% file tab6.tex
\input bal
% V. Strai\v zys, A. Kazlauskas, K. \v Cernis and V. Vansevi\v cius
% The Vicinity of the North America and Pelican Nebulae
% Baltic Astronomy, 1993, vol.2, 171-213.
\font\main =cmr10
\font\ks =cmti10
\def\t{\hbox{$\scriptstyle +$}}
\Table {6} { Results of quantification, extinction and distance determination
 in the  40$^0$ -- 41$^0$ area.}
\hrule
$$\vbox{\tabskip=2pt \baselineskip=8pt
 \halign to \hsize {\tabskip=1em plus1em minus 1em&
 \hfil#\tabskip 10pt& #\hfil\tabskip 0pt& #\hfil\tabskip 10pt plus 10pt minus 5pt&#\hfil 
& \hfil#& \hfil#  &\hfil#&\hfil#\cr  
\hfil{ No.}\hfil &\hfil{BD} \hfil&~~&\hfil{Sp.}\hfil&\hfil{$M_V$}\hfil&\hfil{$V$}\hfil 
&\hfil{$A_V$}\hfil & \hfil{$r$}\hfil\cr 
\noalign{\vskip 0.2cm\hrule\vskip 0.2cm}
  3.  &\t40$^0$ 4116& &  B9 IV        &    0.0 &  7.76 &  0.31 &  310 \cr
  4.  &\t40$^0$ 4119& &  B2 V         &  --1.7:&  8.85 &  1.98 &  520:\cr
  5.  &\t40$^0$ 4120& &  A8.5 V       &   +2.4 &  8.91 &  0.22 &  180 \cr
  6.  &\t40$^0$ 4121& &  A1 V         &   +1.1:&  7.15 &  0.09 &  160 \cr
  8.  &\t40$^0$ 4129& &  B9.5 II-III  &  --2.1 &  7.96 &  0.58:&  790 \cr
  9.  &\t40$^0$ 4132& &  B0 V         &  --4.0:&  8.51 &  3.10 &  760 \cr
 10.  &\t40$^0$ 4135& &  K4 III       &   +0.6 &  8.93 &  0.58 &  350 \cr
 12.  &\t40$^0$ 4137& &  B0.5 III     &  --4.2:&  8.24 &  1.48 & 1560 \cr
 13.  &\t40$^0$ 4139& &  B1.5 IV      &  --3.5:&  8.10 &  1.12 & 1250 \cr
 14.  &\t40$^0$ 4141& &  K5 III       &   +0.3 &  5.94 &  0.45 &  110 \cr
 15.  &\t40$^0$ 4144& &  K1.5 III     &   +0.6 &  7.38 &  0.27 &  200 \cr
 16.  &\t40$^0$ 4147& &  O6 III       &  --5.9:&  8.51 &  3.87 & 1280:\cr
 17.  &\t40$^0$ 4150& &  B2 Ia        &  --7.2:&  7.03 &  3.78 & 1230:\cr
 18.  &\t40$^0$ 4151& &  K0.5 III     &   +1.2 &  9.42 &  0.14 &  410 \cr
 19.  &\t40$^0$ 4152& &  A0 V         &   +0.8:&  9.60 &  0.22 &  520 \cr
 20.  &\t40$^0$ 4155& &  K2 III       &   +0.2 &  8.28 &  0.22 &  370 \cr
 21.  &\t40$^0$ 4157& &  A0.5 V       &   +1.0:&  9.30 &  0.18 &  420 \cr
 22.  &\t40$^0$ 4160& &  A7 V         &   +2.9 &  8.53 &  0.36 &  115 \cr
 23.  &\t40$^0$ 4163& &  B7.5 IV      &  --0.5 &  8.70 &  0.54 &  540 \cr
 24.  &\t40$^0$ 4164& &  B2 II        &  --4.8:&  7.69 &  1.58 & 1520 \cr
