% file tab5.tex
\input bal
% V. Strai\v zys, A. Kazlauskas, K. \v Cernis and V. Vansevi\v cius
% The Vicinity of the North America and Pelican Nebulae
% Baltic Astronomy, 1993, vol.2, 171-213.
\font\main =cmr10
\font\ks =cmti10
\def\t{\hbox{$\scriptstyle +$}}
\Table {5} { Results of quantification, extinction and distance determination
 in the  dark cloud area.}
\hrule
$$\vbox{\tabskip=33pt minus 33pt \baselineskip=10pt
% \halign to \hsize {\tabskip=1em plus1em minus 1em&
% \hfil#\tabskip 10pt plus 10pt minus 5pt&  #\hfil &#\hfil 
%& \hfil#& \hfil#  &\hfil#&\hfil#\cr  
%\hfil{ No.}\hfil &\hfil{Metik} \hfil&\hfil{Sp.}\hfil&\hfil{M$_V$}\hfil&\hfil{$V$}\hfil 
%&\hfil{A$_V$}\hfil & \hfil{$r$}\hfil\cr 
\halign to\hsize{\hfil # & # \hfil & \hfil #& \hfil # & \hfil # & \hfil # \cr
\hfil{ No.}\hfil &\hfil{Sp.}\hfil&\hfil{$M_V$}\hfil&\hfil{$V$}\hfil 
&\hfil{$A_V$}\hfil & \hfil{$r$}\hfil\cr 
\noalign{\vskip 0.2cm\hrule\vskip 0.2cm}
  1. & F5 V       &  +3.6\rlap{:} & 11.24 & 0.23 &   300 \cr
  3. & F6 V       &  +3.7\rlap{:} & 10.36 & 0.15 &   200 \cr
  4. & F5 V       &  +3.6\rlap{:} & 11.12 & 0.18 &   290 \cr
  5. & G0 IV      &  +3.0 & 11.28 & 0.50 &   360 \cr
  6. & K0 III     &  +1.2 & 10.93 & 0.14 &   830 \cr
  7. & A6 V       &  +2.2 &  9.79 & 0.74 &   230 \cr
  8. & F9 V       &  +4.3\rlap{:} & 11.04 & 0.00 &   220 \cr
  9. & A7 V       &  +3.0 & 10.91 & 0.72 &   270 \cr
 10. & F0 V       &  +2.8\rlap{:} & 11.66 & 0.36 &   500 \cr
 11. & K1 III     & --0.6 & 10.11 & 0.00 &  1390 \cr
 13. & F5 V       &  +3.6\rlap{:} & 11.45 & 0.05 &   360 \cr
 15. & K0 IV      &  +2.8 & 10.82 & 0.04 &   390 \cr
 16. & F9 V       &  +4.3\rlap{:} & 11.80 & 0.09 &   300 \cr
 17. & A7 V       &  +2.8 & 11.59 & 0.81 &   390 \cr
 18. & K1 III     &  +0.7 &  9.53 & 0.23 &   530 \cr
 19. & G0 IV-V    &  +3.7 & 10.89 & 0.09 &   260 \cr
 20. & A9 V       &  +3.0 & 10.29 & 0.20 &   260 \cr
 21. & A5 V       &  +2.1 & 10.41 & 0.63 &   340 \cr
 22. & K0.5 III   &  +1.4 & 10.00 & 0.18 &   480 \cr
 23. & F6 V       &  +3.7\rlap{:} & 11.01 & 0.29 &   250 \cr
 24. & F5 V       &  +3.6\rlap{:} & 11.81 & 0.36 &   370 \cr
 25. & A6 V       &  +2.3 & 10.83 & 0.52 &   400 \cr
 26. & F8 IV-V    &  +3.5\rlap{:} & 11.33 & 0.34 &   320 \cr
