Table 2: The catalogue.

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 113.83�3.63 23 39 39.0 57 43 57 23 42 03.8 58 00 36 0.24 0.14 113.92�2.93 23 38 52.9 58 26 03 23 41 17.1 58 42 41 0.15 0.13 114.47�4.51 23 45 51.3 57 02 37 23 48 19.2 57 19 18 0.22 0.19 114.56�3.94 23 45 31.4 57 36 50 23 47 59.0 57 53 31 0.11 0.10 114.56�4.46 23 46 26.9 57 06 42 23 48 55.0 57 23 23 0.21 0.08 114.64�4.20 23 46 31.6 57 23 08 23 48 59.7 57 39 49 0.46 0.43 114.67�4.59 23 47 24.3 57 00 49 23 49 52.9 57 17 30 0.63 0.15 114.83�2.61 23 45 00.2 58 58 19 23 47 27.2 59 14 59 0.10 0.08 114.89�4.63 23 49 04.6 57 01 20 23 51 34.0 57 18 01 0.11 0.10 114.90�4.63a 23 49 07.2 57 01 28 23 51 36.6 57 18 09 0.11 0.08 114.90�4.63b 23 49 08.3 57 01 28 23 51 37.7 57 18 09 0.10 0.08 115.02�3.95 23 48 51.1 57 43 18 23 51 20.2 57 59 59 0.10 0.08 115.23�4.39 23 51 07.9 57 20 12 23 53 38.1 57 36 54 0.11 0.10 115.28�4.00 23 50 51.7 57 43 26 23 53 21.8 58 00 08 0.10 0.10 115.32�3.97 23 51 04.8 57 46 06 23 53 35.0 58 02 48 0.07 0.07 115.43+5.10: 23 31 55.1 66 33 54 23 34 10.6 66 50 29 0.11 0.08 IRAS 23319+6633 115.56�4.53 23 53 44.4 57 16 18 23 56 15.8 57 33 00 0.11 0.10 115.75�4.03 23 54 20.8 57 47 46 23 56 52.5 58 04 28 0.10 0.08 115.82�3.70 23 54 16.1 58 08 27 23 56 47.7 58 25 09 0.15 0.11 115.84�2.10 23 51 47.5 59 42 29 23 54 17.7 59 59 11 0.11 0.11 115.93+0.14: 23 48 19.7 61 54 16 23 50 47.7 62 10 57 0.11 0.08 115.95�4.34 23 56 15.9 57 32 17 23 58 48.5 57 48 59 0.10 0.07 116.12�3.66 23 56 27.3 58 14 18 23 58 59.9 58 31 00 0.20 0.18 116.15�4.73 23 58 18.0 57 11 56 00 00 51.5 57 28 38 0.21 0.10 116.36�4.59 23 59 35.8 57 22 34 00 02 09.9 57 39 16 0.13 0.11 116.36�4.89 23 59 59.2 57 04 45 00 02 33.5 57 21 27 0.11 0.09 116.37+5.45 23 40 06.5 67 09 25 23 42 27.2 67 26 04 0.10 0.08 116.42�3.53 23 58 28.5 58 25 42 00 01 02.1 58 42 24 0.10 0.07 116.45�4.05 23 59 28.4 57 55 29 00 02 02.5 58 12 11 0.09 0.07 116.48�4.64 00 00 33.7 57 20 56 00 03 08.3 57 37 38 0.09 0.08 116.53�4.32 00 00 27.9 57 40 12 00 03 02.4 57 56 54 0.13 0.12 116.56�1.23 23 55 59.8 60 42 18 23 58 32.1 60 59 00 0.57 0.15 116.57�2.39 23 57 54.4 59 34 00 00 00 27.7 59 50 42 0.11 0.09 NVSS J000027+595048 116.58�4.89 00 01 36.9 57 07 14 00 04 11.9 57 23 56 0.20 0.08 116.59�5.14 00 02 01.8 56 52 40 00 04 37.0 57 09 22 0.14 0.11 116.62+0.35 23 53 44.2 62 15 54 23 56 15.1 62 32 36 0.24 0.07 116.64�3.54a 00 00 10.7 58 27 18 00 02 45.1 58 44 00 0.16 0.09 116.64�3.54b 00 00 10.9 58 27 32 00 02 45.3 58 44 14 0.11 0.08 116.71�3.35 00 00 26.5 58 39 23 00 03 01.1 58 56 05 0.15 0.12 116.76�4.05 00 01 45.6 57 58 49 00 04 20.8 58 15 31 0.09 0.09 116.82+5.48 23 44 25.1 67 18 28 23 46 48.7 67 35 08 0.09 0.08 116.84�4.06 00 02 23.9 57 58 48 00 04 59.4 58 15 30 0.10 0.08 116.86�2.04 23 59 40.0 59 58 10 00 02 14.2 60 14 52 0.19 0.15 116.91�4.12 00 02 56.6 57 56 18 00 05 32.3 58 13 00 0.10 0.09 116.99�3.32 00 02 29.4 58 44 04 00 05 05.0 59 00 46 0.11 0.10 116.99�4.59 00 04 11.4 57 29 12 00 06 47.7 57 45 54 0.11 0.08 117.08�5.19 00 05 33.5 56 54 45 00 08 10.3 57 11 27 0.18 0.12 117.12�5.08 00 05 44.4 57 01 36 00 08 21.3 57 18 18 0.15 0.07 117.17�4.51 00 05 23.5 57 36 01 00 08 00.3 57 52 43 0.36 0.07 117.18�4.50 00 05 28.2 57 36 41 00 08 05.1 57 53 23 0.14 0.11 117.26�1.39 00 01 47.7 60 40 46 00 04 23.0 60 57 28 0.11 0.10 117.26�5.08 00 06 44.5 57 02 54 00 09 21.9 57 19 36 0.07 0.07 117.33�4.54 00 06 37.6 57 35 54 00 09 15.0 57 52 36 0.13 0.10 117.39�5.24 00 07 53.2 56 54 41 00 10 31.1 57 11 22 0.18 0.11 117.41�4.91 00 07 40.2 57 14 23 00 10 18.0 57 31 04 0.09 0.08 117.42�4.85 00 07 38.8 57 17 50 00 10 16.6 57 34 31 0.08 0.07 117.43�5.21 00 08 06.5 56 57 06 00 10 44.5 57 13 47 0.10 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 117.49�4.38 00 07 34.2 57 46 39 00 10 12.1 58 03 21 0.08 0.08 117.55�4.82 00 08 33.7 57 20 54 00 11 11.9 57 37 35 0.11 0.08 117.62�3.88 00 07 58.7 58 17 41 00 10 36.8 58 34 22 0.13 0.10 117.76�5.34 00 10 38.2 56 52 11 00 13 17.3 57 08 52 0.11 0.09 117.82�4.95 00 10 38.2 57 16 03 00 13 17.4 57 32 44 0.11 0.07 117.86�5.01 00 10 59.8 57 12 27 00 13 39.1 57 29 08 0.20 0.07 117.91+0.31: 00 04 41.4 62 28 12 00 07 18.5 62 44 54 0.13 0.08 117.92�4.00b 00 10 21.4 58 13 20 00 13 00.7 58 30 01 0.12 0.11 NVSS J001302+583013 117.92�4.00a 00 10 19.8 58 13 08 00 12 59.0 58 29 49 0.15 0.08 117.93�5.08 00 11 36.5 57 08 56 00 14 16.1 57 25 37 0.10 0.07 118.12�4.03 00 11 53.5 58 13 09 00 14 33.5 58 29 50 0.18 0.13 118.13�4.76 00 12 45.2 57 29 36 00 15 25.4 57 46 16 0.20 0.09 118.32+5.61 23 59 24.7 67 45 36 00 01 58.9 68 02 18 0.10 0.09 NVSS J000202+680224 118.36�4.47 00 14 07.9 57 48 53 00 16 48.8 58 05 33 0.21 0.18 118.43�5.32 00 15 29.0 56 58 44 00 18 10.3 57 15 24 0.11 0.10 118.49�1.95 00 12 25.4 60 19 47 00 15 06.2 60 36 27 0.09 0.08 WEIN 010 118.50�5.32 00 16 00.2 56 59 16 00 18 41.7 57 15 55 0.08 0.07 118.53�2.97 00 13 52.2 59 19 35 00 16 33.4 59 36 15 0.11 0.08 118.61�4.74 00 16 16.3 57 34 42 00 18 58.1 57 51 21 0.13 0.12 118.63+5.82 00 02 12.3 68 01 13 00 04 48.6 68 17 55 0.11 0.09 118.63�0.40a: 00 11 44.8 61 52 57 00 14 25.7 62 09 38 0.15 0.12 IRAS 00117+6153? 118.63�0.40b: 00 11 46.0 61 53 02 00 14 26.9 62 09 43 0.13 0.13 IRAS 00117+6153? 118.64�4.61 00 16 21.1 57 42 57 00 19 03.0 57 59 36 0.09 0.08 118.72�4.77 00 17 03.7 57 33 54 00 19 45.9 57 50 33 0.17 0.11 118.78�5.27 00 17 58.5 57 04 46 00 20 41.0 57 21 25 0.10 0.07 118.85�5.45 00 18 38.4 56 54 29 00 21 21.1 57 11 07 0.11 0.11 118.86�5.43 00 18 42.3 56 55 52 00 21 25.0 57 12 30 0.12 0.09 118.89�4.49 00 18 04.2 57 52 03 00 20 47.0 58 08 42 0.20 0.14 NVSS J002105+580759 118.92�4.22 00 18 04.0 58 07 54 00 20 46.9 58 24 33 0.06 0.05 118.92�4.21 00 18 03.2 58 08 33 00 20 46.1 58 25 12 0.11 0.10 118.93�3.58 00 17 35.2 58 46 08 00 20 18.1 59 02 47 0.07 0.07 118.97+1.89 00 11 47.6 64 12 12 00 14 29.3 64 28 53 0.16 0.16 IRAS 00117+6412 118.97�4.08 00 18 19.9 58 16 51 00 21 03.0 58 33 30 0.11 0.07 119.00+5.73 00 06 16.3 67 59 53 00 08 55.5 68 16 35 0.09 0.08 119.01�4.39 00 18 54.7 57 58 54 00 21 37.9 58 15 32 0.19 0.07 119.12�5.50 00 20 37.7 56 53 11 00 23 21.3 57 09 49 0.20 0.13 119.13�4.55 00 19 53.8 57 49 50 00 22 37.4 58 06 28 0.15 0.13 119.16�4.56 00 20 07.8 57 49 15 00 22 51.5 58 05 53 0.19 0.18 119.17�3.19 00 19 02.0 59 11 08 00 21 45.7 59 27 46 0.08 0.07 119.17�5.16 00 20 42.6 57 13 38 00 23 26.4 57 30 16 0.22 0.15 119.17�5.58 00 21 02.5 56 48 43 00 23 46.2 57 05 20 0.22 0.10 119.18�5.03 00 20 41.8 57 21 25 00 23 25.6 57 38 03 0.10 0.09 NVSS J002326+573812 119.24�4.74 00 20 55.7 57 39 21 00 23 39.7 57 55 59 0.05 0.04 119.27�4.87 00 21 12.5 57 31 53 00 23 56.6 57 48 30 0.08 0.07 119.28�5.40 00 21 43.9 57 00 04 00 24 28.0 57 16 41 0.11 0.07 119.30�3.65 00 20 24.1 58 44 57 00 23 08.3 59 01 35 0.11 0.07 119.33�5.37 00 22 01.5 57 02 19 00 24 45.8 57 18 56 0.17 0.08 119.38�3.39 00 20 47.7 59 00 50 00 23 32.2 59 17 28 0.11 0.09 119.43�2.93 00 20 48.1 59 28 12 00 23 32.8 59 44 50 0.11 0.09 119.46�4.62 00 22 26.6 57 47 56 00 25 11.4 58 04 33 0.11 0.11 119.46�5.10 00 22 46.5 57 18 54 00 25 31.2 57 35 31 0.15 0.13 119.46�5.30 00 22 59.0 57 07 15 00 25 43.7 57 23 52 0.15 0.08 119.49�2.82 00 21 12.2 59 35 32 00 23 57.2 59 52 09 0.11 0.11 119.52�5.04 00 23 10.3 57 22 55 00 25 55.2 57 39 32 0.19 0.07 119.55�3.48 00 22 12.8 58 56 39 00 24 58.0 59 13 16 0.08 0.04 119.56�2.40 00 21 26.4 60 00 59 00 24 11.7 60 17 36 0.08 0.07 119.58�4.28 00 23 06.7 58 08 45 00 25 52.0 58 25 22 0.33 0.08 119.69�1.72 00 21 53.6 60 42 39 00 24 39.5 60 59 16 0.10 0.07 119.70�3.13 00 23 07.2 59 18 29 00 25 53.0 59 35 06 0.07 0.05 119.71�2.02 00 22 18.3 60 24 32 00 25 04.2 60 41 09 0.19 0.12 NVSS J002504+604128

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 119.83�3.71 00 24 33.5 58 44 08 00 27 19.7 59 00 44 0.21 0.14 119.84�1.26 00 22 42.7 61 10 37 00 25 29.2 61 27 14 0.11 0.08 119.84�3.59 00 24 33.9 58 51 49 00 27 20.2 59 08 25 0.08 0.05 119.88+0.72: 00 21 15.4 63 09 04 00 24 02.2 63 25 41 0.15 0.14 119.88�1.60 00 23 17.7 60 50 42 00 26 04.4 61 07 18 0.10 0.08 NVSS J002603+610714 119.91�1.52 00 23 27.7 60 55 22 00 26 14.5 61 11 58 0.11 0.09 119.93+0.80: 00 21 40.8 63 14 04 00 24 27.9 63 30 41 0.09 0.09 119.96�1.83 00 24 10.7 60 37 29 00 26 57.7 60 54 05 0.19 0.18 NVSS J002658+605404 119.96�1.90 00 24 11.2 60 33 07 00 26 58.2 60 49 43 0.22 0.11 NVSS J002657+604949 119.97�5.11 00 26 35.1 57 21 28 00 29 21.6 57 38 03 0.15 0.07 119.98�2.10 00 24 33.0 60 21 42 00 27 20.1 60 38 18 0.11 0.07 120.03�4.85 00 26 50.7 57 37 07 00 29 37.4 57 53 42 0.11 0.09 120.04�4.58 00 26 45.7 57 53 30 00 29 32.5 58 10 05 0.06 0.04 120.04�5.52 00 27 18.4 56 57 34 00 30 05.0 57 14 08 0.19 0.08 ZOAG G120.03-05.52 120.06�4.64 00 26 54.9 57 50 17 00 29 41.8 58 06 52 0.07 0.07 120.06�5.19 00 27 16.7 57 17 13 00 30 03.5 57 33 47 0.19 0.10 120.07�2.97 00 25 53.6 59 30 13 00 28 40.9 59 46 48 0.18 0.07 120.12�5.20 00 27 44.2 57 16 36 00 30 31.2 57 33 10 0.16 0.08 120.14�4.52 00 27 24.7 57 57 35 00 30 11.9 58 14 09 0.08 0.04 120.15�2.01 00 25 47.3 60 27 57 00 28 35.1 60 44 32 0.26 0.10 120.17�4.59 00 27 41.6 57 53 52 00 30 28.9 58 10 26 0.11 0.08 120.17�4.43 00 27 34.6 58 03 01 00 30 21.9 58 19 35 0.19 0.11 120.18�5.39 00 28 15.2 57 05 50 00 31 02.3 57 22 24 0.06 0.06 120.20�1.32 00 25 44.7 61 09 05 00 28 32.8 61 25 40 0.10 0.10 120.20�3.11 00 26 57.5 59 22 09 00 29 45.2 59 38 44 0.13 0.11 120.23�4.36 00 28 01.3 58 07 21 00 30 48.9 58 23 55 0.05 0.05 120.24�4.26 00 28 02.7 58 13 43 00 30 50.3 58 30 17 0.07 0.05 120.30�4.62 00 28 41.1 57 52 41 00 31 28.8 58 09 15 0.16 0.10 120.31�1.01 00 26 24.8 61 28 33 00 29 13.5 61 45 08 0.11 0.10 120.33�5.53 00 29 28.7 56 57 54 00 32 16.3 57 14 27 0.21 0.07 NVSS J003216+571421 120.38�1.91 00 27 35.0 60 34 58 00 30 23.8 60 51 32 0.10 0.08 ZOAG G120.37-01.91 120.38�5.55 00 29 49.9 56 56 58 00 32 37.6 57 13 31 0.10 0.09 120.40�4.41 00 29 19.6 58 05 13 00 32 07.7 58 21 46 0.06 0.05 120.41+5.65 00 21 12.5 68 06 19 00 24 02.7 68 22 56 0.33 0.11 ZOAG G120.40+05.65 120.43�2.98 00 28 43.0 59 31 18 00 31 31.7 59 47 52 0.06 0.05 120.45�2.45 00 28 31.3 60 02 58 00 31 20.2 60 19 32 0.08 0.07 ZOAG G120.44-02.45 120.49�4.85 00 30 14.5 57 39 22 00 33 02.8 57 55 55 0.22 0.11 120.50�4.03 00 29 51.6 58 28 42 00 32 40.2 58 45 15 0.18 0.08 120.51�2.26 00 28 55.8 60 14 19 00 31 45.0 60 30 52 0.32 0.11 120.53�3.41 00 29 43.0 59 06 02 00 32 31.9 59 22 35 0.07 0.07 120.54+5.61 00 22 39.9 68 05 08 00 25 31.2 68 21 45 0.34 0.22 IRAS 00227+6805 120.54�2.50 00 29 15.9 60 00 21 00 32 05.2 60 16 54 0.07 0.07 120.54�4.05 00 30 08.8 58 27 46 00 32 57.5 58 44 19 0.39 0.17 ZOAG G120.53-04.04 120.54�5.30 00 30 49.9 57 12 58 00 33 38.2 57 29 30 0.11 0.07 120.56�2.29 00 29 19.4 60 13 11 00 32 08.8 60 29 44 0.30 0.10 ZOAG G120.56-02.28 120.57�3.74 00 30 16.0 58 46 08 00 33 05.0 59 02 41 0.20 0.10 ZOAG G120.57-03.73 120.57�5.48 00 31 08.8 57 02 13 00 33 57.2 57 18 45 0.08 0.08 ZOAG G120.56-05.48 120.57�5.49 00 31 09.2 57 01 42 00 33 57.6 57 18 14 0.19 0.08 ZOAG G120.56-05.49 120.58�2.29 00 29 27.9 60 13 11 00 32 17.4 60 29 44 0.22 0.19 120.59�3.47 00 30 15.1 59 02 42 00 33 04.2 59 19 15 0.15 0.08 120.62�1.99 00 29 36.8 60 30 59 00 32 26.6 60 47 32 0.20 0.07 120.63�5.23 00 31 27.2 57 17 31 00 34 15.9 57 34 03 0.18 0.07 120.66�4.80 00 31 30.4 57 43 18 00 34 19.3 57 59 50 0.18 0.05 120.70�1.94 00 30 11.4 60 34 45 00 33 01.5 60 51 18 0.10 0.07 120.73�5.14 00 32 09.9 57 23 02 00 34 58.9 57 39 34 0.18 0.08 ZOAG G120.72-05.14 120.78�2.41 00 31 09.2 60 06 33 00 33 59.5 60 23 05 0.11 0.11 120.84�4.43 00 32 37.6 58 06 07 00 35 27.3 58 22 38 0.08 0.07 120.88�4.17 00 32 51.4 58 21 32 00 35 41.4 58 38 03 0.07 0.05 120.99�4.35 00 33 43.7 58 11 14 00 36 34.0 58 27 44 0.08 0.06 121.01+0.15 00 31 37.7 62 41 12 00 34 30.1 62 57 44 0.11 0.07

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 121.01�1.90 00 32 42.8 60 37 56 00 35 34.2 60 54 27 0.10 0.07 121.01�5.47 00 34 23.3 57 04 23 00 37 13.2 57 20 53 0.17 0.08 ZOAG G121.01-05.47 121.03�5.66 00 34 34.6 56 53 13 00 37 24.4 57 09 43 0.06 0.05 121.05�4.32 00 34 10.3 58 13 40 00 37 00.8 58 30 10 0.11 0.10 121.10�2.75 00 33 50.9 59 47 50 00 36 42.3 60 04 20 0.08 0.06 121.11+5.49 00 28 48.1 68 00 54 00 31 43.8 68 17 28 0.16 0.11 ZOAG G121.11+05.49 121.16�4.56 00 35 07.9 57 59 12 00 37 58.7 58 15 42 0.11 0.08 121.17�4.18 00 35 01.1 58 22 16 00 37 52.1 58 38 46 0.08 0.05 121.19�4.36 00 35 16.2 58 11 27 00 38 07.2 58 27 56 0.22 0.10 121.21�5.15 00 35 43.9 57 24 09 00 38 34.6 57 40 38 0.10 0.09 ZOAG G121.20-05.19 121.24�4.35 00 35 38.6 58 12 02 00 38 29.8 58 28 31 0.30 0.13 121.30�2.84 00 35 29.9 59 42 48 00 38 22.1 59 59 17 0.26 0.09 121.30�4.79 00 36 16.0 57 45 49 00 39 07.2 58 02 18 0.07 0.07 121.31�2.53 00 35 26.9 60 01 46 00 38 19.3 60 18 15 0.46 0.12 [H92] 05? 121.31�2.98 00 35 37.2 59 34 19 00 38 29.3 59 50 48 0.06 0.04 121.32�5.45 00 36 40.5 57 06 31 00 39 31.4 57 22 59 0.18 0.06 ZOAG G121.32-05.45 121.33�4.73 00 36 28.8 57 49 52 00 39 20.1 58 06 21 0.16 0.09 121.33�4.24 00 36 17.7 58 19 04 00 39 09.3 58 35 33 0.86 0.40 MCG +10-02-001 121.33�4.41 00 36 21.9 58 08 58 00 39 13.4 58 25 27 0.10 0.09 121.36�2.55 00 35 50.7 60 00 21 00 38 43.3 60 16 50 0.77 0.63 ZOAG G121.35-02.54 121.36�4.30 00 36 30.1 58 15 28 00 39 21.7 58 31 57 0.16 0.07 121.44�3.51 00 36 50.9 59 03 11 00 39 43.3 59 19 39 0.36 0.33 IRAS 00368+5903 121.44�4.48 00 37 10.7 58 05 20 00 40 02.5 58 21 48 0.46 0.07 ZOAG G121.43-04.47 121.44�4.83 00 37 20.5 57 44 03 00 40 12.1 58 00 31 0.19 0.11 121.47�4.16 00 37 17.5 58 24 16 00 40 09.6 58 40 44 0.11 0.08 121.53�3.83 00 37 38.0 58 44 20 00 40 30.5 59 00 48 0.05 0.04 121.54�4.61 00 38 00.1 57 57 44 00 40 52.2 58 14 11 0.08 0.06 121.58�4.15 00 38 07.9 58 25 11 00 41 00.4 58 41 38 0.14 0.07 121.58�4.47 00 38 16.4 58 06 03 00 41 08.7 58 22 30 0.06 0.06 121.58�4.66 00 38 17.3 57 54 38 00 41 09.5 58 11 05 0.26 0.08 121.63�3.56 00 38 20.7 59 00 40 00 41 13.7 59 17 07 0.09 0.08 121.64�2.65 00 38 06.5 59 55 29 00 41 00.1 60 11 56 0.34 0.07 121.65�2.58 00 38 11.3 59 59 17 00 41 05.0 60 15 44 0.08 0.07 121.66�2.11 00 38 03.8 60 27 59 00 40 57.9 60 44 26 0.32 0.09 121.66�3.12 00 38 25.1 59 27 22 00 41 18.5 59 43 49 0.19 0.07 121.67�2.08 00 38 09.5 60 29 21 00 41 03.6 60 45 48 0.35 0.11 121.67�2.55 00 38 21.2 60 01 29 00 41 15.1 60 17 56 0.07 0.07 121.70�3.15 00 38 43.1 59 25 27 00 41 36.7 59 41 54 0.18 0.08 121.85�2.77 00 39 49.0 59 48 39 00 42 43.4 60 05 05 0.27 0.26 IRAS 00397+5949 121.88+4.69 00 37 20.6 67 16 08 00 40 21.4 67 32 36 0.14 0.11 121.88�5.34 00 40 43.9 57 14 17 00 43 36.7 57 30 42 0.16 0.09 121.90�5.39 00 40 52.4 57 11 17 00 43 45.3 57 27 42 0.21 0.08 121.95�5.41 00 41 13.2 57 10 44 00 44 06.2 57 27 09 0.10 0.08 122.04�2.34 00 41 14.0 60 14 33 00 44 09.5 60 30 58 0.30 0.09 122.06�4.64 00 41 56.2 57 56 39 00 44 50.1 58 13 03 0.10 0.09 122.10�4.97 00 42 14.5 57 37 12 00 45 08.3 57 53 36 0.07 0.05 ZOAG G122.09-04.97 122.11�2.82 00 41 52.0 59 46 07 00 44 47.4 60 02 31 0.11 0.08 ZOAG G122.10-02.82 122.14�1.91 00 41 58.2 60 40 44 00 44 54.5 60 57 08 0.10 0.09 122.15�3.65 00 42 25.2 58 56 14 00 45 20.1 59 12 38 0.08 0.04 122.15�3.57 00 42 20.4 59 00 53 00 45 15.4 59 17 17 0.16 0.13 122.16�5.27 00 42 45.1 57 18 54 00 45 38.9 57 35 18 0.19 0.18 122.18�4.10 00 42 41.4 58 29 27 00 45 36.1 58 45 51 0.11 0.08 122.19�2.56 00 42 29.1 60 01 47 00 45 25.0 60 18 11 0.32 0.32 122.19�4.30 00 42 47.7 58 17 25 00 45 42.3 58 33 49 0.23 0.20 122.20�0.73 00 42 08.9 61 51 27 00 45 06.4 62 07 51 0.27 0.08 122.22�2.59 00 42 42.6 59 59 55 00 45 38.6 60 16 19 0.06 0.05 122.25�3.65 00 43 10.9 58 56 35 00 46 06.2 59 12 58 0.11 0.09 122.27�3.57 00 43 17.3 59 01 32 00 46 12.7 59 17 55 0.06 0.04 122.29�4.64 00 43 38.8 57 57 00 00 46 33.5 58 13 23 0.15 0.10 122.33�3.55 00 43 47.6 59 02 42 00 46 43.3 59 19 05 0.21 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 122.35�4.43 00 44 04.1 58 10 01 00 46 59.2 58 26 24 0.09 0.07 122.37�1.93 00 43 49.3 60 39 32 00 46 46.5 60 55 55 0.09 0.07 122.40�2.47 00 44 10.2 60 07 13 00 47 07.1 60 23 35 0.19 0.08 122.41�2.70 00 44 15.8 59 53 26 00 47 12.5 60 09 48 0.26 0.10 122.42�4.68 00 44 38.0 57 54 48 00 47 33.1 58 11 10 0.08 0.06 122.43�5.01 00 44 41.9 57 35 20 00 47 36.8 57 51 42 0.17 0.07 122.44�2.65 00 44 27.4 59 56 51 00 47 24.2 60 13 13 0.11 0.07 122.45�5.76 00 44 57.9 56 50 25 00 47 52.3 57 06 47 0.19 0.11 ZOAG G122.45-05.76 122.46�4.66 00 44 53.5 57 56 25 00 47 48.8 58 12 47 0.09 0.07 ZOAG G122.45-04.65 122.47�5.61 00 45 07.2 56 59 10 00 48 01.8 57 15 32 0.11 0.05 122.53�4.63 00 45 26.9 57 57 59 00 48 22.4 58 14 20 0.06 0.05 122.53�4.69 00 45 24.5 57 54 39 00 48 20.0 58 11 00 0.09 0.08 122.55�1.54 00 45 13.7 61 03 29 00 48 12.0 61 19 51 0.08 0.07 122.58�3.92 00 45 44.5 58 40 54 00 48 40.8 58 57 15 0.21 0.18 122.59�2.79 00 45 42.5 59 48 32 00 48 39.8 60 04 53 0.07 0.07 122.59�2.65 00 45 40.0 59 56 56 00 48 37.4 60 13 17 0.29 0.18 122.61+5.26 00 44 46.9 67 51 11 00 47 53.8 68 07 33 0.18 0.10 ZOAG G122.60+05.26 122.61�5.53 00 46 06.4 57 03 52 00 49 01.5 57 20 13 0.16 0.11 ZOAG G122.60-05.53 122.62�5.54 00 46 10.8 57 03 30 00 49 05.9 57 19 51 0.07 0.04 122.65�4.83 00 46 20.8 57 45 53 00 49 16.6 58 02 14 0.32 0.15 122.65�5.66 00 46 24.2 56 56 26 00 49 19.3 57 12 46 0.08 0.08 122.67�4.79 00 46 30.7 57 48 42 00 49 26.6 58 05 02 0.11 0.09 ZOAG G122.66-04.78 122.67�4.77 00 46 30.3 57 49 37 00 49 26.2 58 05 57 0.07 0.06 122.69+2.55: 00 45 58.5 65 08 36 00 49 02.1 65 24 57 0.22 0.21 122.70�3.09 00 46 37.8 59 30 33 00 49 35.3 59 46 53 0.07 0.05 122.70�3.82 00 46 39.2 58 46 36 00 49 36.0 59 02 56 0.10 0.10 122.70�4.16 00 46 39.3 58 26 20 00 49 35.8 58 42 40 0.09 0.08 122.71�5.01 00 46 49.8 57 35 19 00 49 45.7 57 51 39 0.11 0.10 ZOAG G122.71-05.01 122.73�4.82 00 46 55.3 57 46 39 00 49 51.4 58 02 59 0.35 0.19 ZOAG G122.72-04.82 122.74�4.95 00 47 00.6 57 38 56 00 49 56.6 57 55 16 0.08 0.07 122.76�5.27 00 47 11.8 57 19 47 00 50 07.6 57 36 07 0.06 0.05 122.78+2.86: 00 46 49.2 65 27 17 00 49 53.8 65 43 37 0.22 0.16 122.79�3.39 00 47 17.6 59 12 43 00 50 15.1 59 29 03 0.16 0.11 122.83+4.18 00 47 12.8 66 46 30 00 50 19.6 67 02 50 0.13 0.11 122.85�2.85 00 47 47.1 59 45 07 00 50 45.4 60 01 26 0.15 0.08 122.88�5.02 00 48 03.6 57 34 39 00 51 00.0 57 50 58 0.10 0.09 ZOAG G122.87-05.02 122.89�4.05 00 48 05.1 58 32 59 00 51 02.4 58 49 18 0.22 0.07 122.91�2.39 00 48 15.7 60 12 49 00 51 14.7 60 29 08 0.09 0.08 122.93�4.93 00 48 24.4 57 40 15 00 51 21.0 57 56 34 0.28 0.09 ZOAG G122.92-04.93 122.94�2.75 00 48 30.5 59 51 07 00 51 29.3 60 07 26 0.31 0.07 122.95�2.64 00 48 32.2 59 57 37 00 51 31.1 60 13 55 0.06 0.04 122.99+5.48 00 48 50.7 68 05 00 00 52 00.9 68 21 18 0.16 0.09 ZOAG G122.97+05.49 122.99�2.83 00 48 53.2 59 46 29 00 51 52.1 60 02 47 0.16 0.15 ZOAG G122.98-02.82 123.00�3.18 00 48 58.6 59 25 10 00 51 57.2 59 41 28 0.32 0.10 123.01�4.88 00 49 03.0 57 43 22 00 51 60.0 57 59 40 0.06 0.05 123.02�1.46 00 49 08.0 61 08 18 00 52 08.4 61 24 36 0.21 0.20 123.03�3.02 00 49 14.2 59 34 59 00 52 13.0 59 51 17 0.11 0.07 123.03�3.04 00 49 11.5 59 33 20 00 52 10.3 59 49 38 0.15 0.07 123.04�4.70 00 49 15.7 57 54 10 00 52 12.9 58 10 28 0.11 0.08 123.04�4.83 00 49 14.3 57 46 11 00 52 11.4 58 02 29 0.11 0.10 123.06�2.87 00 49 26.6 59 43 47 00 52 25.7 60 00 05 0.07 0.04 123.07�2.72 00 49 33.3 59 53 03 00 52 32.6 60 09 20 0.17 0.16 ZOAG G123.07-02.71 123.07�2.66 00 49 32.3 59 56 20 00 52 31.7 60 12 38 0.14 0.09 123.11�2.64 00 49 49.5 59 57 47 00 52 49.0 60 14 04 0.10 0.07 123.13�2.62 00 50 01.4 59 58 30 00 53 01.0 60 14 47 0.31 0.11 123.15�5.76 00 50 03.3 56 50 33 00 52 59.9 57 06 50 0.34 0.19 ZOAG G123.14-05.76 123.17�1.40 00 50 23.1 61 11 57 00 53 24.3 61 28 14 0.19 0.09 123.19+0.28 00 50 35.6 62 52 43 00 53 38.9 63 08 59 0.09 0.08 123.25�3.88 00 50 52.1 58 43 12 00 53 50.9 58 59 28 0.07 0.06 123.25�4.44 00 50 51.8 58 09 36 00 53 50.0 58 25 52 0.11 0.11 ZOAG G123.25-04.44

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id.