 25.  &\t40$^0$ 4165& &  B0.5 Ia      &  --7.2:&  7.49 &  3.78 & 1520 \cr
 26.  &\t40$^0$ 4171& &  G7 IV        &   +3.2 &  8.91 &  0.32 &  120 \cr
 27.  &\t40$^0$ 4176& &  A2 V         &   +1.3:&  9.13 &  0.18 &  340 \cr
 28.  &\t40$^0$ 4177& &  G7 V         &   +5.3 &  8.95 &  0.00 &   54 \cr
 29.  &\t40$^0$ 4178& &  A2 V         &   +1.8 &  8.73 &  0.40 &  200 \cr
 30.  &\t40$^0$ 4181& &  A3 V         &   +1.5:&  9.10 &  0.09 &  320 \cr
 31.  &\t40$^0$ 4183& &  B9.5 III     &  --0.2 &  7.97 &  0.18 &  400 \cr
 32.  &\t40$^0$ 4186& &  A1 V         &   +1.7:&  9.01 &  0.22 &  260 \cr
 33.  &\t40$^0$ 4187& &  O7           &  --5.2:&  8.76 &  3.78 & 1090:\cr
 34.  &\t40$^0$ 4188& &  A1.5 V       &   +1.3 &  7.92 &  0.14 &  200 \cr
 35.  &\t40$^0$ 4194& &  A0 V         &   +1.3 &  8.84 &  0.18 &  300 \cr
 36.  &\t40$^0$ 4195& &  G1 V         &   +4.5:& 10.02 &  0.09 &  120 \cr
 37.  &\t40$^0$ 4197&A&  A7 V         &   +3.0 &  9.17 &  0.32 &  150 \cr
 38.  &\t40$^0$ 4197&B&  G9 III-IV    &   +2.0 &  9.96 &  0.32:&  340 \cr
 39.  &\t40$^0$ 4199& &  A2 V         &   +1.3:&  9.41 &  0.18 &  380 \cr
 40.  &\t40$^0$ 4200& &  A7 V         &   +2.3:&  9.45 &  0.32 &  230 \cr
 41.  &\t40$^0$ 4201& &  A4 V         &   +2.1:&  9.63 &  0.00 &  320 \cr
 43.  &\t40$^0$ 4205& &  B7.5 V       &   +0.4 &  7.97 &  0.18 &  300 \cr
 44.  &\t40$^0$ 4209& &  B8.5 V       &   +1.0 &  8.76 &  0.18 &  330 \cr
 45.  &\t40$^0$ 4211& &  G9 III       &   +1.0 &  7.44 &  0.18 &  180 \cr
 46.  &\t40$^0$ 4213& &  F5 V         &  +3.6:&  9.11 &  0.00 &  125 \cr
 47.  &\t40$^0$ 4214& &  F4 V         &  +3.2 &  8.56 &  0.18 &  110 \cr
 48.  &\t40$^0$ 4218& &  B8 V         &  +0.7 &  9.64 &  0.36 &  520 \cr
 50.  &\t40$^0$ 4225& &  F8 V         &  +4.1:&  7.24 &  0.00 &   42 \cr
 51.  &\t40$^0$ 4226& &  B9 V         &  +0.7 &  8.22 &  0.14 &  300 \cr
 53.  &\t40$^0$ 4228& &  K0 III       &  +1.3 &  9.24 &  0.14 &  360 \cr}}
$$\hrule
\vfill\eject
\continued{6}
\input ant3
 54.  &\t40$^0$ 4229& &  F2 V         &  +3.2 &  9.44 &  0.28 &  155 \cr
 55.  &\t40$^0$ 4230& &  K0 IV        &  +3.1 &  8.63 &  0.09 &  120 \cr
 56.  &\t40$^0$ 4231& &  G8 III-IV    &  +1.9 &  9.51 &  0.32 &  290 \cr