 27. & G0 V       &  +4.4\rlap{:} & 11.18 & 0.04 &   220 \cr
 28. & K1.5 III   &  +1.7 & 10.45 & 0.63 &   420 \cr
 29. & G9 V       &  +5.8 & 11.94\rlap{:} & 0.25 &   151 \cr
 30. & K0 III-IV  &  +1.5 & 10.55 & 0.65 &   480 \cr
 31. & F5 V       &  +3.6\rlap{:} & 10.74 & 0.09 &   260 \cr
 32. & F7 V       &  +4.0 & 12.40 & 0.39 &   400 \cr
 33. & G0 IV-V    &  +3.5 & 12.66 & 0.27 &   600 \cr
 34. & F0 V       &  +3.0 & 10.85 & 0.63 &   280 \cr
 36. & G0 V       &  +4.4 & 12.66 & 0.22 &   400 \cr
 38. & A7 V       &  +3.0 & 11.76 & 0.45 &   460 \cr
 39. & K0 III     &  +0.9 &  9.42 & 0.13 &   480 \cr
 40. & F5 V       &  +3.6 & 11.42 & 0.23 &   330 \cr
 41. & F7 V       &  +4.0 & 12.43 & 0.12 &   460 \cr
 42. & K2.5 V     &  +6.5 & 12.58 & 0.14 &   154 \cr
 43. & F4 V       &  +3.5\rlap{:} & 11.45 & 0.31 &   340 \cr
 44. & B6:V       &  +0.3\rlap{:} & 11.02 & 2.47 &   450 \cr
 45. & F0 V       &  +2.8 & 11.78 & 0.54 &   490 \cr
 46. & A1 V       &  +1.1\rlap{:} & 10.81 & 0.63 &   650 \cr
 47. & F8 V       &  +4.1 & 12.05 & 0.18 &   360 \cr
 48. & F8 V       &  +3.8 & 11.21 & 0.18 &   280 \cr
 49. & F2 V       &  +3.1 & 11.05 & 0.45 &   320 \cr
 50. & G5 V       &  +5.1\rlap{:} & 10.42 & 0.45 &    94 \cr}}
 $$\hrule
 \vfill\eject
 \continued{5}
 \input ant4
 51. & G2 IV      &  +3.5\rlap{:} & 10.80 & 0.04 &   280 \cr
 52. & B2 V       & --1.6\rlap{:} & 11.18 & 3.82 &   620 \cr
 54. & F5 V       &  +3.6\rlap{:} & 11.68 & 0.50 &   330 \cr
 55. & K2 IV      &  +3.6 & 12.25 & 0.72 &   390 \cr
 57. &:B2 V       & --2.0\rlap{:} & 12.49 & 4.95 &   810\rlap{:} \cr
 58. & F8 V       &  +3.8 & 11.29 & 0.31 &   270 \cr
 59. & F8 V       &  +3.8 & 12.62 & 0.32 &   500 \cr
 60. & G5 V       &  +5.1\rlap{:} & 12.66 & 0.23 &   290 \cr
 61. & A6 V       &  +2.1 & 10.13 & 0.29 &   350 \cr
 62. & F6 V       &  +3.7\rlap{:} & 11.56 & 0.38 &   310 \cr
 63. & F8 V       &  +4.1 & 11.68 & 0.23 &   300 \cr
 64. & F7 V       &  +4.0 & 11.32 & 0.00 &   290 \cr
 65. & F2 V       &  +3.1 & 10.51 & 0.18 &   280 \cr
 66. & G1 III-IV  &  +2.0 & 11.91 & 0.00 &   960 \cr
 67. & K0 III     &  +0.9 &  9.49 & 0.18 &   480 \cr
 68. & F7 V       &  +4.0 & 10.94 & 0.03 &   240 \cr
 69. & K1 III     & --0.3 &  9.58 & 0.99 &   600 \cr
 70. & K0 III     &  +0.7 & 10.34 & 0.27 &   750 \cr