123.27�5.15 00 50 59.4 57 26 49 00 53 57.0 57 43 05 0.17 0.09 ZOAG G123.27-05.15 123.29�2.10 00 51 16.5 60 30 00 00 54 17.3 60 46 16 0.11 0.07 123.29�2.15 00 51 20.6 60 27 09 00 54 21.4 60 43 25 0.28 0.10 123.31+2.99: 00 51 55.7 65 35 21 00 55 03.7 65 51 36 0.11 0.09 123.32�3.41 00 51 27.2 59 11 01 00 54 26.7 59 27 17 0.08 0.06 123.35�3.85 00 51 38.5 58 44 43 00 54 37.7 59 00 58 0.14 0.13 ZOAG G123.34-03.85 123.35�5.75 00 51 32.1 56 51 10 00 54 29.4 57 07 26 0.23 0.07 ZOAG G123.35-05.75 123.36�2.85 00 51 50.4 59 45 06 00 54 50.7 60 01 21 0.11 0.08 123.37�2.90 00 51 52.5 59 41 38 00 54 52.8 59 57 53 0.15 0.08 ZOAG G123.36-02.90 123.44�3.54 00 52 21.0 59 03 28 00 55 20.8 59 19 43 0.21 0.10 123.51�2.44 00 53 01.1 60 09 09 00 56 02.4 60 25 23 0.27 0.08 123.51�3.12 00 52 58.7 59 28 21 00 55 59.3 59 44 35 0.20 0.08 123.52�3.01 00 53 02.8 59 35 18 00 56 03.5 59 51 32 0.07 0.06 123.54�2.70 00 53 15.3 59 54 01 00 56 16.5 60 10 15 0.16 0.04 123.56�3.73 00 53 19.1 58 51 40 00 56 19.2 59 07 54 0.15 0.09 123.59�2.32 00 53 43.8 60 16 13 00 56 45.6 60 32 26 0.10 0.07 123.60�4.42 00 53 31.1 58 10 43 00 56 30.6 58 26 57 0.07 0.06 123.61�0.20: 00 54 15.0 62 23 42 00 57 19.7 62 39 55 0.11 0.08 123.62�5.61 00 53 29.5 56 59 18 00 56 27.8 57 15 32 0.07 0.06 123.66�3.87 00 54 01.3 58 43 29 00 57 01.6 58 59 42 0.18 0.10 123.72�4.28 00 54 25.3 58 18 54 00 57 25.3 58 35 07 0.16 0.11 123.73�2.93 00 54 43.4 59 39 31 00 57 45.0 59 55 43 0.09 0.09 ZOAG G123.72-02.93 123.73�4.11 00 54 31.9 58 28 59 00 57 32.1 58 45 11 0.11 0.10 123.73�5.28 00 54 22.6 57 18 29 00 57 21.6 57 34 42 0.32 0.08 ZOAG G123.73-05.28 123.77�2.44 00 55 09.6 60 09 10 00 58 12.0 60 25 22 0.07 0.07 ZOAG G123.77-02.44 123.78+5.25 00 57 13.6 67 49 60 01 00 29.3 68 06 09 0.15 0.07 123.82�1.61 00 55 43.2 60 58 53 00 58 46.9 61 15 04 0.10 0.07 123.82�4.67 00 55 05.1 57 55 02 00 58 05.0 58 11 14 0.36 0.09 ZOAG G123.81-04.67 123.85�5.27 00 55 15.6 57 19 07 00 58 15.0 57 35 19 0.07 0.05 ZOAG G123.85-05.27 123.88�2.07 00 56 04.1 60 31 05 00 59 07.4 60 47 16 0.18 0.09 123.88�2.83 00 55 54.8 59 45 31 00 58 57.1 60 01 42 0.16 0.15 ZOAG G123.87-02.83 123.89�5.35 00 55 29.9 57 14 05 00 58 29.3 57 30 16 0.32 0.07 ZOAG G123.88-05.35 123.90�2.44 00 56 09.5 60 08 52 00 59 12.4 60 25 03 0.21 0.09 ZOAG G123.89-02.44 123.92+4.40 00 58 19.4 66 58 45 01 01 34.1 67 14 53 0.11 0.08 ZOAG G123.92+04.40 123.95�3.32b 00 56 23.0 59 16 11 00 59 25.0 59 32 21 0.11 0.08 123.95�3.32a 00 56 21.8 59 16 08 00 59 23.8 59 32 18 0.19 0.15 123.97�4.64 00 56 14.6 57 56 36 00 59 15.1 58 12 47 0.11 0.08 123.97�3.05 00 56 37.4 59 32 11 00 59 39.8 59 48 21 0.11 0.09 123.99+4.29 00 59 03.1 66 52 00 01 02 18.0 67 08 07 0.23 0.10 IRAS 00590+6652 123.99�3.05 00 56 48.0 59 32 12 00 59 50.5 59 48 22 0.45 0.18 IRAS 00568+5932 123.99�3.23 00 56 42.8 59 21 16 00 59 45.0 59 37 26 0.08 0.06 124.01�3.20 00 56 54.3 59 23 11 00 59 56.7 59 39 21 0.39 0.26 ZOAG G124.01-03.19 124.01�4.07 00 56 40.9 58 31 03 00 59 42.2 58 47 13 0.19 0.09 ZOAG G124.00-04.06 124.02�2.89 00 57 03.8 59 41 51 01 00 06.6 59 58 01 0.10 0.07 124.03�3.76 00 56 56.5 58 49 37 00 59 58.2 59 05 47 0.08 0.08 124.05�2.93 00 57 14.6 59 39 09 01 00 17.4 59 55 18 0.15 0.04 124.06�4.75 00 56 52.8 57 49 51 00 59 53.4 58 06 01 0.11 0.09 124.12�4.19 00 57 28.3 58 23 28 01 00 29.8 58 39 37 0.20 0.10 124.13�5.17 00 57 17.2 57 24 34 01 00 17.6 57 40 43 0.10 0.08 ZOAG G124.12-05.17 124.14�1.92 00 58 13.8 60 39 36 01 01 18.3 60 55 44 0.11 0.07 124.16�5.62 00 57 27.4 56 57 40 01 00 27.4 57 13 49 0.22 0.08 ZOAG G124.16-05.62 124.20�2.97 00 58 24.8 59 36 36 01 01 28.1 59 52 44 0.17 0.11 124.21�2.87 00 58 34.0 59 42 34 01 01 37.5 59 58 42 0.29 0.07 IRAS 00585+5942 124.22�2.89 00 58 36.8 59 41 08 01 01 40.3 59 57 16 0.11 0.11 124.22�2.99 00 58 36.0 59 35 30 01 01 39.4 59 51 38 0.15 0.11 124.22�3.30 00 58 29.7 59 16 25 01 01 32.7 59 32 33 0.17 0.08 124.23+4.86 01 01 46.6 67 25 44 01 05 04.5 67 41 48 0.08 0.08 124.23�4.03 00 58 21.0 58 32 41 01 01 23.1 58 48 49 0.07 0.04 124.27+5.34 01 02 22.0 67 54 19 01 05 41.4 68 10 22 0.09 0.07 124.27�2.91 00 58 58.2 59 39 50 01 02 01.9 59 55 58 0.34 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 124.27�3.44 00 58 50.8 59 08 10 01 01 53.8 59 24 18 0.07 0.07 124.29�2.37 00 59 20.4 60 12 14 01 02 24.9 60 28 21 0.31 0.10 124.30�3.04 00 59 11.5 59 32 16 01 02 15.1 59 48 23 0.47 0.17 ZOAG G124.29-03.04 124.31�3.01 00 59 16.8 59 33 43 01 02 20.5 59 49 50 0.16 0.08 124.33�4.25 00 59 05.7 58 19 14 01 02 07.9 58 35 21 0.19 0.11 124.34�2.78 00 59 36.4 59 47 40 01 02 40.5 60 03 47 0.19 0.15 124.34�4.88 00 58 57.8 57 41 40 01 01 59.2 57 57 48 0.06 0.05 124.34�5.04 00 58 53.7 57 32 12 01 01 54.9 57 48 20 0.11 0.11 124.35+4.71 01 02 55.6 67 16 39 01 06 14.0 67 32 42 0.08 0.08 124.36�5.24 00 58 58.3 57 20 00 01 01 59.3 57 36 08 0.18 0.07 124.38�2.99 00 59 52.2 59 34 45 01 02 56.2 59 50 52 0.18 0.08 124.45�4.62 00 59 51.7 57 57 02 01 02 53.8 58 13 09 0.12 0.11 124.46�3.03 01 00 29.4 59 32 19 01 03 33.7 59 48 25 0.30 0.07 124.47+5.05: 01 04 18.0 67 36 19 01 07 38.1 67 52 20 0.21 0.15 124.47�4.51 01 00 05.0 58 03 35 01 03 07.3 58 19 41 0.22 0.09 124.49�3.26 01 00 37.9 59 18 31 01 03 41.9 59 34 37 0.15 0.10 124.55�3.52 01 01 00.4 59 02 25 01 04 04.3 59 18 30 0.15 0.07 124.56�5.12 01 00 31.8 57 26 54 01 03 33.7 57 43 00 0.16 0.07 ZOAG G124.56-05.12 124.57�3.79 01 01 03.1 58 46 15 01 04 06.7 59 02 20 0.06 0.06 124.57�5.47 01 00 26.5 57 06 01 01 03 27.9 57 22 07 0.08 0.05 124.61+5.31 01 05 58.3 67 51 08 01 09 20.1 68 07 07 0.17 0.10 124.61�4.80 01 01 02.0 57 46 02 01 04 04.4 58 02 07 0.17 0.10 124.62�3.42 01 01 36.4 59 08 33 01 04 40.7 59 24 37 0.18 0.07 124.63�4.81 01 01 10.3 57 45 06 01 04 12.8 58 01 11 0.18 0.10 ZOAG G124.63-04.81 124.64�4.92 01 01 09.8 57 38 23 01 04 12.2 57 54 28 0.10 0.10 124.65�3.23 01 01 51.9 59 19 29 01 04 56.6 59 35 33 0.08 0.07 124.67�2.22 01 02 28.6 60 20 25 01 05 34.9 60 36 28 0.21 0.17 124.68�3.34 01 02 03.4 59 13 14 01 05 08.0 59 29 18 0.18 0.08 124.69�5.29 01 01 26.3 57 16 25 01 04 28.4 57 32 30 0.17 0.08 124.74+4.92: 01 07 05.4 67 27 30 01 10 27.0 67 43 27 0.11 0.08 124.74�5.18 01 01 48.9 57 22 25 01 04 51.2 57 38 29 0.29 0.15 ZOAG G124.73-05.18 124.75�3.36 01 02 35.6 59 11 42 01 05 40.4 59 27 45 0.08 0.08 ZOAG G124.74-03.35 124.81+0.55 01 04 59.2 63 05 35 01 08 10.9 63 21 35 0.10 0.07 124.85�5.49 01 02 32.3 57 03 50 01 05 34.6 57 19 53 0.38 0.32 ZOAG G124.84-05.49 124.91�5.28 01 03 00.2 57 15 54 01 06 03.0 57 31 57 0.16 0.10 124.93�2.65 01 04 20.3 59 53 50 01 07 26.9 60 09 51 0.33 0.11 125.05�5.21 01 04 04.1 57 19 39 01 07 07.4 57 35 40 0.10 0.09 125.07�2.60 01 05 30.9 59 55 57 01 08 38.1 60 11 57 0.19 0.15 ZOAG G125.07-02.60 125.08�4.70 01 04 32.8 57 50 20 01 07 36.9 58 06 21 0.15 0.09 125.10�3.74 01 05 07.3 58 47 44 01 08 12.8 59 03 44 0.11 0.08 125.12�3.52 01 05 24.4 59 00 34 01 08 30.3 59 16 34 0.11 0.11 125.15�3.79 01 05 29.4 58 44 39 01 08 35.0 59 00 39 0.45 0.21 ZOAG G125.14-03.79 125.32�4.72 01 06 19.5 57 48 18 01 09 24.4 58 04 17 0.09 0.07 125.41�3.82 01 07 29.8 58 41 23 01 10 36.3 58 57 20 0.12 0.11 125.41�4.28 01 07 14.9 58 14 23 01 10 20.7 58 30 20 0.18 0.08 125.41�4.77 01 07 00.6 57 45 00 01 10 05.7 58 00 58 0.31 0.08 IRAS 01069+5745 125.42�4.72 01 07 05.2 57 47 48 01 10 10.4 58 03 46 0.34 0.09 125.48�3.72 01 08 03.2 58 47 34 01 11 10.1 59 03 30 0.19 0.10 125.49�3.71 01 08 09.7 58 47 40 01 11 16.6 59 03 36 0.22 0.20 125.50�2.99 01 08 41.8 59 31 08 01 11 50.0 59 47 04 0.23 0.19 ZOAG G125.50-02.98 125.61+5.69 01 16 56.4 68 08 45 01 20 26.6 68 24 29 0.09 0.07 125.61+2.10 01 13 16.7 64 34 42 01 16 35.8 64 50 31 0.11 0.08 [PCC93] 16 125.61�3.92b 01 08 59.1 58 34 58 01 12 06.1 58 50 53 0.22 0.10 ZOAG G125.60-03.91 125.61�3.92a 01 08 58.5 58 34 43 01 12 05.5 58 50 38 0.36 0.12 ZOAG G125.60-03.92 125.62�0.18 01 11 29.7 62 18 17 01 14 43.6 62 34 09 0.10 0.10 125.68�4.30 01 09 15.5 58 11 33 01 12 22.2 58 27 28 0.12 0.10 125.69�4.41 01 09 16.9 58 04 46 01 12 23.4 58 20 41 0.11 0.10 125.69�4.42 01 09 14.5 58 04 36 01 12 21.0 58 20 31 0.27 0.11 125.74�2.19 01 11 03.0 60 17 39 01 14 13.4 60 33 31 0.17 0.16 IRAS 01111+6018 125.82+4.90 01 18 12.8 67 20 16 01 21 41.6 67 35 58 0.16 0.07

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 125.83+4.29 01 17 34.9 66 44 01 01 21 01.7 66 59 44 0.19 0.07 125.88+4.91 01 18 48.8 67 20 55 01 22 18.0 67 36 36 0.10 0.08 125.90�3.54 01 11 26.3 58 55 53 01 14 34.9 59 11 45 0.17 0.16 ZOAG G125.89-03.54 125.91�4.73 01 10 45.2 57 44 38 01 13 51.9 58 00 31 0.11 0.07 125.95+2.72 01 17 05.9 65 09 16 01 20 28.6 65 25 00 0.24 0.16 IRAS 01170+6509 125.96�4.09 01 11 30.9 58 22 54 01 14 38.8 58 38 46 0.11 0.10 125.96�4.15 01 11 27.4 58 19 32 01 14 35.2 58 35 24 0.09 0.08 126.03�2.03 01 13 32.4 60 25 35 01 16 44.2 60 41 24 0.27 0.08 126.04+4.40 01 19 52.0 66 49 16 01 23 20.5 67 04 55 0.17 0.10 126.05+5.28 01 21 03.1 67 41 44 01 24 34.8 67 57 22 0.09 0.08 126.05�2.33 01 13 28.8 60 07 35 01 16 40.2 60 23 24 0.22 0.09 ZOAG G126.04-02.33 126.05�2.67 01 13 10.4 59 47 14 01 16 21.1 60 03 03 0.18 0.12 ZOAG G126.04-02.67 126.12�0.41 01 15 35.0 62 01 31 01 18 50.5 62 17 17 0.10 0.07 ZOAG G126.11-00.41 126.13�2.67 01 13 52.8 59 46 34 01 17 03.8 60 02 22 0.24 0.23 126.13�4.31 01 12 39.5 58 08 50 01 15 47.6 58 24 40 0.05 0.04 126.13�4.44 01 12 31.7 58 00 47 01 15 39.6 58 16 37 0.33 0.15 ZOAG G126.12-04.44 126.14+0.37: 01 16 27.8 62 47 54 01 19 45.2 63 03 39 0.16 0.16 126.14+0.36: 01 16 26.4 62 47 49 01 19 43.8 63 03 34 0.21 0.15 126.16+4.71 01 21 23.7 67 06 50 01 24 54.0 67 22 27 0.11 0.11 126.17�0.39: 01 16 05.4 62 02 46 01 19 21.2 62 18 31 0.12 0.04 126.19�4.61 01 12 52.4 57 50 38 01 16 00.2 58 06 28 0.20 0.08 126.20�1.86 01 15 04.6 60 34 57 01 18 17.4 60 50 44 0.11 0.09 126.20�2.65 01 14 23.7 59 47 39 01 17 35.0 60 03 27 0.30 0.22 ZOAG G126.19-02.65 126.20�4.41 01 13 05.3 58 02 26 01 16 13.5 58 18 16 0.19 0.19 IRAS 01130+5802 126.21�2.71 01 14 26.4 59 44 03 01 17 37.6 59 59 51 0.43 0.18 126.23�5.20 01 12 48.8 57 15 15 01 15 55.8 57 31 05 0.21 0.10 126.24�4.95 01 12 59.8 57 30 06 01 16 07.2 57 45 56 0.43 0.15 ZOAG G126.23-04.94 126.25�1.57 01 15 43.4 60 51 55 01 18 57.0 61 07 41 0.30 0.26 126.26�3.43 01 14 15.1 59 00 50 01 17 25.2 59 16 38 0.08 0.07 126.28+1.16 01 18 27.5 63 34 21 01 21 47.5 63 50 03 0.07 0.07 WEIN 011 126.28�4.83 01 13 25.0 57 36 53 01 16 32.8 57 52 42 0.11 0.07 126.29+4.75 01 22 45.8 67 08 04 01 26 17.0 67 23 39 0.10 0.08 126.31�4.42 01 13 55.5 58 01 08 01 17 04.0 58 16 56 0.29 0.27 ZOAG G126.30-04.42 126.33�3.92 01 14 25.0 58 31 09 01 17 34.4 58 46 57 0.09 0.07 126.34�3.97 01 14 28.8 58 27 53 01 17 38.2 58 43 41 0.24 0.13 ZOAG G126.33-03.97 126.34�4.18 01 14 18.8 58 15 40 01 17 27.8 58 31 28 0.32 0.14 ZOAG G126.33-04.17 126.34�4.82 01 13 51.0 57 37 10 01 16 58.9 57 52 58 0.09 0.07 126.35�2.20 01 15 56.3 60 13 25 01 19 09.0 60 29 10 0.10 0.09 126.35�4.54 01 14 06.4 57 53 52 01 17 14.8 58 09 40 0.18 0.07 126.38�4.45 01 14 25.5 57 59 03 01 17 34.2 58 14 51 0.08 0.08 126.40�4.58 01 14 29.2 57 51 25 01 17 37.7 58 07 13 0.21 0.07 126.40�4.70 01 14 24.9 57 43 54 01 17 33.2 57 59 42 0.23 0.10 126.42�4.13 01 15 00.3 58 18 01 01 18 09.7 58 33 48 0.36 0.10 126.49�4.33 01 15 20.0 58 05 35 01 18 29.2 58 21 21 0.33 0.30 ZOAG G126.48-04.33 126.51+4.49 01 24 37.2 66 50 36 01 28 08.8 67 06 08 0.15 0.10 126.53�4.21 01 15 44.8 58 12 40 01 18 54.4 58 28 26 0.39 0.22 ZOAG G126.52-04.20 126.60�4.15 01 16 18.6 58 15 17 01 19 28.5 58 31 02 0.46 0.36 ZOAG G126.59-04.15 126.61+5.48 01 27 10.4 67 49 04 01 30 46.6 68 04 32 0.22 0.09 ZOAG G126.61+05.48 126.61�4.27 01 16 17.6 58 08 28 01 19 27.3 58 24 13 0.09 0.07 126.64�4.04 01 16 40.3 58 21 41 01 19 50.5 58 37 25 0.17 0.15 ZOAG G126.63-04.04 126.71+5.76 01 28 42.2 68 04 26 01 32 20.2 68 19 51 0.11 0.09 126.72+5.01 01 27 36.2 67 19 51 01 31 11.1 67 35 18 0.08 0.08 126.73+2.68 01 24 24.5 65 01 14 01 27 51.2 65 16 46 0.10 0.07 126.73�4.22 01 17 12.8 58 10 19 01 20 23.0 58 26 03 0.27 0.09 ZOAG G126.72-04.22 126.75+4.38 01 26 54.3 66 42 26 01 30 27.0 66 57 54 0.15 0.08 126.76�4.95 01 16 51.5 57 27 06 01 20 00.5 57 42 50 0.43 0.07 126.77�3.09 01 18 32.3 59 17 54 01 21 44.8 59 33 36 0.19 0.15 126.78�3.75 01 17 59.7 58 38 21 01 21 10.9 58 54 03 0.24 0.09 126.78�4.63 01 17 16.5 57 45 41 01 20 26.1 58 01 25 0.58 0.46 MCG +10-03-001 126.79�1.81 01 19 52.5 60 33 41 01 23 07.7 60 49 21 0.34 0.28 WEIN 012

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id.

126.79�3.11 01 18 40.6 59 16 10 01 21 53.1 59 31 51 0.31 0.10 ZOAG G126.78-03.11 126.81+4.67 01 27 57.0 66 58 53 01 31 31.1 67 14 19 0.09 0.08 ZOAG G126.81+04.67 126.81�4.13 01 17 53.4 58 15 16 01 21 04.0 58 30 59 0.27 0.08 126.82�5.10 01 17 09.3 57 17 17 01 20 18.2 57 33 01 0.42 0.07 ZOAG G126.81-05.10 126.85�2.59 01 19 34.0 59 46 50 01 22 47.7 60 02 30 0.32 0.19 126.88�4.74 01 17 53.2 57 38 24 01 21 02.9 57 54 07 0.11 0.08 ZOAG G126.87-04.74 126.90�2.86 01 19 44.4 59 30 27 01 22 57.8 59 46 07 0.33 0.10 126.90�4.62 01 18 08.3 57 45 29 01 21 18.3 58 01 11 0.30 0.10 126.94�3.50 01 19 28.6 58 51 59 01 22 40.8 59 07 39 0.20 0.11 126.96�3.46 01 19 40.8 58 54 25 01 22 53.2 59 10 05 0.08 0.08 126.99+3.27 01 27 39.0 65 34 04 01 31 09.0 65 49 31 0.08 0.08 127.00�2.82 01 20 31.6 59 32 12 01 23 45.4 59 47 51 0.22 0.18 ZOAG G126.98-02.82 127.01+4.00 01 28 56.2 66 17 17 01 32 28.9 66 32 42 0.21 0.09 ZOAG G127.01+03.99 127.01+0.55 01 24 16.2 62 52 36 01 27 38.0 63 08 09 0.11 0.07 127.04+3.84 01 28 54.4 66 07 23 01 32 26.7 66 22 48 0.11 0.10 127.05�2.58 01 21 12.2 59 46 18 01 24 26.7 60 01 56 0.62 0.08 IRAS 01211+5946 127.06�2.11 01 21 45.4 60 13 48 01 25 00.9 60 29 25 0.15 0.11 127.09+3.34 01 28 43.0 65 37 28 01 32 13.8 65 52 53 0.11 0.07 127.10+0.47 01 24 57.9 62 46 51 01 28 19.8 63 02 22 0.17 0.08 ZOAG G127.10+00.47 127.12+0.56 01 25 10.2 62 52 04 01 28 32.4 63 07 35 0.11 0.08 127.16�3.39 01 21 14.7 58 56 56 01 24 27.9 59 12 33 0.20 0.18 127.17+2.29 01 27 57.6 64 34 35 01 31 25.3 64 50 01 0.11 0.08 127.17�4.18 01 20 35.7 58 10 06 01 23 47.4 58 25 44 0.18 0.06 127.19+4.18 01 30 58.9 66 26 35 01 34 33.3 66 41 56 0.09 0.07 127.19+4.17 01 30 54.7 66 26 02 01 34 29.1 66 41 23 0.21 0.09 127.19+3.85 01 30 25.1 66 06 38 01 33 58.2 66 22 00 0.08 0.07 127.19�1.81 01 23 04.0 60 30 35 01 26 20.6 60 46 10 0.27 0.26 WEIN 013 127.20+2.59 01 28 36.5 64 51 55 01 32 05.2 65 07 20 0.10 0.08 127.21+3.97 01 30 46.7 66 13 51 01 34 20.4 66 29 13 0.11 0.09 127.24+5.18 01 33 11.4 67 25 01 01 36 50.2 67 40 18 0.18 0.06 127.24�1.86 01 23 27.1 60 27 11 01 26 43.8 60 42 45 0.64 0.13 127.27+3.93 01 31 19.7 66 11 00 01 34 53.6 66 26 21 0.13 0.09 ZOAG G127.26+03.94 127.27+3.97 01 31 22.0 66 13 00 01 34 56.0 66 28 21 0.10 0.08 ZOAG G127.26+03.97 127.27+3.98 01 31 25.1 66 13 59 01 34 59.2 66 29 20 0.20 0.07 ZOAG G127.26+03.99 127.27�3.57 01 21 55.4 58 45 43 01 25 08.6 59 01 19 0.10 0.10 ZOAG G127.26-03.56 127.29�0.17 01 25 48.4 62 07 15 01 29 09.4 62 22 45 0.09 0.08 127.31+4.64 01 32 57.1 66 52 16 01 36 34.1 67 07 34 0.11 0.09 127.32+3.86 01 31 43.7 66 06 10 01 35 17.6 66 21 30 0.09 0.08 127.34+4.61 01 33 09.5 66 50 33 01 36 46.5 67 05 50 0.11 0.08 127.42+4.93 01 34 32.1 67 08 17 01 38 10.9 67 23 32 0.05 0.04 127.43+3.98 01 33 01.2 66 12 05 01 36 36.2 66 27 23 0.12 0.11 127.45�3.32 01 23 33.7 58 58 43 01 26 48.0 59 14 17 0.21 0.19 127.50�3.55 01 23 43.1 58 44 40 01 26 57.1 59 00 14 0.11 0.10 127.53�4.64 01 22 47.0 57 39 56 01 25 58.9 57 55 31 0.07 0.07 127.54�4.00 01 23 32.0 58 17 42 01 26 45.2 58 33 16 0.31 0.09 127.55+4.81 01 35 35.1 66 59 42 01 39 14.1 67 14 55 0.10 0.07 127.56�4.00 01 23 39.0 58 17 46 01 26 52.2 58 33 20 0.11 0.10 127.59�2.36 01 25 39.4 59 54 43 01 28 56.2 60 10 13 0.11 0.08 127.59�2.23 01 25 49.4 60 02 29 01 29 06.5 60 17 59 0.21 0.17 ZOAG G127.58-02.23 127.61�4.11 01 23 55.7 58 10 52 01 27 08.9 58 26 25 0.43 0.32 127.63+5.39 01 37 35.5 67 33 01 01 41 17.6 67 48 10 0.13 0.09 127.65�3.36 01 25 01.5 58 54 50 01 28 16.3 59 10 21 0.18 0.07 ZOAG G127.64-03.36 127.68+5.40 01 38 07.7 67 33 22 01 41 50.2 67 48 30 0.13 0.13 127.69�3.46 01 25 15.5 58 48 47 01 28 30.3 59 04 18 0.15 0.15 127.70�4.05 01 24 42.4 58 13 42 01 27 56.0 58 29 14 0.28 0.07 127.75+3.47 01 35 10.6 65 38 49 01 38 45.3 65 54 03 0.10 0.07 127.77�2.63 01 26 48.8 59 37 16 01 30 05.7 59 52 45 0.36 0.08 127.79+1.69 01 32 39.0 63 52 51 01 36 07.6 64 08 09 0.11 0.07 127.80�2.55 01 27 07.4 59 41 47 01 30 24.5 59 57 15 0.26 0.18 127.82+4.72 01 38 07.8 66 51 46 01 41 48.0 67 06 54 0.08 0.07

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 127.87�2.17 01 28 07.9 60 03 51 01 31 26.2 60 19 17 0.50 0.19 127.87�4.14 01 25 52.2 58 06 38 01 29 06.1 58 22 08 0.39 0.36 ZOAG G127.86-04.14 127.88+3.03 01 35 41.7 65 11 01 01 39 15.4 65 26 14 0.11 0.11 127.88�4.01 01 26 02.8 58 14 40 01 29 17.0 58 30 10 0.22 0.19 127.89�4.18 01 25 58.6 58 04 24 01 29 12.5 58 19 54 0.75 0.08 IRAS 01259+5804 127.91+4.86 01 39 20.5 66 58 36 01 43 01.8 67 13 42 0.15 0.08 127.92�1.21 01 29 42.0 60 59 54 01 33 02.8 61 15 18 0.36 0.07 127.96�4.09 01 26 37.0 58 08 48 01 29 51.3 58 24 17 0.08 0.07 127.97�2.85 01 28 02.9 59 22 29 01 31 19.9 59 37 55 0.19 0.15 128.04�2.75 01 28 42.5 59 27 58 01 31 60.0 59 43 23 0.20 0.19 128.09�4.64 01 26 57.5 57 35 04 01 30 11.1 57 50 32 0.42 0.35 ZOAG G128.08-04.64 128.16+1.42 01 35 31.1 63 33 28 01 39 00.5 63 48 41 0.19 0.09 WEIN 014 128.16�2.80 01 29 38.3 59 23 31 01 32 56.1 59 38 55 0.18 0.15 128.18�2.27 01 30 27.2 59 55 00 01 33 46.3 60 10 22 0.08 0.08 128.20�1.68 01 31 23.4 60 29 23 01 34 44.0 60 44 44 0.18 0.12 128.22�3.81 01 28 49.8 58 23 32 01 32 05.5 58 38 57 0.17 0.09 128.24�4.43 01 28 19.0 57 45 59 01 31 33.5 58 01 25 0.11 0.07 128.25+0.99 01 35 41.2 63 06 52 01 39 09.6 63 22 05 0.10 0.10 128.27�1.63 01 31 58.6 60 31 56 01 35 19.6 60 47 16 0.21 0.15 128.27�2.73 01 30 33.3 59 26 42 01 33 51.6 59 42 04 0.22 0.11 128.28�3.44 01 29 43.6 58 44 51 01 33 00.3 59 00 15 0.30 0.24 128.29�3.50 01 29 43.5 58 41 13 01 33 00.1 58 56 37 0.18 0.11 128.40+2.93 01 40 20.0 64 59 36 01 43 55.8 65 14 40 0.13 0.08 ZOAG G128.39+02.93 128.40�4.15 01 29 47.2 58 01 41 01 33 02.7 58 17 05 0.41 0.39 128.44+2.83 01 40 31.1 64 53 27 01 44 06.7 65 08 31 0.15 0.11 128.47+4.04 01 43 12.5 66 03 40 01 46 53.2 66 18 39 0.10 0.08 ZOAG G128.47+04.04a 128.48+4.04 01 43 13.3 66 03 49 01 46 54.0 66 18 48 0.11 0.10 ZOAG G128.47+04.04b 128.56�3.38 01 31 55.3 58 45 31 01 35 13.0 59 00 51 0.10 0.07 128.65�3.80 01 32 08.1 58 19 48 01 35 25.1 58 35 08 0.07 0.06 128.66�3.53 01 32 31.7 58 35 30 01 35 49.4 58 50 49 0.23 0.20 ZOAG G128.65-03.53 128.69�3.49 01 32 48.0 58 37 35 01 36 05.8 58 52 53 0.26 0.08 IRAS 01327+5837 128.71�1.62 01 35 31.9 60 27 37 01 38 54.4 60 42 50 0.36 0.34 128.72�4.21 01 32 03.8 57 54 43 01 35 20.1 58 10 03 0.11 0.11 IRAS 01320+5754 128.73+5.87 01 49 54.9 67 47 43 01 53 45.8 68 02 28 0.15 0.11 128.73+3.50 01 44 34.3 65 29 06 01 48 14.0 65 44 02 0.10 0.07 128.74�4.22 01 32 14.7 57 54 13 01 35 31.1 58 09 32 0.08 0.08 128.75+4.45 01 46 47.1 66 24 29 01 50 31.1 66 39 21 0.33 0.21 128.75�1.47 01 36 03.4 60 36 33 01 39 26.5 60 51 45 0.18 0.10 128.83�2.07 01 35 49.9 59 59 52 01 39 11.6 60 15 05 0.17 0.17 128.89�4.22 01 33 19.0 57 52 18 01 36 35.8 58 07 35 0.09 0.07 128.93�1.91 01 36 51.3 60 08 40 01 40 13.8 60 23 51 0.20 0.10 128.95�3.94 01 34 08.1 58 08 26 01 37 25.7 58 23 42 0.17 0.10 ZOAG G128.94-03.94 128.97�3.13 01 35 25.3 58 55 42 01 38 44.8 59 10 56 0.19 0.19 ZOAG G128.97-03.13 128.99�4.33 01 33 56.4 57 44 35 01 37 13.2 57 59 51 0.43 0.18 ZOAG G128.99-04.33 129.04+3.76 01 48 00.8 65 40 10 01 51 43.1 65 54 59 0.09 0.07 129.05+2.49 01 45 28.1 64 25 46 01 49 05.2 64 40 40 0.11 0.07 129.06�1.70 01 38 09.0 60 19 33 01 41 32.5 60 34 42 0.10 0.08 129.07�4.59 01 34 11.7 57 28 33 01 37 28.2 57 43 49 0.36 0.10 ZOAG G129.07-04.59 129.09+1.84 01 44 31.3 63 46 57 01 48 06.1 64 01 53 0.45 0.17 ZOAG G129.09+01.84 129.10+2.69 01 46 15.3 64 36 48 01 49 53.3 64 51 41 0.23 0.19 129.14�3.87 01 35 40.3 58 10 13 01 38 58.6 58 25 26 0.21 0.11 ZOAG G129.14-03.87 129.16+2.14 01 45 42.3 64 03 54 01 49 18.5 64 18 48 0.08 0.07 129.22+2.77 01 47 32.4 64 39 41 01 51 11.3 64 54 31 0.23 0.07 129.23+5.70 01 54 32.3 67 30 06 01 58 25.0 67 44 42 0.17 0.10 ZOAG G129.23+05.70 129.25�3.82 01 36 31.8 58 12 01 01 39 50.5 58 27 13 0.11 0.09 129.26�3.59 01 36 57.2 58 25 38 01 40 16.5 58 40 49 0.11 0.10 129.27+6.25 01 56 23.5 68 01 52 02 00 19.5 68 16 24 0.14 0.08 ZOAG G129.26+06.25 129.27+0.91 01 44 16.7 62 50 03 01 47 48.9 63 05 00 0.19 0.18 ZOAG G129.26+00.91 129.28�3.73 01 36 53.5 58 17 24 01 40 12.5 58 32 35 0.09 0.07 129.29+2.96 01 48 33.0 64 50 01 01 52 13.0 65 04 49 0.33 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 129.31+6.20 01 56 40.0 67 58 07 02 00 35.9 68 12 38 0.19 0.10 129.34+6.41 01 57 36.6 68 09 42 02 01 33.9 68 24 11 0.31 0.21 IRAS 01575+6809 129.36�3.51 01 37 47.7 58 29 06 01 41 07.5 58 44 15 0.17 0.07 ZOAG G129.35-03.51 129.39�3.84 01 37 33.6 58 09 22 01 40 52.7 58 24 32 0.19 0.11 129.40�3.00 01 38 52.8 58 58 39 01 42 14.0 59 13 46 0.20 0.08 129.42+6.39 01 58 21.9 68 07 10 02 02 19.5 68 21 37 0.22 0.22 IRAS 01583+6807 129.42�3.89 01 37 44.3 58 06 24 01 41 03.4 58 21 33 0.14 0.09 129.43+2.33 01 48 33.9 64 11 17 01 52 12.0 64 26 05 0.21 0.20 129.44+5.27 01 55 28.7 67 02 25 01 59 20.2 67 16 59 0.07 0.04 129.44�4.26 01 37 20.8 57 44 07 01 40 39.1 57 59 17 0.17 0.08 129.46+4.23 01 53 05.1 66 01 43 01 56 51.5 66 16 22 0.10 0.09 129.46+0.94 01 46 02.3 62 49 29 01 49 35.3 63 04 22 0.11 0.08 129.47�3.07 01 39 17.3 58 53 42 01 42 38.5 59 08 49 0.21 0.08 129.48�2.71 01 39 55.9 59 14 56 01 43 18.0 59 30 01 0.11 0.09 129.51+2.59 01 49 49.2 64 25 09 01 53 28.6 64 39 55 0.12 0.11 ZOAG G129.51+02.59 129.52+3.13 01 51 02.3 64 56 43 01 54 44.0 65 11 26 0.30 0.11 ZOAG G129.51+03.13 129.54�2.43 01 40 46.7 59 30 56 01 44 09.7 59 46 00 0.19 0.17 ZOAG G129.53-02.42 129.55+4.56: 01 54 45.8 66 19 17 01 58 34.2 66 33 52 0.28 0.22 PN G129.5+04.5 129.55+3.46 01 52 05.2 65 15 24 01 55 48.5 65 30 05 0.15 0.08 129.59+3.49 01 52 29.9 65 16 30 01 56 13.5 65 31 10 0.08 0.07 129.59�1.95 01 41 55.1 59 58 14 01 45 19.6 60 13 16 0.31 0.11 129.60�3.21 01 40 03.8 58 44 08 01 43 25.0 58 59 13 0.32 0.19 ZOAG G129.60-03.21 129.60�3.57 01 39 29.9 58 22 47 01 42 50.2 58 37 53 0.08 0.07 129.63+3.40 01 52 41.8 65 11 03 01 56 25.2 65 25 43 0.14 0.09 [WB92] 0152+6513 129.63�3.75 01 39 30.5 58 11 52 01 42 50.5 58 26 58 0.29 0.16 ZOAG G129.63-03.75 129.64+2.58 01 50 55.2 64 23 09 01 54 35.1 64 37 52 0.18 0.07 IRAS 01509+6423 129.64�3.60 01 39 47.1 58 20 30 01 43 07.5 58 35 36 0.11 0.10 129.65�2.35 01 41 48.5 59 33 56 01 45 12.1 59 48 58 0.11 0.09 129.67+3.65 01 53 39.3 65 24 47 01 57 24.0 65 39 25 0.10 0.07 ZOAG G129.66+03.65 129.67+3.82 01 54 05.5 65 34 29 01 57 50.9 65 49 06 0.15 0.11 ZOAG G129.67+03.82 129.68+4.16 01 54 58.7 65 54 03 01 58 45.8 66 08 38 0.16 0.07 ZOAG G129.68+04.16 129.68+3.79 01 54 06.5 65 32 40 01 57 51.8 65 47 17 0.10 0.08 129.69+5.42 01 58 21.5 67 06 59 02 02 15.0 67 21 26 0.16 0.06 IRAS 01584+6706 129.70+5.82 01 59 34.9 67 29 50 02 03 30.7 67 44 15 0.11 0.07 129.70+2.62 01 51 33.7 64 24 36 01 55 14.0 64 39 18 0.09 0.08 129.70�3.81 01 39 54.1 58 07 56 01 43 14.1 58 23 01 0.10 0.08 129.72+1.45 01 49 14.9 63 15 57 01 52 50.7 63 30 44 0.11 0.10 129.73�2.99 01 41 23.8 58 55 22 01 44 46.0 59 10 25 0.24 0.19 129.75+3.20 01 53 17.8 64 57 26 01 57 00.8 65 12 04 0.10 0.07 129.76+4.14 01 55 39.1 65 51 45 01 59 26.4 66 06 18 0.11 0.10 ZOAG G129.75+04.14 129.77+5.72 02 00 01.5 67 22 48 02 03 57.1 67 37 12 0.18 0.07 ZOAG G129.77+05.72 129.77+6.52 02 02 17.7 68 09 11 02 06 18.0 68 23 29 0.18 0.11 ZOAG G129.76+06.52 129.77+6.47 02 02 13.1 68 06 11 02 06 13.1 68 20 30 0.11 0.07 129.77�4.69 01 39 09.6 57 15 04 01 42 27.8 57 30 11 0.13 0.12 129.79+3.32 01 53 57.3 65 03 41 01 57 41.0 65 18 18 0.10 0.09 129.81+3.48 01 54 31.2 65 12 56 01 58 15.7 65 27 32 0.13 0.08 ZOAG G129.80+03.48 129.82�3.23 01 41 42.8 58 40 20 01 45 04.6 58 55 22 0.11 0.09 129.82�4.54 01 39 42.7 57 23 25 01 43 01.3 57 38 31 0.28 0.26 ZOAG G129.82-04.53 129.82�5.04 01 38 59.1 56 54 01 01 42 16.6 57 09 08 0.15 0.07 ZOAG G129.81-05.05 129.83+3.33 01 54 24.7 65 03 38 01 58 08.6 65 18 14 0.18 0.07 129.83�3.01 01 42 07.7 58 53 20 01 45 30.1 59 08 21 0.15 0.08 129.84+3.28 01 54 19.5 65 00 52 01 58 03.2 65 15 28 0.23 0.08 IRAS 01542+6500 129.84+2.72 01 53 01.9 64 27 56 01 56 43.2 64 42 35 0.18 0.09 129.86+3.66 01 55 29.1 65 22 41 01 59 14.7 65 37 15 0.09 0.08 129.86�1.26 01 45 16.0 60 35 15 01 48 43.3 60 50 10 0.42 0.15 WEIN 016 129.89+5.97 02 01 51.7 67 35 30 02 05 49.3 67 49 49 0.47 0.18 ZOAG G129.88+05.97 129.90+3.58 01 55 34.3 65 17 14 01 59 19.6 65 31 48 0.17 0.10 129.90�1.33 01 45 30.0 60 31 03 01 48 57.3 60 45 58 0.37 0.17 IRAS 01455+6031 129.91�3.35 01 42 10.7 58 32 04 01 45 32.5 58 47 05 0.09 0.08 129.91�4.11 01 41 00.4 57 47 26 01 44 20.3 58 02 29 0.15 0.09 ZOAG G129.91-04.11