 57.  &\t40$^0$ 4236& &  B8 V         &  +0.8 &  8.71 &  0.09 &  370 \cr
 58.  &\t40$^0$ 4239& &  A1 V         &  +1.7:&  8.94 &  0.22 &  250 \cr
 59.  &\t40$^0$ 4240& &  K4 III       &  +0.5 &  6.66 &  0.22 &  155 \cr
 60.  &\t40$^0$ 4246& &  A4 V         &  +1.8:&  7.87 &  0.09 &  155 \cr
 61.  &\t40$^0$ 4247& &  K0.5 III     &  +0.6 &  9.77 &  0.14 &  640 \cr
 62.  &\t40$^0$ 4248& &  K0 III       &  +0.6 &  9.30 &  0.14 &  520 \cr
 63.  &\t40$^0$ 4250& &  A1 V         &  +1.7:&  9.28 &  0.00 &  330 \cr
 64.  &\t40$^0$ 4251& &  F6 V         &  +3.9:&  7.79 &  0.00 &   60 \cr
 65.  &\t40$^0$ 4255& &  A5 V         &  +2.4 &  9.13 &  0.14 &  210 \cr
 66.  &\t40$^0$ 4257& &  G7 IV        &  +2.7 &  8.98 &  0.32 &  155 \cr
 67.  &\t40$^0$ 4260& &  F9 V         &  +4.3:&  9.70 &  0.22 &  110 \cr
 68.  &\t40$^0$ 4261& &  F5 V         &  +3.6:&  9.38 &  0.00 &  145 \cr
 70.  &\t40$^0$ 4267& &  B9.5 V       &  +1.3 &  8.74 &  0.09 &  300 \cr
 71.  &\t40$^0$ 4274& &  A5 V         &  +2.7 &  9.74 &  0.32 &  220 \cr
 72.  &\t40$^0$ 4275& &  G9 IV        &  +2.5 &  9.63 &  0.40 &  220 \cr
 73.  &\t40$^0$ 4276& &  B9 V         &  +0.6 &  6.98 &  0.09 &  145 \cr
 74.  &\t40$^0$ 4277& &  A4 V         &  +2.1 &  9.83 &  0.09 &  340 \cr
 75.  &\t40$^0$ 4279& &  A0 V         &  +1.0 &  9.24 &  0.32 &  380 \cr
 76.  &\t40$^0$ 4282& &  A7 V         &  +2.4 &  9.58 &  0.45 &  220 \cr
 77.  &\t40$^0$ 4283& &  A0 IV        &  +0.2 &  9.28 &  0.18 &  600 \cr
 78.  &\t40$^0$ 4286& &  G7 III       &  +0.3 &  9.10 &  0.54 &  450 \cr
 79.  &\t40$^0$ 4289& &  A9 III       &  +1.6 &  8.12 &  0.09 &  195 \cr
 80.  &\t40$^0$ 4290& &  B9 V         &  +0.8 &  8.52 &  0.12 &  330 \cr
 82.  &\t40$^0$ 4297& &  F8 IV-V      &  +3.6:&  9.93 &  0.00 &  185 \cr
 83.  &\t40$^0$ 4300& &  A4 V         &  +2.3 &  9.97 &  0.08 &  330 \cr
 84.  &\t40$^0$ 4301& &  A0.5 V       &  +0.7 &  9.40 &  0.16 &  510 \cr
 85.  &\t40$^0$ 4305& &  A7 V         &  +3.0 &  9.61 &  0.54 &  165 \cr
 86.  &\t40$^0$ 4310&A&  K2 III       &  +0.7 &  9.59 &  0.50 &  480 \cr
 87.  &\t40$^0$ 4310&B&  G3 V         &  +5.0 & 11.80 &  0.04 &  225 \cr
 88.  &\t40$^0$ 4313& &  K1 III       &  +1.0 &  9.76 &  0.27 &  500 \cr
 89.  &\t40$^0$ 4322& &  B8 V         &   0.0 &  9.77 &  0.54 &  700 \cr