 71. & F5 V       &  +3.6\rlap{:} & 12.48 & 0.45 &   490 \cr
 72. & F5 V       &  +3.6\rlap{:} & 12.04 & 0.18 &   450 \cr
 73. & K0 III-IV  &  +2.0 & 12.21 & 1.19 &   640 \cr
 74. & F6 V:     &  +3.7\rlap{:} & 12.27 & 0.11 &   490 \cr
 75. & F5 IV      &  +2.5\rlap{:} & 11.46 & 0.36 &   520 \cr
 76. & F5 V       &  +3.6\rlap{:} & 11.96 & 0.27 &   410 \cr
 77. & F7 V       &  +4.0 & 12.09 & 0.08 &   400 \cr
 78. & F5 V       &  +3.6\rlap{:} & 11.07 & 0.14 &   290 \cr
 79. & G0 IV-V    &  +3.5 & 12.63 & 0.63 &   500 \cr
 80. & A7 V       &  +3.0 & 11.40 & 0.49 &   380 \cr
 81. & G8 IV-V    &  +4.0 & 10.61 & 0.36 &   178 \cr
 82. & F8 V       &  +4.1 & 11.86 & 0.09 &   340 \cr
 85. & F5:V      &  +3.5\rlap{:} & 10.66 & 0.00 &   270 \cr
 87. & F5 V       &  +3.6\rlap{:} & 11.67 & 0.27 &   360 \cr
 88. & G3 IV      &  +3.0 & 10.68 & 0.00 &   340 \cr
 90. & F5 V      &  +3.6\rlap{:} & 11.93 & 0.36 &   390 \cr
 92. & G0 V       &  +4.4 & 13.24 & 0.36 &   500 \cr
 93. & G0 IV-V    &  +3.3\rlap{:} & 12.11 & 0.31 &   500 \cr
 97. & F6:V       &  +3.7\rlap{:} & 12.87 & 0.38\rlap{:} & 570\rlap{:} \cr
 98. & G1 V       &  +4.6 & 11.08 & 0.16 &   184 \cr
 99. & A9 V       &  +3.0 & 11.02 & 0.33 &   350 \cr
100. & G9.5 III-IV  &  +2.0 & 11.21 & 0.00 &   700 \cr
101. & F5 V       &  +3.6\rlap{:} & 11.50 & 0.27 &   340 \cr
102. & G2 V       &  +4.7 & 11.64 & 0.00 &   240 \cr
104. & A9 V       &  +3.0 & 11.53 & 0.78 &   350 \cr
105. & F5 V       &  +3.6\rlap{:} & 13.09 & 0.72 &   570 \cr
106. & K0 IV-V    &  +4.1 &  9.92 & 0.18 &   134 \cr}}
 $$\hrule
 \vfill\eject
 \continued{5}
 \input ant4
107. & G0 V       &  +4.5\rlap{:} & 13.28 & 0.18 &   520 \cr
108. & F8 V       &  +4.1 & 10.60 & 0.00 &   200 \cr
109. & F2 V       &  +3.1 & 11.60 & 0.22 &   450 \cr
110. & A7 V       &  +3.0 & 11.36 & 0.54 &   370 \cr
111. & F5 IV-V    &  +3.1 & 11.46 & 0.09 &   450 \cr
112. & F5 V       &  +3.6\rlap{:} & 11.31 & 0.00 &   350 \cr
113. & G0 V       &  +4.4 & 12.26 & 0.36 &   320 \cr
114. & F5 V       &  +3.6\rlap{:} & 11.80 & 0.00 &   440 \cr
115. & F0 V       &  +2.8 & 10.88 & 0.32 &   360 \cr
116. & F2 V       &  +3.1 & 12.34 & 0.95 &   460 \cr
117. & A0 V       &  +0.8\rlap{:} &  9.76 & 0.36 &   520 \cr
118. & K0 III     &  +0.8 & 10.37 & 0.50 &   650 \cr