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 129.92+3.60 01 55 51.3 65 18 13 01 59 36.8 65 32 46 0.11 0.08 129.93+3.60 01 55 56.8 65 18 07 01 59 42.4 65 32 40 0.20 0.11 IRAS 01559+6518 129.93�3.51 01 42 06.0 58 22 40 01 45 27.4 58 37 41 0.18 0.11 ZOAG G129.94-03.51 129.93�3.58 01 41 57.6 58 18 43 01 45 18.9 58 33 45 0.32 0.15 ZOAG G129.93-03.58 129.96+3.68 01 56 24.7 65 21 59 02 00 10.7 65 36 31 0.16 0.11 ZOAG G129.96+03.68 129.96�3.06 01 43 01.0 58 48 54 01 46 23.7 59 03 53 0.23 0.21 ZOAG G129.96-03.05 129.96�3.84 01 41 48.6 58 02 38 01 45 09.3 58 17 40 0.18 0.10 129.97+6.11 02 03 06.4 67 42 06 02 07 05.2 67 56 23 0.11 0.10 129.97�3.42 01 42 30.7 58 27 35 01 45 52.5 58 42 35 0.13 0.12 129.98+3.27 01 55 35.9 64 58 16 01 59 20.2 65 12 49 0.16 0.15 ZOAG G129.97+03.28 129.98+4.96 01 59 54.4 66 35 49 02 03 46.8 66 50 13 0.08 0.07 IRAS 01599+6636 130.00+3.61 01 56 39.0 65 17 28 02 00 24.9 65 31 59 0.12 0.11 ZOAG G130.00+03.61 130.00+3.60 01 56 36.0 65 16 52 02 00 21.9 65 31 23 0.24 0.10 ZOAG G130.00+03.60 130.00�3.56 01 42 31.4 58 18 36 01 45 52.9 58 33 36 0.15 0.10 130.01�2.86 01 43 40.7 58 59 53 01 47 04.0 59 14 51 0.09 0.07 130.03+3.63 01 56 54.3 65 18 09 02 00 40.4 65 32 40 0.11 0.09 ZOAG G130.02+03.63 130.09�3.97 01 42 34.4 57 53 28 01 45 55.1 58 08 28 0.18 0.15 ZOAG G130.09-03.97 130.10+3.36 01 56 54.8 65 01 21 02 00 40.0 65 15 52 0.10 0.08 130.10�4.87 01 41 15.4 57 00 30 01 44 34.0 57 15 33 0.22 0.10 130.11+3.24 01 56 45.1 64 54 21 02 00 29.8 65 08 52 0.11 0.09 130.11�3.05 01 44 07.5 58 47 17 01 47 30.6 59 02 14 0.22 0.08 130.11�4.34 01 42 08.5 57 31 30 01 45 28.4 57 46 31 0.13 0.08 ZOAG G130.11-04.34 130.13�2.89 01 44 33.7 58 56 30 01 47 57.3 59 11 26 0.12 0.09 130.14�2.05 01 46 05.2 59 45 23 01 49 31.1 60 00 16 0.18 0.11 130.16+3.91 01 58 52.1 65 31 56 02 02 40.1 65 46 22 0.09 0.07 130.17+0.49 01 51 06.6 62 13 36 01 54 40.6 62 28 19 0.07 0.06 IRAS 01511+6213 130.19+3.66 01 58 32.3 65 17 22 02 02 19.3 65 31 49 0.11 0.09 130.19�3.37 01 44 12.6 58 27 37 01 47 35.1 58 42 34 0.17 0.17 130.20+3.90 01 59 10.9 65 31 16 02 02 59.0 65 45 42 0.18 0.15 IRAS 01591+6531 130.20+4.00 01 59 25.3 65 36 34 02 03 13.9 65 50 59 0.21 0.12 130.22+3.43 01 58 14.3 65 03 42 02 02 00.3 65 18 10 0.43 0.11 130.23+6.63 02 07 22.2 68 07 46 02 11 25.5 68 21 53 0.15 0.07 130.23+3.21 01 57 45.1 64 50 18 02 01 30.1 65 04 47 0.10 0.08 130.24�4.19 01 43 19.7 57 39 05 01 46 40.3 57 54 04 0.58 0.44 ZOAG G130.24-04.18 130.25+0.21 01 51 12.3 61 56 06 01 54 45.6 62 10 49 0.17 0.16 130.25+3.70 01 59 10.3 65 18 43 02 02 57.7 65 33 09 0.12 0.11 130.27�3.46 01 44 39.7 58 21 33 01 48 02.2 58 36 29 0.09 0.07 130.28+4.95 02 02 50.5 66 30 12 02 06 44.3 66 44 29 0.08 0.07 130.29+1.65b 01 54 38.2 63 19 25 01 58 17.0 63 34 01 0.07 0.04 WEIN 017 130.29+1.65a 01 54 37.3 63 19 18 01 58 16.1 63 33 54 0.11 0.10 130.29+2.40 01 56 21.5 64 02 59 02 00 03.3 64 17 31 0.11 0.07 130.29�2.41 01 46 37.4 59 22 19 01 50 02.8 59 37 11 0.09 0.07 130.29�2.43 01 46 35.2 59 21 03 01 50 00.5 59 35 55 0.13 0.11 130.33�4.95 01 42 46.2 56 53 07 01 46 05.2 57 08 07 0.20 0.18 130.34+0.18 01 51 53.8 61 53 10 01 55 27.4 62 07 51 0.17 0.09 130.37�4.23 01 44 12.7 57 34 38 01 47 33.5 57 49 35 0.11 0.11 130.39+6.34 02 08 05.8 67 47 56 02 12 08.1 68 02 01 0.13 0.11 130.39�4.94 01 43 14.9 56 52 48 01 46 34.1 57 07 47 0.10 0.09 130.40+3.65 02 00 26.2 65 13 21 02 04 14.0 65 27 44 0.09 0.09 130.44�2.31 01 47 57.4 59 26 10 01 51 23.5 59 41 00 0.13 0.10 130.46+6.72 02 10 02.0 68 08 13 02 14 07.0 68 22 13 0.24 0.11 HFLLZOA A020 130.46+4.93 02 04 28.2 66 26 19 02 08 22.7 66 40 33 0.15 0.15 ZOAG G130.46+04.94 130.50+6.36 02 09 12.8 67 47 30 02 13 15.7 68 01 32 0.08 0.07 130.50+3.26 02 00 17.4 64 49 31 02 04 03.8 65 03 54 0.07 0.07 130.52+6.76 02 10 46.6 68 09 42 02 14 52.2 68 23 41 0.54 0.22 HFLLZOA A019 130.52+6.31 02 09 14.4 67 43 58 02 13 17.1 67 58 00 0.11 0.09 130.53�2.17 01 48 50.1 59 33 17 01 52 16.8 59 48 05 0.19 0.18 ZOAG G130.53-02.17 130.53�4.92 01 44 12.8 56 52 11 01 47 32.4 57 07 08 0.34 0.18 CGCG 559-002 130.56�4.64 01 44 56.3 57 08 16 01 48 16.6 57 23 12 0.11 0.10 130.56�4.59 01 44 58.2 57 11 38 01 48 18.7 57 26 34 0.09 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 130.57�4.64 01 44 57.1 57 08 31 01 48 17.5 57 23 27 0.10 0.07 130.57�4.66 01 44 57.1 57 06 49 01 48 17.4 57 21 45 0.10 0.09 130.60+5.95 02 08 56.0 67 21 51 02 12 56.9 67 35 54 0.20 0.11 130.62�4.71 01 45 12.4 57 03 34 01 48 32.7 57 18 29 0.15 0.14 130.63�4.92 01 44 55.5 56 50 57 01 48 15.3 57 05 53 0.13 0.10 130.65�4.36 01 46 00.2 57 23 25 01 49 21.4 57 38 19 0.10 0.10 130.66+6.59 02 11 35.5 67 57 20 02 15 40.6 68 11 17 0.10 0.07 130.67+6.57 02 11 37.8 67 55 58 02 15 42.8 68 09 55 0.11 0.08 130.67�3.46 01 47 40.4 58 15 51 01 51 04.0 58 30 41 0.14 0.11 130.67�4.02 01 46 40.5 57 43 19 01 50 02.6 57 58 11 0.12 0.07 130.70+5.78 02 09 21.4 67 10 46 02 13 21.7 67 24 48 0.14 0.08 130.70�2.14 01 50 15.4 59 32 34 01 53 42.7 59 47 19 0.08 0.08 130.71�4.81 01 45 43.0 56 56 39 01 49 03.3 57 11 33 0.11 0.07 130.72�3.23 01 48 23.8 58 28 31 01 51 48.1 58 43 20 0.11 0.08 130.72�4.19 01 46 48.5 57 32 28 01 50 10.3 57 47 20 0.21 0.18 ZOAG G130.72-04.19 130.73�4.05 01 47 07.5 57 40 37 01 50 29.7 57 55 28 0.13 0.11 130.74�4.63 01 46 14.6 57 06 25 01 49 35.4 57 21 18 0.11 0.09 130.76�3.62 01 48 02.0 58 05 32 01 51 25.4 58 20 22 0.40 0.11 ZOAG G130.76-03.62 130.77+0.92: 01 57 03.1 62 29 21 02 00 40.8 62 43 51 0.29 0.16 130.77�2.67 01 49 49.7 59 00 44 01 53 15.7 59 15 30 0.29 0.16 ZOAG G130.78-02.67 130.77�2.84 01 49 31.1 58 51 05 01 52 56.6 59 05 52 0.29 0.10 ZOAG G130.77-02.84 130.79+3.47 02 03 26.7 64 56 27 02 07 15.1 65 10 43 0.22 0.10 130.79�3.51 01 48 28.7 58 11 10 01 51 52.5 58 25 59 0.19 0.09 130.79�4.64 01 46 32.1 57 05 15 01 49 53.0 57 20 08 0.15 0.07 130.80�3.53 01 48 27.6 58 10 10 01 51 51.3 58 24 59 0.11 0.11 130.81�3.95 01 47 49.2 57 45 45 01 51 11.9 58 00 35 0.19 0.11 130.82+3.78 02 04 36.0 65 14 00 02 08 26.1 65 28 13 0.22 0.21 130.84�3.48 01 48 52.9 58 12 33 01 52 16.9 58 27 21 0.20 0.18 130.84�4.60 01 46 58.5 57 06 54 01 50 19.6 57 21 46 0.15 0.11 130.86�3.94 01 48 15.3 57 45 10 01 51 38.1 57 59 59 0.18 0.17 130.87�3.99 01 48 14.4 57 42 29 01 51 37.1 57 57 18 0.13 0.11 130.87�4.00 01 48 09.5 57 41 37 01 51 32.2 57 56 26 0.16 0.15 ZOAG G130.86-04.00 130.89+6.04 02 12 02.8 67 21 51 02 16 05.5 67 35 47 0.34 0.33 HFLLZOA A045 130.90�4.67 01 47 18.0 57 02 22 01 50 39.1 57 17 13 0.17 0.11 130.91�4.65 01 47 21.5 57 02 59 01 50 42.7 57 17 50 0.13 0.08 130.92�2.53 01 51 10.4 59 06 33 01 54 37.2 59 21 16 0.18 0.07 130.92�4.09 01 48 23.4 57 35 38 01 51 46.0 57 50 27 0.20 0.07 ZOAG G130.92-04.09 130.95+5.23 02 10 04.7 66 34 24 02 14 02.9 66 48 24 0.10 0.09 130.97+6.31 02 13 43.9 67 35 32 02 17 48.6 67 49 23 0.09 0.08 HFLLZOA A033 130.97�2.98 01 50 42.5 58 40 12 01 54 08.2 58 54 56 0.10 0.09 130.99+3.24 02 04 37.4 64 39 37 02 08 25.5 64 53 50 0.11 0.09 131.02+3.67 02 06 05.9 65 04 05 02 09 56.2 65 18 15 0.21 0.09 131.03+6.77 02 15 52.0 68 00 35 02 19 59.9 68 14 21 0.11 0.07 131.04+3.44 02 05 36.0 64 50 34 02 09 25.3 65 04 45 0.09 0.07 131.05�4.21 01 49 07.3 57 27 17 01 52 29.9 57 42 04 0.11 0.08 ZOAG G131.04-04.20 131.05�4.34 01 48 52.7 57 19 16 01 52 15.0 57 34 04 0.18 0.11 131.07�2.30 01 52 46.4 59 17 49 01 56 14.3 59 32 29 0.11 0.09 131.08+4.84 02 10 05.4 66 10 02 02 14 02.0 66 24 02 0.09 0.08 131.10�3.70 01 50 24.1 57 55 56 01 53 48.2 58 10 41 0.10 0.07 131.10�4.80 01 48 31.9 56 52 00 01 51 53.2 57 06 49 0.11 0.08 131.11+3.47 02 06 24.0 64 51 05 02 10 13.7 65 05 14 0.23 0.11 131.11+2.88 02 04 43.2 64 16 50 02 08 30.1 64 31 03 0.11 0.09 131.13+4.88 02 10 41.5 66 11 03 02 14 38.5 66 25 02 0.11 0.10 131.13+3.12 02 05 34.5 64 30 17 02 09 22.6 64 44 28 0.19 0.18 ZOAG G131.13+03.11 131.13�4.09 01 49 54.7 57 33 11 01 53 17.8 57 47 57 0.08 0.07 131.15�3.86 01 50 30.6 57 45 55 01 53 54.4 58 00 40 0.19 0.15 131.16+6.28 02 15 31.8 67 30 15 02 19 37.2 67 44 02 0.10 0.07 131.18+3.40 02 06 46.3 64 45 35 02 10 35.9 64 59 43 0.13 0.09 IRAS 02068+6445? 131.18�4.49 01 49 34.2 57 09 05 01 52 56.4 57 23 51 0.18 0.07 7C 0149+5708 131.19+3.40 02 06 50.4 64 45 50 02 10 40.0 64 59 58 0.10 0.07 IRAS 02068+6445?

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 131.22+5.55 02 13 38.8 66 47 55 02 17 40.0 67 01 47 0.12 0.12 131.23�2.27 01 54 01.7 59 17 26 01 57 30.1 59 32 03 0.20 0.09 ZOAG G131.23-02.27 131.23�4.73 01 49 32.7 56 54 00 01 52 54.5 57 08 47 0.09 0.09 131.25+4.49 02 10 33.3 65 46 59 02 14 28.7 66 00 58 0.09 0.07 131.25�3.50 01 51 50.8 58 05 51 01 55 15.8 58 20 33 0.19 0.07 ZOAG G131.24-03.49 131.26+3.28 02 07 11.2 64 37 10 02 11 00.5 64 51 17 0.07 0.07 131.26�3.55 01 51 50.2 58 02 19 01 55 15.1 58 17 01 0.14 0.08 131.27+6.13 02 16 05.8 67 19 41 02 20 10.7 67 33 27 0.09 0.08 131.27+3.49 02 07 50.7 64 49 04 02 11 41.1 65 03 10 0.10 0.09 131.27�3.97 01 51 10.1 57 37 40 01 54 33.9 57 52 23 0.20 0.07 131.29+4.56 02 11 10.9 65 49 58 02 15 06.8 66 03 56 0.20 0.07 131.30�3.45 01 52 19.7 58 07 41 01 55 45.0 58 22 22 0.30 0.10 ZOAG G131.30-03.45 131.30�4.39 01 50 39.3 57 13 14 01 54 02.1 57 27 58 0.19 0.08 131.31+2.85 02 06 25.3 64 12 04 02 10 12.8 64 26 13 0.15 0.09 131.32+4.61 02 11 35.8 65 52 05 02 15 32.1 66 06 02 0.35 0.20 IRAS 02115+6552 131.33+6.81 02 19 04.8 67 56 28 02 23 14.3 68 10 06 0.11 0.09 131.33+5.29 02 13 52.6 66 30 46 02 17 52.7 66 44 37 0.07 0.07 131.33+4.50 02 11 18.8 65 46 06 02 15 14.5 66 00 04 0.31 0.17 131.34+2.95 02 06 59.4 64 17 05 02 10 47.5 64 31 13 0.11 0.10 131.34�2.55 01 54 18.6 58 59 22 01 57 46.5 59 13 59 0.24 0.21 131.34�4.25 01 51 09.9 57 20 35 01 54 33.1 57 35 18 0.21 0.11 131.36�3.86 01 51 59.5 57 42 45 01 55 23.8 57 57 26 0.14 0.09 131.37�3.17 01 53 19.5 58 23 04 01 56 45.7 58 37 43 0.14 0.07 131.38+3.00 02 07 28.4 64 19 25 02 11 16.9 64 33 32 0.11 0.07 131.38+0.67 02 01 31.5 62 05 21 02 05 10.2 62 19 42 0.10 0.07 131.38�2.11 01 55 29.8 59 24 38 01 58 59.1 59 39 12 0.11 0.07 131.38�2.35 01 55 00.8 59 10 40 01 58 29.4 59 25 15 0.09 0.07 131.40�4.70 01 50 50.0 56 53 27 01 54 12.3 57 08 11 0.08 0.07 131.41+3.29 02 08 31.9 64 35 15 02 12 21.8 64 49 19 0.15 0.11 131.42+5.27 02 14 39.2 66 27 52 02 18 39.5 66 41 41 0.19 0.11 IRAS 02146+6627 131.42�4.16 01 51 54.0 57 24 57 01 55 17.7 57 39 39 0.10 0.08 131.42�4.19 01 51 52.3 57 22 49 01 55 15.9 57 37 31 0.36 0.18 ZOAG G131.42-04.18 131.43�3.13 01 53 50.8 58 24 22 01 57 17.3 58 39 00 0.26 0.07 131.46+3.16 02 08 34.9 64 26 59 02 12 24.4 64 41 03 0.21 0.12 131.46�4.62 01 51 23.3 56 57 33 01 54 45.9 57 12 16 0.08 0.08 131.47�4.61 01 51 25.3 56 57 31 01 54 47.9 57 12 14 0.07 0.07 131.48+6.30 02 18 39.8 67 25 01 02 22 46.6 67 38 40 0.09 0.07 HFLLZOA A044 131.48+2.72 02 07 35.6 64 01 10 02 11 23.1 64 15 16 0.18 0.12 IRAS 02075+6401 131.48�3.04 01 54 26.3 58 28 55 01 57 53.2 58 43 31 0.29 0.26 ZOAG G131.48-03.04 131.48�4.34 01 51 58.5 57 13 21 01 55 21.8 57 28 02 0.10 0.10 131.49+5.94 02 17 32.0 67 04 27 02 21 36.6 67 18 09 0.09 0.07 131.49+3.08 02 08 37.5 64 21 36 02 12 26.7 64 35 40 0.31 0.11 131.50+3.21 02 09 07.1 64 29 10 02 12 57.0 64 43 13 0.21 0.19 131.51+4.64 02 13 25.1 65 50 30 02 17 22.2 66 04 22 0.09 0.09 131.52+0.52 02 02 17.7 61 54 09 02 05 56.3 62 08 28 0.08 0.08 131.55�3.24 01 54 33.0 58 16 16 01 57 59.5 58 30 52 0.12 0.11 131.56+3.99 02 11 53.5 65 12 16 02 15 47.4 65 26 12 0.19 0.13 131.56+2.84 02 08 37.1 64 06 47 02 12 25.5 64 20 51 0.11 0.11 131.56�3.46 01 54 11.7 58 03 04 01 57 37.6 58 17 41 0.11 0.09 [WB92] 0154+5800 131.58+5.75 02 17 43.9 66 51 36 02 21 47.7 67 05 18 0.11 0.07 [WB92] 0217+6649 131.58�3.19 01 54 50.6 58 18 52 01 58 17.3 58 33 27 0.11 0.10 131.59+3.89 02 11 52.5 65 06 21 02 15 46.0 65 20 17 0.36 0.07 131.59+2.47 02 07 49.5 63 44 52 02 11 36.3 63 58 58 0.11 0.10 131.60+5.29 02 16 20.2 66 25 39 02 20 21.3 66 39 24 0.09 0.07 HFLLZOA A060 131.60+5.75 02 17 56.2 66 51 34 02 22 00.1 67 05 15 0.10 0.07 131.60+3.23 02 09 59.5 64 28 08 02 13 49.8 64 42 09 0.11 0.07 7C 0209+6427 131.60+2.42 02 07 48.3 63 41 53 02 11 34.9 63 55 59 0.11 0.09 131.61�2.11 01 57 14.8 59 20 41 02 00 44.7 59 35 11 0.21 0.08 131.62�3.19 01 55 09.2 58 18 07 01 58 36.0 58 32 42 0.09 0.07 131.62�3.39 01 54 45.8 58 06 43 01 58 12.0 58 21 19 0.14 0.14

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 131.63�3.00 01 55 36.4 58 28 56 01 59 03.8 58 43 30 0.15 0.11 131.64�3.35 01 54 59.4 58 08 46 01 58 25.8 58 23 21 0.11 0.09 131.65�2.62 01 56 30.8 58 50 46 01 59 59.3 59 05 18 0.10 0.07 131.66+5.15 02 16 26.3 66 16 38 02 20 26.9 66 30 23 0.10 0.07 131.67�3.48 01 54 59.2 58 00 10 01 58 25.3 58 14 45 0.13 0.09 131.70�2.39 01 57 21.0 59 03 14 02 00 50.3 59 17 44 0.15 0.10 131.70�4.03b 01 54 06.9 57 28 24 01 57 31.6 57 43 01 0.14 0.09 131.70�4.03a 01 54 06.9 57 28 14 01 57 31.6 57 42 51 0.14 0.07 131.71�3.21 01 55 46.2 58 15 43 01 59 13.2 58 30 16 0.22 0.20 ZOAG G131.70-03.20 131.72�4.60 01 53 16.6 56 54 52 01 56 39.9 57 09 31 0.11 0.09 131.73+3.49 02 11 55.4 64 40 41 02 15 47.4 64 54 37 0.32 0.31 ZOAG G131.72+03.49 131.74+0.94 02 05 08.4 62 14 35 02 08 49.3 62 28 47 0.09 0.09 131.74�3.03 01 56 21.3 58 25 27 01 59 48.8 58 39 59 0.11 0.07 131.74�3.58 01 55 17.9 57 53 42 01 58 43.9 58 08 16 0.09 0.08 131.75+1.50 02 06 35.7 62 46 40 02 10 18.8 63 00 49 0.10 0.09 131.76+3.32 02 11 40.1 64 30 33 02 15 31.4 64 44 30 0.18 0.11 131.77+1.57 02 06 55.2 62 50 09 02 10 38.7 63 04 17 0.19 0.09 131.79�3.40 01 55 59.5 58 03 26 01 59 26.1 58 17 59 0.23 0.18 131.81�4.42 01 54 10.8 57 04 00 01 57 34.7 57 18 37 0.19 0.09 131.82+5.14 02 17 56.4 66 12 29 02 21 57.5 66 26 10 0.09 0.07 131.82�4.29 01 54 29.8 57 11 18 01 57 54.1 57 25 54 0.58 0.30 V Zw 153 131.84�3.93 01 55 18.6 57 31 38 01 58 43.9 57 46 12 0.19 0.08 131.86+1.33 02 07 07.0 62 35 07 02 10 49.8 62 49 15 0.14 0.12 IRAS 02071+6235 131.87+6.29 02 22 28.1 67 16 20 02 26 36.4 67 29 49 0.23 0.09 HFLLZOA A043 131.87+5.45 02 19 25.8 66 29 19 02 23 28.9 66 42 56 0.11 0.10 131.89�4.17 01 55 15.6 57 16 56 01 58 40.4 57 31 31 0.08 0.07 131.90�4.17 01 55 19.9 57 17 00 01 58 44.7 57 31 34 0.16 0.10 131.91�4.34 01 55 04.2 57 07 10 01 58 28.6 57 21 45 0.09 0.09 ZOAG G131.90-04.33 131.91�4.61 01 54 33.7 56 51 07 01 57 57.4 57 05 43 0.31 0.10 IRAS 01545+5651 131.92�3.10 01 57 32.8 58 18 54 02 01 00.6 58 33 24 0.21 0.20 ZOAG G131.92-03.09 131.94�2.25 01 59 24.2 59 07 43 02 02 54.6 59 22 08 0.11 0.09 131.94�4.39 01 55 12.7 57 03 22 01 58 37.0 57 17 57 0.18 0.07 131.94�4.59 01 54 49.4 56 51 48 01 58 13.2 57 06 23 0.13 0.11 131.96+6.45 02 23 52.0 67 23 31 02 28 01.7 67 36 57 0.14 0.11 131.96�2.24 01 59 37.4 59 08 03 02 03 07.9 59 22 28 0.16 0.11 ZOAG G131.96-02.23 131.96�4.07 01 55 55.1 57 21 37 01 59 20.3 57 36 10 0.08 0.07 131.97+1.52 02 08 32.6 62 43 43 02 12 16.5 62 57 47 0.10 0.09 132.00�4.24 01 55 55.8 57 11 24 01 59 20.7 57 25 57 0.15 0.10 132.00�4.31 01 55 45.1 57 07 40 01 59 09.8 57 22 13 0.09 0.08 132.01+1.86 02 09 43.4 63 02 46 02 13 28.9 63 16 48 0.14 0.11 ZOAG G132.00+01.86 132.02+1.87 02 09 52.0 63 03 03 02 13 37.5 63 17 04 0.14 0.12 132.02�2.22 02 00 05.6 59 07 52 02 03 36.3 59 22 16 0.10 0.07 132.02�4.19 01 56 07.1 57 14 07 01 59 32.1 57 28 40 0.19 0.16 ZOAG G132.01-04.18 132.03�4.52 01 55 33.5 56 54 50 01 58 57.7 57 09 24 0.10 0.09 132.04�4.55 01 55 36.0 56 52 52 01 59 00.1 57 07 26 0.10 0.08 132.05+7.17 02 27 35.5 68 01 27 02 31 50.4 68 14 43 0.11 0.08 HFLLZOA A027 132.05+4.88 02 19 14.4 65 53 20 02 23 14.9 66 06 58 0.14 0.08 132.06�2.49 01 59 50.3 58 51 48 02 03 20.3 59 06 12 0.19 0.15 132.06�4.59 01 55 42.1 56 50 24 01 59 06.2 57 04 58 0.11 0.10 132.08+2.76 02 12 53.5 63 52 20 02 16 43.2 64 06 14 0.09 0.07 132.09�4.04 01 56 55.3 57 21 19 02 00 20.9 57 35 50 0.09 0.09 132.10+7.20 02 28 05.8 68 02 01 02 32 21.1 68 15 16 0.10 0.07 HFLLZOA A026 132.11�4.50 01 56 13.0 56 54 48 01 59 37.4 57 09 20 0.19 0.15 132.12+6.95 02 27 22.3 67 47 36 02 31 35.9 68 00 53 0.22 0.19 HFLLZOA A030 132.14+1.61 02 10 07.8 62 46 03 02 13 52.6 63 00 04 0.15 0.11 132.14�2.93 01 59 30.8 58 25 15 02 02 59.6 58 39 40 0.20 0.18 132.14�2.61 02 00 09.2 58 43 40 02 03 39.0 58 58 04 0.10 0.08 132.15+1.04 02 08 44.1 62 12 53 02 12 26.6 62 26 57 0.22 0.07 132.15+1.91 02 11 03.4 63 02 46 02 14 49.5 63 16 44 0.20 0.09 132.15�2.87 01 59 41.3 58 28 14 02 03 10.3 58 42 39 0.17 0.11 HFLLZOA C029

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 132.15�2.80 01 59 50.8 58 32 34 02 03 20.1 58 46 58 0.30 0.19 132.16+1.97 02 11 19.2 63 05 52 02 15 05.6 63 19 50 0.10 0.07 87GB 021118.2+630610 132.16�0.72 02 04 31.0 60 31 56 02 08 07.0 60 46 10 0.24 0.19 KR 138 132.17+2.00 02 11 31.0 63 07 49 02 15 17.6 63 21 46 0.11 0.08 132.18+4.06 02 17 41.9 65 04 20 02 21 38.3 65 18 02 0.24 0.19 132.18+3.47 02 15 49.1 64 30 44 02 19 42.5 64 44 31 0.13 0.11 132.18�3.95 01 57 44.7 57 25 33 02 01 10.7 57 40 02 0.08 0.07 132.18�4.00 01 57 40.9 57 22 41 02 01 06.8 57 37 10 0.13 0.13 ZOAG G132.18-03.99 132.19+5.14 02 21 22.5 66 04 45 02 25 24.9 66 18 17 0.20 0.19 HFLLZOA A068 132.19+3.50 02 16 03.9 64 32 23 02 19 57.5 64 46 09 0.44 0.22 ZOAG G132.19+03.50 132.20�3.91 01 57 57.6 57 27 22 02 01 23.8 57 41 51 0.10 0.08 132.21�4.08 01 57 42.0 57 17 38 02 01 07.8 57 32 07 0.10 0.07 132.22�3.29 01 59 22.3 58 02 50 02 02 50.3 58 17 16 0.09 0.07 132.22�3.92 01 58 05.8 57 26 25 02 01 32.0 57 40 53 0.18 0.07 132.24�3.42 01 59 12.8 57 55 11 02 02 40.5 58 09 37 0.20 0.10 132.27�2.61 02 01 07.7 58 41 33 02 04 37.8 58 55 55 0.22 0.07 132.29+2.02 02 12 32.8 63 06 46 02 16 19.8 63 20 41 0.10 0.07 132.31+7.13 02 29 54.5 67 53 48 02 34 10.1 68 06 58 0.37 0.26 132.33+3.80 02 18 09.0 64 46 41 02 22 04.6 65 00 22 0.31 0.20 HFLLZOA A096 132.33+2.06 02 13 00.1 63 07 51 02 16 47.4 63 21 45 0.20 0.09 132.34+7.07 02 30 00.1 67 49 47 02 34 15.4 68 02 56 0.22 0.15 HFLLZOA A028 132.34+0.35 02 08 31.2 61 30 32 02 12 11.6 61 44 36 0.11 0.10 132.34�3.02 02 00 46.5 58 16 53 02 04 15.6 58 31 15 0.13 0.11 132.34�3.93 01 58 56.0 57 23 55 02 02 22.5 57 38 22 0.07 0.07 132.40+1.69 02 12 31.9 62 45 52 02 16 17.8 62 59 47 0.10 0.07 132.42+6.97 02 30 19.3 67 42 22 02 34 34.2 67 55 31 0.18 0.15 HFLLZOA A029 132.42+5.51 02 24 47.3 66 20 49 02 28 52.7 66 34 13 0.11 0.07 132.42�2.82 02 01 47.3 58 26 54 02 05 17.1 58 41 14 0.56 0.07 132.42�4.42 01 58 31.9 56 54 30 02 01 57.2 57 08 57 0.19 0.15 ZOAG G132.41-04.42 132.44�1.94 02 03 49.3 59 17 11 02 07 21.9 59 31 26 0.30 0.29 132.45+6.21 02 27 42.2 66 59 24 02 31 52.1 67 12 40 0.11 0.07 132.45+3.40 02 18 00.2 64 21 44 02 21 54.2 64 35 25 0.11 0.10 132.45�2.98 02 01 40.2 58 17 19 02 05 09.6 58 31 39 0.18 0.09 132.45�3.38 02 00 50.7 57 53 53 02 04 19.0 58 08 15 0.46 0.43 MCG +10-04-001 132.48+4.71 02 22 32.2 65 34 26 02 26 33.1 65 47 55 0.19 0.19 PN G132.4+04.7 132.51+5.36 02 25 01.6 66 10 21 02 29 06.4 66 23 44 0.11 0.07 132.51�2.59 02 02 56.3 58 38 19 02 06 27.0 58 52 37 0.29 0.19 7C 0202+5837 132.51�3.88 02 00 13.4 57 24 00 02 03 40.4 57 38 24 0.18 0.09 132.52+3.38 02 18 32.4 64 18 45 02 22 26.5 64 32 25 0.10 0.07 132.52�2.55 02 03 03.7 58 40 45 02 06 34.6 58 55 02 0.38 0.29 HFLLZOA C028 132.54+3.85 02 20 12.1 64 44 53 02 24 08.6 64 58 29 0.15 0.12 ZOAG G132.54+03.85 132.54+3.57 02 19 19.1 64 29 14 02 23 14.2 64 42 52 0.18 0.07 132.57�3.68 02 01 02.5 57 34 43 02 04 30.2 57 49 05 0.15 0.10 132.59�3.21 02 02 13.5 58 01 40 02 05 42.6 58 15 59 0.37 0.14 ZOAG G132.59-03.20 132.65�4.33 02 00 20.6 56 56 00 02 03 46.7 57 10 23 0.20 0.20 132.67�3.23 02 02 45.3 57 59 05 02 06 14.5 58 13 23 0.15 0.15 ZOAG G132.67-03.23 132.70+7.13 02 33 43.7 67 44 40 02 38 00.7 67 57 39 0.10 0.09 HFLLZOA A024 132.75+6.72 02 32 29.2 67 20 51 02 36 43.5 67 33 54 0.17 0.10 132.75+6.11 02 30 03.5 66 47 00 02 34 13.7 67 00 09 0.09 0.09 HFLLZOA A053 132.75+4.70 02 24 56.5 65 28 07 02 28 58.3 65 41 30 0.14 0.08 132.75�3.20 02 03 24.2 57 59 18 02 06 53.7 58 13 35 0.18 0.10 132.78+3.68 02 21 44.0 64 30 20 02 25 40.4 64 43 52 0.11 0.09 IRAS 02217+6430 132.80+4.62 02 25 05.2 65 22 54 02 29 06.7 65 36 17 0.09 0.08 132.86+6.41 02 32 16.5 67 01 11 02 36 29.0 67 14 14 0.09 0.07 132.88+6.52 02 32 53.7 67 06 39 02 37 07.0 67 19 41 0.08 0.08 [WB92] 0233+6708? 132.89+6.55 02 33 11.1 67 08 18 02 37 24.7 67 21 19 0.10 0.09 87GB 023301.7+670807 132.89+6.11 02 31 25.9 66 43 44 02 35 36.6 66 56 50 0.11 0.10 HFLLZOA A052 132.89�3.21 02 04 22.2 57 56 40 02 07 52.0 58 10 54 0.19 0.13 132.91+5.15 02 27 58.4 65 49 39 02 32 03.2 66 02 54 0.20 0.09 HFLLZOA A067 132.92+4.48 02 25 39.2 65 12 19 02 29 40.2 65 25 40 0.10 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 132.93�3.15 02 04 46.4 57 59 13 02 08 16.4 58 13 26 0.18 0.11 132.95+6.24 02 32 26.9 66 49 54 02 36 38.6 67 02 57 0.11 0.09 132.95+4.45 02 25 50.6 65 10 08 02 29 51.6 65 23 29 0.22 0.19 HFLLZOA A081 132.97+6.06 02 31 57.4 66 38 58 02 36 08.0 66 52 02 0.09 0.08 132.98�2.99 02 05 29.8 58 07 44 02 09 00.4 58 21 56 0.19 0.07 133.03+6.30 02 33 27.6 66 50 52 02 37 39.9 67 03 52 0.09 0.07 133.07+5.55 02 30 52.0 66 08 26 02 34 59.7 66 21 33 0.11 0.09 133.07�3.49 02 05 04.1 57 36 58 02 08 33.4 57 51 11 0.07 0.07 133.09�3.10 02 06 00.8 57 59 16 02 09 31.3 58 13 27 0.10 0.10 133.10+3.48 02 23 51.6 64 12 18 02 27 47.9 64 25 44 0.10 0.09 133.13�4.08 02 04 12.1 57 02 26 02 07 39.9 57 16 41 0.18 0.11 133.14+7.68 02 40 19.8 68 04 05 02 44 42.2 68 16 46 0.11 0.07 133.16+2.37 02 20 47.6 63 09 01 02 24 38.7 63 22 35 0.10 0.07 133.18�2.51 02 07 59.3 58 31 29 02 11 31.8 58 45 35 0.19 0.09 133.19+2.76 02 22 17.8 63 30 08 02 26 10.8 63 43 38 0.11 0.09 IRAS 02222+6330 133.19�2.88 02 07 13.6 58 09 58 02 10 45.0 58 24 06 0.21 0.12 133.23�2.98 02 07 17.7 58 03 42 02 10 48.9 58 17 50 0.15 0.07 133.25+4.20 02 27 37.1 64 49 37 02 31 37.6 65 02 53 0.16 0.15 133.30+6.78 02 37 57.3 67 10 42 02 42 13.7 67 23 30 0.10 0.08 HFLLZOA A051 133.30�4.07 02 05 24.3 57 00 01 02 08 52.5 57 14 13 0.13 0.11 133.31�4.11 02 05 26.0 56 57 16 02 08 54.1 57 11 28 0.17 0.15 133.33�4.06 02 05 38.0 57 00 01 02 09 06.3 57 14 12 0.27 0.10 ZOAG G133.32-04.05 133.35+3.17 02 24 58.5 63 49 36 02 28 53.9 64 02 59 0.11 0.07 133.38�3.07 02 08 09.6 57 55 41 02 11 40.8 58 09 46 0.08 0.07 133.39+4.10 02 28 24.4 64 40 49 02 32 24.7 64 54 03 0.44 0.20 IRAS 02283+6440 133.40+3.30 02 25 48.7 63 56 04 02 29 44.9 64 09 25 0.08 0.07 133.42+2.52 02 23 28.0 63 12 07 02 27 20.5 63 25 34 0.11 0.08 133.49+2.32 02 23 22.8 62 58 58 02 27 14.5 63 12 25 0.11 0.08 133.50+2.54 02 24 09.8 63 11 16 02 28 02.6 63 24 41 0.10 0.07 133.50�4.11 02 06 42.8 56 53 50 02 10 11.3 57 07 59 0.12 0.11 133.53�2.27 02 11 08.1 58 38 31 02 14 42.2 58 52 29 0.11 0.10 133.55�3.23 02 09 02.2 57 43 20 02 12 33.3 57 57 23 0.09 0.07 133.55+2.49 02 24 24.2 63 07 41 02 28 16.9 63 21 06 0.11 0.08 133.60+6.66 02 40 11.8 66 56 44 02 44 28.2 67 09 25 0.07 0.07 133.61+3.36 02 27 45.0 63 54 58 02 31 42.1 64 08 14 0.19 0.18 HFLLZOA A108 133.62+5.90 02 37 12.8 66 14 43 02 41 24.3 66 27 33 0.09 0.09 133.63�3.62 02 08 44.8 57 19 39 02 12 14.9 57 33 43 0.41 0.40 ZOAG G133.63-03.61 133.64+3.33 02 27 54.2 63 52 26 02 31 51.2 64 05 41 0.10 0.07 133.64�3.85 02 08 17.8 57 06 16 02 11 47.3 57 20 21 0.16 0.09 133.65+3.56 02 28 50.8 64 05 00 02 32 49.0 64 18 13 0.21 0.19 HFLLZOA A106 133.65+7.92 02 46 20.8 68 03 49 02 50 46.4 68 16 12 0.13 0.11 133.70+3.29 02 28 16.2 63 48 55 02 32 13.2 64 02 09 0.22 0.15 133.75�2.57 02 12 02.7 58 17 21 02 15 36.3 58 31 17 0.09 0.08 133.75�2.56 02 12 01.3 58 18 18 02 15 34.9 58 32 14 0.10 0.07 133.76+3.35 02 29 02.0 63 50 45 02 32 59.4 64 03 57 0.09 0.07 133.76+4.42 02 32 47.3 64 50 26 02 36 50.4 65 03 28 0.08 0.07 133.76�2.56 02 12 06.8 58 17 45 02 15 40.5 58 31 41 0.34 0.09 133.76�2.57 02 12 04.1 58 17 22 02 15 37.7 58 31 18 0.10 0.08 133.82�3.98 02 09 14.1 56 55 53 02 12 43.6 57 09 56 0.21 0.07 133.82�4.06 02 09 03.4 56 51 15 02 12 32.6 57 05 18 0.09 0.07 133.83+3.36 02 29 38.0 63 49 49 02 33 35.7 64 03 00 0.09 0.07 133.84+3.40 02 29 48.1 63 51 40 02 33 46.0 64 04 50 0.38 0.21 IRAS 02297+6351 133.84+4.70 02 34 32.0 65 03 39 02 38 36.9 65 16 36 0.07 0.07 133.85+7.24 02 45 02.1 67 22 05 02 49 23.2 67 34 32 0.10 0.08 133.86�2.71 02 12 29.8 58 07 40 02 16 03.2 58 21 35 0.12 0.11 133.86�3.74 02 10 02.5 57 08 50 02 13 32.8 57 22 51 0.22 0.21 133.86�4.02 02 09 24.9 56 52 50 02 12 54.3 57 06 53 0.11 0.08 133.87�4.04 02 09 28.6 56 51 19 02 12 58.0 57 05 21 0.11 0.11 133.88+2.53 02 27 14.4 63 02 40 02 31 08.1 63 15 57 0.57 0.34 IRAS 02272+6302 133.92+4.11 02 33 05.2 64 29 27 02 37 07.0 64 42 28 0.20 0.12