 90.  &\t40$^0$ 4324& &  K1 III       &  +1.2 &  8.94 &  0.00 &  350 \cr
 91.  &\t40$^0$ 4325& &  A5 V         &  +2.3 & 10.38 &  0.09 &  400 \cr
 92.  &\t40$^0$ 4328& &  F8 IV        &  +3.0 &  7.72 &  0.18 &   81 \cr
 93.  &\t40$^0$ 4329& &  F5 V         &  +3.6:&  8.41 &  0.00 &   92 \cr
 94.  &\t40$^0$ 4331& &  A4 III-IV    &  +1.1 &  8.90 &  0.24 &  325 \cr
 95.  &\t40$^0$ 4333& &  A8 V         &  +3.0 &  9.42 &  0.40 &  160 \cr
 96.  &\t40$^0$ 4335& &  G8 V         &  +5.5 &  9.96 &  0.14 &   73 \cr
 97.  &\t40$^0$ 4336& &  K0 III       &  +0.8 &  8.89 &  0.18 &  380 \cr
 99.  &\t40$^0$ 4343& &  A1.5 V       &  +1.7:&  9.38 &  0.27 &  300 \cr
100.  &\t40$^0$ 4345& &  A1 V         &  +1.7:& 10.00 &  0.50 &  360 \cr
101.  &\t40$^0$ 4346& &  B5.5 V       &   0.0 &  7.56 &  0.18 &  300 \cr
102.  &\t40$^0$ 4347& &  A3 V         &  +2.2 &  9.59 &  0.13 &  280 \cr}}
$$\hrule
\vfill\eject
\continued{6}
\input ant3
103.  &\t40$^0$ 4349& &  K0 III       &  +1.1 &  8.61 &  0.18 &  290 \cr
104.  &\t40$^0$ 4348& &  A7 IV        &  +1.5 &  8.75 &  0.31 &  245 \cr
105.  &\t40$^0$ 4350& &  A2 V         &  +1.8:&  8.38 &  0.40 &  170 \cr
106.  &\t40$^0$ 4352& &  K1.5 III     &  +1.3 &  9.44 &  0.09 &  410 \cr
108.  &\t40$^0$ 4354& &  B7 III       &  -1.5 &  6.66 &  0.18 &  400 \cr
109.  &\t40$^0$ 4356& &  A1.5 V       &  +1.7:&  8.86 &  0.32 &  230 \cr
110.  &\t40$^0$ 4357& &  F5 V         &  +3.6:&  9.25:&  0.00 &  135 \cr
111.  &\t40$^0$ 4358& &  F5 III       &  +2.1 &  9.77 &  0.45 &  280 \cr
112.  &\t40$^0$ 4362& &  A0.5 V       &  +2.0 &  8.96 &  0.05 &  240 \cr
113.  &\t40$^0$ 4363& &  A6 IV        &  +1.7 &  8.63 &  0.36 &  210 \cr
114.  &\t40$^0$ 4369& &  A3 V         &  +1.5:&  8.48 &  0.14 &  230 \cr
116.  &\t40$^0$ 4373& &  K5:III:      &  +0.1 &  7.11 &  0.37 &  210 \cr
117.  &\t40$^0$ 4374& &  F2 V         &  +3.1 &  7.97 &  0.00 &   95 \cr
118.  &\t40$^0$ 4378& &  K0 III       &  +0.3 &  6.99 &  0.18 &  200 \cr
119.  &\t40$^0$ 4380& &  G0 V         &  +4.4:&  8.90 &  0.00 &   79 \cr
121.  &\t40$^0$ 4382& &  A3 V         &  +2.0 &  8.70 &  0.04 &  215 \cr
122.  &\t40$^0$ 4385& &  G8 III       &  +1.0 &  9.03 &  0.28 &  355 \cr
123.  &\t40$^0$ 4389& &  F6 V         &  +3.8:&  7.15 &  0.00 &   47 \cr