119. & G9 IV-V    &  +4.2 & 12.28 & 0.38 &   350 \cr
120. & K0 III-IV  &  +2.0 & 10.54 & 0.29 &   450 \cr
124. & F6 III     &  +0.8\rlap{:} & 12.56 & 0.57 &  1730 \cr
125. & A5 V       &  +2.2 & 11.69 & 0.58 &   600 \cr
127. & G0 V       &  +4.0 & 12.00 & 0.09 &   380 \cr
129. & G0 IV      &  +3.2 & 11.77 & 0.23 &   470 \cr
130. & F0 V       &  +2.9 & 11.61 & 1.04 &   340 \cr
131. & F8 V       &  +4.0 & 12.15 & 0.04 &   420 \cr
132. & F7 V       &  +3.8\rlap{:} & 10.79 & 0.00 &   250 \cr
133. & F2 V       &  +3.1\rlap{:} & 10.97 & 0.23 &   340 \cr
134. & G5 V       &  +5.1\rlap{:} & 11.66 & 0.36 &   174 \cr
135. & A6 V       &  +2.5 & 11.33 & 0.34 &   500 \cr
136. & F5 V       &  +3.6\rlap{:} & 10.60 & 0.09 &   240 \cr
138. & F5 V       &  +3.6\rlap{:} & 10.72 & 0.09 &   250 \cr
139. & F8 V       &  +4.1\rlap{:} & 11.39 & 0.00 &   290 \cr
140. & G7 V       &  +5.5\rlap{:} & 11.24 & 0.28 &   124 \cr
142. & F2 V       &  +3.1\rlap{:} & 11.93 & 0.54 &   450 \cr
143. & F8 IV      &  +3.3 & 11.23 & 0.18 &   350 \cr
145. & F9 V       &  +4.2\rlap{:} & 12.34 & 0.36 &   360 \cr
146. & A7 V       &  +2.9 &  9.87 & 0.58 &   190 \cr
147. & F8 V       &  +4.1\rlap{:} & 12.17 & 0.14 &   390 \cr
149. & A0 V       &  +1.5\rlap{:} & 10.87 & 0.67 &   550 \cr
151. & G5 V       &  +5.1\rlap{:} & 11.29 & 0.36 &   146 \cr
152. & G0 IV      &  +3.2 & 11.14 & 0.54 &   300 \cr
153. & F8 V       &  +4.1\rlap{:} & 11.63 & 0.00 &   320 \cr
154. & K0 III     &  +0.8 &  9.12 & 0.04 &   450 \cr
155. & F9 V       &  +4.3\rlap{:} & 10.71 & 0.00 &   191 \cr
156. & G1 IV-V    &  +3.5\rlap{:} & 12.69 & 0.20 &   630 \cr
157. & F0 V       &  +2.8\rlap{:} & 10.72 & 0.59 &   290 \cr
158. & F5 IV-V    &  +3.0\rlap{:} & 12.23 & 0.23 &   630 \cr
159. & A4 V       &  +1.7\rlap{:} & 10.76 & 0.72 &   470 \cr
160. & A9 V       &  +2.7\rlap{:} & 12.02 & 0.73 &   520 \cr
161. & G0 V       &  +4.4\rlap{:} & 12.64 & 0.36 &   380 \cr}}
 $$\hrule
 \vfill\eject
 \continued{5}
 \input ant4
162. & F6 V       &  +3.7\rlap{:} & 11.94 & 0.11 &   420 \cr
164. & A4 V       &  +1.7\rlap{:} & 11.08 & 0.54 &   590 \cr
166. & F2 III     &  +1.8 & 10.50 & 0.76 &   390 \cr
167. & F3 V       &  +3.2\rlap{:} & 11.86 & 0.27 &   480 \cr
168. & K0.5 IV    &  +2.7 & 10.39 & 0.00 &   350 \cr