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 133.93+3.20 02 29 57.1 63 38 24 02 33 54.2 63 51 34 0.11 0.11 133.94+5.30 02 37 43.8 65 34 19 02 41 52.5 65 47 07 0.11 0.09 133.96+2.61 02 28 10.2 63 05 24 02 32 04.5 63 18 39 0.09 0.07 133.97+6.44 02 42 40.4 66 35 44 02 46 56.3 66 48 18 0.08 0.07 133.97�1.77 02 15 34.7 58 58 45 02 19 11.4 59 12 33 0.14 0.08 133.98+4.11 02 33 31.9 64 27 58 02 37 33.9 64 40 58 0.24 0.23 HFLLZOA A103 133.98�3.69 02 11 03.2 57 09 10 02 14 33.9 57 23 09 0.11 0.09 133.99+6.70 02 43 59.7 66 49 16 02 48 17.4 67 01 46 0.09 0.08 134.03+4.67 02 36 02.2 64 57 20 02 40 07.4 65 10 13 0.45 0.20 IRAS 02359+6457 134.03+2.59 02 28 42.0 63 02 21 02 32 36.4 63 15 34 0.10 0.09 134.06+6.27 02 42 44.8 66 24 11 02 46 59.8 66 36 45 0.10 0.07 134.07�3.78 02 11 24.7 57 02 26 02 14 55.2 57 16 24 0.19 0.07 134.08+3.99 02 33 55.2 64 18 47 02 37 56.7 64 31 46 0.09 0.09 134.09+3.79 02 33 17.9 64 07 27 02 37 18.4 64 20 28 0.11 0.08 134.15+2.31 02 28 43.8 62 44 14 02 32 37.1 62 57 27 0.09 0.09 134.15�1.83 02 16 46.7 58 51 57 02 20 23.6 59 05 42 0.08 0.08 ZOAG G134.15-01.82 134.19+6.30 02 44 02.8 66 22 20 02 48 18.3 66 34 50 0.20 0.15 134.19�3.06 02 13 58.5 57 41 32 02 17 31.5 57 55 24 0.07 0.07 134.23+4.05 02 35 24.5 64 18 34 02 39 26.7 64 31 29 0.40 0.18 IRAS 02354+6418 134.23+4.06 02 35 29.1 64 19 29 02 39 31.4 64 32 24 0.12 0.11 ZOAG G134.22+04.06 134.24�3.45 02 13 25.4 57 17 52 02 16 57.3 57 31 45 0.11 0.08 134.27+2.22 02 29 24.4 62 36 35 02 33 17.6 62 49 47 0.08 0.08 134.28�1.90 02 17 30.6 58 45 17 02 21 07.5 58 59 00 0.22 0.20 WEIN 018 134.30+3.89 02 35 27.9 64 08 21 02 39 29.5 64 21 16 0.09 0.08 134.31�3.47 02 13 52.0 57 15 27 02 17 23.9 57 29 19 0.11 0.08 134.32+6.24 02 44 54.5 66 16 09 02 49 10.0 66 28 37 0.76 0.35 IRAS 02449+6616 134.33+3.40 02 33 58.6 63 40 23 02 37 57.7 63 53 22 0.10 0.07 134.33+8.32 02 54 41.9 68 07 24 02 59 12.3 68 19 22 0.10 0.09 134.33+8.20 02 54 05.8 68 00 52 02 58 35.2 68 12 52 0.10 0.08 134.34+5.16 02 40 38.5 65 16 37 02 44 47.3 65 29 17 0.12 0.08 134.37+5.17 02 40 56.5 65 16 41 02 45 05.4 65 29 20 0.09 0.07 134.37�3.86 02 13 18.9 56 52 16 02 16 49.8 57 06 09 0.09 0.08 HFLLZOA D007 134.38+5.37b 02 41 53.2 65 27 22 02 46 03.4 65 39 59 0.11 0.09 134.38+5.37a 02 41 52.7 65 27 10 02 46 02.9 65 39 47 0.08 0.08 134.39+6.48 02 46 33.1 66 26 58 02 50 50.3 66 39 21 0.18 0.09 134.44+2.35 02 31 14.2 62 40 01 02 35 08.4 62 53 08 0.22 0.08 134.48+6.44 02 47 11.2 66 22 31 02 51 28.3 66 34 52 0.11 0.07 134.48+3.01 02 33 47.4 63 15 12 02 37 44.9 63 28 12 0.23 0.11 134.50+3.96 02 37 25.6 64 07 23 02 41 28.0 64 20 12 0.43 0.08 HFLLZOA A104 134.52+3.04 02 34 13.2 63 16 06 02 38 10.9 63 29 04 0.15 0.14 134.52�2.31 02 18 10.3 58 17 12 02 21 46.3 58 30 53 0.10 0.10 134.54�1.32 02 20 59.2 59 12 33 02 24 38.7 59 26 07 0.13 0.11 134.55+2.66 02 33 09.2 62 54 35 02 37 05.1 63 07 36 0.33 0.22 134.56+6.62 02 48 45.5 66 29 49 02 53 04.0 66 42 05 0.11 0.10 134.57+3.30 02 35 32.0 63 29 20 02 39 31.1 63 42 15 0.09 0.08 134.63�1.90 02 20 02.0 58 38 10 02 23 39.6 58 51 46 0.15 0.09 134.64+8.11 02 56 30.9 67 47 19 03 01 00.3 67 59 12 0.11 0.10 134.65+3.06b 02 35 22.6 63 13 52 02 39 20.7 63 26 47 0.11 0.08 134.65+3.06a 02 35 21.4 63 14 13 02 39 19.5 63 27 08 0.09 0.08 134.68+5.93 02 46 48.7 65 49 51 02 51 03.0 66 02 13 0.22 0.18 134.69+5.52 02 45 07.9 65 27 23 02 49 19.6 65 39 50 0.14 0.14 134.71+4.70 02 41 59.5 64 42 30 02 46 06.5 64 55 06 0.27 0.14 ZOAG G134.70+04.70 134.72+7.68 02 55 09.5 67 22 31 02 59 35.8 67 34 28 0.11 0.08 134.74+7.67 02 55 16.4 67 21 27 02 59 42.7 67 33 23 0.10 0.07 134.77+3.69 02 38 37.7 63 45 48 02 42 39.3 63 58 34 0.15 0.08 134.84+8.67 03 01 14.6 68 11 27 03 05 48.8 68 23 05 0.19 0.11 134.84�2.35 02 20 22.9 58 08 39 02 23 59.4 58 22 14 0.19 0.08 134.85+7.68 02 56 19.8 67 18 53 03 00 46.4 67 30 46 0.09 0.07 134.88+4.05 02 40 52.0 64 02 57 02 44 55.7 64 15 37 0.09 0.07 134.88+6.44 02 50 46.3 66 11 59 02 55 04.3 66 24 09 0.77 0.46 MCG +11-04-003

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 134.89+6.62 02 51 43.6 66 21 18 02 56 02.8 66 33 25 0.09 0.08 134.91+8.73 03 02 15.8 68 11 57 03 06 50.6 68 23 31 0.11 0.09 134.92�3.35 02 18 22.2 57 10 40 02 21 55.7 57 24 21 0.24 0.10 134.93+3.51 02 39 14.6 63 32 15 02 43 15.6 63 44 59 0.11 0.07 134.95+2.03 02 34 14.0 62 10 02 02 38 07.8 62 23 00 0.15 0.11 135.00+0.32 02 29 05.5 60 34 10 02 32 52.1 60 47 23 0.15 0.11 135.04+6.84 02 53 58.7 66 29 09 02 58 19.7 66 41 10 0.18 0.18 135.09+7.25 02 56 23.3 66 49 22 03 00 47.2 67 01 15 0.09 0.08 135.10+7.10 02 55 42.3 66 40 53 03 00 05.1 66 52 48 0.12 0.10 135.13+6.74 02 54 19.8 66 20 53 02 58 40.2 66 32 52 0.10 0.07 135.14+3.32 02 40 14.5 63 16 20 02 44 14.9 63 29 01 0.21 0.07 135.14�2.25 02 22 46.0 58 07 48 02 26 23.4 58 21 17 0.19 0.15 135.15+8.09 03 01 07.8 67 31 39 03 05 38.0 67 43 17 0.09 0.07 135.15+7.01 02 55 44.9 66 34 46 03 00 07.2 66 46 41 0.22 0.20 135.16+8.25 03 01 58.0 67 39 54 03 06 29.4 67 51 30 0.21 0.09 135.18+8.43 03 03 05.2 67 48 42 03 07 38.0 68 00 14 0.12 0.07 135.18+5.58 02 49 37.6 65 17 53 02 53 50.7 65 30 07 0.29 0.19 HFLLZOA A079 135.19+6.42 02 53 26.0 66 02 28 02 57 44.5 66 14 30 0.12 0.08 7C 0253+6602 135.19+2.70 02 38 25.2 62 41 14 02 42 22.6 62 54 01 0.81 0.80 87GB 023825.5+624056 135.24+7.86 03 00 43.5 67 17 08 03 05 12.1 67 28 47 0.10 0.09 135.25+7.62 02 59 38.2 67 04 27 03 04 05.1 67 16 10 0.21 0.15 135.26+5.90 02 51 42.1 65 32 49 02 55 57.4 65 44 57 0.11 0.08 135.27+8.80 03 05 55.8 68 05 14 03 10 31.7 68 16 37 0.09 0.07 135.28+6.09 02 52 41.9 65 42 17 02 56 58.4 65 54 21 0.11 0.11 HFLLZOA A064 135.29+7.75 03 00 36.3 67 09 50 03 05 04.1 67 21 30 0.11 0.10 135.36+3.24 02 41 42.5 63 06 37 02 45 42.9 63 19 14 0.19 0.08 135.40+7.63 03 01 01.6 67 00 31 03 05 28.8 67 12 10 0.07 0.07 135.42+7.17 02 58 54.5 66 35 53 03 03 18.4 66 47 38 0.33 0.09 135.45+7.76 03 02 04.7 67 05 28 03 06 32.8 67 17 03 0.10 0.07 135.46+6.48 02 56 01.9 65 57 58 03 00 21.2 66 09 52 0.21 0.10 135.46+2.08 02 38 19.4 62 00 40 02 42 14.4 62 13 27 0.20 0.10 135.47+8.75 03 07 26.0 67 56 41 03 12 01.8 68 07 59 0.10 0.07 HFLLZOA G135.46+08.75 135.47+8.51 03 06 10.3 67 43 49 03 10 44.1 67 55 11 0.21 0.11 135.47+8.52 03 06 10.5 67 44 28 03 10 44.4 67 55 50 0.18 0.10 135.47+2.09 02 38 29.3 62 00 59 02 42 24.4 62 13 46 0.11 0.11 HFLLZOA G135.47+02.08 135.48+7.94 03 03 17.9 67 14 12 03 07 47.5 67 25 43 0.36 0.35 HFLLZOA A038 135.50+3.10 02 42 21.4 62 55 27 02 46 21.4 63 08 02 0.11 0.07 135.51+4.55 02 48 04.2 64 13 55 02 52 11.9 64 26 14 0.20 0.09 135.52+3.00 02 42 05.7 62 49 33 02 46 05.2 63 02 09 0.10 0.10 135.53+8.69 03 07 38.3 67 51 35 03 12 13.6 68 02 52 0.22 0.10 HFLLZOA G135.53+08.69 135.53�1.83 02 26 39.8 58 22 53 02 30 19.3 58 36 12 0.08 0.07 135.54+6.92 02 58 46.5 66 18 56 03 03 08.9 66 30 42 0.21 0.11 135.55+9.04 03 09 46.3 68 08 54 03 14 24.5 68 20 04 0.14 0.09 135.56+8.67 03 07 53.2 67 49 44 03 12 28.5 68 01 01 0.13 0.12 135.56+4.29 02 47 23.2 63 58 34 02 51 29.6 64 10 55 0.09 0.08 135.57+8.63 03 07 44.2 67 47 13 03 12 19.1 67 58 30 0.19 0.18 HFLLZOA A022 135.57+8.66a 03 07 48.5 67 48 47 03 12 23.6 68 00 04 0.20 0.19 HFLLZOA G135.56+08.65 135.57+8.66b 03 07 51.5 67 49 10 03 12 26.7 68 00 27 0.19 0.13 135.57+6.17 02 55 29.0 65 38 35 02 59 46.5 65 50 31 0.21 0.20 135.58+9.00 03 09 51.9 68 06 14 03 14 29.8 68 17 24 0.19 0.16 HFLLZOA A012 135.58+7.13 03 00 07.0 66 28 49 03 04 30.9 66 40 31 0.19 0.11 135.58+6.54 02 57 17.8 65 57 53 03 01 37.7 66 09 43 0.14 0.10 135.58+4.09 02 46 46.2 63 47 20 02 50 51.5 63 59 42 0.07 0.07 135.60+8.33 03 06 21.3 67 30 53 03 10 53.9 67 42 15 0.13 0.08 135.60+6.32 02 56 28.6 65 45 20 03 00 47.1 65 57 13 0.13 0.11 135.60�1.85 02 27 08.7 58 19 55 02 30 48.3 58 33 13 0.14 0.13 135.61+9.14 03 10 53.7 68 12 00 03 15 32.8 68 23 07 0.22 0.21 HFLLZOA A011 135.63+6.74 02 58 43.6 66 07 09 03 03 05.0 66 18 55 0.23 0.08 135.63+2.77 02 42 08.2 62 34 20 02 46 06.8 62 46 56 0.20 0.18 IRAS 02421+6233? 135.64+2.75: 02 42 10.1 62 33 06 02 46 08.7 62 45 42 0.21 0.18

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 135.65�2.69 02 25 11.1 57 31 49 02 28 47.9 57 45 12 0.21 0.10 135.66+8.65 03 08 39.9 67 45 24 03 13 15.1 67 56 38 0.09 0.07 135.67+3.33 02 44 32.1 63 03 58 02 48 33.6 63 16 27 0.17 0.11 135.67�3.61 02 22 51.8 56 39 59 02 26 25.7 56 53 28 0.14 0.11 ZOAG G135.66-03.61 135.68+8.96 03 10 30.2 68 00 44 03 15 07.9 68 11 52 0.08 0.07 135.68+8.58 03 08 25.8 67 41 40 03 13 00.5 67 52 55 0.83 0.22 HFLLZOA G135.67+08.58 135.68+2.40 02 41 13.5 62 12 35 02 45 10.4 62 25 14 0.08 0.07 135.68�1.84 02 27 43.6 58 18 43 02 31 23.3 58 31 59 0.08 0.08 135.69�2.71 02 25 23.2 57 29 58 02 29 00.0 57 43 21 0.11 0.10 135.71�3.78 02 22 39.9 56 29 43 02 26 13.4 56 43 13 0.15 0.14 ZOAG G135.70-03.79 135.72�3.56 02 23 19.7 56 41 56 02 26 53.9 56 55 24 0.07 0.07 135.73+6.55 02 58 40.6 65 53 59 03 03 00.8 66 05 45 0.11 0.11 87GB 025841.3+655423 135.78+6.80 03 00 15.8 66 05 35 03 04 37.7 66 17 16 0.08 0.08 135.78+3.10 02 44 36.6 62 48 29 02 48 37.2 63 00 58 0.13 0.12 ZOAG G135.78+03.10 135.78�3.22 02 24 40.8 56 59 45 02 28 16.2 57 13 09 0.13 0.08 135.78�3.04 02 25 05.5 57 09 52 02 28 41.4 57 23 15 0.32 0.18 ZOAG G135.77-03.04 135.79�0.24: 02 33 16.7 59 45 15 02 37 02.5 59 58 16 0.11 0.11 135.80+4.32 02 49 28.9 63 53 41 02 53 35.8 64 05 55 0.14 0.08 135.80+3.19 02 45 02.5 62 52 26 02 49 03.5 63 04 54 0.22 0.19 ZOAG G135.79+03.18 135.81+2.98 02 44 21.7 62 41 11 02 48 21.7 62 53 41 0.20 0.07 135.81+2.73 02 43 23.8 62 27 18 02 47 22.5 62 39 50 0.47 0.21 HFLLZOA C011 135.82+8.31 03 08 16.4 67 23 22 03 12 49.2 67 34 37 0.27 0.11 135.82+6.72 03 00 10.6 66 00 26 03 04 32.1 66 12 07 0.11 0.07 135.82+6.50 02 59 09.7 65 48 40 03 03 29.7 66 00 25 0.18 0.09 135.82+6.40 02 58 39.0 65 43 36 03 02 58.3 65 55 22 0.11 0.10 135.83+9.01 03 12 09.7 67 58 31 03 16 47.9 68 09 34 0.24 0.19 HFLLZOA A021 135.83+9.00 03 12 05.7 67 58 12 03 16 43.9 68 09 15 0.11 0.07 135.83+6.31 02 58 23.2 65 38 26 03 02 42.0 65 50 13 0.10 0.08 135.84�4.11 02 22 44.8 56 08 37 02 26 17.5 56 22 07 0.11 0.11 135.86+8.14 03 07 39.0 67 13 13 03 12 10.5 67 24 30 0.58 0.34 IRAS 03076+6712 135.86+3.65 02 47 17.9 63 15 46 02 51 21.3 63 28 07 0.09 0.09 135.86�0.86 02 31 52.2 59 09 30 02 35 35.8 59 22 35 0.11 0.10 MB 1 135.87�0.55 02 32 52.5 59 26 24 02 36 37.3 59 39 26 1.89 1.22 Maffei 1 135.89+9.11 03 13 13.6 68 01 51 03 17 52.7 68 12 50 0.22 0.21 135.89+8.46 03 09 39.1 67 28 46 03 14 13.1 67 39 57 0.10 0.09 135.89+3.42 02 46 40.0 63 02 45 02 50 42.3 63 15 08 0.21 0.10 135.89+3.30 02 46 10.6 62 56 07 02 50 12.3 63 08 31 0.18 0.14 ZOAG G135.88+03.29 135.89+3.21 02 45 50.5 62 51 43 02 49 51.8 63 04 08 0.15 0.13 ZOAG G135.88+03.21 135.90+6.20 02 58 27.9 65 30 44 03 02 46.1 65 42 31 0.10 0.09 135.90�2.25 02 28 06.4 57 51 03 02 31 45.1 58 04 18 0.19 0.19 IRAS 02280+5751 135.91+8.84 03 11 54.3 67 47 41 03 16 31.3 67 58 44 0.11 0.08 135.92+2.25 02 42 32.2 61 58 18 02 46 28.8 62 10 53 0.10 0.07 135.92�1.26: 02 31 04.7 58 46 04 02 34 46.9 58 59 11 0.12 0.09 135.92�1.66 02 29 56.0 58 23 28 02 33 36.8 58 36 38 0.18 0.14 IRAS 02299+5823 135.93+3.84 02 48 35.6 63 24 33 02 52 40.2 63 36 50 0.22 0.09 HFLLZOA A110 135.95+4.32 02 50 42.4 63 49 17 02 54 49.6 64 01 28 0.10 0.10 135.96�2.57 02 27 40.2 57 32 08 02 31 17.9 57 45 25 0.22 0.14 135.98+2.13 02 42 34.8 61 50 11 02 46 31.0 62 02 46 0.08 0.08 135.98�2.70 02 27 23.9 57 24 10 02 31 01.2 57 37 27 0.10 0.07 136.00+6.66 03 01 27.6 65 52 09 03 05 48.9 66 03 46 0.20 0.08 136.00+4.40 02 51 24.9 63 52 27 02 55 32.6 64 04 36 0.12 0.11 136.01+9.25 03 15 05.2 68 05 11 03 19 45.5 68 16 04 0.07 0.07 136.02+9.26 03 15 18.4 68 05 36 03 19 58.9 68 16 28 0.11 0.07 136.02+6.97 03 03 08.3 66 07 59 03 07 31.8 66 19 31 0.10 0.10 136.03+3.23 02 47 00.0 62 48 54 02 51 01.6 63 01 16 0.11 0.08 136.03�4.17 02 23 49.2 56 01 02 02 27 22.0 56 14 29 0.22 0.08 136.04+9.22 03 15 10.1 68 02 44 03 19 50.2 68 13 37 0.11 0.09 136.04+8.20 03 09 33.9 67 10 45 03 14 06.1 67 21 56 0.24 0.08 HFLLZOA A036 136.06+8.03 03 08 48.9 67 01 43 03 13 19.9 67 12 57 0.11 0.09 136.08�3.32 02 26 26.6 56 47 37 02 30 02.1 57 00 57 0.24 0.10