124.  &\t40$^0$ 4391& &  G9 III       &  +1.4 &  9.14 &  0.14 &  330 \cr
125.  &\t40$^0$ 4393& &  B8 V         &  +0.1:&  8.55 &  0.32 &  420 \cr
126.  &\t40$^0$ 4397& &  G8 III       &  --0.4 &  9.31 &  0.27 &  770 \cr
128.  &\t40$^0$ 4401& &  A0 III       &  --0.1 &  8.24 &  0.40 &  390 \cr
129.  &\t40$^0$ 4402& &  K3 III       &  +1.0 &  8.89 &  0.40 &  315 \cr
130.  &\t40$^0$ 4403& & \llap{:}F8 V  &  +4.1: & 10.78 &  0.06 &  210 \cr
131.  &\t40$^0$ 4404& &  A6 V         &  +1.8 &  9.80 &  0.49 &  320 \cr
132.  &\t40$^0$ 4405& &  K0 III       &  +1.1 & 10.28 &  0.26 &  610 \cr
133.  &\t40$^0$ 4406& &  A8 V         &  +3.0 & 10.08 &  0.18 &  240 \cr
134.  &\t40$^0$ 4407& &  A1 V         &  +1.1:&  8.89 &  0.22 &  330 \cr
135.  &\t41$^0$ 3687& &  K2 IV        &  +2.9 &  7.93 &  0.28 &   89 \cr
137.  &\t41$^0$ 3691& &  K0 III       &   0.0 &  9.52 & 0.25 &  710 \cr
138.  &\t41$^0$ 3693& &  B9 IV        &   0.0 &  9.06 &  0.31 &  560 \cr
139.  &\t41$^0$ 3700& &  A1.5 V       &  +1.2:&  9.83 &  0.40 &  440 \cr
140.  &\t41$^0$ 3703& &  B7.5 III     &  --1.4 &  8.09 &  0.45 &  640 \cr
141.  &\t41$^0$ 3705& &  G9 V         &  +5.3 &  9.91 &  0.00 &   84 \cr
142.  &\t41$^0$ 3707& &  G8.5 III     &  +1.8 &  9.24 &  0.22 &  280 \cr
143.  &\t41$^0$ 3709& &  A7 V         &  +2.8 &  9.73 &  0.40 &  200 \cr
144.  &\t41$^0$ 3711& &  A0 V         &  +1.6:&  9.72 &  0.27 &  370 \cr
145.  &\t41$^0$ 3712& &  B9 V         &  +1.4 &  8.28 &  0.27 &  210 \cr
146.  &\t41$^0$ 3715& &  A7 V         &  +3.0 &  9.15 &  0.54 &  130 \cr
147.  &\t41$^0$ 3716& &  B5 V         &  --0.7 &  9.21 &  1.35 &  515 \cr
148.  &\t41$^0$ 3718& &  K2 III       &   0.0 &  9.40 &  0.50 &  600 \cr
149.  &\t41$^0$ 3720& &  A1 V         &  +1.7 &  9.35 &  0.22 &  310 \cr
150.  &\t41$^0$ 3721& &  A2.5 V       &  +1.8:&  8.49 &  0.18 &  200 \cr
151.  &\t41$^0$ 3725& &  B8.5 V       &  +0.6 &  9.19 &  0.36 &  440 \cr
153.  &\t41$^0$ 3729& &  K0 IV        &  +2.7 &  9.32 &  0.09 &  200 \cr
154.  &\t41$^0$ 3731& &  B3 V         &  --1.0:&  9.84 &  0.94 &  950:\cr}}
$$\hrule
\vfill\eject
\continued{6}
\input ant3
155.  &\t41$^0$ 3732& &  B9 V         &  +1.2 &  9.35 &  0.27 &  380 \cr
156.  &\t41$^0$ 3734& &  K3 III       &  +1.5 &  8.96 &  0.58 &  240 \cr
