pm$0.16& 7.72$\pm$4.06 &  19&  .77  & \\ % 46.03
1700+518 &           &      &           &           &    & $18\pm 9$ counts \\ % 42.06
1704+608 & 2.54$\pm$1.21  & 2.30$\pm$0.41&  2.99$\pm$0.30 &  24& 4.11 & weak absorption  \\ % 44.43
1718+481 & 2.28$\pm$0.62  & 2.25$\pm$0.21&  4.16$\pm$0.24 &  37& 0.87&  \\ % 45.60
2112+059 &14.60$\pm$140.  & 2.21$\pm$8.16&  0.29$\pm$1.12 &   3& 1.83  & \\ % 43.65
2214+139 & 4.93$\pm$89.3  &  .35$\pm$1.20&  0.33$\pm$3.12 &   8& 1.59  & \\ % 42.72
2233+134 & 4.74$\pm$1.94  & 2.77$\pm$0.42&  2.86$\pm$0.37 &  11& 0.65 & \\ %44.15
2308+098 & 4.07$\pm$1.30  & 2.44$\pm$0.34&  6.62$\pm$0.60&  13&  .79 & \\ % 44.87
2344+09  & 5.25$\pm$1.75  & 2.28$\pm$0.39 & 3.80$\pm$0.39 & 16&  .74 &  \\\hline % 45.10
\end{tabular}
\end{table*}
\end{document}