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 136.11+8.05 03 09 22.5 67 01 12 03 13 53.7 67 12 24 0.08 0.08 136.13+8.16 03 10 12.1 67 06 10 03 14 44.1 67 17 19 0.11 0.10 136.13+7.91 03 08 49.5 66 53 29 03 13 19.7 67 04 43 0.35 0.19 136.15+6.06 02 59 54.8 65 16 14 03 04 12.5 65 27 56 0.11 0.08 136.17�1.21 02 33 01.5 58 42 27 02 36 44.3 58 55 29 0.11 0.08 136.20�4.73 02 23 35.2 55 26 10 02 27 06.6 55 39 37 0.22 0.22 ZOAG G136.20-04.73 136.22+8.99 03 15 26.5 67 45 29 03 20 04.9 67 56 21 0.10 0.07 136.24�4.23 02 25 05.9 55 53 14 02 28 38.8 56 06 37 0.20 0.09 136.25+7.19 03 06 11.2 66 12 37 03 10 36.5 66 23 59 0.11 0.08 136.25+4.16 02 52 25.8 63 32 48 02 56 32.6 63 44 54 0.11 0.09 136.26+8.95 03 15 35.2 67 42 27 03 20 13.4 67 53 18 0.10 0.07 136.26�3.65 02 26 46.5 56 25 03 02 30 21.2 56 38 22 0.32 0.14 136.27�4.21 02 25 19.5 55 53 49 02 28 52.5 56 07 12 0.11 0.10 136.28�1.91 02 31 41.7 58 01 24 02 35 22.2 58 14 30 0.15 0.09 WEIN 020 136.31+8.93 03 15 57.3 67 39 54 03 20 35.4 67 50 44 0.23 0.19 HFLLZOA G136.31+08.94 136.32+3.33 02 49 40.9 62 46 47 02 53 43.5 62 59 01 0.20 0.08 136.32+2.91 02 48 03.5 62 23 43 02 52 04.0 62 36 02 0.18 0.10 136.34+8.19 03 12 08.8 67 01 16 03 16 41.3 67 12 19 0.33 0.22 HFLLZOA A035 136.34+4.58 02 54 54.5 63 52 44 02 59 03.7 64 04 42 0.11 0.07 136.39+2.27: 02 46 10.2 61 47 41 02 50 07.7 62 00 05 0.45 0.35 IRAS 02461+6147 136.39�5.04 02 24 00.3 55 04 35 02 27 31.1 55 18 01 0.18 0.08 136.41+6.64 03 04 50.4 65 39 00 03 09 12.1 65 50 27 0.10 0.07 136.41+5.99 03 01 46.3 65 05 00 03 06 03.9 65 16 36 0.34 0.14 HFLLZOA A087 136.42+7.31 03 08 12.6 66 13 44 03 12 38.9 66 25 00 0.09 0.08 136.42+6.21 03 02 51.8 65 15 59 03 07 10.8 65 27 32 0.58 0.22 IRAS 03028+6516? 136.44+5.57 03 00 00.6 64 42 13 03 04 15.7 64 53 55 0.47 0.19 HFLLZOA A088 136.45+6.89 03 06 23.4 65 50 35 03 10 46.8 66 01 57 0.10 0.08 136.45+6.26 03 03 20.2 65 18 02 03 07 39.6 65 29 34 0.45 0.20 HFLLZOA A074 136.46+6.46 03 04 24.8 65 28 16 03 08 45.5 65 39 44 0.66 0.57 IRAS 03044+6528 136.46+6.16 03 02 57.4 65 12 46 03 07 16.2 65 24 19 0.11 0.09 136.48+6.56 03 05 01.5 65 32 29 03 09 22.8 65 43 55 0.29 0.21 HFLLZOA A072 136.50+8.00 03 12 25.9 66 46 24 03 16 57.1 66 57 26 0.24 0.22 HFLLZOA A050 136.50+5.98 03 02 24.9 65 02 15 03 06 42.6 65 13 49 0.09 0.07 136.51�0.33 02 38 09.4 59 23 24 02 41 56.0 59 36 12 0.69 0.43 Maffei 2 136.51�3.69 02 28 19.5 56 17 39 02 31 54.5 56 30 54 0.15 0.15 ZOAG G136.50-03.69 136.52�3.49 02 28 56.6 56 28 33 02 32 32.2 56 41 46 0.28 0.11 136.53+6.72 03 06 13.1 65 39 27 03 10 35.5 65 50 49 0.24 0.12 136.53+6.51 03 05 09.5 65 28 33 03 09 30.5 65 39 59 0.22 0.07 136.54+6.59 03 05 41.9 65 32 28 03 10 03.5 65 43 52 0.18 0.10 136.54�3.48 02 29 04.4 56 28 15 02 32 40.1 56 41 28 0.14 0.12 136.55+4.20 02 55 00.2 63 26 35 02 59 07.6 63 38 33 0.10 0.10 136.56+6.49 03 05 21.2 65 26 53 03 09 42.2 65 38 18 0.21 0.08 136.56+4.79 02 57 35.7 63 57 34 03 01 46.4 64 09 24 0.20 0.09 136.56+5.00 02 58 29.8 64 08 56 03 02 41.7 64 20 43 0.41 0.28 HFLLZOA A100 136.56�3.23 02 29 53.1 56 42 05 02 33 29.6 56 55 16 0.41 0.09 ZOAG G136.55-03.23 136.59�2.20 02 33 03.0 57 38 18 02 36 43.0 57 51 20 0.11 0.07 136.60+6.50 03 05 40.5 65 26 12 03 10 01.5 65 37 36 0.10 0.08 136.61+7.17 03 09 05.8 66 00 09 03 13 31.3 66 11 22 0.26 0.13 136.61�3.24 02 30 12.9 56 39 52 02 33 49.4 56 53 02 0.19 0.11 HFLLZOA G136.61-03.25 136.61�3.68 02 29 00.7 56 15 56 02 32 35.9 56 29 09 0.11 0.07 136.63+7.30 03 09 56.0 66 06 14 03 14 22.4 66 17 24 0.15 0.15 136.63+4.07 02 55 07.4 63 17 25 02 59 14.3 63 29 22 0.13 0.11 136.63�4.60 02 26 41.2 55 24 20 02 30 13.6 55 37 39 0.26 0.11 136.64+9.39 03 21 32.3 67 52 06 03 26 14.2 68 02 37 0.11 0.09 136.64�1.03 02 36 52.1 58 41 18 02 40 36.3 58 54 09 0.20 0.12 136.65+7.95 03 13 33.0 66 39 13 03 18 04.0 66 50 11 0.14 0.10 HFLLZOA A049 136.67+9.22 03 20 47.5 67 42 42 03 25 28.1 67 53 16 0.09 0.09 136.67+7.96 03 13 42.4 66 38 45 03 18 13.4 66 49 43 0.46 0.43 HFLLZOA A048 136.67+6.90 03 08 14.5 65 45 02 03 12 38.3 65 56 18 0.11 0.10 136.67+6.03 03 04 02.6 64 59 47 03 08 20.8 65 11 16 0.11 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 136.68+7.17 03 09 41.6 65 58 17 03 14 07.1 66 09 28 0.11 0.11 136.71+9.40 03 22 08.6 67 50 18 03 26 50.6 68 00 47 0.10 0.08 136.72+8.51 03 17 07.4 67 05 03 03 21 42.5 67 15 49 0.11 0.11 136.74+6.48 03 06 46.7 65 20 58 03 11 07.8 65 32 18 0.10 0.09 HFLLZOA A071 136.74�5.74 02 24 33.6 54 18 00 02 28 03.0 54 31 25 0.22 0.10 136.76�3.61 02 30 13.4 56 16 09 02 33 49.0 56 29 19 0.21 0.07 136.77�4.25 02 28 31.6 55 40 27 02 32 05.2 55 53 41 0.21 0.09 136.79+7.95 03 14 41.6 66 34 32 03 19 12.6 66 45 26 0.24 0.08 HFLLZOA A047 136.79+6.07 03 05 15.4 64 58 12 03 09 34.0 65 09 37 0.11 0.10 136.79�5.10 02 26 28.6 54 52 29 02 29 59.8 55 05 49 0.32 0.07 HFLLZOA G136.79-05.10 136.80+7.15 03 10 37.1 65 53 21 03 15 02.6 66 04 29 0.21 0.08 136.85+4.52 02 58 42.3 63 35 31 03 02 51.9 63 47 17 0.09 0.08 136.85+3.76 02 55 29.6 62 55 10 02 59 35.1 63 07 06 0.10 0.09 136.85�6.15 02 24 10.7 53 52 32 02 27 39.1 54 05 58 0.11 0.08 HFLLZOA G136.84-06.16 136.86+8.77 03 19 47.5 67 13 53 03 24 24.6 67 24 30 0.09 0.08 136.86�2.19 02 34 53.5 57 32 24 02 38 33.9 57 45 21 0.20 0.18 136.87+8.19 03 16 37.2 66 44 24 03 21 10.0 66 55 12 0.69 0.43 HFLLZOA G136.86+08.19 136.87�4.93 02 27 25.5 55 00 34 02 30 57.3 55 13 51 0.21 0.10 ZOAG G136.86-04.93 136.88�5.58 02 25 46.7 54 23 51 02 29 16.7 54 37 13 0.07 0.07 136.88�5.78 02 25 17.4 54 12 29 02 28 46.8 54 25 52 0.18 0.07 7C 0225+5412 136.89+8.19 03 16 51.1 66 43 50 03 21 24.0 66 54 37 0.22 0.21 HFLLZOA G136.88+08.19 136.89+8.00 03 15 49.7 66 34 12 03 20 21.2 66 45 03 0.52 0.22 HFLLZOA A046 136.89+7.98 03 15 39.5 66 33 20 03 20 10.9 66 44 11 0.18 0.08 136.89�5.10 02 27 05.5 54 50 10 02 30 36.8 55 03 28 0.19 0.09 136.89�5.35 02 26 28.8 54 36 23 02 29 59.4 54 49 43 0.09 0.08 136.90+5.81 03 04 56.2 64 41 21 03 09 13.3 64 52 47 0.11 0.08 136.90�2.23 02 35 05.4 57 29 09 02 38 45.7 57 42 05 0.11 0.09 136.90�5.87b 02 25 15.2 54 07 16 02 28 44.4 54 20 39 0.23 0.15 HFLLZOA G136.90-05.87 136.90�5.87a 02 25 13.9 54 07 11 02 28 43.1 54 20 34 0.09 0.07 136.91+6.23 03 06 58.3 65 02 55 03 11 18.0 65 14 15 0.20 0.07 136.93+7.20 03 11 54.2 65 52 09 03 16 20.2 66 03 13 0.10 0.07 HFLLZOA A062 136.95�3.69 02 31 15.1 56 07 15 02 34 50.7 56 20 22 0.38 0.37 ZOAG G136.95-03.70 136.96+8.14 03 17 10.0 66 38 47 03 21 42.5 66 49 33 0.19 0.18 HFLLZOA G136.96+08.14 136.96+3.43 02 55 02.0 62 34 21 02 59 06.0 62 46 19 0.11 0.08 136.97+4.40 02 59 11.5 63 25 24 03 03 20.6 63 37 09 0.11 0.11 136.98+7.18 03 12 15.9 65 49 24 03 16 41.8 66 00 27 0.24 0.12 HFLLZOA A063 136.98�6.13 02 25 04.7 53 50 40 02 28 33.3 54 04 04 0.09 0.09 136.99+7.06 03 11 41.4 65 42 54 03 16 06.5 65 53 58 0.15 0.11 136.99�4.48 02 29 21.1 55 22 57 02 32 54.4 55 36 09 0.30 0.10 136.99�5.87 02 25 47.1 54 05 24 02 29 16.4 54 18 46 0.11 0.08 136.99�6.37 02 24 34.0 53 37 13 02 28 02.0 53 50 38 0.39 0.09 137.00+6.38 03 08 23.1 65 07 47 03 12 43.8 65 19 02 0.12 0.09 137.00�5.04 02 27 59.6 54 51 19 02 31 31.3 55 04 35 0.10 0.10 137.01+8.18 03 17 47.0 66 39 36 03 22 19.9 66 50 20 0.15 0.11 137.01+6.02 03 06 43.8 64 49 02 03 11 02.3 65 00 23 0.57 0.09 HFLLZOA A086 137.01�5.74 02 26 13.6 54 12 24 02 29 43.3 54 25 45 0.22 0.10 137.02+6.49 03 09 06.9 65 13 05 03 13 28.3 65 24 18 0.08 0.08 137.02�6.01 02 25 36.4 53 56 50 02 29 05.4 54 10 12 0.11 0.07 137.03+9.39 03 24 50.7 67 39 13 03 29 32.7 67 49 33 0.10 0.09 137.03�3.74 02 31 38.2 56 02 42 02 35 13.8 56 15 48 0.22 0.10 137.04+6.09 03 07 22.6 64 51 33 03 11 41.5 65 02 52 0.10 0.10 137.04�2.38 02 35 36.2 57 17 43 02 39 16.2 57 30 38 0.15 0.13 137.04�4.25 02 30 17.1 55 34 29 02 33 51.1 55 47 39 0.27 0.17 ZOAG G137.03-04.25 137.05+6.65 03 10 09.7 65 20 19 03 14 32.2 65 31 29 0.36 0.19 HFLLZOA A070 137.05�2.39 02 35 35.3 57 17 03 02 39 15.3 57 29 58 0.09 0.07 137.06+3.12 02 54 32.2 62 14 54 02 58 34.7 62 26 53 0.11 0.07 IRAS 02546+6214? 137.06�4.24 02 30 27.0 55 34 37 02 34 01.1 55 47 46 0.11 0.07 ZOAG G137.05-04.24 137.07�3.63 02 32 12.9 56 08 13 02 35 48.9 56 21 17 0.16 0.07 ZOAG G137.07-03.63 137.07�6.14 02 25 38.0 53 48 26 02 29 06.7 54 01 48 0.15 0.15 137.08�4.79 02 29 08.5 55 03 23 02 32 41.0 55 16 36 0.10 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 137.09+7.71 03 15 53.5 66 13 07 03 20 23.1 66 23 57 0.11 0.09 7C 0315+6612? 137.09+7.76 03 16 11.8 66 15 37 03 20 41.7 66 26 26 0.20 0.18 [WB92] 0316+6620 137.09+7.15 03 12 59.2 65 44 45 03 17 25.0 65 55 45 0.15 0.12 HFLLZOA G137.08+07.15 137.09+5.71 03 05 58.5 64 30 20 03 10 15.2 64 41 43 0.19 0.11 137.09�6.58 02 24 40.5 53 23 18 02 28 08.1 53 36 43 0.18 0.08 137.10+9.77 03 27 46.3 67 55 45 03 32 31.4 68 05 55 0.11 0.09 IRAS 03277+6755 137.11�3.80 02 32 00.0 55 57 18 02 35 35.5 56 10 23 0.12 0.11 137.12+7.58 03 15 30.6 66 05 24 03 19 59.3 66 16 16 0.56 0.15 HFLLZOA G137.12+07.58 137.13+7.58 03 15 34.6 66 05 24 03 20 03.3 66 16 16 0.08 0.07 137.13�5.64 02 27 14.7 54 15 15 02 30 44.8 54 28 33 0.23 0.11 137.14+9.69 03 27 35.5 67 50 17 03 32 19.9 68 00 27 0.09 0.07 137.14�5.50 02 27 39.7 54 22 52 02 31 10.2 54 36 09 0.15 0.11 137.15+9.71 03 27 52.2 67 50 55 03 32 36.8 68 01 04 0.21 0.11 137.15+8.47 03 20 35.8 66 49 10 03 25 10.8 66 59 45 0.09 0.08 137.15+7.08 03 13 07.2 65 39 10 03 17 32.6 65 50 10 0.11 0.11 137.15+5.47 03 05 20.8 64 16 13 03 09 36.1 64 27 38 0.21 0.08 137.15+4.64 03 01 33.4 63 32 58 03 05 44.0 63 44 35 0.09 0.07 137.15�6.20 02 25 56.2 53 43 12 02 29 24.8 53 56 33 0.10 0.08 137.16�1.49 02 39 06.5 58 03 14 02 42 49.7 58 15 59 0.15 0.11 137.16�2.92 02 34 47.6 56 44 53 02 38 25.9 56 57 50 0.30 0.22 IRAS 02348+5644 137.17+8.44 03 20 30.7 66 47 12 03 25 05.5 66 57 47 0.11 0.10 137.17+6.45 03 10 10.0 65 06 03 03 14 31.3 65 17 13 0.10 0.08 137.18+8.26 03 19 35.6 66 37 49 03 24 09.1 66 48 27 0.67 0.20 HFLLZOA G137.17+08.26 137.18�2.92 02 34 55.3 56 44 56 02 38 33.7 56 57 53 0.33 0.32 ZOAG G137.17-02.92 137.20+3.61 02 57 36.8 62 36 51 03 01 42.0 62 48 41 0.10 0.08 137.20+2.99 02 55 06.5 62 04 05 02 59 08.6 62 16 03 0.09 0.07 137.21+6.35 03 09 56.9 64 59 50 03 14 17.6 65 11 00 0.08 0.07 HFLLZOA A085 137.21�6.60 02 25 22.0 53 19 35 02 28 49.7 53 32 58 0.09 0.08 137.22+6.48 03 10 39.6 65 06 05 03 15 01.1 65 17 13 0.10 0.10 137.22+6.19 03 09 16.3 64 51 17 03 13 36.0 65 02 29 0.11 0.09 137.22+4.08 02 59 43.4 63 01 42 03 03 51.1 63 13 25 0.11 0.09 137.22�4.48 02 30 53.3 55 17 35 02 34 26.9 55 30 43 0.09 0.08 137.23+5.45 03 05 52.1 64 12 59 03 10 07.4 64 24 23 0.10 0.08 HFLLZOA A098 137.24+6.19 03 09 26.0 64 50 41 03 13 45.7 65 01 53 0.11 0.07 137.24+5.36 03 05 29.5 64 07 32 03 09 44.2 64 18 57 0.27 0.24 IRAS 03054+6407? 137.26�5.25 02 29 04.2 54 33 34 02 32 35.6 54 46 47 0.14 0.08 137.27�5.38 02 28 49.8 54 26 22 02 32 20.8 54 39 36 0.15 0.14 HFLLZOA G137.27-05.38 137.29+6.37 03 10 43.7 64 58 28 03 15 04.6 65 09 36 0.13 0.12 137.29�4.21 02 32 02.6 55 31 01 02 35 37.1 55 44 06 0.19 0.10 137.30+3.47 02 57 46.0 62 26 48 03 01 50.6 62 38 37 0.09 0.08 137.31+3.94 02 59 50.5 62 51 43 03 03 57.6 63 03 26 0.11 0.11 137.34+8.17 03 20 26.7 66 28 12 03 24 59.6 66 38 47 0.11 0.08 137.35+5.89 03 08 55.8 64 31 58 03 13 13.8 64 43 12 0.11 0.07 137.35�3.50 02 34 25.3 56 08 18 02 38 02.0 56 21 16 0.20 0.16 ZOAG G137.35-03.51 137.35�6.40 02 26 42.6 53 27 31 02 30 10.9 53 40 50 0.14 0.12 137.37+5.57 03 07 28.9 64 14 42 03 11 45.0 64 26 00 0.15 0.11 137.37�5.40 02 29 24.2 54 22 55 02 32 55.3 54 36 07 0.19 0.07 137.38+7.58 03 17 36.6 65 57 18 03 22 05.5 66 08 03 0.15 0.14 137.39�4.60 02 31 36.6 55 07 06 02 35 10.0 55 20 12 0.10 0.07 137.40+1.00: 02 49 05.4 60 12 31 02 52 58.7 60 24 47 0.09 0.08 137.41+6.20 03 10 49.5 64 45 41 03 15 09.4 64 56 48 0.09 0.07 137.41+6.02 03 09 56.4 64 36 30 03 14 15.2 64 47 40 0.10 0.09 137.41�5.85 02 28 27.9 53 57 06 02 31 57.8 54 10 21 0.23 0.09 HFLLZOA G137.40-05.85 137.41�6.37 02 27 10.7 53 28 14 02 30 39.2 53 41 32 0.21 0.07 HFLLZOA G137.41-06.37 137.42�4.42 02 32 17.9 55 16 23 02 35 51.9 55 29 27 0.10 0.09 137.42�4.70 02 31 32.5 55 00 50 02 35 05.7 55 13 56 0.20 0.07 IRAS 02315+5500 137.43+8.06 03 20 35.1 66 19 57 03 25 07.3 66 30 32 0.11 0.11 137.44+8.24 03 21 41.6 66 28 06 03 26 15.1 66 38 37 0.10 0.09 HFLLZOA G137.44+08.24 137.45+6.14 03 10 52.8 64 41 31 03 15 12.4 64 52 38 0.35 0.34 IRAS 03108+6441 137.45�6.62 02 26 49.7 53 13 22 02 30 17.6 53 26 41 0.09 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 137.46+1.04: 02 49 39.6 60 12 55 02 53 33.1 60 25 09 0.10 0.10 137.47+8.19 03 21 41.2 66 25 02 03 26 14.4 66 35 33 0.48 0.41 HFLLZOA G137.46+08.19 137.49+6.22 03 11 36.7 64 44 30 03 15 56.8 64 55 35 0.11 0.11 137.50+8.63 03 24 22.8 66 45 28 03 28 59.1 66 55 50 0.42 0.31 IRAS 03243+6645 137.50+7.93 03 20 30.1 66 10 37 03 25 01.4 66 21 12 0.20 0.09 137.50�3.48 02 35 27.5 56 05 50 02 39 04.5 56 18 45 0.19 0.18 137.50�7.13 02 25 51.9 52 43 25 02 29 18.5 52 56 47 0.08 0.07 HFLLZOA G137.50-07.14 137.51+8.25 03 22 17.9 66 26 23 03 26 51.4 66 36 52 0.08 0.07 137.51+6.35 03 12 23.1 64 50 36 03 16 44.1 65 01 38 1.66 0.50 IRAS 03123+6450 137.51+5.47 03 08 06.4 64 05 18 03 12 22.0 64 16 34 0.20 0.18 137.51�6.45 02 27 33.5 53 21 30 02 31 01.9 53 34 47 0.08 0.08 137.52+6.57 03 13 34.7 65 01 24 03 17 57.0 65 12 22 0.08 0.08 137.52�4.72 02 32 08.9 54 57 13 02 35 42.1 55 10 18 0.14 0.13 137.54+7.42 03 18 01.1 65 43 49 03 22 28.9 65 54 32 0.43 0.20 HFLLZOA G137.53+07.42 137.54+5.73 03 09 39.1 64 17 46 03 13 56.3 64 28 57 0.11 0.11 137.54�2.77 02 37 48.5 56 44 24 02 41 27.9 56 57 13 0.10 0.09 137.54�3.52 02 35 37.1 56 02 51 02 39 14.0 56 15 46 0.15 0.11 137.54�5.36 02 30 32.2 54 21 09 02 34 03.6 54 34 18 0.19 0.18 HFLLZOA G137.53-05.36 137.55+8.03 03 21 25.9 66 14 01 03 25 57.9 66 24 33 0.08 0.07 137.55�5.08 02 31 22.4 54 36 35 02 34 54.6 54 49 42 0.24 0.23 HFLLZOA G137.55-05.08 137.57+7.94 03 21 08.6 66 09 05 03 25 40.0 66 19 38 0.11 0.07 137.58+7.85 03 20 43.0 66 03 55 03 25 13.8 66 14 29 0.12 0.11 137.58�5.03 02 31 43.2 54 38 52 02 35 15.6 54 51 58 0.13 0.08 137.60+8.10 03 22 13.9 66 16 00 03 26 46.4 66 26 29 0.11 0.10 137.61�6.57 02 27 53.3 53 12 29 02 31 21.5 53 25 45 0.26 0.11 137.63�6.91 02 27 08.5 52 53 02 02 30 35.8 53 06 20 0.14 0.11 137.64�5.10 02 31 52.9 54 33 34 02 35 25.2 54 46 39 0.21 0.07 137.65�0.97 02 44 05.2 58 19 42 02 47 51.0 58 32 13 0.09 0.09 137.66+7.37 03 18 43.8 65 37 32 03 23 11.4 65 48 13 0.23 0.07 HFLLZOA G137.65+07.37 137.68�5.86 02 30 08.9 53 50 32 02 33 39.1 54 03 42 0.11 0.10 137.70+8.70 03 26 26.1 66 42 25 03 31 02.9 66 52 39 0.10 0.08 137.70+7.28 03 18 39.6 65 31 47 03 23 06.6 65 42 28 0.22 0.08 137.71�6.34 02 29 05.9 53 23 00 02 32 34.8 53 36 13 0.11 0.07 137.72�4.59 02 33 46.3 55 00 02 02 37 20.2 55 13 02 0.11 0.07 137.74�5.01 02 32 47.0 54 36 20 02 36 19.7 54 49 23 0.10 0.09 137.74�4.96 02 32 54.2 54 38 54 02 36 27.0 54 51 57 0.15 0.11 137.74�5.92 02 30 21.0 53 45 58 02 33 51.1 53 59 08 0.10 0.08 137.75+6.24 03 13 43.7 64 37 34 03 18 04.1 64 48 32 0.11 0.11 137.76+8.69 03 26 50.8 66 39 54 03 31 27.6 66 50 07 0.10 0.07 137.76�5.06 02 32 47.0 54 32 50 02 36 19.6 54 45 53 0.22 0.20 HFLLZOA G137.76-05.06 137.76�4.94 02 33 05.4 54 39 29 02 36 38.3 54 52 31 0.11 0.11 137.79�4.94 02 33 15.1 54 38 37 02 36 48.0 54 51 39 0.15 0.11 137.81�4.92 02 33 26.2 54 39 26 02 36 59.2 54 52 27 0.45 0.41 ZOAG G137.80-04.92 137.81�5.29 02 32 26.7 54 18 59 02 35 58.6 54 32 03 0.10 0.07 137.82�1.39 02 43 56.5 57 52 21 02 47 40.9 58 04 52 0.08 0.07 137.82�4.88 02 33 36.0 54 41 21 02 37 09.1 54 54 22 0.18 0.10 ZOAG G137.81-04.88 137.84�3.72 02 36 56.7 55 44 40 02 40 33.3 55 57 31 0.12 0.08 137.84�5.09 02 33 11.1 54 29 03 02 36 43.6 54 42 05 0.08 0.08 137.84�6.93 02 28 24.0 52 47 35 02 31 51.6 53 00 50 0.14 0.07 137.85�3.70 02 37 05.6 55 45 59 02 40 42.3 55 58 50 0.14 0.09 137.86+7.50 03 21 03.0 65 37 40 03 25 31.5 65 48 13 0.24 0.08 137.86�3.61 02 37 25.7 55 50 23 02 41 02.7 56 03 13 0.12 0.11 137.86�4.14 02 35 56.4 55 21 16 02 39 31.8 55 34 10 0.41 0.17 137.86�5.05 02 33 25.9 54 31 11 02 36 58.6 54 44 12 0.45 0.43 HFLLZOA G137.86-05.05 137.87+6.18 03 14 24.1 64 30 39 03 18 44.3 64 41 35 0.12 0.10 137.87�4.02 02 36 20.4 55 27 16 02 39 56.2 55 40 09 0.26 0.20 ZOAG G137.87-04.02 137.88�4.86 02 34 02.1 54 40 57 02 37 35.4 54 53 56 0.20 0.08 137.88�5.84 02 31 26.2 53 47 09 02 34 56.7 54 00 16 0.11 0.10 137.89�4.08b 02 36 16.2 55 23 38 02 39 51.8 55 36 31 0.09 0.09 137.89�4.08a 02 36 15.3 55 23 38 02 39 50.9 55 36 31 0.08 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 137.90�4.49a 02 35 12.5 55 01 18 02 38 46.9 55 14 14 0.14 0.08 137.90�4.49b 02 35 14.1 55 01 02 02 38 48.5 55 13 58 0.14 0.09 ZOAG G137.90-04.49 137.91�3.90 02 36 57.0 55 33 03 02 40 33.2 55 45 54 0.09 0.07 137.92�4.43 02 35 29.6 55 03 57 02 39 04.2 55 16 52 0.07 0.07 137.94+8.40 03 26 37.8 66 19 42 03 31 12.5 66 29 56 0.34 0.18 IRAS 03266+6619 137.94+7.12 03 19 41.9 65 15 39 03 24 07.9 65 26 17 0.22 0.21 IRAS 03197+6515 137.94�6.41 02 30 18.6 53 14 01 02 33 47.6 53 27 11 0.11 0.11 137.95+6.27 03 15 26.3 64 32 39 03 19 47.0 64 43 31 0.08 0.07 HFLLZOA G137.94+06.27 137.95+5.30 03 10 46.7 63 42 57 03 15 01.7 63 54 05 0.10 0.09 137.96�3.01 02 39 49.9 56 20 28 02 43 28.9 56 33 11 0.33 0.33 ZOAG G137.95-03.01 137.96�6.43 02 30 25.2 53 12 13 02 33 54.2 53 25 22 0.45 0.29 HFLLZOA G137.96-06.44 137.97�3.00 02 39 57.8 56 21 13 02 43 36.9 56 33 56 0.27 0.09 ZOAG G137.97-03.00 137.99�5.18 02 33 53.4 54 21 05 02 37 25.9 54 34 05 0.17 0.09 HFLLZOA G137.98-05.18 138.01�3.71 02 38 08.4 55 40 59 02 41 45.3 55 53 47 0.10 0.07 138.02+3.71 03 04 15.5 62 18 52 03 08 22.1 62 30 21 0.32 0.15 ZOAG G138.02+03.71 138.03�6.88 02 29 40.0 52 45 54 02 33 07.9 52 59 05 0.22 0.07 138.04�4.25 02 36 44.0 55 10 58 02 40 19.3 55 23 50 0.09 0.07 138.05+7.90 03 24 48.8 65 51 06 03 29 20.1 66 01 26 0.90 0.44 IRAS 03248+6551 138.05�3.67 02 38 28.6 55 42 30 02 42 05.7 55 55 17 0.19 0.11 IRAS 02384+5542 138.06�4.23 02 36 57.8 55 11 24 02 40 33.1 55 24 15 0.15 0.10 138.07�5.57 02 33 18.1 53 57 34 02 36 49.6 54 10 35 0.45 0.34 HFLLZOA G138.06-05.57 138.07�5.60 02 33 15.0 53 55 33 02 36 46.4 54 08 35 0.21 0.09 138.08�5.54 02 33 28.3 53 59 09 02 36 59.9 54 12 10 0.19 0.07 138.08�5.63 02 33 14.4 53 54 10 02 36 45.7 54 07 12 0.13 0.12 138.09�5.18 02 34 30.3 54 18 41 02 38 02.9 54 31 39 0.36 0.22 HFLLZOA G138.08-05.18 138.10�4.01 02 37 52.4 55 22 40 02 41 28.5 55 35 29 0.11 0.11 138.11�5.55 02 33 39.4 53 57 37 02 37 11.0 54 10 37 0.18 0.15 138.12�4.82 02 35 41.0 54 37 35 02 39 14.7 54 50 30 0.18 0.09 138.14�5.60 02 33 41.3 53 54 25 02 37 12.8 54 07 25 0.24 0.08 138.14�5.85 02 32 59.6 53 40 18 02 36 30.3 53 53 20 0.13 0.12 138.15+4.57 03 08 59.3 62 59 17 03 13 10.5 63 10 31 0.11 0.10 138.15�4.98 02 35 25.3 54 28 01 02 38 58.5 54 40 57 0.20 0.07 138.16�5.88 02 33 04.4 53 38 17 02 36 35.1 53 51 19 0.22 0.12 138.18+6.56 03 18 40.7 64 40 01 03 23 03.3 64 50 42 0.15 0.12 138.18�6.01 02 32 51.9 53 30 19 02 36 22.3 53 43 22 0.18 0.08 138.19�5.67 02 33 47.1 53 49 00 02 37 18.4 54 02 00 0.15 0.08 138.20�1.03: 02 47 41.0 58 02 12 02 51 27.2 58 14 32 0.09 0.08 138.21+6.56 03 18 58.3 64 38 49 03 23 20.9 64 49 29 0.21 0.12 138.21+4.54 03 09 15.7 62 56 15 03 13 26.8 63 07 28 0.22 0.09 138.21+3.70 03 05 34.9 62 12 17 03 09 41.6 62 23 42 0.11 0.08 138.22�6.52 02 31 47.5 53 01 35 02 35 16.6 53 14 41 0.11 0.09 138.25+4.06 03 07 26.4 62 30 08 03 11 35.0 62 41 27 0.20 0.19 IRAS 03074+6230 138.26+7.83 03 26 01.1 65 40 29 03 30 31.9 65 50 45 0.12 0.11 138.27+7.82 03 26 02.6 65 39 46 03 30 33.3 65 50 02 0.09 0.09 138.29+5.93 03 16 26.4 64 04 20 03 20 45.3 64 15 09 0.20 0.16 HFLLZOA G138.29+05.93 138.29+4.48 03 09 35.4 62 50 16 03 13 46.2 63 01 28 0.09 0.09 138.29�4.53 02 37 33.4 54 49 29 02 41 08.1 55 02 19 0.12 0.12 138.29�6.04 02 33 27.1 53 26 08 02 36 57.5 53 39 09 0.41 0.11 138.30+7.03 03 22 04.9 64 59 12 03 26 30.5 65 09 42 0.11 0.10 138.33+0.83 02 55 02.5 59 38 14 02 58 56.1 59 50 12 0.11 0.10 138.34�6.28 02 33 06.0 53 12 13 02 36 35.8 53 25 15 0.22 0.07 138.36+5.98 03 17 13.0 64 04 31 03 21 32.2 64 15 17 0.09 0.07 138.37�6.87 02 31 48.2 52 38 36 02 35 16.5 52 51 42 0.21 0.07 138.40+3.43 03 05 50.0 61 53 02 03 09 55.5 62 04 26 0.16 0.07 HFLLZOA G138.39+03.43 138.41�7.07 02 31 31.3 52 26 23 02 34 59.1 52 39 29 0.18 0.09 138.43+6.84 03 22 03.9 64 45 34 03 26 28.3 64 56 04 0.18 0.07 HFLLZOA G138.42+06.84 138.43�6.89 02 32 03.5 52 36 11 02 35 31.8 52 49 16 0.47 0.08 HFLLZOA G138.42-06.89 138.45+3.99 03 08 38.8 62 20 10 03 12 47.1 62 31 25 0.10 0.09 HFLLZOA G138.45+03.99 138.45�5.23 02 36 38.0 54 07 08 02 40 10.8 54 20 00 0.21 0.09 138.47+5.75 03 16 56.2 63 49 51 03 21 14.2 64 00 38 0.19 0.10

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 138.48�6.76 02 32 43.0 52 41 58 02 36 11.7 52 55 01 0.08 0.08 138.49�6.78 02 32 43.3 52 40 58 02 36 11.9 52 54 01 0.24 0.13 138.50+6.16 03 19 09.0 64 09 18 03 23 29.3 64 19 58 0.11 0.10 138.50�4.63 02 38 37.8 54 39 04 02 42 12.4 54 51 51 0.11 0.09 138.50�4.81 02 38 06.4 54 28 55 02 41 40.5 54 41 43 0.19 0.09 138.52�0.11 02 53 02.0 58 42 30 02 56 52.0 58 54 34 0.07 0.07 Dwingeloo 1 138.52�2.10 02 46 18.2 56 55 57 02 50 00.9 57 08 21 0.11 0.09 138.52�3.82 02 41 02.5 55 22 43 02 44 39.6 55 35 23 0.11 0.10 138.52�6.89 02 32 38.0 52 33 52 02 36 06.4 52 46 55 0.19 0.08 HFLLZOA G138.52-06.90 138.53�5.28 02 37 00.5 54 02 41 02 40 33.3 54 15 32 0.13 0.08 138.53�7.35 02 31 30.8 52 08 12 02 34 58.0 52 21 18 0.10 0.08 HFLLZOA G138.52-07.36 138.54+6.42 03 20 45.2 64 21 01 03 25 07.1 64 31 35 0.19 0.11 138.54+3.61 03 07 39.5 61 57 58 03 11 46.0 62 09 16 0.09 0.07 138.54+4.08 03 09 42.6 62 21 59 03 13 51.5 62 33 10 0.51 0.33 ZOAG G138.54+04.08 138.55�4.56 02 39 08.2 54 41 37 02 42 43.1 54 54 22 0.21 0.21 ZOAG G138.55-04.55 138.55�5.14 02 37 30.0 54 09 24 02 41 03.2 54 22 14 0.20 0.18 138.55�6.80 02 33 03.4 52 38 37 02 36 32.1 52 51 39 0.13 0.13 138.56+5.98 03 18 42.8 63 58 31 03 23 02.1 64 09 12 0.22 0.14 138.56+5.39 03 15 52.9 63 28 44 03 20 08.8 63 39 35 0.10 0.09 138.57+4.14 03 10 10.1 62 24 39 03 14 19.3 62 35 49 0.14 0.08 138.57+3.91 03 09 11.0 62 12 27 03 13 19.0 62 23 40 0.20 0.09 138.60�6.10 02 35 12.1 53 15 33 02 38 42.7 53 28 29 0.23 0.08 138.61�5.22 02 37 36.8 54 03 49 02 41 09.8 54 16 38 0.15 0.11 138.62+6.86 03 23 37.5 64 40 22 03 28 02.1 64 50 47 0.09 0.09 138.62�0.86: 02 51 06.0 57 59 58 02 54 53.3 58 12 08 0.15 0.14 IRAS 02510+5759 138.62�4.06 02 41 00.7 55 07 02 02 44 37.2 55 19 42 0.20 0.20 ZOAG G138.61-04.06 138.64+7.02 03 24 41.6 64 47 54 03 29 07.2 64 58 15 0.69 0.44 HFLLZOA G138.63+07.03 138.64�6.22 02 35 07.6 53 08 25 02 38 37.9 53 21 21 0.15 0.13 138.65�4.52 02 39 52.4 54 40 55 02 43 27.5 54 53 38 0.10 0.07 138.65�6.01 02 35 43.4 53 19 42 02 39 14.3 53 32 37 0.33 0.11 HFLLZOA G138.64-06.01 138.65�6.08 02 35 33.5 53 15 44 02 39 04.2 53 28 39 0.22 0.19 138.67+6.59 03 22 38.1 64 25 30 03 27 01.1 64 35 58 0.10 0.08 138.67�4.25 02 40 47.0 54 55 10 02 44 22.9 55 07 50 0.46 0.07 ZOAG G138.67-04.25 138.68+6.60 03 22 45.1 64 25 41 03 27 08.1 64 36 09 0.11 0.07 HFLLZOA G138.67+06.60 138.68�1.57 02 49 05.1 57 20 04 02 52 49.8 57 32 20 0.12 0.09 138.69+4.36 03 12 01.1 62 32 02 03 16 11.5 62 43 06 0.23 0.22 ZOAG G138.68+04.36 138.69�3.77 02 42 20.5 55 21 05 02 45 58.0 55 33 41 0.19 0.19 HFLLZOA G138.69-03.77 138.71+6.96 03 24 52.1 64 42 25 03 29 17.3 64 52 45 0.11 0.07 HFLLZOA G138.70+06.96 138.71�3.79 02 42 21.8 55 19 29 02 45 59.2 55 32 05 0.36 0.13 HFLLZOA G138.70-03.79 138.71�5.58 02 37 15.7 53 41 54 02 40 47.8 53 54 44 0.19 0.09 138.72�1.54 02 49 31.0 57 20 43 02 53 15.9 57 32 58 0.20 0.18 ZOAG G138.72-01.54 138.72�6.58 02 34 38.8 52 46 28 02 38 08.2 52 59 26 0.31 0.21 138.74�3.74 02 42 42.0 55 21 15 02 46 19.6 55 33 50 0.21 0.13 138.74�5.86 02 36 41.1 53 25 36 02 40 12.5 53 38 28 0.11 0.09 138.76+4.21 03 11 55.3 62 22 15 03 16 05.0 62 33 19 0.09 0.07 138.76�5.86 02 36 49.5 53 25 04 02 40 20.9 53 37 56 0.19 0.07 138.76�5.81 02 36 56.4 53 27 58 02 40 27.9 53 40 49 0.11 0.07 138.77�3.94 02 42 20.1 55 09 57 02 45 57.1 55 22 33 0.67 0.18 ZOAG G138.77-03.94 138.79�6.45 02 35 24.5 52 52 00 02 38 54.3 53 04 56 0.11 0.08 138.80�4.60 02 40 34.4 54 33 20 02 44 09.4 54 46 01 0.13 0.09 138.81+6.53 03 23 23.0 64 17 42 03 27 45.6 64 28 07 0.11 0.10 138.81�6.87 02 34 26.4 52 28 07 02 37 55.1 52 41 05 0.46 0.35 HFLLZOA G138.81-06.87 138.84+4.65 03 14 28.6 62 42 15 03 18 40.6 62 53 11 0.08 0.07 138.84�6.91 02 34 27.7 52 25 19 02 37 56.3 52 38 17 0.18 0.08 138.85�3.56 02 43 58.0 55 28 34 02 47 36.3 55 41 05 0.20 0.08 ZOAG G138.85-03.56 138.85�4.18 02 42 06.6 54 54 21 02 45 42.9 55 06 58 0.11 0.07 ZOAG G138.85-04.19 138.85�5.14 02 39 20.5 54 02 30 02 42 54.0 54 15 15 0.14 0.11 87GB 023922.4+540152 138.85�6.12 02 36 39.1 53 08 41 02 40 09.9 53 21 33 0.11 0.10 138.86+5.43 03 18 20.0 63 21 07 03 22 36.3 63 31 50 0.11 0.11 IRAS 03183+6321 138.89�3.77 02 43 35.3 55 15 45 02 47 12.9 55 28 17 0.22 0.11 HFLLZOA G138.89-03.77

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 138.89�6.53 02 35 48.4 52 45 08 02 39 18.1 52 58 03 0.10 0.08 138.90�2.92 02 46 14.7 56 01 24 02 49 55.1 56 13 49 0.36 0.12 138.91�3.66 02 44 03.2 55 21 10 02 47 41.2 55 33 41 0.11 0.09 138.91�4.68 02 41 02.0 54 25 42 02 44 36.9 54 38 22 0.18 0.10 138.91�4.76 02 40 46.0 54 21 42 02 44 20.7 54 34 23 0.19 0.09 HFLLZOA G138.90-04.76 138.92+5.60 03 19 35.3 63 27 29 03 23 52.5 63 38 07 0.22 0.07 138.92�4.75 02 40 54.7 54 21 41 02 44 29.4 54 34 21 0.13 0.11 138.92�5.61 02 38 29.3 53 34 40 02 42 01.5 53 47 27 0.09 0.07 138.92�5.50 02 38 44.6 53 40 46 02 42 17.1 53 53 32 0.19 0.16 138.93+5.60 03 19 38.9 63 26 59 03 23 56.1 63 37 37 0.12 0.10 138.93�6.65 02 35 42.5 52 37 40 02 39 11.9 52 50 35 0.11 0.10 IRAS 02356+5237? 138.94�2.91 02 46 29.3 56 01 16 02 50 09.7 56 13 40 0.09 0.07 138.95�1.85 02 49 58.0 56 58 09 02 53 42.0 57 10 23 0.10 0.10 138.95�6.64 02 35 52.9 52 37 52 02 39 22.4 52 50 46 0.24 0.22 138.96+2.65 03 06 39.9 60 55 27 03 10 42.1 61 06 48 0.56 0.45 ZOAG G138.96+02.66 138.96�5.41 02 39 14.9 53 44 38 02 42 47.7 53 57 23 0.13 0.10 138.96�6.35 02 36 40.0 52 53 19 02 40 10.2 53 06 11 0.22 0.21 138.98+5.94 03 21 41.1 63 42 35 03 26 00.3 63 53 06 0.14 0.12 HFLLZOA G138.97+05.94 138.98+5.83 03 21 09.8 63 36 46 03 25 28.3 63 47 19 0.08 0.07 138.98+2.65 03 06 44.1 60 54 56 03 10 46.3 61 06 17 0.43 0.24 IRAS 03067+6055 138.98�3.97 02 43 31.8 55 03 06 02 47 08.9 55 15 39 0.18 0.08 138.98�4.69 02 41 24.1 54 23 42 02 44 59.0 54 36 21 0.11 0.07 139.00�5.35 02 39 41.5 53 46 55 02 43 14.5 53 59 39 0.13 0.12 139.00�5.55 02 39 05.8 53 36 11 02 42 38.3 53 48 56 0.34 0.12 139.00�7.50 02 33 55.5 51 49 07 02 37 22.8 52 02 07 0.22 0.08 139.01�4.72 02 41 33.9 54 21 12 02 45 08.8 54 33 50 0.11 0.07 HFLLZOA G139.01-04.72 139.01�4.97 02 40 50.5 54 07 41 02 44 24.7 54 20 21 0.20 0.19 139.02�1.63 02 51 08.0 57 07 53 02 54 52.9 57 20 03 0.08 0.08 HFLLZOA G139.01-01.63 139.02�7.08 02 35 09.7 52 12 00 02 38 38.1 52 24 56 0.20 0.19 HFLLZOA G139.02-07.08 139.04�5.49 02 39 33.4 53 38 26 02 43 06.1 53 51 10 0.17 0.11 139.05�6.49 02 36 51.8 52 43 47 02 40 21.8 52 56 39 0.28 0.15 HFLLZOA G139.04-06.49 139.07�4.80 02 41 42.4 54 15 24 02 45 17.1 54 28 02 0.11 0.08 139.07�6.13 02 37 58.1 53 03 02 02 41 29.1 53 15 51 0.20 0.11 139.08�5.14 02 40 46.3 53 56 18 02 44 20.0 54 08 59 0.12 0.07 139.08�7.02 02 35 36.4 52 13 44 02 39 05.0 52 26 39 0.09 0.07 139.09+3.21 03 09 55.9 61 20 22 03 14 00.8 61 31 33 0.09 0.09 139.09�5.61 02 39 31.3 53 30 32 02 43 03.7 53 43 16 0.35 0.34 HFLLZOA G139.09-05.61 139.11�6.47 02 37 17.9 52 43 05 02 40 48.0 52 55 55 0.11 0.07 139.12�3.24 02 46 38.4 55 38 47 02 50 17.9 55 51 10 0.22 0.21 IRAS 02466+5538 139.12�6.90 02 36 12.9 52 19 25 02 39 41.9 52 32 18 0.22 0.11 139.15�4.84 02 42 03.9 54 11 26 02 45 38.6 54 24 03 0.20 0.10 139.15�4.85 02 42 02.2 54 10 47 02 45 36.8 54 23 24 0.47 0.13 HFLLZOA G139.15-04.85 139.16�4.51 02 43 03.6 54 29 05 02 46 39.2 54 41 39 0.11 0.09 ZOAG G139.15-04.51 139.18�5.83 02 39 28.0 53 16 41 02 42 59.9 53 29 25 0.11 0.10 139.18�7.19 02 35 45.1 52 02 00 02 39 13.4 52 14 55 0.08 0.07 139.19�4.25 02 44 00.4 54 42 31 02 47 36.9 54 55 02 0.10 0.08 ZOAG G139.18-04.25 139.21�6.43 02 38 00.9 52 43 07 02 41 31.2 52 55 55 0.19 0.07 IRAS 02380+5243 139.29�4.60 02 43 35.1 54 20 31 02 47 10.6 54 33 03 0.24 0.10 ZOAG G139.28-04.60 139.29�6.05 02 39 30.3 53 01 45 02 43 01.7 53 14 29 0.15 0.15 139.31+4.83 03 18 47.7 62 36 09 03 23 00.9 62 46 50 0.22 0.07 ZOAG G139.30+04.83 139.31�4.80 02 43 09.3 54 09 10 02 46 44.2 54 21 44 0.11 0.11 139.32+4.85 03 18 55.6 62 36 54 03 23 08.9 62 47 35 0.22 0.19 ZOAG G139.32+04.85 139.32�4.00 02 45 33.5 54 52 27 02 49 10.8 55 04 54 0.22 0.21 ZOAG G139.31-04.00 139.32�6.10 02 39 34.1 52 58 15 02 43 05.4 53 10 59 0.27 0.08 139.33�5.77 02 40 31.1 53 15 52 02 44 03.3 53 28 33 0.32 0.10 HFLLZOA G139.33-05.77 139.35�5.97 02 40 04.2 53 04 53 02 43 35.9 53 17 36 0.21 0.10 139.37�3.64 02 47 00.2 55 10 22 02 50 38.7 55 22 44 0.31 0.08 139.41�3.47 02 47 46.6 55 18 26 02 51 25.7 55 30 46 0.10 0.09 139.43+4.38 03 17 29.0 62 09 24 03 21 39.8 62 20 10 0.21 0.07 139.43�2.44 02 51 09.7 56 13 08 02 54 52.1 56 25 18 0.17 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 139.43�1.12 02 55 35.3 57 24 08 02 59 22.4 57 36 04 0.15 0.15 139.45�7.05 02 37 42.9 52 03 06 02 41 11.8 52 15 55 0.14 0.09 139.49�7.15 02 37 41.4 51 56 49 02 41 10.0 52 09 38 0.11 0.07 139.52+4.53 03 18 55.3 62 14 17 03 23 07.0 62 24 58 0.22 0.07 IRAS 03189+6213 139.52�2.62 02 51 08.0 56 01 26 02 54 49.9 56 13 36 0.20 0.07 139.52�2.66 02 51 03.0 55 59 07 02 54 44.8 56 11 17 0.08 0.08 139.53�4.08 02 46 38.6 54 42 32 02 50 15.9 54 54 55 0.22 0.07 139.56�4.02 02 47 01.5 54 45 10 02 50 39.0 54 57 32 0.11 0.10 139.56�5.68 02 42 10.1 53 15 18 02 45 42.7 53 27 55 0.29 0.09 139.58�5.30 02 43 19.9 53 35 07 02 46 53.6 53 47 40 0.24 0.19 139.58�6.07 02 41 11.4 52 53 31 02 44 43.0 53 06 10 0.42 0.21 HFLLZOA G139.57-06.07 139.58�6.41 02 40 16.1 52 34 46 02 43 46.8 52 47 28 0.41 0.19 139.59�4.34 02 46 12.9 54 26 53 02 49 49.4 54 39 18 0.11 0.10 IRAS 02462+5426 139.62�6.28 02 40 51.0 52 40 54 02 44 22.0 52 53 34 0.18 0.08 139.63�4.26 02 46 43.8 54 30 24 02 50 20.6 54 42 47 0.69 0.22 139.66�3.39 02 49 36.2 55 16 01 02 53 15.7 55 28 16 0.36 0.09 IRAS 02496+5516 139.66�6.19 02 41 20.4 52 44 44 02 44 51.7 52 57 23 0.18 0.18 HFLLZOA G139.65-06.19 139.67�3.37 02 49 41.0 55 17 02 02 53 20.6 55 29 16 0.15 0.12 ZOAG G139.66-03.37 139.68�4.24 02 47 06.0 54 29 53 02 50 42.9 54 42 15 0.11 0.11 IRAS 02471+5430 139.68�6.27 02 41 12.5 52 40 23 02 44 43.6 52 53 02 0.23 0.15 139.71�6.31 02 41 16.9 52 36 52 02 44 47.9 52 49 31 0.18 0.15 139.74�2.72 02 52 13.9 55 50 01 02 55 55.7 56 02 08 0.20 0.09 139.76�5.78 02 43 06.2 53 04 46 02 46 38.7 53 17 20 0.24 0.21 HFLLZOA G139.76-05.78 139.77�4.40 02 47 09.6 54 19 23 02 50 46.1 54 31 45 0.18 0.11 HFLLZOA G139.76-04.40 139.77�4.81 02 45 54.8 53 56 50 02 49 30.1 54 09 16 0.12 0.08 139.77�6.35 02 41 31.6 52 33 34 02 45 02.6 52 46 12 0.18 0.15 139.77�7.10 02 39 28.4 51 52 38 02 42 57.4 52 05 22 0.15 0.09 139.78�4.20 02 47 49.7 54 29 43 02 51 26.8 54 42 03 0.11 0.11 139.80�4.14 02 48 08.5 54 32 01 02 51 45.8 54 44 20 0.10 0.07 HFLLZOA G139.80-04.14 139.81�5.79 02 43 21.4 53 03 00 02 46 54.0 53 15 33 0.21 0.21 139.82�3.40 02 50 32.8 55 11 36 02 54 12.4 55 23 48 0.10 0.10 139.83�6.09 02 42 37.4 52 46 20 02 46 09.2 52 58 55 0.10 0.10 139.84�5.49 02 44 21.6 53 18 14 02 47 55.0 53 30 44 0.09 0.07 HFLLZOA G139.83-05.49 139.85�6.17 02 42 30.6 52 41 14 02 46 02.1 52 53 50 0.10 0.10 HFLLZOA G139.84-06.17 139.86�6.25 02 42 19.5 52 36 29 02 45 50.8 52 49 05 0.20 0.19 139.91�5.83 02 43 51.3 52 58 19 02 47 23.8 53 10 51 0.10 0.10 139.92�6.21 02 42 49.1 52 37 33 02 46 20.6 52 50 08 0.20 0.10 139.93�4.64 02 47 27.4 54 01 59 02 51 03.3 54 14 20 0.17 0.07 ZOAG G139.93-04.64 139.94�4.21 02 48 48.6 54 24 51 02 52 25.8 54 37 08 0.22 0.20 ZOAG G139.94-04.21 139.95�4.53 02 47 54.3 54 07 27 02 51 30.6 54 19 47 0.12 0.08 139.95�5.89 02 43 54.2 52 53 35 02 47 26.6 53 06 07 0.15 0.11 139.96�4.71 02 47 23.9 53 57 15 02 50 59.6 54 09 36 0.12 0.09 139.97+2.59: 03 13 25.3 60 21 13 03 17 27.8 60 32 12 0.22 0.20 IRAS 03134+6021 139.98�5.64 02 44 46.7 53 06 53 02 48 19.8 53 19 22 0.08 0.07 139.99�3.50 02 51 18.8 55 01 29 02 54 58.3 55 13 39 0.28 0.13 ZOAG G139.99-03.50 139.99�4.71 02 47 36.6 53 56 39 02 51 12.4 54 09 00 0.21 0.09 139.99�6.51 02 42 25.1 52 19 16 02 45 55.9 52 31 52 0.10 0.10 140.02�4.90 02 47 11.2 53 45 34 02 50 46.4 53 57 56 0.18 0.08 140.05�4.57 02 48 20.9 54 02 50 02 51 57.1 54 15 08 0.30 0.21 ZOAG G140.04-04.57 140.06�5.74 02 44 59.2 52 59 16 02 48 32.1 53 11 44 0.15 0.13 140.06�6.22 02 43 37.7 52 32 49 02 47 09.3 52 45 21 0.12 0.08 140.07�5.34 02 46 13.1 53 20 45 02 49 47.1 53 33 10 0.33 0.10 140.08�4.68 02 48 11.6 53 55 38 02 51 47.5 54 07 57 0.10 0.09 140.10�4.00 02 50 23.7 54 31 45 02 54 01.7 54 43 57 0.15 0.14 140.10�4.75 02 48 08.0 53 51 46 02 51 43.8 54 04 05 0.21 0.08 140.10�6.59 02 42 47.7 52 12 17 02 46 18.3 52 24 52 0.10 0.08 140.15�4.75 02 48 26.7 53 50 22 02 52 02.5 54 02 40 0.22 0.09 140.15�6.66 02 42 56.4 52 07 04 02 46 26.9 52 19 38 0.31 0.10 HFLLZOA G140.14-06.66 140.16�6.58 02 43 10.9 52 10 55 02 46 41.6 52 23 29 0.11 0.09 HFLLZOA G140.15-06.59 140.17�4.24 02 50 07.0 54 16 48 02 53 44.3 54 29 01 0.22 0.22 HFLLZOA G140.17-04.24