158.  &\t41$^0$ 3737& &  B3 V         &  --1.0:&  9.22 &  1.08 &  670 \cr
159.  &\t41$^0$ 3739& &  A9 V         &  +2.8 &  7.81 &  0.40 &   84 \cr
160.  &\t41$^0$ 3742& &  A6 V         &  +2.3 &  7.09 &  0.27 &   80 \cr
161.  &\t41$^0$ 3748&b&  F7 V         &  +4.0:& 10.73 &  0.00 &  220 \cr
162.  &\t41$^0$ 3748&a&  B8 V         &  +0.7 & 10.56 &  0.72 &  670 \cr
163.  &\t41$^0$ 3749& &  A2 V         &  +1.8:&  9.61 &  0.18 &  335 \cr
164.  &\t41$^0$ 3751& &  F5 V         &  +3.6:&  9.22 &  0.00 &  135 \cr
166.  &\t41$^0$ 3754& &  B6 IV-V      &  --0.7 &  8.67 &  0.86 &  500 \cr
167.  &\t41$^0$ 3756& &  B9 IV        &  +0.2 &  9.32 &  0.36 &  560 \cr
168.  &\t41$^0$ 3757& &  A4 V         &  +1.7:&  9.04 &  0.00 &  290 \cr
169.  &\t41$^0$ 3758& &  B2 IV        &  --2.1 &  7.30 &  0.76 &  530 \cr
170.  &\t41$^0$ 3761& &  B7 V         &  +0.3 &  9.19 &  0.32 &  520 \cr
171.  &\t41$^0$ 3764& &  G5 V         &  +4.9 &  8.56 &  0.18 &   50 \cr
172.  &\t41$^0$ 3765& &  B0.5 III     &  --4.7 &  7.64 &  1.58 & 1420 \cr
173.  &\t41$^0$ 3769& &  B9.5 V       &  +1.3 &  8.81 &  0.14 &  300 \cr
174.  &\t41$^0$ 3770& &  G3 IV        &  +3.2:&  8.00 &  0.00 &   91 \cr
175.  &\t41$^0$ 3773& &  F5 V         &  +3.6 &  9.00 &  0.00 &  120 \cr
176.  &\t41$^0$ 3775& &  K0 III       &  +0.7 &  8.24 &  0.00 &  320 \cr
177.  &\t41$^0$ 3776& &  F5:V         &  +3.7:&  9.73 &  0.00 &  160 \cr
178.  &\t41$^0$ 3782& &  K5 III       &  +0.4 &  9.29 &  0.90 &  400 \cr
179.  &\t41$^0$ 3783& &  G5 IV-V      &  +4.5 &  9.64 &  0.00 &  105 \cr
180.  &\t41$^0$ 3789& &  B9 V         &  +1.3 &  8.54 &  0.18 &  260 \cr
181.  &\t41$^0$ 3790& &  B6.5 V       &  --0.4:&  9.81 &  1.26 &  620 \cr
182.  &\t41$^0$ 3791& &  B8 V         &  +0.9 &  8.89 &  0.27 &  350 \cr
183.  &\t41$^0$ 3792& &  B8.5 III     &  --1.9 &  8.67 &  0.81 &  890 \cr
186.  &\t41$^0$ 3800& &  A0.5 V       &  +0.9:&  9.46 &  0.27 &  455 \cr
187.  &\t41$^0$ 3805& &  K0 III-IV    &  +1.7 &  6.51 &  0.18 &   84 \cr
188.  &\t41$^0$ 3809& &  A9 V         &  +3.0 &  9.32 &  0.36 &  155 \cr
189.  &\t41$^0$ 3810& &  A1 III       &  --1.2:& 10.14 &  1.26 & 1040 \cr
190.  &\t41$^0$ 3811& &  A4 III-IV    &  +1.0 &  7.96 &  0.32 &  210 \cr