169. & F3 V       &  +3.2\rlap{:} & 11.84 & 0.31 &   460 \cr
170. & A7 V       &  +2.9 & 11.63 & 0.54 &   430 \cr
171. & F8 IV     &  +3.0\rlap{:} & 11.77 & 0.72 &   410 \cr
172. & F5 V       &  +3.6\rlap{:} & 11.39 & 0.27 &   320 \cr
174. & A8 II      & --3.0 & 10.92 & 3.22 &  1380 \cr
175. & G5 V       &  +5.1\rlap{:} & 12.70 & 0.14 &   310 \cr
176. & G1 V       &  +4.5\rlap{:} & 13.17 & 0.02 &   540 \cr
177. & F5 V       &  +3.6\rlap{:} & 10.13 & 0.09 &   194 \cr
178. & A0 V       &  +1.6\rlap{:} & 12.28 & 2.29 &   480 \cr
179. & K4 III     &  +0.8 & 10.21 & 1.26 &   430 \cr
180. & K0.5 III   &  +0.8 & 11.23 & 0.23 &  1100 \cr
181. & G5 V       &  +5.1\rlap{:} & 13.18 & 0.36 &   350 \cr
182. & A5 V       &  +2.2 & 10.55 & 0.18 &   430 \cr
183. & G1 V       &  +4.5\rlap{:} & 12.16 & 0.11 &   320 \cr
185. & F5 V       &  +3.6\rlap{:} & 11.85 & 0.72 &   320 \cr
186. & A9 V       &  +2.7 & 10.47 & 0.78 &   250 \cr
187. & F5 V       &  +3.6\rlap{:} & 12.79 & 0.59 &   530 \cr
189. & F7 V       &  +3.9 & 10.58 & 0.44 &   177 \cr
190. & A6 V       &  +2.1\rlap{:} & 12.81 & 1.15 &   820 \cr
191. & B9 IV      &  +0.2 & 10.04 & 1.08 &   560 \cr
192. & F5 V       &  +3.6\rlap{:} & 11.65 & 0.50 &   320 \cr
193. & G3 IV      &  +3.6 & 11.98 & 0.39 &   400 \cr
194. & A3 V       &  +1.9 & 11.37 & 0.76 &   550 \cr
195. & G0 V       &  +4.4\rlap{:} &  9.87 & 0.23 &   112 \cr
196. & A2 V       &  +1.5 & 11.31 & 1.22 &   520 \cr
198. & B9 III     & --0.5 & 11.34 & 2.79 &   650 \cr
199. & A8 V       &  +2.5 & 11.52 & 0.61 &   480 \cr
200. & F0 V       &  +2.8\rlap{:} & 11.68 & 0.77 &   420 \cr
201. & F5 V       &  +3.6\rlap{:} & 11.39 & 0.45 &   290 \cr
202. & F8 V       &  +4.1\rlap{:} & 11.36 & 0.04 &   280 \cr
203. & A4 V       &  +1.7\rlap{:} & 10.58 & 0.86 &   400 \cr
204. & F8 V       &  +4.1\rlap{:} & 12.50 & 0.23 &   430 \cr
205. & A7 V       &  +2.5 & 11.90 & 1.08 &   460 \cr
207. & F5 III     &  +1.2\rlap{:} & 12.42 & 1.76 &   780 \cr
208. & G3 V       &  +4.8\rlap{:} & 11.96 & 0.30 &   240 \cr
209. & A5 V       &  +1.7 & 12.02 & 1.13 &   690 \cr
210. & G0 V       &  +4.4\rlap{:} & 10.82 & 0.04 &   189 \cr
211. & F7 V       &  +3.9\rlap{:} & 11.74 & 0.21 &   340 \cr
212. & F6 V       &  +3.7\rlap{:} & 10.29 & 0.15 &   194 \cr}}
 $$\hrule
\bye%