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id.

140.18�5.86 02 45 20.9 52 49 41 02 48 53.6 53 02 08 1.26 0.43 [RC3] 024521.0+52492 140.20�4.90 02 48 18.8 53 40 44 02 51 54.2 53 53 03 0.24 0.10 140.20�5.61 02 46 12.2 53 02 43 02 49 45.6 53 15 08 0.28 0.20 HFLLZOA G140.19-05.61 140.22�5.68 02 46 08.7 52 58 19 02 49 41.9 53 10 44 0.30 0.29 HFLLZOA G140.22-05.68 140.24�6.77 02 43 09.5 51 58 48 02 46 39.8 52 11 22 0.22 0.19 140.25�5.69 02 46 15.1 52 56 57 02 49 48.3 53 09 22 0.09 0.09 HFLLZOA G140.24-05.69 140.28�0.69 03 02 38.2 57 22 00 03 06 27.4 57 33 35 0.09 0.08 140.29�4.17 02 51 03.5 54 17 32 02 54 41.1 54 29 42 0.21 0.11 140.29�5.23 02 47 49.7 53 20 39 02 51 24.2 53 32 59 0.29 0.11 140.31�5.38 02 47 33.0 53 12 00 02 51 07.1 53 24 21 0.20 0.14 140.32�4.21b 02 51 09.1 54 14 44 02 54 46.6 54 26 54 0.11 0.07 140.32�4.21a 02 51 05.8 54 14 41 02 54 43.3 54 26 51 0.11 0.09 140.32�5.53 02 47 06.7 53 03 49 02 50 40.4 53 16 11 0.41 0.41 HFLLZOA G140.31-05.53 140.32�5.78 02 46 25.6 52 50 11 02 49 58.6 53 02 35 0.10 0.09 140.33�4.55 02 50 08.8 53 56 09 02 53 45.3 54 08 22 0.08 0.07 140.34�6.27 02 45 05.9 52 23 14 02 48 37.6 52 35 42 0.11 0.11 140.36�4.96 02 49 03.5 53 33 38 02 52 38.8 53 45 54 0.09 0.07 ZOAG G140.35-04.96 140.36�6.05 02 45 51.3 52 34 29 02 49 23.6 52 46 55 0.24 0.09 140.38�4.14 02 51 43.8 54 16 40 02 55 21.6 54 28 48 0.09 0.07 140.38�6.59 02 44 27.2 52 05 08 02 47 58.0 52 17 38 0.10 0.08 140.40�5.44 02 47 52.3 53 06 21 02 51 26.3 53 18 41 1.12 0.18 140.41+5.98 03 32 19.6 62 56 11 03 36 39.0 63 06 05 0.21 0.18 140.41�6.28 02 45 28.3 52 20 54 02 48 60.0 52 33 21 0.22 0.21 140.41�6.18 02 45 46.2 52 26 22 02 49 18.2 52 38 48 0.53 0.33 HFLLZOA G140.40-06.18 140.41�0.39 03 04 37.0 57 33 46 03 08 27.4 57 45 14 0.21 0.11 IRAS 03046+5733 140.42+5.97 03 32 20.0 62 55 35 03 36 39.3 63 05 29 0.18 0.15 140.42�1.46 03 00 47.3 56 37 26 03 04 33.8 56 49 06 0.22 0.08 140.42�4.58 02 50 34.5 53 52 12 02 54 11.0 54 04 24 0.22 0.19 ZOAG G140.41-04.58 140.44+4.26 03 24 05.0 61 30 29 03 28 15.5 61 40 52 0.09 0.08 140.46�6.38 02 45 30.6 52 14 07 02 49 02.0 52 26 34 0.21 0.10 HFLLZOA G140.45-06.38 140.47�6.65 02 44 50.1 51 59 14 02 48 20.8 52 11 43 0.18 0.08 140.51�2.34 02 58 19.1 55 48 54 03 02 02.7 56 00 42 0.16 0.16 140.52�6.60 02 45 15.8 52 00 45 02 48 46.7 52 13 13 0.08 0.08 140.54�5.91 02 47 20.4 52 37 20 02 50 53.2 52 49 42 0.20 0.19 IRAS 02473+5237 140.55�6.38 02 46 02.8 52 12 02 02 49 34.3 52 24 27 0.15 0.11 140.58�6.23 02 46 37.3 52 19 09 02 50 09.2 52 31 33 0.22 0.07 HFLLZOA G140.57-06.23 140.58�1.76 03 00 46.3 56 17 19 03 04 31.9 56 28 59 0.08 0.04 140.61�6.07 02 47 16.9 52 27 19 02 50 49.3 52 39 41 0.22 0.22 140.61�6.47 02 46 05.9 52 05 21 02 49 37.2 52 17 46 0.22 0.11 140.62�6.61 02 45 49.1 51 57 37 02 49 20.1 52 10 03 0.18 0.11 140.63�5.06 02 50 24.1 53 20 32 02 53 59.3 53 32 44 0.21 0.07 140.63�6.06 02 47 25.7 52 27 22 02 50 58.2 52 39 43 0.22 0.20 140.64�4.20 02 53 05.7 54 06 27 02 56 43.5 54 18 31 0.10 0.07 140.64�6.68 02 45 43.0 51 53 29 02 49 13.8 52 05 55 0.21 0.19 HFLLZOA G140.63-06.68 140.68�6.14 02 47 28.7 52 21 34 02 51 01.0 52 33 55 0.11 0.07 140.68�6.61 02 46 08.5 51 56 21 02 49 39.5 52 08 46 0.09 0.07 140.69�6.68 02 46 01.9 51 52 01 02 49 32.7 52 04 26 0.10 0.10 IRAS 02460+5152 140.70�6.09 02 47 43.3 52 23 24 02 51 15.7 52 35 44 0.12 0.07 140.70�6.66 02 46 08.6 51 52 46 02 49 39.5 52 05 11 0.24 0.09 140.71�6.09 02 47 48.1 52 23 35 02 51 20.5 52 35 55 0.14 0.11 140.71�6.31 02 47 10.1 52 11 47 02 50 41.9 52 24 09 0.24 0.21 140.72�6.65 02 46 15.1 51 52 57 02 49 46.0 52 05 22 0.18 0.12 IRAS 02460+5152? 140.73�5.57 02 49 25.4 52 50 32 02 52 59.3 53 02 47 0.10 0.07 140.78�4.21 02 53 53.2 54 02 11 02 57 31.0 54 14 13 0.29 0.11 ZOAG G140.77-04.21 140.80�4.61 02 52 45.2 53 40 08 02 56 21.9 53 52 13 0.10 0.09 ZOAG G140.79-04.61 140.84�6.04 02 48 44.7 52 22 38 02 52 17.4 52 34 55 0.54 0.21 HFLLZOA G140.84-06.04 140.85�6.57 02 47 14.7 51 53 28 02 50 45.9 52 05 50 0.10 0.10 140.93+3.98 03 26 13.3 61 00 07 03 30 22.5 61 10 23 0.35 0.19 ZOAG G140.93+03.98 140.93�5.74 02 50 06.9 52 36 23 02 53 40.4 52 48 36 0.11 0.10 140.96�5.61 02 50 39.1 52 42 23 02 54 13.0 52 54 35 0.15 0.13 HFLLZOA G140.95-05.61

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 140.97�3.23 02 58 13.7 54 48 23 03 01 54.7 55 00 11 0.11 0.11 140.98+4.02 03 26 42.2 61 00 11 03 30 51.5 61 10 25 0.28 0.15 ZOAG G140.98+04.02 140.99�4.95 02 52 51.4 53 16 35 02 56 27.2 53 28 40 0.22 0.13 140.99�5.00 02 52 43.0 53 13 53 02 56 18.6 53 25 58 0.33 0.09 141.04�6.20 02 49 24.9 52 08 41 02 52 57.2 52 20 56 0.52 0.21 IRAS 02493+5208 141.04�6.22 02 49 21.8 52 07 46 02 52 54.1 52 20 02 0.11 0.08 141.13�4.81 02 54 05.0 53 20 27 02 57 41.3 53 32 28 0.26 0.17 141.16�5.95 02 50 51.5 52 18 32 02 54 24.6 52 30 43 0.11 0.11 141.16�5.56 02 52 01.2 52 39 33 02 55 35.4 52 51 41 0.11 0.10 141.16�6.09 02 50 24.3 52 11 13 02 53 57.0 52 23 25 0.14 0.08 141.17�6.46 02 49 25.2 51 51 22 02 52 56.9 52 03 37 0.32 0.14 HFLLZOA G141.16-06.46 141.19�4.07 02 56 48.5 53 58 12 03 00 27.0 54 10 05 0.11 0.08 141.24+6.42 03 40 26.2 62 47 47 03 44 47.6 62 57 12 0.11 0.09 141.25�5.97 02 51 16.6 52 15 29 02 54 49.7 52 27 39 0.10 0.07 141.25�3.11 03 00 16.8 54 46 47 03 03 58.3 54 58 29 0.09 0.08 141.26�5.97 02 51 20.6 52 14 55 02 54 53.7 52 27 05 0.11 0.07 141.26�2.99 03 00 43.9 54 52 55 03 04 25.8 55 04 36 0.08 0.07 141.28�6.34 02 50 23.1 51 54 27 02 53 55.2 52 06 40 0.20 0.09 HFLLZOA G141.27-06.35? 141.28�6.35 02 50 22.9 51 54 12 02 53 55.0 52 06 25 0.19 0.08 HFLLZOA G141.27-06.35 141.32�1.04 03 07 59.0 56 33 16 03 11 47.5 56 44 33 0.11 0.08 141.34�6.08 02 51 29.9 52 06 51 02 55 02.8 52 19 00 0.11 0.11 141.34�4.20 02 57 18.4 53 46 42 03 00 56.6 53 58 33 0.09 0.07 141.35�4.85 02 55 17.2 53 12 08 02 58 53.5 53 24 06 0.29 0.15 ZOAG G141.34-04.85 141.38�6.12 02 51 38.3 52 03 45 02 55 11.1 52 15 54 0.11 0.10 141.41�4.93 02 55 25.8 53 06 20 02 59 01.9 53 18 17 0.54 0.10 ZOAG G141.41-04.92 141.41�5.01 02 55 10.0 53 01 55 02 58 45.9 53 13 53 0.30 0.15 141.41�6.19 02 51 32.8 51 59 02 02 55 05.4 52 11 11 0.09 0.07 141.41�2.49 03 03 23.2 55 14 42 03 07 06.8 55 26 14 0.19 0.08 141.42�5.09 02 54 57.2 52 57 13 02 58 32.8 53 09 12 0.26 0.11 141.42�3.21 03 01 00.1 54 36 37 03 04 41.4 54 48 17 0.11 0.07 141.44�6.20 02 51 41.7 51 57 58 02 55 14.3 52 10 07 0.21 0.21 141.45�5.52 02 53 48.3 52 33 42 02 57 22.8 52 45 44 0.09 0.09 141.47�6.19 02 51 56.6 51 57 32 02 55 29.2 52 09 40 0.11 0.07 141.49�2.61 03 03 28.4 55 06 15 03 07 11.7 55 17 47 0.22 0.20 ZOAG G141.48-02.61 141.52�4.89 02 56 09.8 53 05 08 02 59 46.1 53 17 03 0.21 0.12 141.53+2.97 03 25 34.6 59 49 41 03 29 39.1 59 59 59 0.10 0.08 IRAS 03256+5949 141.54+7.00 03 45 40.1 63 04 34 03 50 04.5 63 13 40 0.13 0.12 141.54+5.61 03 38 17.6 61 58 31 03 42 34.6 62 08 04 0.34 0.20 141.56�4.49 02 57 39.0 53 25 17 03 01 16.5 53 37 07 0.16 0.11 141.60�4.51 02 57 49.3 53 23 27 03 01 26.7 53 35 17 0.19 0.09 141.61�4.75 02 57 09.0 53 10 06 03 00 45.7 53 21 58 0.21 0.18 141.61�5.50 02 54 48.8 52 30 15 02 58 23.4 52 42 14 0.07 0.07 141.61�0.40 03 12 12.5 56 56 36 03 16 03.4 57 07 40 0.15 0.08 141.62�0.40 03 12 13.5 56 56 33 03 16 04.4 57 07 37 0.11 0.11 141.62�0.43 03 12 08.2 56 55 06 03 15 59.0 57 06 10 0.11 0.09 141.65�3.53 03 01 18.1 54 13 29 03 04 58.5 54 25 08 0.06 0.05 141.66�5.21 02 56 01.1 52 44 37 02 59 36.6 52 56 32 0.23 0.20 141.66�4.01 02 59 46.8 53 48 04 03 03 25.8 53 59 48 0.11 0.11 141.67�5.92 02 53 53.3 52 06 17 02 57 26.8 52 18 19 0.14 0.10 141.69�3.40 03 02 00.5 54 18 46 03 05 41.3 54 30 23 0.10 0.07 141.70�5.57 02 55 06.1 52 24 19 02 58 40.6 52 36 17 0.11 0.07 141.72�3.53 03 01 45.3 54 11 08 03 05 25.8 54 22 46 0.19 0.18 141.72�4.13 02 59 46.7 53 39 42 03 03 25.3 53 51 26 0.09 0.07 141.74�4.20 02 59 39.4 53 35 31 03 03 17.8 53 47 15 0.09 0.07 ZOAG G141.74-04.20 141.77�3.81 03 01 05.4 53 55 01 03 04 45.0 54 06 41 0.94 0.32 MCG +09-06-002 141.78�4.13 03 00 06.8 53 37 48 03 03 45.5 53 49 31 0.09 0.07 141.80�3.25 03 03 08.5 54 23 43 03 06 49.9 54 35 16 0.42 0.33 ZOAG G141.79-03.25 141.80�1.89 03 07 53.3 55 34 03 03 11 39.1 55 45 21 0.05 0.04 141.80�3.02 03 03 53.8 54 35 34 03 07 35.9 54 47 05 0.11 0.08 141.84�3.59 03 02 15.8 54 04 18 03 05 56.1 54 15 54 0.61 0.35 MCG +09-06-003

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 141.85�0.64 03 12 47.4 56 37 01 03 16 37.5 56 48 03 0.08 0.07 141.85�2.89 03 04 39.6 54 40 49 03 08 22.1 54 52 17 0.08 0.06 141.87�2.48 03 06 13.4 55 01 46 03 09 57.3 55 13 09 0.07 0.05 141.90�2.83 03 05 10.0 54 42 18 03 08 52.7 54 53 45 0.11 0.10 141.90�3.94 03 01 27.4 53 44 38 03 05 06.7 53 56 16 0.17 0.07 141.90�4.71 02 58 56.3 53 04 19 03 02 33.3 53 16 05 0.09 0.08 141.94�3.71 03 02 27.7 53 55 20 03 06 07.7 54 06 55 0.10 0.07 7C 0302+5355 141.96�2.65 03 06 12.2 54 50 10 03 09 55.6 55 01 33 0.10 0.07 IRAS 03061+5450 141.99�4.95 02 58 44.5 52 48 56 03 02 20.9 53 00 43 0.34 0.24 ZOAG G141.98-04.95 142.00�5.07 02 58 22.0 52 42 13 03 01 58.0 52 54 01 0.11 0.07 142.04�4.19 03 01 25.3 53 27 14 03 05 03.9 53 38 53 0.21 0.19 142.04�4.41 03 00 45.0 53 15 34 03 04 23.0 53 27 15 0.08 0.05 142.05+6.78 03 47 56.3 62 35 03 03 52 19.1 62 44 01 0.36 0.11 142.05�4.45 03 00 40.6 53 13 35 03 04 18.5 53 25 16 0.09 0.08 142.06�2.70 03 06 36.0 54 44 46 03 10 19.2 54 56 08 0.15 0.10 142.07�5.51 02 57 24.4 52 17 22 03 00 59.2 52 29 13 0.09 0.09 142.10�4.66 03 00 16.3 53 00 50 03 03 53.5 53 12 32 0.19 0.08 142.11+6.06 03 44 23.9 61 58 59 03 48 42.8 62 08 10 0.34 0.13 142.12�3.81 03 03 11.1 53 44 43 03 06 50.9 53 56 16 0.09 0.09 142.12�4.66 03 00 25.5 53 00 32 03 04 02.8 53 12 14 0.18 0.10 142.12�4.86 02 59 43.1 52 49 50 03 03 19.8 53 01 34 0.11 0.09 142.14�4.53 03 00 55.1 53 06 54 03 04 32.8 53 18 34 0.33 0.08 142.14�4.65 03 00 32.2 53 00 10 03 04 09.5 53 11 51 0.11 0.09 142.15�4.98 02 59 31.7 52 42 54 03 03 08.1 52 54 39 0.17 0.09 142.16�3.49 03 04 28.9 54 00 26 03 08 09.7 54 11 55 0.11 0.08 142.17�5.82 02 57 03.1 51 57 37 03 00 37.1 52 09 29 0.11 0.10 142.17�5.93 02 56 42.2 51 51 42 03 00 15.9 52 03 35 0.21 0.08 142.17�4.99 02 59 38.3 52 41 47 03 03 14.6 52 53 31 0.10 0.09 4C +52.07 142.19�3.66 03 04 05.7 53 50 57 03 07 46.0 54 02 27 0.10 0.07 142.21�5.01 02 59 47.1 52 39 35 03 03 23.4 52 51 19 0.19 0.11 142.22�5.91 02 57 02.6 51 51 51 03 00 36.4 52 03 43 0.10 0.09 142.23+6.05 03 45 09.6 61 54 11 03 49 28.4 62 03 19 0.15 0.10 142.23�4.69 03 00 56.4 52 55 47 03 04 33.6 53 07 27 0.08 0.07 142.24�4.57 03 01 24.2 53 01 46 03 05 01.8 53 13 25 0.10 0.07 142.25+7.49 03 53 10.0 63 00 12 03 57 36.3 63 08 51 0.09 0.07 142.25�4.67 03 01 06.9 52 56 16 03 04 44.2 53 07 56 0.10 0.09 142.25�4.38 03 02 04.2 53 11 32 03 05 42.4 53 23 09 0.09 0.07 ZOAG G142.25-04.38 142.26+3.74 03 33 53.4 60 02 12 03 38 01.2 60 12 01 0.11 0.10 142.27�4.37 03 02 11.7 53 11 33 03 05 49.9 53 23 09 0.19 0.09 ZOAG G142.26-04.37 142.28�3.75 03 04 20.1 53 43 25 03 08 00.1 53 54 54 0.08 0.07 142.33�3.29 03 06 07.4 54 05 41 03 09 48.8 54 17 05 0.22 0.11 87GB 030608.1+540543 142.36�5.28 02 59 47.3 52 21 11 03 03 22.9 52 32 55 0.07 0.07 142.36�4.23 03 03 11.0 53 15 54 03 06 49.6 53 27 27 0.10 0.07 142.37�3.75 03 04 49.3 53 40 39 03 08 29.4 53 52 07 0.17 0.16 142.37�3.91 03 04 17.0 53 32 25 03 07 56.6 53 43 55 0.17 0.09 142.38�3.74 03 04 55.2 53 40 43 03 08 35.3 53 52 11 0.11 0.08 142.40�3.97 03 04 17.5 53 28 19 03 07 56.9 53 39 49 0.11 0.11 142.40�4.30 03 03 13.4 53 11 13 03 06 51.9 53 22 46 0.10 0.09 142.40�4.45 03 02 40.8 53 03 29 03 06 18.8 53 15 04 0.09 0.07 142.41�3.76 03 05 03.3 53 38 41 03 08 43.3 53 50 08 0.29 0.07 142.43�3.76 03 05 08.9 53 38 31 03 08 49.0 53 49 58 0.17 0.09 142.46�4.27 03 03 37.9 53 11 11 03 07 16.5 53 22 43 0.10 0.08 142.46�4.28 03 03 36.8 53 09 59 03 07 15.3 53 21 31 0.18 0.09 142.46�4.50 03 02 55.0 52 58 59 03 06 32.9 53 10 33 0.06 0.04 142.47�5.04 03 01 12.4 52 30 05 03 04 48.7 52 41 44 0.11 0.07 142.48�4.39 03 03 22.2 53 03 53 03 07 00.4 53 15 25 0.38 0.19 ZOAG G142.48-04.39 142.54�4.19 03 04 21.8 53 12 52 03 08 00.6 53 24 21 0.10 0.08 142.54�4.76 03 02 29.8 52 42 35 03 06 06.9 52 54 10 0.21 0.07 142.56�3.84 03 05 39.6 53 30 01 03 09 19.5 53 41 26 0.11 0.08 142.56�4.07 03 04 53.4 53 18 34 03 08 32.6 53 30 02 0.22 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 142.57�4.08 03 04 52.0 53 17 27 03 08 31.1 53 28 55 0.11 0.11 142.58�4.37 03 03 59.4 53 02 19 03 07 37.7 53 13 50 0.14 0.11 142.60�4.06 03 05 08.9 53 17 54 03 08 48.1 53 29 21 0.18 0.10 142.63�4.24 03 04 43.0 53 07 12 03 08 21.7 53 18 40 0.19 0.11 142.64+6.04 03 47 47.1 61 38 27 03 52 05.5 61 47 26 0.31 0.11 142.64�1.79 03 13 17.3 55 13 23 03 17 03.7 55 24 23 0.14 0.14 142.67�4.33 03 04 38.2 53 01 34 03 08 16.7 53 13 02 0.18 0.11 142.67�4.16 03 05 13.6 53 10 25 03 08 52.6 53 21 52 0.11 0.09 ZOAG G142.67-04.16 142.67�4.00 03 05 44.0 53 18 40 03 09 23.4 53 30 05 0.08 0.07 142.67�3.99 03 05 46.9 53 18 54 03 09 26.3 53 30 19 0.22 0.11 142.68�3.89 03 06 09.7 53 24 03 03 09 49.5 53 35 27 0.11 0.07 142.69�4.16 03 05 19.2 53 09 37 03 08 58.2 53 21 03 0.16 0.09 ZOAG G142.69-04.16 142.70�4.31 03 04 53.7 53 01 50 03 08 32.2 53 13 18 0.18 0.09 142.71+6.69 03 51 45.2 62 05 58 03 56 06.8 62 14 42 0.22 0.20 142.71�4.46 03 04 25.8 52 53 51 03 08 03.9 53 05 20 0.22 0.10 142.71�4.17 03 05 25.9 53 08 49 03 09 04.8 53 20 15 0.09 0.07 ZOAG G142.71-04.17 142.74�5.02 03 02 48.2 52 23 28 03 06 24.7 52 35 02 0.33 0.30 142.74�4.22 03 05 23.7 53 05 25 03 09 02.5 53 16 51 0.17 0.08 142.75�4.51 03 04 31.0 52 49 42 03 08 09.0 53 01 11 0.19 0.10 142.77�4.00 03 06 19.4 53 15 37 03 09 58.9 53 27 00 0.10 0.07 142.78�4.00 03 06 22.6 53 15 17 03 10 02.1 53 26 40 0.07 0.07 142.78�4.09 03 06 05.2 53 10 36 03 09 44.4 53 22 00 0.11 0.10 142.78�4.53 03 04 39.2 52 48 00 03 08 17.1 52 59 28 0.19 0.09 142.79�4.01 03 06 22.8 53 14 45 03 10 02.2 53 26 08 0.09 0.07 87GB 030624.3+531434 142.80+5.43 03 45 40.7 61 03 29 03 49 56.0 61 12 36 0.22 0.19 142.83+8.08 04 00 26.9 63 04 10 04 04 55.6 63 12 21 0.19 0.18 HFLLZOA G142.83+08.08 142.83�3.58 03 08 05.9 53 35 22 03 11 46.6 53 46 39 0.18 0.11 142.83�3.99 03 06 42.8 53 14 09 03 10 22.3 53 25 31 0.10 0.09 142.85�3.31 03 09 07.5 53 48 42 03 12 49.1 53 59 56 0.11 0.09 142.87�4.75 03 04 24.1 52 33 54 03 08 01.4 52 45 23 0.19 0.09 142.89�4.48 03 05 25.4 52 47 16 03 09 03.5 52 58 42 0.09 0.08 142.92�2.91 03 10 56.4 54 07 24 03 14 39.2 54 18 32 0.07 0.06 142.94�4.87 03 04 24.4 52 25 41 03 08 01.4 52 37 10 0.19 0.08 142.95�3.37 03 09 31.0 53 42 47 03 13 12.4 53 54 00 0.07 0.07 142.96�3.74 03 08 17.3 53 23 29 03 11 57.6 53 34 46 0.11 0.09 142.96�4.88 03 04 29.5 52 24 00 03 08 06.5 52 35 29 0.11 0.07 142.98�1.54 03 16 17.1 55 15 35 03 20 04.4 55 26 25 0.06 0.04 142.98�2.42 03 13 02.3 54 30 40 03 16 46.7 54 41 41 0.08 0.04 142.98�4.76 03 05 01.3 52 29 55 03 08 38.6 52 41 22 0.10 0.07 143.00�4.00 03 07 38.5 53 08 29 03 11 18.0 53 19 48 0.08 0.08 143.00�3.60 03 08 59.8 53 29 28 03 12 40.5 53 40 42 0.07 0.07 143.08+7.58 03 59 10.1 62 32 19 04 03 35.9 62 40 35 0.33 0.12 143.09�4.58 03 06 14.4 52 35 44 03 09 52.3 52 47 07 0.15 0.09 143.11�4.81 03 05 35.4 52 23 41 03 09 12.6 52 35 06 0.20 0.11 143.16+5.25 03 47 05.7 60 42 04 03 51 19.9 60 51 05 0.11 0.07 143.17�4.64 03 06 28.5 52 30 38 03 10 06.2 52 42 01 0.16 0.09 143.19�5.19 03 04 46.9 52 01 17 03 08 23.1 52 12 45 0.09 0.07 143.19�4.92 03 05 40.2 52 15 16 03 09 17.1 52 26 41 0.10 0.10 143.20�3.17 03 11 39.6 53 45 21 03 15 21.7 53 56 27 0.22 0.10 143.21+5.48 03 48 31.0 60 50 50 03 52 46.2 60 59 46 0.32 0.14 143.21�2.50 03 14 06.4 54 19 31 03 17 50.6 54 30 29 0.10 0.08 143.22�3.77 03 09 41.0 53 13 59 03 13 21.3 53 25 11 0.11 0.10 143.23�4.77 03 06 24.6 52 21 46 03 10 02.0 52 33 09 0.08 0.07 143.25�4.54 03 07 14.5 52 33 05 03 10 52.5 52 44 25 0.16 0.10 143.27�3.44 03 11 07.7 53 29 13 03 14 49.0 53 40 20 0.10 0.09 143.27�4.14 03 08 43.7 52 53 25 03 12 22.9 53 04 40 0.19 0.07 143.29�3.99 03 09 20.0 53 00 28 03 12 59.6 53 11 41 0.07 0.07 143.31�4.74 03 06 54.7 52 21 00 03 10 32.2 52 32 21 0.15 0.10 143.32�4.94 03 06 20.0 52 10 25 03 09 56.9 52 21 48 0.18 0.10 143.34�4.80 03 06 52.9 52 17 03 03 10 30.2 52 28 24 0.11 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 143.35�3.77 03 10 26.0 53 09 38 03 14 06.3 53 20 48 0.09 0.07 143.35�4.57 03 07 45.0 52 28 47 03 11 23.0 52 40 06 0.16 0.10 143.36�3.61 03 11 01.5 53 17 53 03 14 42.3 53 29 01 0.11 0.07 143.37�1.96 03 17 00.6 54 41 29 03 20 46.5 54 52 17 0.19 0.08 ZOAG G143.37-01.96 143.38�4.77 03 07 12.8 52 17 26 03 10 50.2 52 28 46 0.19 0.09 143.39�3.54 03 11 25.4 53 20 25 03 15 06.4 53 31 32 0.10 0.10 143.41�4.90 03 06 59.1 52 09 50 03 10 36.2 52 21 11 0.09 0.07 143.42�4.57 03 08 05.0 52 26 26 03 11 43.0 52 37 43 0.22 0.08 ZOAG G143.41-04.57 143.42�5.15 03 06 12.6 51 56 17 03 09 48.9 52 07 40 0.19 0.10 143.43�4.02 03 10 00.9 52 54 43 03 13 40.5 53 05 54 0.11 0.08 143.44�3.44 03 12 05.2 53 23 56 03 15 46.5 53 35 00 0.10 0.09 143.45�2.85 03 14 13.0 53 53 55 03 17 56.1 54 04 52 0.06 0.04 143.46+2.13 03 34 06.3 58 01 59 03 38 07.0 58 11 48 0.04 0.04 143.48+5.39 03 49 50.4 60 36 31 03 54 05.0 60 45 22 0.11 0.07 [WB92] 0349+6037 143.49�2.00 03 17 33.1 54 35 58 03 21 18.9 54 46 44 0.11 0.07 143.49�4.90 03 07 25.7 52 07 30 03 11 02.8 52 18 50 0.10 0.07 143.53�3.66 03 11 49.6 53 09 48 03 15 30.3 53 20 53 0.18 0.10 IRAS 03118+5309 143.53�4.90 03 07 36.4 52 06 05 03 11 13.5 52 17 24 0.11 0.08 143.54�5.12 03 06 59.8 51 54 17 03 10 36.3 52 05 38 0.11 0.08 143.54�4.79 03 08 05.5 52 11 34 03 11 42.9 52 22 51 0.08 0.07 143.54�4.97 03 07 26.7 52 02 12 03 11 03.6 52 13 32 0.21 0.19 IRAS 03074+5202 143.55�4.91 03 07 42.5 52 05 15 03 11 19.6 52 16 34 0.10 0.08 143.56�4.97 03 07 34.8 52 01 33 03 11 11.7 52 12 52 0.10 0.10 143.59�3.89 03 11 24.2 52 56 32 03 15 04.2 53 07 39 0.11 0.10 143.66�4.90 03 08 23.3 52 02 20 03 12 00.4 52 13 36 0.08 0.08 143.67+5.01 03 49 00.7 60 11 37 03 53 13.4 60 20 31 0.47 0.32 IRAS 03490+6011 143.68�4.77 03 08 55.8 52 08 25 03 12 33.3 52 19 40 0.07 0.07 ZOAG G143.68-04.77 143.70�4.88 03 08 40.1 52 02 04 03 12 17.3 52 13 20 0.17 0.09 143.71�3.66 03 12 49.4 53 04 24 03 16 30.1 53 15 26 0.07 0.07 143.71�4.70 03 09 17.1 52 11 04 03 12 54.8 52 22 18 0.11 0.11 143.73�4.69 03 09 28.6 52 11 04 03 13 06.3 52 22 17 0.11 0.07 143.75�4.83 03 09 06.8 52 02 54 03 12 44.1 52 14 08 0.23 0.19 87GB 030905.4+520227 143.76�3.80 03 12 39.8 52 55 22 03 16 20.1 53 06 24 0.13 0.11 143.78�2.04 03 19 06.1 54 24 37 03 22 51.8 54 35 18 0.10 0.10 143.79�4.73 03 09 40.5 52 06 54 03 13 18.1 52 18 06 0.21 0.11 143.80�2.97 03 15 47.1 53 36 51 03 19 29.9 53 47 43 0.10 0.10 143.82+7.93 04 05 53.9 62 18 04 04 10 20.3 62 25 54 0.35 0.10 143.83+6.02 03 55 18.7 60 51 54 03 59 35.9 61 00 25 0.35 0.11 143.83�4.40 03 10 59.6 52 22 59 03 14 38.2 52 34 07 0.11 0.08 143.83�4.45 03 10 50.7 52 20 12 03 14 29.1 52 31 20 0.12 0.07 ZOAG G143.83-04.45 143.83�4.99 03 09 00.0 51 52 28 03 12 36.9 52 03 43 0.16 0.11 ZOAG G143.83-04.99 143.83�4.86 03 09 26.3 51 59 05 03 13 03.6 52 10 18 0.17 0.11 143.84�4.72 03 09 59.0 52 06 08 03 13 36.7 52 17 19 0.12 0.08 143.88+6.88 04 00 17.2 61 29 27 04 04 38.4 61 37 39 0.44 0.14 143.90+2.73 03 39 27.5 58 15 35 03 43 30.4 58 25 05 0.20 0.14 ZOAG G143.89+02.73 143.91+2.21 03 37 11.3 57 49 59 03 41 12.1 57 59 37 0.11 0.09 143.96�3.89 03 13 29.1 52 44 29 03 17 09.2 52 55 29 0.21 0.08 87GB 031332.1+524426 143.97�3.95 03 13 17.5 52 41 29 03 16 57.4 52 52 29 0.18 0.11 143.98�3.83 03 13 46.9 52 47 27 03 17 27.2 52 58 26 0.18 0.09 143.98�4.99 03 09 51.1 51 47 49 03 13 28.0 51 59 01 0.10 0.07 143.98�5.01 03 09 47.2 51 46 36 03 13 24.1 51 57 48 0.11 0.08 144.03�5.12 03 09 40.3 51 39 33 03 13 16.9 51 50 45 0.11 0.08 144.05�4.81 03 10 51.8 51 54 57 03 14 29.3 52 06 05 0.10 0.07 144.06�4.57 03 11 42.9 52 06 33 03 15 21.0 52 17 39 0.10 0.07 144.08�4.76 03 11 09.5 51 56 48 03 14 47.1 52 07 55 0.11 0.10 144.10+5.81 03 55 51.5 60 31 47 04 00 07.4 60 40 16 0.11 0.07 144.10+5.90 03 56 19.6 60 36 22 04 00 35.9 60 44 49 0.12 0.10 144.14�4.83 03 11 14.8 51 51 13 03 14 52.2 52 02 20 0.19 0.14 144.14�5.07 03 10 26.8 51 38 42 03 14 03.5 51 49 52 0.09 0.09 144.15�5.24 03 09 56.8 51 29 55 03 13 33.1 51 41 06 0.15 0.14