191.  &\t41$^0$ 3813& &  A3 V         &  +1.9:& 10.21 &  0.50 &  360 \cr
192.  &\t41$^0$ 3814& &  B6 V         &   0.0 &  7.57 &  0.27 &  290 \cr
193.  &\t41$^0$ 3815& &  G8 III       &  -0.7:&  9.58 &  2.18 &  420 \cr
194.  &\t41$^0$ 3818& &  G8 III       &  +1.6 &  6.64 &  0.09 &   98 \cr
195.  &\t41$^0$ 3820& &  B7 V         &   0.0 &  9.27 &  0.54 &  560 \cr
196.  &\t41$^0$ 3823& &  K2 III       &  +1.5 &  9.45 &  0.14 &  360 \cr
197.  &\t41$^0$ 3824& &  A1 V         &  +1.5 & 10.10 &  0.50 &  420 \cr
199.  &\t41$^0$ 3836& &  K4 II-III    &  --2.0 &  7.58 &  1.55 &  580 \cr
200.  &\t41$^0$ 3841& &  B9.5 V       &  +1.2 &  9.09 &  0.22 &  340 \cr
202.  &\t41$^0$ 3845& &  F7:V         &  +4.1 &  6.82 &  0.00 &   35 \cr
203.  &\t41$^0$ 3846& &  G9 III       &  +1.9 &  9.36 &  0.00 &  310 \cr
204.  &\t41$^0$ 3853& &  F9 IV-V      &  +3.5 &  9.07 &  0.18 &  120 \cr
205.  &\t41$^0$ 3855& &  F8 III       &  +2.0 &  7.94 &  0.22 &  140 \cr
206.  &\t41$^0$ 3856& &  B6 IV        &  --0.9 &  5.63 &  0.22 &  185 \cr}}
$$\hrule
\vfill\eject
\continued{6}
\input ant3
207.  &\t41$^0$ 3858& &  K1 III       &  +1.2 &  8.72 &  0.14 &  300 \cr
208.  &\t41$^0$ 3859& &  G0.5 V       &  +4.5:&  9.66 &  0.00 &  110 \cr
209.  &\t41$^0$ 3865& &  K3 III       &  +1.2 &  9.43 &  0.09 &  425 \cr
210.  &\t41$^0$ 3868& &  B7 IV-V      &  --0.4 &  8.44 &  0.32 &  510 \cr
211.  &\t41$^0$ 3872& &  K0.5 IV      &  +3.0 &  8.46 &  0.09 &  120 \cr
212.  &\t41$^0$ 3878& &  A2 V         &  +1.8:&  9.59 &  0.45 &  290 \cr
213.  &\t41$^0$ 3879& &  A5 IV        &  +1.5 &  9.91 &  0.27 &  420 \cr
214.  &\t41$^0$ 3881& &  K5 III       &  +0.1 &  8.60 &  0.02 &  490 \cr
215.  &\t41$^0$ 3884&A&  B6 V         &  --0.5 &  7.44 &  0.32 &  335 \cr
216.  &\t41$^0$ 3884&B&  A1 V         &  +1.8 &  8.97 &  0.08 &  245 \cr
217.  &\t41$^0$ 3889& &  A0 IV-V      &  +0.2 &  7.52 &  0.12 &  275 \cr
218.  &\t41$^0$ 3890& &  F5 V:        &  +3.6:&  9.44 &  0.00 &  145 \cr
219.  &\t41$^0$ 3893& &  G8.5 III     &  +1.6 &  8.07 &  0.14 &  185 \cr
220.  &\t41$^0$ 3894& &  F4 V         &  +3.5:&  9.18 &  0.18 &  125 \cr
221.  &\t41$^0$ 3895& &  G0 V         &  +4.5:&  8.15 &  0.18 &   49 \cr
222.  &\t41$^0$ 3896& &  B5 III       &  --2.0 &  9.47 &  2.55 &  610 \cr