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 144.16+5.97 03 57 05.2 60 37 03 04 01 21.8 60 45 27 0.29 0.18 144.17�3.90 03 14 38.4 52 37 34 03 18 18.5 52 48 30 0.10 0.09 144.19�5.36 03 09 46.7 51 22 35 03 13 22.7 51 33 47 0.09 0.07 144.21�4.75 03 11 56.5 51 52 44 03 15 34.2 52 03 49 0.12 0.11 144.22�4.52 03 12 45.4 52 04 46 03 16 23.7 52 15 48 0.14 0.13 ZOAG G144.21-04.52 144.24�5.40 03 09 54.6 51 18 33 03 13 30.5 51 29 45 0.11 0.08 144.26�5.09 03 11 04.0 51 33 46 03 14 40.7 51 44 54 0.15 0.10 144.29+7.24 04 04 50.5 61 29 06 04 09 12.9 61 37 00 0.21 0.08 144.33+7.23 04 05 01.0 61 27 09 04 09 23.3 61 35 03 0.14 0.13 144.33+5.79 03 57 08.0 60 22 19 04 01 23.6 60 30 43 0.36 0.20 IRAS 03571+6022 144.34�3.05 03 18 34.7 53 15 09 03 22 17.3 53 25 52 0.10 0.09 144.38+2.33 03 40 32.2 57 38 34 03 44 33.2 57 48 00 0.07 0.06 144.38�4.55 03 13 29.8 51 57 49 03 17 08.0 52 08 49 0.09 0.08 144.40�1.95 03 22 58.0 54 08 39 03 26 44.0 54 19 07 0.48 0.22 IRAS 03229+5408 144.42�4.61 03 13 33.4 51 53 33 03 17 11.5 52 04 33 0.21 0.11 144.42�4.74 03 13 07.2 51 46 50 03 16 44.9 51 57 51 0.26 0.12 ZOAG G144.42-04.74 144.43�4.43 03 14 13.8 52 02 29 03 17 52.4 52 13 26 0.10 0.08 144.45�4.85 03 12 55.4 51 40 08 03 16 32.8 51 51 10 0.10 0.09 144.46�5.30 03 11 28.0 51 16 46 03 15 04.2 51 27 53 0.11 0.09 144.47�5.02 03 12 28.6 51 31 05 03 16 05.6 51 42 08 0.09 0.09 144.49�3.70 03 17 06.1 52 37 14 03 20 46.8 52 48 02 0.26 0.08 144.51�3.82 03 16 47.0 52 30 51 03 20 27.3 52 41 40 0.07 0.07 144.52+6.24 04 00 42.2 60 35 14 04 04 59.6 60 43 24 0.18 0.15 144.53�3.78 03 17 03.4 52 32 29 03 20 43.9 52 43 17 0.08 0.07 144.54+5.76b 03 58 18.4 60 12 34 04 02 33.6 60 20 53 0.36 0.20 144.54+5.76a 03 58 17.2 60 12 28 04 02 32.4 60 20 48 0.08 0.07 IRAS 03582+6012 144.56�4.47 03 14 49.4 51 56 20 03 18 27.9 52 07 15 0.08 0.07 144.61+5.73 03 58 33.1 60 08 15 04 02 48.1 60 16 34 0.19 0.12 144.65+2.45 03 42 40.4 57 34 36 03 46 41.8 57 43 54 0.13 0.12 144.66�3.12 03 20 04.5 53 01 20 03 23 46.9 53 11 58 0.19 0.08 144.66�2.93 03 20 46.5 53 10 48 03 24 29.5 53 21 23 0.07 0.07 144.67�5.87 03 10 43.0 50 41 00 03 14 17.7 50 52 09 0.13 0.11 HFLLZOA G144.67-05.87 144.69�4.06 03 16 56.5 52 12 46 03 20 36.2 52 23 34 0.15 0.10 144.70�4.74 03 14 39.1 51 37 51 03 18 16.8 51 48 47 0.31 0.10 144.71+1.86 03 40 24.1 57 04 16 03 44 23.2 57 13 42 0.05 0.04 144.71�2.96 03 20 58.8 53 07 50 03 24 41.7 53 18 25 0.10 0.07 144.76�5.14 03 13 35.7 51 15 44 03 17 12.3 51 26 44 0.09 0.08 144.77�3.78 03 18 22.9 52 24 43 03 22 03.4 52 35 27 0.11 0.09 144.78�2.98 03 21 16.1 53 04 31 03 24 58.9 53 15 05 0.17 0.08 144.78�4.24 03 16 47.6 52 01 15 03 20 26.8 52 12 04 0.11 0.08 144.81�3.05 03 21 14.1 53 00 08 03 24 56.7 53 10 42 0.29 0.09 ZOAG G144.81-03.04 144.81�3.57 03 19 18.1 52 33 45 03 22 59.2 52 44 25 0.16 0.08 144.81�3.75 03 18 39.2 52 24 50 03 22 19.8 52 35 33 0.08 0.07 144.82�3.05 03 21 15.7 52 59 34 03 24 58.3 53 10 08 0.16 0.07 ZOAG G144.82-03.05 144.82�3.75 03 18 42.3 52 24 28 03 22 22.9 52 35 10 0.14 0.09 144.82�6.22 03 10 23.6 50 18 48 03 13 57.4 50 29 58 0.07 0.07 144.83�6.27 03 10 16.7 50 15 30 03 13 50.4 50 26 40 0.21 0.20 HFLLZOA G144.83-06.27 144.86�4.12 03 17 39.8 52 04 22 03 21 19.3 52 15 08 0.11 0.08 144.86�4.04 03 17 55.8 52 08 47 03 21 35.5 52 19 32 0.10 0.09 144.90+0.45 03 35 23.1 55 49 47 03 39 17.0 55 59 31 0.08 0.05 IRAS 03353+5550 144.92�2.94 03 22 13.7 53 01 52 03 25 56.7 53 12 22 0.15 0.09 144.93�3.00 03 22 05.3 52 58 41 03 25 48.1 53 09 12 0.08 0.08 144.93�4.81 03 15 37.8 51 27 14 03 19 15.4 51 38 07 0.30 0.08 144.93�5.78 03 12 23.6 50 37 56 03 15 58.6 50 49 00 0.18 0.11 144.94�5.10 03 14 43.2 51 12 05 03 18 20.0 51 23 01 0.37 0.20 MCG +09-06-004 144.94�5.77 03 12 30.6 50 37 54 03 16 05.6 50 48 57 0.18 0.18 144.95+6.82 04 06 28.2 60 44 02 04 10 47.6 60 51 50 0.21 0.20 144.95�3.51 03 20 19.6 52 32 33 03 24 00.9 52 43 10 0.11 0.09 144.95�5.19 03 14 28.8 51 07 04 03 18 05.3 51 18 01 0.10 0.08 144.97�3.39 03 20 50.0 52 37 39 03 24 31.6 52 48 14 0.15 0.11

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id.

144.97�5.60 03 13 13.5 50 45 32 03 16 48.9 50 56 33 0.20 0.11 HFLLZOA G144.97-05.60 145.01�2.53 03 24 14.0 53 19 29 03 27 58.2 53 29 53 0.08 0.07 145.03�3.44 03 21 00.7 52 33 28 03 24 42.2 52 44 03 0.10 0.08 145.04�4.35 03 17 50.8 51 46 45 03 21 29.7 51 57 30 0.14 0.14 145.04�4.30 03 17 59.2 51 49 30 03 21 38.2 52 00 15 0.09 0.08 145.04�4.85 03 16 07.4 51 21 57 03 19 44.9 51 32 48 0.13 0.12 145.04�5.52 03 13 51.3 50 47 35 03 17 27.0 50 58 34 0.11 0.07 145.05�3.74 03 20 02.2 52 17 50 03 23 42.8 52 28 28 0.12 0.07 145.05�5.58 03 13 41.6 50 44 11 03 17 17.1 50 55 10 0.18 0.10 145.08�4.84 03 16 20.5 51 20 52 03 19 58.0 51 31 42 0.16 0.08 ZOAG G145.08-04.84 145.09�4.56 03 17 22.1 51 34 35 03 21 00.4 51 45 22 0.14 0.09 145.10�6.05 03 12 23.5 50 18 34 03 15 57.8 50 29 38 0.11 0.10 145.11�6.51 03 10 58.7 49 54 31 03 14 31.8 50 05 39 0.13 0.11 145.13+3.16 03 48 48.2 57 49 59 03 52 52.0 57 58 54 0.08 0.08 145.13�4.46 03 17 55.1 51 38 49 03 21 33.7 51 49 34 0.46 0.11 145.14�4.68 03 17 14.6 51 27 03 03 20 52.5 51 37 50 0.31 0.09 ZOAG G145.13-04.68 145.14�4.56 03 17 40.2 51 33 25 03 21 18.5 51 44 11 0.08 0.08 145.16�5.04 03 16 07.3 51 07 54 03 19 44.3 51 18 45 0.21 0.07 IRAS 03161+5108 145.16�6.61 03 10 55.6 49 47 46 03 14 28.4 49 58 54 0.26 0.10 145.17+2.69 03 46 48.3 57 26 53 03 50 50.3 57 35 56 0.20 0.13 145.18�3.88 03 20 15.6 52 06 22 03 23 55.8 52 16 59 0.11 0.09 145.18�4.87 03 16 48.6 51 15 56 03 20 26.0 51 26 45 0.15 0.10 145.20+2.10 03 44 17.8 56 58 02 03 48 17.5 57 07 14 0.19 0.09 ZOAG G145.19+02.10 145.20�5.54 03 14 37.7 50 41 19 03 18 13.3 50 52 15 0.19 0.18 145.21+1.51 03 41 45.1 56 29 26 03 45 42.7 56 38 47 0.11 0.07 145.22�2.44 03 25 42.8 53 16 40 03 29 27.2 53 26 58 0.08 0.08 145.22�4.42 03 18 34.7 51 37 39 03 22 13.4 51 48 22 0.43 0.15 ZOAG G145.22-04.41 145.23�4.78 03 17 23.2 51 19 13 03 21 00.9 51 30 00 0.14 0.08 ZOAG G145.23-04.78 145.24�2.42 03 25 54.3 53 17 24 03 29 38.8 53 27 42 0.09 0.07 145.24�6.65 03 11 13.2 49 43 29 03 14 45.9 49 54 36 0.09 0.08 145.25�6.81 03 10 45.0 49 34 55 03 14 17.3 49 46 04 0.21 0.09 145.26�2.41 03 26 02.8 53 16 48 03 29 47.3 53 27 05 0.07 0.07 145.27+6.30 04 05 32.4 60 07 35 04 09 49.0 60 15 27 0.24 0.18 145.27�6.69 03 11 14.8 49 40 31 03 14 47.5 49 51 38 0.19 0.07 145.27�6.42 03 12 07.0 49 54 43 03 15 40.3 50 05 47 0.08 0.07 145.29+7.60 04 12 54.3 61 03 44 04 17 16.7 61 11 07 0.19 0.13 IRAS 04128+6103 145.29�0.44 03 33 54.5 54 52 55 03 37 45.3 55 02 45 0.11 0.07 145.29�2.58 03 25 34.2 53 07 29 03 29 18.2 53 17 48 0.09 0.07 145.32�6.73 03 11 21.9 49 36 56 03 14 54.5 49 48 03 0.11 0.08 145.34�2.58 03 25 52.0 53 05 38 03 29 36.0 53 15 56 0.11 0.09 145.34�4.79 03 17 56.7 51 14 56 03 21 34.3 51 25 41 0.18 0.11 145.35+6.61 04 07 41.5 60 18 23 04 11 59.4 60 26 06 0.20 0.18 145.35�4.81 03 17 54.0 51 14 06 03 21 31.6 51 24 51 0.11 0.09 145.35�4.84 03 17 48.3 51 12 37 03 21 25.8 51 23 23 0.11 0.11 145.42+7.36 04 12 19.2 60 47 55 04 16 40.3 60 55 20 0.14 0.11 IRAS 04122+6047 145.42�3.02 03 24 41.5 52 41 28 03 28 24.2 52 51 50 0.08 0.07 145.42�2.61 03 26 12.2 53 01 21 03 29 56.1 53 11 38 0.11 0.10 145.42�6.46 03 12 45.8 49 48 00 03 16 19.1 49 59 02 0.20 0.07 145.45�3.04 03 24 45.4 52 39 22 03 28 28.0 52 49 44 0.15 0.11 145.46�6.99 03 11 16.8 49 19 25 03 14 48.7 49 30 32 0.19 0.09 145.47�7.16 03 10 46.3 49 10 24 03 14 17.8 49 21 33 0.08 0.08 145.48�7.02 03 11 15.8 49 17 31 03 14 47.7 49 28 38 0.21 0.16 145.49�4.56 03 19 33.5 51 21 58 03 23 11.8 51 32 38 0.11 0.08 ZOAG G145.49-04.56 145.49�4.73 03 18 57.7 51 13 09 03 22 35.5 51 23 51 0.11 0.09 145.50+5.57 04 02 58.7 59 26 20 04 07 11.9 59 34 22 0.11 0.10 145.53+5.44 04 02 29.5 59 19 12 04 06 42.1 59 27 16 0.14 0.08 IRAS 04024+5919 145.53�6.96 03 11 41.7 49 18 41 03 15 13.7 49 29 47 0.11 0.08 145.54�3.60 03 23 13.2 52 08 35 03 26 54.2 52 19 02 0.08 0.07 145.55�1.21 03 32 19.0 54 06 07 03 36 07.2 54 16 02 0.11 0.09 145.55�6.36 03 13 47.1 49 48 23 03 17 20.6 49 59 22 0.13 0.07

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 145.56+5.62 04 03 35.6 59 25 51 04 07 48.9 59 33 50 0.55 0.23 145.57�3.11 03 25 09.4 52 31 30 03 28 51.8 52 41 50 0.08 0.08 145.57�6.19 03 14 26.4 49 56 53 03 18 00.4 50 07 50 0.09 0.08 145.57�6.60 03 13 06.2 49 35 59 03 16 39.1 49 47 00 0.22 0.07 145.57�7.06 03 11 34.6 49 12 18 03 15 06.4 49 23 24 0.17 0.08 145.57�7.07 03 11 35.6 49 11 41 03 15 07.3 49 22 47 0.14 0.12 145.58�6.58 03 13 12.5 49 36 54 03 16 45.5 49 47 55 0.13 0.10 145.59�4.89 03 18 55.3 51 01 50 03 22 32.7 51 12 32 0.11 0.09 145.59�7.21 03 11 15.0 49 04 00 03 14 46.4 49 15 07 0.10 0.09 145.60�7.39 03 10 43.5 48 54 24 03 14 14.5 49 05 33 0.09 0.08 HFLLZOA G145.59-07.39 145.61�5.73 03 16 09.4 50 18 45 03 19 44.5 50 29 36 0.11 0.10 145.61�7.32 03 10 59.1 48 57 47 03 14 30.2 49 08 55 0.09 0.08 145.62�3.50 03 23 58.4 52 10 46 03 27 39.7 52 21 11 0.24 0.18 145.62�6.28 03 14 24.4 49 50 58 03 17 58.1 50 01 55 0.11 0.10 145.62�6.91 03 12 20.7 49 18 17 03 15 52.8 49 29 21 0.20 0.18 145.63�6.51 03 13 42.0 49 38 21 03 17 15.1 49 49 20 0.16 0.15 145.65�2.06 03 29 35.2 53 21 05 03 33 20.7 53 31 10 0.09 0.08 145.65�4.84 03 19 26.8 51 02 42 03 23 04.3 51 13 22 0.22 0.07 145.65�5.34 03 17 42.6 50 37 35 03 21 18.8 50 48 21 0.11 0.08 145.66�6.51 03 13 53.4 49 37 50 03 17 26.6 49 48 49 0.21 0.09 145.66�7.18 03 11 43.0 49 03 18 03 15 14.5 49 14 24 0.19 0.18 145.67+3.24 03 52 19.3 57 33 45 03 56 23.0 57 42 27 0.22 0.09 145.67�3.48 03 24 21.5 52 10 14 03 28 02.8 52 20 37 0.07 0.07 145.67�5.14 03 18 29.2 50 46 54 03 22 05.9 50 57 37 0.09 0.08 145.67�6.00 03 15 34.9 50 03 04 03 19 09.3 50 13 57 0.06 0.04 145.67�7.07 03 12 07.9 49 08 47 03 15 39.7 49 19 51 0.09 0.09 145.67�7.15b 03 11 50.5 49 04 53 03 15 22.1 49 15 58 0.18 0.17 V Zw 334 145.67�7.15a 03 11 49.7 49 04 45 03 15 21.3 49 15 50 0.13 0.09 V Zw 334 NOTES02 145.68�7.07 03 12 09.4 49 08 33 03 15 41.2 49 19 37 0.15 0.11 145.69+2.45 03 48 43.3 56 55 47 03 52 44.0 57 04 43 0.18 0.08 ZOAG G145.69+02.45 145.70�3.46 03 24 35.8 52 10 11 03 28 17.2 52 20 33 0.22 0.10 145.71�6.81 03 13 08.0 49 20 51 03 16 40.4 49 31 52 0.10 0.08 145.72+4.26 03 57 33.0 58 18 39 04 01 40.6 58 27 02 0.19 0.11 IRAS 03575+5818 145.72�3.53 03 24 25.4 52 05 53 03 28 06.6 52 16 16 0.14 0.09 145.72�3.73 03 23 43.4 51 55 45 03 27 24.0 52 06 10 0.11 0.07 145.73�6.32 03 14 50.6 49 45 10 03 18 24.2 49 56 05 0.10 0.07 145.74�5.14 03 18 51.2 50 44 23 03 22 27.9 50 55 05 0.11 0.07 145.74�6.43 03 14 33.3 49 39 03 03 18 06.7 49 49 59 0.11 0.08 145.75�3.50 03 24 40.3 52 06 20 03 28 21.5 52 16 42 0.24 0.11 ZOAG G145.74-03.51 145.75�3.64 03 24 09.3 51 59 20 03 27 50.1 52 09 44 0.12 0.10 ZOAG G145.74-03.65 145.75�4.81 03 20 03.2 51 00 48 03 23 40.8 51 11 26 0.19 0.08 ZOAG G145.75-04.81 145.76�6.30 03 15 03.5 49 45 23 03 18 37.2 49 56 18 0.19 0.08 145.76�6.95 03 12 57.4 49 12 03 03 16 29.5 49 23 05 0.12 0.08 145.77�3.28 03 25 35.6 52 16 43 03 29 17.5 52 27 02 0.07 0.07 145.78�4.08 03 22 45.5 51 36 23 03 26 25.1 51 46 52 0.08 0.07 ZOAG G145.77-04.08 145.79�3.68 03 24 15.7 51 56 11 03 27 56.4 52 06 35 0.11 0.09 145.79�6.94 03 13 08.1 49 11 25 03 16 40.2 49 22 26 0.29 0.20 145.80�5.54 03 17 49.6 50 22 05 03 21 25.2 50 32 51 0.10 0.09 IRAS 03178+5022 145.82�4.02b 03 23 12.1 51 38 13 03 26 51.9 51 48 40 0.10 0.09 145.82�4.02a 03 23 10.7 51 37 59 03 26 50.5 51 48 26 0.11 0.09 145.83�3.47 03 25 14.3 52 05 20 03 28 55.6 52 15 40 0.21 0.11 145.84�3.38 03 25 38.5 52 09 13 03 29 20.1 52 19 32 0.14 0.09 145.84+1.20 03 43 58.3 55 51 50 03 47 54.4 56 01 03 0.10 0.08 ZOAG G145.83+01.20 145.84�4.71 03 20 51.7 51 03 03 03 24 29.6 51 13 38 0.33 0.32 ZOAG G145.83-04.71 145.84�7.30 03 12 14.9 48 52 02 03 15 46.1 49 03 06 0.07 0.07 145.85�7.32 03 12 15.0 48 50 29 03 15 46.2 49 01 33 0.11 0.09 145.87�2.74 03 28 10.8 52 39 43 03 31 54.2 52 49 53 0.10 0.07 145.87�2.95 03 27 22.8 52 29 53 03 31 05.6 52 40 06 0.09 0.07 145.87�3.36 03 25 52.4 52 09 24 03 29 34.0 52 19 42 0.30 0.09 145.87�6.76 03 14 07.2 49 18 05 03 17 39.7 49 29 03 0.15 0.12

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 145.87�7.75 03 10 58.7 48 27 43 03 14 28.8 48 38 51 0.18 0.18 145.88�6.65 03 14 31.9 49 23 26 03 18 04.7 49 34 23 0.19 0.08 145.88�6.68 03 14 27.0 49 22 08 03 17 59.7 49 33 05 0.11 0.09 145.89�5.31 03 19 02.0 50 31 00 03 22 38.2 50 41 41 0.10 0.09 145.89�7.05 03 13 20.0 49 03 02 03 16 51.8 49 14 03 0.14 0.07 145.90�3.52 03 25 28.3 52 00 21 03 29 09.5 52 10 40 0.12 0.08 145.90�6.36 03 15 36.4 49 37 55 03 19 09.9 49 48 48 0.14 0.12 145.90�7.64 03 11 29.3 48 32 23 03 14 59.7 48 43 30 0.09 0.09 145.91+6.48 04 10 12.9 59 49 49 04 14 29.4 59 57 23 0.24 0.12 145.91+5.62 04 05 36.5 59 11 59 04 09 49.4 59 19 51 0.12 0.12 145.91�3.80 03 24 26.4 51 46 00 03 28 06.8 51 56 23 0.22 0.11 145.91�6.89 03 13 55.3 49 10 32 03 17 27.5 49 21 31 0.15 0.15 145.92�6.92 03 13 52.7 49 08 47 03 17 24.8 49 19 46 0.22 0.07 145.93�2.80 03 28 15.4 52 34 46 03 31 58.6 52 44 56 0.11 0.09 145.93�6.32 03 15 52.4 49 38 55 03 19 26.0 49 49 47 0.08 0.07 145.93�6.43 03 15 31.0 49 33 17 03 19 04.4 49 44 10 0.12 0.11 145.93�6.65 03 14 48.8 49 21 48 03 18 21.6 49 32 44 0.18 0.15 145.95�4.91 03 20 46.2 50 49 31 03 24 23.5 51 00 07 0.18 0.11 ZOAG G145.95-04.91 145.95�5.08 03 20 09.5 50 40 50 03 23 46.4 50 51 28 0.13 0.07 145.95�6.09 03 16 45.3 49 49 53 03 20 19.5 50 00 42 0.29 0.11 145.95�6.89 03 14 07.8 49 09 16 03 17 40.0 49 20 14 0.11 0.10 145.95�7.05 03 13 36.3 49 01 21 03 17 08.1 49 12 21 0.12 0.11 145.96�6.65 03 14 57.7 49 21 06 03 18 30.5 49 32 01 0.16 0.15 145.96�7.57 03 12 01.9 48 34 18 03 15 32.5 48 45 23 0.09 0.07 145.97�3.30 03 26 37.3 52 09 10 03 30 19.1 52 19 25 0.09 0.09 145.97�5.23 03 19 45.4 50 32 20 03 23 21.9 50 42 59 0.14 0.11 145.97�6.05 03 16 59.6 49 51 11 03 20 33.9 50 01 59 0.21 0.11 145.97�6.93b 03 14 07.8 49 06 39 03 17 39.9 49 17 37 0.79 0.15 145.97�6.93a 03 14 06.8 49 06 38 03 17 38.9 49 17 36 0.12 0.12 145.97�6.94 03 14 04.0 49 06 15 03 17 36.1 49 17 13 0.22 0.21 HFLLZOA G145.96-06.93 145.97�7.41 03 12 35.2 48 41 56 03 16 06.1 48 52 59 0.10 0.07 145.99�6.82 03 14 33.4 49 11 13 03 18 05.8 49 22 09 0.18 0.16 HFLLZOA G145.99-06.82 145.99�7.00 03 14 00.5 49 02 21 03 17 32.5 49 13 19 0.19 0.09 7C 0313+4902 NED02 146.00+5.67 04 06 20.6 59 10 21 04 10 33.5 59 18 10 0.22 0.19 146.00+1.19 03 44 51.6 55 45 25 03 48 47.6 55 54 35 0.57 0.55 IRAS 03448+5545 146.00�5.20 03 20 00.2 50 32 54 03 23 36.7 50 43 32 0.10 0.09 146.00�5.17 03 20 08.7 50 34 27 03 23 45.3 50 45 05 0.13 0.10 146.00�6.63 03 15 13.5 49 20 45 03 18 46.4 49 31 39 0.14 0.14 146.01+6.61 04 11 30.0 59 51 37 04 15 46.9 59 59 06 0.47 0.14 146.01�5.22 03 20 00.8 50 31 56 03 23 37.3 50 42 34 0.21 0.10 146.01�5.20 03 20 04.7 50 32 41 03 23 41.2 50 43 19 0.56 0.09 146.01�5.16 03 20 14.0 50 34 54 03 23 50.7 50 45 31 0.14 0.13 146.01�6.07 03 17 07.5 49 48 39 03 20 41.8 49 59 27 0.14 0.12 146.03�4.86 03 21 21.4 50 49 11 03 24 58.9 50 59 45 0.21 0.10 146.03�6.72 03 15 03.5 49 15 11 03 18 36.1 49 26 06 0.20 0.17 HFLLZOA G146.02-06.72 146.04�7.14 03 13 47.5 48 53 22 03 17 19.1 49 04 21 0.22 0.11 146.05�7.12 03 13 53.0 48 54 35 03 17 24.7 49 05 34 0.19 0.19 146.05�7.72 03 11 59.5 48 23 21 03 15 29.7 48 34 26 0.19 0.11 146.06�5.57 03 19 06.3 50 12 38 03 22 41.9 50 23 19 0.10 0.10 146.06�6.71 03 15 14.9 49 14 43 03 18 47.6 49 25 37 0.10 0.07 146.06�7.00 03 14 18.9 49 00 01 03 17 50.8 49 10 58 0.85 0.09 HFLLZOA G146.05-07.00 146.07�6.97 03 14 28.3 49 01 26 03 18 00.3 49 12 23 0.14 0.13 146.08�3.93 03 24 54.3 51 34 12 03 28 34.3 51 44 33 0.08 0.07 146.08�6.57 03 15 50.3 49 21 11 03 19 23.3 49 32 03 0.21 0.09 146.09�6.89 03 14 51.0 49 04 30 03 18 23.2 49 15 25 0.24 0.11 146.10�5.97 03 17 55.9 49 50 51 03 21 30.4 50 01 36 0.40 0.19 146.11�3.25 03 27 33.8 52 06 30 03 31 15.7 52 16 42 0.09 0.08 146.11�7.81 03 12 02.5 48 17 23 03 15 32.5 48 28 28 0.11 0.08 146.12�2.84 03 29 07.9 52 26 35 03 32 51.0 52 36 42 0.11 0.10 IRAS 03291+5226 146.12�6.34 03 16 46.7 49 31 47 03 20 20.3 49 42 36 0.22 0.10

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 146.13�6.71 03 15 37.2 49 12 46 03 19 09.9 49 23 39 0.11 0.07 146.13�7.82 03 12 05.4 48 16 22 03 15 35.4 48 27 27 0.11 0.07 146.14�5.52 03 19 39.5 50 12 31 03 23 15.2 50 23 10 0.19 0.07 146.16�6.69 03 15 51.9 49 12 43 03 19 24.6 49 23 35 0.17 0.16 146.17�4.24 03 24 17.2 51 15 35 03 27 56.3 51 25 59 0.12 0.11 146.17�5.14 03 21 07.0 50 30 28 03 24 43.7 50 41 02 0.19 0.09 146.17�7.18 03 14 18.8 48 47 25 03 17 50.3 48 58 22 0.10 0.09 146.17�7.07 03 14 40.7 48 52 58 03 18 12.5 49 03 54 0.18 0.07 146.18+3.72 03 57 30.4 57 35 57 04 01 35.4 57 44 20 0.11 0.07 146.19+3.71 03 57 31.0 57 35 14 04 01 36.0 57 43 37 0.10 0.09 146.19�4.75 03 22 34.3 50 49 36 03 26 12.0 51 00 05 0.10 0.08 IRAS 03225+5049 146.19�4.98 03 21 47.7 50 37 44 03 25 24.8 50 48 16 0.08 0.07 146.19�7.69 03 12 47.9 48 20 56 03 16 18.2 48 31 58 0.11 0.08 146.20�4.98 03 21 51.1 50 37 33 03 25 28.2 50 48 05 0.11 0.08 146.20�5.44 03 20 13.4 50 14 38 03 23 49.3 50 25 15 0.20 0.18 146.21�5.23 03 20 59.7 50 24 32 03 24 36.1 50 35 07 0.10 0.08 146.22�7.89 03 12 19.6 48 09 23 03 15 49.4 48 20 27 0.54 0.11 HFLLZOA G146.22-07.89 146.23�4.19 03 24 45.9 51 15 45 03 28 25.1 51 26 07 0.21 0.19 146.23�6.09 03 18 11.1 49 40 36 03 21 45.3 49 51 20 0.33 0.32 146.23�6.84 03 15 44.2 49 02 35 03 19 16.5 49 13 28 0.21 0.07 146.24�3.77 03 26 22.1 51 36 22 03 30 02.5 51 46 38 0.18 0.11 146.24�7.58 03 13 22.0 48 24 51 03 16 52.5 48 35 51 0.11 0.11 146.28�4.23 03 24 53.5 51 12 31 03 28 32.6 51 22 52 0.22 0.21 IRAS 03249+5112 146.28�4.30 03 24 36.7 51 08 47 03 28 15.6 51 19 09 0.11 0.11 ZOAG G146.27-04.30 146.28�7.23 03 14 43.6 48 41 14 03 18 15.0 48 52 10 0.11 0.09 146.28�7.11 03 15 06.1 48 47 45 03 18 37.8 48 58 40 0.09 0.08 146.28�6.97 03 15 32.1 48 54 41 03 19 04.1 49 05 34 0.16 0.15 146.29�5.58 03 20 14.3 50 04 35 03 23 49.8 50 15 12 0.20 0.07 146.29�6.50 03 17 09.4 49 17 46 03 20 42.6 49 28 34 0.14 0.14 146.29�7.53 03 13 48.7 48 26 01 03 17 19.4 48 37 00 0.18 0.15 146.30+4.86 04 03 53.7 58 22 42 04 08 03.0 58 30 40 0.12 0.10 146.30�4.86 03 22 45.9 50 40 14 03 26 23.3 50 50 43 0.22 0.10 146.30�6.53 03 17 06.6 49 16 38 03 20 39.7 49 27 26 0.14 0.14 146.31+2.95 03 54 33.4 56 56 02 03 58 35.5 57 04 36 0.11 0.10 ZOAG G146.30+02.95 146.32�4.31 03 24 49.1 51 07 06 03 28 28.0 51 17 28 0.22 0.07 146.33+5.80 04 08 55.4 59 03 05 04 13 08.4 59 10 44 0.27 0.16 146.33+2.55 03 52 48.1 56 36 21 03 56 48.7 56 45 02 0.12 0.11 146.33�5.60 03 20 20.7 50 02 15 03 23 56.2 50 12 52 0.20 0.11 146.34�5.35 03 21 16.6 50 14 16 03 24 52.7 50 24 50 0.18 0.10 146.35+2.54 03 52 49.7 56 35 18 03 56 50.2 56 43 59 0.15 0.11 146.35�4.35 03 24 50.2 51 03 47 03 28 29.0 51 14 09 0.19 0.07 146.36�4.66 03 23 45.5 50 48 18 03 27 23.5 50 58 43 0.31 0.09 146.38+5.57 04 07 59.8 58 50 54 04 12 11.8 58 58 36 0.17 0.15 146.38�3.29 03 28 51.6 51 55 35 03 32 33.4 52 05 43 0.11 0.10 146.38�7.15 03 15 29.4 48 42 35 03 19 01.0 48 53 28 0.21 0.18 146.39�3.72 03 27 18.7 51 33 54 03 30 59.2 51 44 07 0.13 0.10 146.39�6.92 03 16 16.5 48 53 53 03 19 48.7 49 04 44 0.14 0.13 146.40+3.10 03 55 46.3 56 59 23 03 59 48.8 57 07 52 0.08 0.07 146.40�6.80 03 16 43.3 48 59 19 03 20 15.7 49 10 08 0.13 0.08 146.41�7.67 03 13 57.5 48 14 47 03 17 27.8 48 25 45 0.11 0.10 146.41�7.77 03 13 39.0 48 10 10 03 17 09.1 48 21 10 0.11 0.10 146.42�4.71 03 23 56.9 50 43 51 03 27 34.7 50 54 16 0.10 0.09 146.42�6.35 03 18 19.4 49 21 31 03 21 53.0 49 32 15 0.08 0.07 146.42�6.99 03 16 11.6 48 49 26 03 19 43.6 49 00 17 0.10 0.07 146.43�3.61 03 27 55.7 51 38 04 03 31 36.5 51 48 15 0.18 0.08 146.43�6.38 03 18 16.4 49 19 30 03 21 49.9 49 30 14 0.15 0.10 146.43�7.68 03 14 03.3 48 13 44 03 17 33.6 48 24 42 0.07 0.07 146.44+3.43 03 57 33.6 57 12 30 04 01 37.3 57 20 53 0.10 0.07 146.44�3.71 03 27 39.6 51 32 45 03 31 20.2 51 42 57 0.26 0.08 146.44�5.89 03 19 59.5 49 44 08 03 23 34.2 49 54 46 0.21 0.15