223.  &\t41$^0$ 3897& &  G6 III       &  +0.5 &  7.40 &  0.14 &  225 \cr
224.  &\t41$^0$ 3901& &  B8 V         &  +0.4 &  8.83 &  0.14 &  450 \cr
225.  &\t41$^0$ 3904& &  A6 V         &  +2.5 &  9.12 &  0.28 &  185 \cr
226.  &\t41$^0$ 3906& &  A0 V         &  +1.6:&  9.54 &  0.28 &  340 \cr
227.  &\t41$^0$ 3913& &  A0 V         &  +1.6:&  9.85 &  0.09 &  430 \cr
228.  &\t41$^0$ 3916& &  A1 V         &  +1.1:&  7.84 &  0.09 &  210 \cr
229.  &\t41$^0$ 3918& &  A2 V         &  +1.7 &  9.86 &  0.68 &  310 \cr
230.  &\t41$^0$ 3928& &  B8 V         &  +0.6 &  9.00 &  0.58 &  370 \cr
231.  &\t41$^0$ 3929& &  K1.5 III     &  +0.5 &  7.48 &  0.09 &  240 \cr
233.  &\t41$^0$ 3933& &  A6 V         &  +3.0 &  9.45 &  0.32 &  170 \cr
234.  &\t41$^0$ 3935& &  A1 V         &  +1.1:&  9.73 &  0.18 &  490 \cr
235.  &\t41$^0$ 3937& &  K1 III       &  --0.5:&  8.96 &  0.90 &  520 \cr
236.  &\t41$^0$ 3940& &  G0 V         &  +4.4:&  9.81 &  0.00 &  120 \cr
237.  &\t41$^0$ 3941& &  G0 V         &  +4.4:&  9.20 &  0.00 &   91 \cr
238.  &\t41$^0$ 3943& &  A3 V         &  +1.7 &  7.32 &  0.14 &  125 \cr
239.  &\t41$^0$ 3946& &  A6 V         &  +2.7 &  9.09 &  0.09 &  180 \cr
240.  &\t41$^0$ 3949& &  B6 V         &  +0.4:&  6.12 &  0.22 &  125 \cr
241.  &\t41$^0$ 3951& &  F5 Ia        &  --5.0 &  8.40 &  3.20 & 1100 \cr
242.  &\t41$^0$ 3955& &  A2.5 V       &  +1.4:&  9.93 &  0.40 &  420 \cr
243.  &\t41$^0$ 3961& &  A3 V         &  +1.9 & 10.03 &  0.45 &  340 \cr
246.  &\t41$^0$ 3963& &  A2 V         &  +1.8:&  9.15 &  0.18 &  270 \cr
247.  &\t41$^0$ 3972& &  A6 V         &  +2.6 &  9.02 &  0.50 &  155 \cr
248.  &\t41$^0$ 3973& &  F5 V         &  +3.6:&  9.46 &  0.09 &  140 \cr
249.  &\t41$^0$ 3976& &  F6 V         &  +3.8:&  8.75 &  0.00 &   98 \cr
250.  &\t41$^0$ 3985& &  B2 V         &  --1.6:&  9.07 &  1.98 &  550 \cr
251.  &\t41$^0$ 3986& &  F6 V         &  +3.7:&  8.79 &  0.00 &  105 \cr
252.  &\t41$^0$ 3987& &  F0 IV        &  +2.5 &  6.32 &  0.22 &   52 \cr
253.  &\t41$^0$ 3991& &  M3 III       &  +0.5 &  7.71 &  0.58:&  210:\cr
254.  &\t41$^0$ 3993& &  K1.5 III     &  +0.8 &  8.35 &  0.22 &  290 \cr
255.  &\t41$^0$ 3995& &  K3.5 III     &  +0.6 &  9.23 &  0.40 &  440 \cr}}
$$\hrule
\vfill\eject
\bye%