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 146.44�7.92 03 13 20.0 48 01 31 03 16 49.8 48 12 32 0.11 0.08 146.44�8.15 03 12 35.8 47 49 53 03 16 05.0 48 00 56 0.24 0.12 HFLLZOA G146.43-08.14 146.45�3.07 03 30 03.4 52 03 53 03 33 45.8 52 13 56 0.29 0.20 ZOAG G146.45-03.07 146.45�8.15 03 12 38.0 47 49 25 03 16 07.2 48 00 28 0.11 0.11 146.46+5.15 04 06 14.9 58 28 43 04 10 25.1 58 36 32 0.18 0.12 146.46�2.63 03 31 43.7 52 25 04 03 35 27.3 52 35 02 0.11 0.08 146.46�4.10 03 26 17.7 51 12 45 03 29 57.2 51 23 02 0.08 0.08 146.47�3.26 03 29 26.4 51 53 46 03 33 08.2 52 03 52 0.11 0.09 146.47�5.92 03 20 00.7 49 41 54 03 23 35.4 49 52 32 0.12 0.10 146.48�2.33 03 32 59.3 52 38 54 03 36 43.8 52 48 47 0.22 0.11 ZOAG G146.48-02.33 146.49+3.80 03 59 36.5 57 27 21 04 03 41.5 57 35 36 0.21 0.20 146.49�5.78 03 20 33.4 49 47 49 03 24 08.4 49 58 25 0.17 0.15 146.50�4.90 03 23 41.4 50 31 32 03 27 18.7 50 41 58 0.11 0.07 146.51�4.08 03 26 38.6 51 12 23 03 30 18.1 51 22 38 0.11 0.11 146.51�5.57 03 21 22.6 49 57 44 03 24 58.1 50 08 18 0.15 0.07 146.51�5.63 03 21 13.3 49 54 53 03 24 48.7 50 05 27 0.09 0.08 146.52+1.62 03 49 33.9 55 46 04 03 53 31.0 55 54 57 0.41 0.15 146.52�5.77 03 20 46.7 49 47 32 03 24 21.7 49 58 08 0.19 0.17 146.53�5.55 03 21 35.5 49 57 59 03 25 11.1 50 08 32 0.15 0.08 146.53�5.99 03 20 04.3 49 35 58 03 23 38.8 49 46 36 0.22 0.21 146.54�3.48 03 29 00.4 51 40 40 03 32 41.6 51 50 47 0.18 0.13 146.54�6.15 03 19 35.4 49 27 53 03 23 09.5 49 38 33 0.15 0.07 146.54�6.62 03 18 03.2 49 03 55 03 21 36.1 49 14 40 0.13 0.11 146.54�7.15 03 16 18.9 48 37 19 03 19 50.5 48 48 10 0.11 0.11 146.55�7.65 03 14 44.7 48 11 12 03 18 15.1 48 22 08 0.18 0.12 146.56+2.84b 03 55 26.9 56 41 02 03 59 28.3 56 49 33 0.23 0.12 146.56+2.84a 03 55 23.5 56 40 54 03 59 24.9 56 49 25 0.18 0.08 146.56�3.78 03 28 00.9 51 24 59 03 31 41.2 51 35 10 0.20 0.10 ZOAG G146.56-03.78 146.57+4.61 04 04 06.5 58 00 31 04 08 14.5 58 08 29 0.09 0.07 146.57�3.66 03 28 27.3 51 30 39 03 32 08.0 51 40 48 0.17 0.10 146.57�7.31 03 15 55.8 48 28 03 03 19 27.0 48 38 55 0.19 0.10 146.57�7.92 03 13 58.3 47 57 16 03 17 28.1 48 08 14 0.11 0.07 146.58�4.39 03 25 52.5 50 54 22 03 29 31.2 51 04 40 0.13 0.11 146.58�6.13 03 19 51.8 49 27 45 03 23 25.9 49 38 24 0.22 0.20 146.59+2.15 03 52 22.9 56 08 22 03 56 21.9 56 17 04 0.22 0.13 IRAS 03523+5608 146.59�3.24 03 30 06.3 51 50 38 03 33 48.1 52 00 41 0.20 0.11 146.59�4.75 03 24 40.0 50 36 04 03 28 17.7 50 46 26 0.26 0.11 146.59�4.77 03 24 35.0 50 35 11 03 28 12.6 50 45 34 0.15 0.14 146.59�8.18 03 13 16.3 47 43 17 03 16 45.5 47 54 18 0.24 0.14 146.60+2.74 03 55 10.3 56 35 04 03 59 11.3 56 43 36 0.15 0.12 146.60�8.06 03 13 40.7 47 49 27 03 17 10.1 48 00 26 0.18 0.16 146.61�4.54 03 25 29.7 50 45 42 03 29 07.9 50 56 01 0.16 0.15 IRAS 03255+5045 146.62+1.73 03 50 40.5 55 47 32 03 54 38.0 55 56 21 0.14 0.12 146.65�4.97 03 24 14.0 50 23 17 03 27 51.1 50 33 41 0.20 0.09 146.65�8.22 03 13 27.2 47 39 30 03 16 56.3 47 50 30 0.17 0.08 146.66+3.48 03 59 02.0 57 06 06 04 03 05.7 57 14 23 0.22 0.14 ZOAG G146.65+03.48 146.66�6.17 03 20 07.4 49 22 42 03 23 41.4 49 33 20 0.14 0.11 146.66�6.19 03 20 04.7 49 21 31 03 23 38.6 49 32 09 0.15 0.11 146.66�6.53 03 18 55.0 49 04 49 03 22 28.1 49 15 31 0.18 0.09 146.67�8.16 03 13 44.4 47 41 36 03 17 13.6 47 52 35 0.19 0.09 146.69+2.73 03 55 37.6 56 30 59 03 59 38.5 56 39 29 0.21 0.12 146.71�5.74 03 21 53.1 49 42 40 03 25 28.2 49 53 12 0.12 0.08 146.71�5.99 03 21 02.2 49 30 19 03 24 36.7 49 40 54 0.08 0.07 146.71�6.32 03 19 53.4 49 13 54 03 23 27.0 49 24 33 0.16 0.12 146.72+4.25 04 03 10.1 57 38 22 04 07 16.6 57 46 23 0.13 0.13 146.72�3.55 03 29 40.6 51 30 57 03 33 21.5 51 41 02 0.19 0.09 146.72�6.34 03 19 53.3 49 12 24 03 23 26.9 49 23 03 0.24 0.12 146.72�7.83 03 15 01.0 47 56 57 03 18 31.0 48 07 52 0.19 0.18 HFLLZOA G146.71-07.83 146.73�7.81 03 15 09.2 47 57 33 03 18 39.2 48 08 28 0.12 0.11 146.74+3.34 03 58 48.9 56 57 00 04 02 52.0 57 05 18 0.35 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 146.74�5.92 03 21 22.8 49 32 49 03 24 57.4 49 43 23 0.19 0.07 146.74�7.95 03 14 44.7 47 50 00 03 18 14.4 48 00 56 0.20 0.14 146.76�7.87 03 15 06.7 47 53 50 03 18 36.6 48 04 45 0.11 0.10 146.77�4.02 03 28 14.7 51 06 18 03 31 54.3 51 16 28 0.20 0.12 146.77�4.05 03 28 06.1 51 04 46 03 31 45.7 51 14 56 0.21 0.19 IRAS 03281+5105 146.78+5.86 04 11 47.7 58 46 57 04 16 00.3 58 54 25 0.37 0.11 146.78+2.75 03 56 11.6 56 28 12 04 00 12.5 56 36 40 0.20 0.07 146.78�6.92 03 18 17.6 48 41 07 03 21 49.8 48 51 51 0.14 0.13 146.79�2.02 03 35 53.1 52 43 10 03 39 38.4 52 52 53 0.08 0.07 146.80�3.16 03 31 34.3 51 47 12 03 35 16.3 51 57 10 0.11 0.08 146.80�6.85 03 18 34.6 48 43 57 03 22 06.9 48 54 40 0.14 0.11 146.80�8.06 03 14 39.8 47 42 57 03 18 09.2 47 53 53 0.16 0.11 146.81�4.99 03 24 58.6 50 17 07 03 28 35.6 50 27 28 0.15 0.08 146.81�6.27 03 20 34.7 49 12 41 03 24 08.4 49 23 17 0.20 0.07 146.81�8.10 03 14 37.3 47 40 18 03 18 06.6 47 51 14 0.19 0.15 HFLLZOA G146.81-08.10 146.81�8.04 03 14 48.3 47 43 52 03 18 17.8 47 54 48 0.19 0.13 HFLLZOA G146.80-08.03 146.81�8.01 03 14 54.8 47 44 54 03 18 24.4 47 55 49 0.12 0.08 146.82�4.54 03 26 37.9 50 38 58 03 30 16.1 50 49 14 0.11 0.08 ZOAG G146.81-04.54 146.82�6.95 03 18 21.5 48 38 19 03 21 53.6 48 49 03 0.17 0.15 146.82�7.98 03 15 02.3 47 46 12 03 18 31.9 47 57 07 0.11 0.07 146.83�6.75 03 19 04.9 48 48 21 03 22 37.5 48 59 02 0.08 0.08 146.84+5.81 04 11 53.0 58 42 29 04 16 05.3 58 49 56 0.18 0.12 146.84�4.26 03 27 42.2 50 52 10 03 31 21.2 51 02 22 0.08 0.07 146.84�6.86 03 18 46.0 48 42 02 03 22 18.3 48 52 44 0.19 0.15 146.84�7.98 03 15 09.0 47 45 25 03 18 38.6 47 56 20 0.11 0.10 146.85�3.00 03 32 27.2 51 53 25 03 36 09.7 52 03 20 0.09 0.07 146.85�7.96 03 15 15.7 47 46 29 03 18 45.4 47 57 23 0.17 0.12 146.86�6.30 03 20 43.5 49 09 56 03 24 17.2 49 20 32 0.17 0.07 146.86�8.12 03 14 49.5 47 37 50 03 18 18.8 47 48 46 0.12 0.11 146.86�8.03 03 15 04.8 47 42 22 03 18 34.3 47 53 17 0.16 0.07 146.86�7.88 03 15 34.6 47 50 02 03 19 04.5 48 00 55 0.16 0.12 146.87+3.13 03 58 31.0 56 42 16 04 02 33.2 56 50 35 0.21 0.14 146.87�7.84 03 15 45.6 47 51 56 03 19 15.6 48 02 49 0.11 0.07 146.88+3.14 03 58 37.3 56 41 59 04 02 39.5 56 50 18 0.08 0.07 146.88�7.92 03 15 30.2 47 47 17 03 18 60.0 47 58 10 0.19 0.12 146.88�8.01 03 15 14.5 47 42 56 03 18 44.1 47 53 50 0.12 0.10 146.89�3.04 03 32 28.4 51 49 55 03 36 10.7 51 59 50 0.11 0.08 146.89�4.80 03 26 02.4 50 23 26 03 29 39.9 50 33 44 0.18 0.07 146.89�7.14 03 18 06.4 48 26 16 03 21 38.0 48 37 01 0.18 0.10 146.89�8.02 03 15 14.4 47 41 50 03 18 43.9 47 52 44 0.22 0.09 146.90�8.01 03 15 19.1 47 42 11 03 18 48.7 47 53 05 0.14 0.11 146.91�5.49 03 23 45.0 49 48 27 03 27 20.7 49 58 52 1.02 0.09 UGC 02739 146.91�8.00 03 15 25.8 47 42 30 03 18 55.4 47 53 24 0.15 0.15 146.91�7.86a 03 15 51.0 47 49 29 03 19 20.9 48 00 21 0.11 0.11 146.91�7.86b 03 15 51.8 47 49 34 03 19 21.7 48 00 26 0.11 0.10 146.92+2.52 03 55 55.2 56 12 31 03 59 55.2 56 21 00 0.20 0.08 146.92�5.86 03 22 30.1 49 29 58 03 26 04.9 49 40 28 0.12 0.07 146.93�4.75 03 26 26.0 50 24 29 03 30 03.6 50 34 45 0.11 0.08 146.93�5.34 03 24 20.4 49 55 12 03 27 56.5 50 05 35 0.09 0.07 146.93�5.80 03 22 45.5 49 32 29 03 26 20.4 49 42 58 0.10 0.09 146.93�7.59 03 16 50.3 48 02 50 03 20 20.9 48 13 39 0.38 0.09 146.96�7.02 03 18 50.4 48 30 15 03 22 22.3 48 40 57 0.18 0.16 146.96�7.23 03 18 07.7 48 19 39 03 21 39.1 48 30 24 0.15 0.14 146.98+3.10 03 58 58.9 56 36 39 04 03 00.9 56 44 56 0.09 0.07 146.98�4.26 03 28 26.4 50 47 10 03 32 05.3 50 57 19 0.18 0.12 ZOAG G146.98-04.26 146.98�5.61 03 23 40.3 49 40 10 03 27 15.7 49 50 36 0.11 0.09 146.98�6.42 03 20 57.4 48 59 50 03 24 30.8 49 10 25 0.07 0.07 146.98�6.55 03 20 30.4 48 53 13 03 24 03.4 49 03 50 0.21 0.11 146.99�7.44 03 17 38.0 48 08 05 03 21 08.9 48 18 51 0.21 0.11 147.03�7.41 03 17 53.8 48 08 19 03 21 24.8 48 19 04 0.12 0.11

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 147.03�8.03 03 15 56.3 47 37 21 03 19 25.8 47 48 13 0.19 0.17 147.03�7.92 03 16 15.9 47 42 28 03 19 45.7 47 53 19 0.16 0.11 147.04�5.22 03 25 22.6 49 57 41 03 28 59.0 50 08 01 0.19 0.07 147.04�6.72 03 20 14.3 48 42 29 03 23 46.9 48 53 06 0.11 0.09 147.05�4.54 03 27 48.6 50 31 12 03 31 26.8 50 41 23 0.19 0.17 147.05�7.50 03 17 43.9 48 03 09 03 21 14.6 48 13 55 0.11 0.08 147.06�4.93 03 26 30.0 50 11 19 03 30 07.2 50 21 35 0.08 0.07 147.07�7.40 03 18 08.2 48 07 40 03 21 39.2 48 18 25 0.09 0.08 147.08�7.34 03 18 23.1 48 10 05 03 21 54.2 48 20 49 0.29 0.19 147.08�7.35 03 18 23.4 48 09 57 03 21 54.5 48 20 41 0.10 0.08 147.09�5.32 03 25 15.2 49 51 16 03 28 51.3 50 01 36 0.14 0.07 147.09�6.07 03 22 40.6 49 13 19 03 26 14.8 49 23 48 0.14 0.07 7C 0322+4913 147.10�6.08 03 22 40.6 49 13 09 03 26 14.8 49 23 38 0.11 0.10 147.11�6.00 03 23 02.5 49 16 28 03 26 36.9 49 26 56 0.17 0.08 147.11�7.72 03 17 19.2 47 49 50 03 20 49.4 48 00 37 0.11 0.08 147.12�4.14 03 29 34.8 50 48 20 03 33 14.0 50 58 25 0.23 0.21 147.12�5.21 03 25 48.4 49 55 20 03 29 24.8 50 05 38 0.18 0.10 147.12�4.95 03 26 43.2 50 08 10 03 30 20.3 50 18 25 0.48 0.19 ZOAG G147.12-04.95 147.12�6.63 03 20 56.2 48 44 52 03 24 29.0 48 55 27 0.09 0.09 147.13�5.51 03 24 48.2 49 40 14 03 28 23.8 49 50 36 0.13 0.12 147.14�4.86 03 27 07.3 50 12 23 03 30 44.6 50 22 37 0.12 0.11 147.14�5.85 03 23 40.4 49 22 44 03 27 15.2 49 33 10 0.10 0.09 147.14�7.52 03 18 06.8 47 59 17 03 21 37.5 48 10 02 0.11 0.09 147.16�4.99 03 26 48.3 50 05 00 03 30 25.3 50 15 15 0.26 0.20 ZOAG G147.16-04.99 147.17�6.33 03 22 13.2 48 58 05 03 25 46.8 49 08 36 0.18 0.15 147.19�3.39 03 32 44.4 51 22 40 03 36 25.7 51 32 34 0.22 0.20 147.19�7.07 03 19 48.9 48 20 35 03 23 20.7 48 31 14 0.19 0.11 147.20�5.21 03 26 13.2 49 52 35 03 29 49.6 50 02 52 0.12 0.11 147.20�6.72 03 21 02.7 48 37 43 03 24 35.3 48 48 18 0.23 0.07 147.22�6.43 03 22 06.1 48 51 25 03 25 39.4 49 01 56 0.18 0.08 147.22�7.50 03 18 34.2 47 58 01 03 22 05.0 48 08 44 0.15 0.11 147.23+3.40 04 01 47.0 56 40 01 04 05 49.8 56 48 08 0.11 0.08 147.23�4.94 03 27 18.5 50 04 57 03 30 55.6 50 15 10 0.07 0.07 147.23�5.62 03 24 57.6 49 31 33 03 28 33.0 49 41 54 0.21 0.10 147.23�7.15 03 19 44.9 48 15 07 03 23 16.5 48 25 46 0.11 0.10 147.24�7.50 03 18 39.8 47 56 58 03 22 10.5 48 07 41 0.21 0.07 147.25�7.48 03 18 48.4 47 57 51 03 22 19.2 48 08 33 0.13 0.08 147.28�4.68 03 28 29.3 50 16 07 03 32 07.1 50 26 16 0.13 0.07 147.29+4.05 04 05 16.0 57 06 47 04 09 21.0 57 14 40 0.24 0.09 147.30+4.05 04 05 20.4 57 06 00 04 09 25.4 57 13 53 0.09 0.08 147.30+4.07 04 05 28.4 57 07 18 04 09 33.5 57 15 10 0.10 0.09 147.31�4.92 03 27 46.6 50 03 11 03 31 23.7 50 13 23 0.11 0.10 147.31�5.58 03 25 27.0 49 30 37 03 29 02.4 49 40 57 0.11 0.09 147.31�6.04 03 23 52.1 49 07 42 03 27 26.4 49 18 07 0.11 0.11 147.31�6.96 03 20 49.3 48 22 02 03 24 21.3 48 32 38 0.14 0.08 147.32�5.76 03 24 54.8 49 21 09 03 28 29.8 49 31 31 0.09 0.07 147.33�7.51 03 19 06.5 47 53 42 03 22 37.2 48 04 23 0.18 0.07 147.33�7.89 03 17 52.0 47 34 35 03 21 21.8 47 45 21 0.12 0.11 147.35�7.91 03 17 54.6 47 32 58 03 21 24.4 47 43 43 0.15 0.11 147.37�6.26 03 23 27.5 48 55 04 03 27 01.2 49 05 31 0.18 0.07 147.38�4.79 03 28 36.7 50 07 02 03 32 14.1 50 17 11 0.17 0.15 ZOAG G147.38-04.79 147.38�6.99 03 21 02.3 48 18 10 03 24 34.2 48 28 45 0.17 0.09 147.39�6.77 03 21 49.5 48 29 08 03 25 22.0 48 39 40 0.24 0.23 147.39�6.16 03 23 51.2 48 59 08 03 27 25.2 49 09 33 0.18 0.14 147.39�7.92 03 18 03.6 47 31 00 03 21 33.4 47 41 45 0.11 0.10 147.40�5.65 03 25 41.0 49 24 34 03 29 16.3 49 34 53 0.19 0.10 147.40�6.19 03 23 48.4 48 57 21 03 27 22.3 49 07 46 0.11 0.09 147.41�4.61 03 29 24.6 50 15 30 03 33 02.5 50 25 36 0.26 0.14 147.41�7.84 03 18 25.4 47 34 04 03 21 55.3 47 44 48 0.18 0.08 147.42�6.87 03 21 37.6 48 23 00 03 25 09.8 48 33 33 0.11 0.08 87GB 032142.5+482250

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 147.43�5.09 03 27 47.6 49 50 54 03 31 24.3 50 01 06 0.13 0.10 147.43�7.35 03 20 06.2 47 58 31 03 23 37.3 48 09 09 0.13 0.12 147.45�6.80 03 22 03.0 48 25 26 03 25 35.4 48 35 57 0.15 0.13 147.46�7.94 03 18 22.2 47 27 48 03 21 51.9 47 38 32 0.15 0.11 147.47�5.68 03 25 56.0 49 20 05 03 29 31.1 49 30 23 0.22 0.13 147.48�4.34 03 30 44.8 50 25 49 03 34 23.4 50 35 50 0.13 0.11 147.48�5.65 03 26 06.9 49 21 32 03 29 42.1 49 31 49 0.09 0.07 147.48�7.85 03 18 44.1 47 31 38 03 22 14.0 47 42 21 0.11 0.10 147.49+4.54 04 08 47.8 57 20 27 04 12 54.4 57 28 06 0.19 0.09 147.49�7.32 03 20 29.7 47 58 00 03 24 00.8 48 08 37 0.21 0.11 147.49�7.37 03 20 21.7 47 55 38 03 23 52.7 48 06 15 0.20 0.10 147.49�7.63 03 19 30.6 47 42 16 03 23 01.0 47 52 56 0.11 0.08 147.50�3.43 03 34 12.7 51 09 44 03 37 53.8 51 19 33 0.20 0.19 147.50�5.15 03 27 55.1 49 45 30 03 31 31.6 49 55 41 0.18 0.08 147.50�5.23 03 27 39.2 49 41 58 03 31 15.5 49 52 10 0.15 0.15 147.50�6.14 03 24 29.6 48 56 55 03 28 03.6 49 07 18 0.07 0.07 147.50�7.82 03 18 55.0 47 32 37 03 22 25.0 47 43 19 0.11 0.09 147.51�5.04 03 28 21.3 49 50 32 03 31 58.1 50 00 42 0.29 0.15 147.51�7.00 03 21 41.2 48 13 22 03 25 13.1 48 23 55 0.09 0.07 147.51�7.92 03 18 39.2 47 27 03 03 22 08.9 47 37 46 0.19 0.11 147.52�6.87 03 22 09.1 48 19 33 03 25 41.3 48 30 04 0.15 0.07 147.53�5.06 03 28 23.5 49 49 07 03 32 00.2 49 59 16 0.09 0.07 147.55�2.93a 03 36 20.7 51 31 51 03 40 03.1 51 41 32 0.08 0.07 147.55�2.93b 03 36 20.7 51 32 02 03 40 03.1 51 41 43 0.10 0.09 147.55�5.38 03 27 23.8 49 32 37 03 30 59.7 49 42 50 0.11 0.10 147.55�7.63 03 19 47.2 47 40 19 03 23 17.6 47 50 58 0.21 0.11 147.56�4.91 03 29 04.9 49 55 35 03 32 42.0 50 05 42 0.19 0.19 ZOAG G147.55-04.91 147.57�5.68 03 26 25.7 49 16 50 03 30 00.8 49 27 06 0.67 0.10 147.57�5.54 03 26 54.2 49 24 02 03 30 29.7 49 34 17 0.13 0.11 147.57�5.99 03 25 21.5 49 01 39 03 28 55.9 49 11 59 0.15 0.12 147.58�6.14 03 24 53.4 48 53 37 03 28 27.4 49 03 59 0.11 0.09 147.58�7.42 03 20 36.2 47 49 58 03 24 07.1 48 00 34 0.09 0.08 147.59�6.50 03 23 44.2 48 35 16 03 27 17.3 48 45 42 0.09 0.07 147.60�3.63 03 33 57.9 50 56 09 03 37 38.4 51 05 59 0.22 0.11 147.60�7.74 03 19 40.7 47 33 02 03 23 10.8 47 43 41 0.12 0.08 147.61�6.86 03 22 37.8 48 16 50 03 26 10.0 48 27 19 0.22 0.19 147.61�7.87 03 19 17.1 47 26 42 03 22 47.0 47 37 23 0.08 0.07 147.61�7.41 03 20 48.0 47 49 14 03 24 18.9 47 59 50 0.07 0.07 147.62�3.99 03 32 44.0 50 38 37 03 36 23.5 50 48 31 0.41 0.15 ZOAG G147.61-03.98 147.62�8.22 03 18 12.4 47 08 27 03 21 41.4 47 19 11 0.21 0.10 147.63�6.60 03 23 34.8 48 29 34 03 27 07.7 48 40 00 0.11 0.11 147.63�7.06 03 22 04.0 48 06 06 03 25 35.7 48 16 37 0.12 0.11 147.64�4.33 03 31 34.9 50 21 13 03 35 13.5 50 31 11 0.16 0.15 ZOAG G147.63-04.33 147.65�8.56 03 17 16.9 46 50 50 03 20 45.2 47 01 38 0.08 0.07 147.66�7.73 03 19 58.8 47 31 46 03 23 29.0 47 42 24 0.41 0.08 147.66�8.12 03 18 44.8 47 12 19 03 22 14.1 47 23 02 0.10 0.08 147.66�8.58 03 17 15.0 46 49 14 03 20 43.2 47 00 02 0.23 0.11 147.68�6.40 03 24 32.4 48 37 41 03 28 05.7 48 48 04 0.13 0.11 147.69�3.45 03 35 05.1 51 02 22 03 38 46.1 51 12 08 0.11 0.09 ZOAG G147.68-03.45 147.69�3.41 03 35 13.7 51 03 56 03 38 54.8 51 13 41 0.10 0.08 ZOAG G147.68-03.41 147.69�7.69 03 20 17.1 47 32 31 03 23 47.4 47 43 08 0.35 0.13 147.70�6.37 03 24 41.8 48 38 27 03 28 15.2 48 48 49 0.22 0.17 147.70�7.92 03 19 35.7 47 21 18 03 23 05.4 47 31 58 0.19 0.18 147.71+5.74 04 16 11.8 58 03 24 04 20 22.5 58 10 34 0.20 0.15 147.72�5.85 03 26 34.5 49 03 26 03 30 09.2 49 13 42 0.08 0.08 147.73�5.47 03 27 57.9 49 21 48 03 31 33.5 49 31 59 0.15 0.10 147.73�6.37 03 24 52.3 48 37 11 03 28 25.7 48 47 33 0.09 0.09 147.73�7.81 03 20 05.2 47 25 46 03 23 35.2 47 36 24 0.14 0.13 147.74�3.82 03 33 56.7 50 42 15 03 37 36.6 50 52 05 0.14 0.12 147.76�4.36 03 32 03.7 50 15 22 03 35 42.2 50 25 19 0.10 0.09

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 147.76�5.34 03 28 35.2 49 27 08 03 32 11.2 49 37 17 0.12 0.10 147.76�6.34 03 25 06.8 48 37 47 03 28 40.3 48 48 08 0.13 0.11 147.76�6.31 03 25 12.3 48 39 11 03 28 45.8 48 49 32 0.11 0.10 147.76�6.30 03 25 16.0 48 39 43 03 28 49.6 48 50 03 0.28 0.28 147.77+5.73 04 16 27.5 58 00 04 04 20 38.1 58 07 13 0.18 0.16 147.77�5.70 03 27 22.0 49 09 20 03 30 57.1 49 19 33 0.11 0.09 147.77�6.35 03 25 08.8 48 37 08 03 28 42.2 48 47 29 0.15 0.08 147.77�8.22 03 18 55.2 47 03 36 03 22 24.2 47 14 18 0.22 0.10 147.79+5.69 04 16 25.2 57 57 46 04 20 35.6 58 04 55 0.11 0.09 147.79�6.18 03 25 50.1 48 44 49 03 29 24.0 48 55 07 0.08 0.07 147.79�7.77 03 20 30.1 47 25 38 03 24 00.2 47 36 15 0.11 0.09 147.80+5.65 04 16 13.7 57 55 51 04 20 24.0 58 03 01 0.44 0.19 147.81�7.22 03 22 26.0 47 52 37 03 25 57.4 48 03 07 0.10 0.08 147.81�7.14 03 22 41.7 47 56 29 03 26 13.2 48 06 58 0.12 0.11 147.81�6.96 03 23 16.9 48 05 14 03 26 48.9 48 15 41 0.19 0.17 147.82�8.13 03 19 27.4 47 06 32 03 22 56.6 47 17 12 0.11 0.07 147.82�8.46 03 18 25.5 46 49 52 03 21 54.0 47 00 36 0.21 0.21 147.83�5.02 03 30 06.0 49 40 44 03 33 42.8 49 50 48 0.20 0.10 147.83�6.45 03 25 06.8 48 30 17 03 28 40.0 48 40 38 0.19 0.16 147.83�8.10 03 19 38.3 47 07 35 03 23 07.6 47 18 15 0.15 0.13 147.83�8.42 03 18 35.9 46 52 00 03 22 04.5 47 02 43 0.11 0.07 147.84�5.08 03 29 53.6 49 37 14 03 33 30.2 49 47 18 0.19 0.09 147.84�6.03 03 26 33.7 48 50 35 03 30 07.9 49 00 51 0.30 0.18 147.84�7.56 03 21 27.0 47 34 16 03 24 57.5 47 44 49 0.10 0.07 147.85+3.17 04 04 00.4 56 04 46 04 08 01.7 56 12 44 0.15 0.08 147.85�5.16 03 29 40.5 49 33 07 03 33 16.9 49 43 12 0.13 0.11 147.85�5.78 03 27 27.6 49 02 30 03 31 02.4 49 12 43 0.20 0.19 147.85�7.26 03 22 27.4 47 49 12 03 25 58.7 47 59 42 0.18 0.17 147.86�6.55 03 24 52.0 48 24 08 03 28 24.9 48 34 30 0.21 0.07 147.87�3.88 03 34 23.9 50 34 53 03 38 03.6 50 44 41 0.10 0.07 147.87�6.28 03 25 52.6 48 37 03 03 29 26.2 48 47 21 0.12 0.11 147.87�7.74 03 21 00.6 47 24 29 03 24 30.7 47 35 04 0.14 0.14 147.87�7.48 03 21 51.3 47 37 08 03 25 22.0 47 47 40 0.18 0.12 87GB 032149.8+473733 147.88�6.17 03 26 18.3 48 42 22 03 29 52.2 48 52 39 0.19 0.16 147.88�6.91 03 23 47.0 48 05 41 03 27 19.1 48 16 06 0.20 0.19 147.88�7.91 03 20 27.5 47 15 33 03 23 57.2 47 26 10 0.14 0.10 147.89�7.27 03 22 38.6 47 46 59 03 26 09.8 47 57 28 0.13 0.09 147.89�8.19 03 19 37.7 47 01 04 03 23 06.8 47 11 44 0.08 0.07 147.90�4.79 03 31 16.5 49 49 31 03 34 53.8 49 59 30 0.11 0.10 147.91�6.50 03 25 19.9 48 25 10 03 28 53.0 48 35 30 0.11 0.08 147.91�6.93 03 23 51.8 48 03 32 03 27 23.8 48 13 57 0.22 0.21 147.92�7.03 03 23 34.9 47 58 35 03 27 06.7 48 09 01 0.17 0.11 147.92�8.43 03 18 59.8 46 48 12 03 22 28.4 46 58 54 0.10 0.07 147.93�6.65 03 24 55.0 48 17 09 03 28 27.7 48 27 31 0.13 0.11 147.93�7.58 03 21 50.4 47 30 34 03 25 20.9 47 41 06 0.14 0.13 147.94�7.37 03 22 33.7 47 40 20 03 26 04.7 47 50 50 0.13 0.11 147.97�5.81 03 27 59.8 48 57 16 03 31 34.5 49 07 27 0.20 0.07 147.97�7.11 03 23 33.6 47 52 31 03 27 05.2 48 02 57 0.19 0.19 147.97�7.56 03 22 05.0 47 30 08 03 25 35.5 47 40 39 0.09 0.07 147.97�7.84 03 21 08.3 47 16 18 03 24 38.2 47 26 53 0.15 0.12 147.97�8.02 03 20 33.6 47 07 20 03 24 03.1 47 17 56 0.19 0.08 147.99�6.22 03 26 40.5 48 36 03 03 30 14.2 48 46 18 0.14 0.13 148.01�5.38 03 29 40.3 49 17 00 03 33 16.1 49 27 05 0.09 0.08 148.03�5.01a 03 31 06.6 49 34 10 03 34 43.3 49 44 10 0.07 0.04 148.03�5.01b 03 31 07.2 49 33 59 03 34 43.9 49 43 59 0.10 0.09 148.03�5.74 03 28 31.5 48 58 08 03 32 06.4 49 08 17 0.11 0.08 148.03�6.53 03 25 47.9 48 19 10 03 29 20.9 48 29 29 0.11 0.10 148.03�7.53 03 22 30.1 47 29 45 03 26 00.7 47 40 15 0.09 0.09 148.04�5.62 03 29 00.3 49 04 16 03 32 35.5 49 14 23 0.10 0.09 148.04�7.08 03 24 00.8 47 51 44 03 27 32.5 48 02 09 0.09 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 148.05�6.32 03 26 37.3 48 28 49 03 30 10.8 48 39 05 0.11 0.10 148.05�5.72 03 28 40.0 48 58 43 03 32 14.9 49 08 52 0.17 0.09 148.05�6.53 03 25 56.3 48 18 50 03 29 29.3 48 29 08 0.14 0.14 148.05�7.34 03 23 10.6 47 38 26 03 26 41.6 47 48 54 0.15 0.14 148.06�5.41 03 29 50.1 49 13 38 03 33 25.8 49 23 42 0.19 0.18 148.07�2.80 03 39 29.9 51 19 34 03 43 12.5 51 29 04 0.12 0.07 148.07�6.92 03 24 40.7 47 58 57 03 28 12.7 48 09 19 0.20 0.18 148.08�2.57 03 40 26.1 51 30 32 03 44 09.3 51 39 59 0.18 0.10 148.11�7.08 03 24 20.7 47 49 36 03 27 52.3 48 00 00 0.20 0.11 148.12�6.46 03 26 28.2 48 19 54 03 30 01.3 48 30 10 0.10 0.07 148.13�2.53 03 40 53.1 51 30 38 03 44 36.4 51 40 03 0.22 0.19 148.13�2.52 03 40 53.0 51 31 11 03 44 36.4 51 40 36 0.08 0.08 148.13�3.60 03 36 45.0 50 39 12 03 40 25.4 50 48 52 0.15 0.15 148.14�5.82 03 28 48.8 48 50 54 03 32 23.5 49 01 02 0.18 0.18 148.15+4.29 04 11 07.5 56 42 15 04 15 12.3 56 49 45 0.22 0.22 148.15�6.86 03 25 17.9 47 59 12 03 28 50.1 48 09 32 0.32 0.07 148.16�5.80 03 28 56.3 48 51 03 03 32 31.0 49 01 11 0.19 0.15 148.19+4.11 04 10 24.8 56 32 55 04 14 28.9 56 40 28 0.15 0.12 148.19�6.24 03 27 36.5 48 28 35 03 31 10.1 48 38 47 0.63 0.11 148.19�5.59 03 29 49.7 49 00 15 03 33 24.9 49 10 19 0.11 0.09 148.19�8.18 03 21 07.7 46 52 01 03 24 36.8 47 02 36 0.21 0.18 148.20�5.47 03 30 19.9 49 05 32 03 33 55.4 49 15 35 0.05 0.05 148.20�6.45 03 26 57.3 48 17 43 03 30 30.4 48 27 58 0.29 0.28 148.22+4.14 04 10 44.6 56 32 54 04 14 48.8 56 40 26 0.09 0.07 148.23�8.19 03 21 17.1 46 50 01 03 24 46.2 47 00 35 0.22 0.11 148.24�4.90 03 32 35.0 49 32 25 03 36 12.0 49 42 20 0.10 0.09 148.24�5.80 03 29 20.0 48 48 08 03 32 54.7 48 58 14 0.10 0.08 148.24�6.30 03 27 38.9 48 23 44 03 31 12.4 48 33 56 0.13 0.09 148.24�6.54 03 26 48.4 48 11 42 03 30 21.3 48 21 57 0.44 0.07 148.24�7.06 03 25 03.0 47 45 59 03 28 34.7 47 56 20 0.07 0.07 148.25�7.58 03 23 23.6 47 19 59 03 26 54.1 47 30 26 0.19 0.18 148.26�5.58 03 30 12.4 48 58 22 03 33 47.6 49 08 25 0.20 0.16 148.27�4.93 03 32 34.8 49 30 01 03 36 11.7 49 39 56 0.11 0.07 148.27�5.49 03 30 35.4 49 02 10 03 34 10.8 49 12 12 0.19 0.19 148.28�7.43 03 24 00.6 47 26 35 03 27 31.4 47 37 00 0.13 0.07 148.29+4.75 04 14 10.3 56 56 36 04 18 16.6 57 03 54 0.18 0.15 148.29�7.39 03 24 11.7 47 27 53 03 27 42.6 47 38 17 0.12 0.10 148.30�4.39 03 34 43.2 49 54 49 03 38 21.4 50 04 36 0.08 0.07 148.30�6.11 03 28 35.8 48 30 50 03 32 09.7 48 40 59 0.11 0.10 148.30�8.04 03 22 04.8 46 55 27 03 25 34.2 47 05 58 0.19 0.17 148.31�5.11 03 32 07.6 49 19 41 03 35 44.0 49 29 37 0.11 0.08 148.31�8.08 03 21 59.5 46 52 57 03 25 28.8 47 03 29 0.10 0.07 148.31�8.09 03 21 59.1 46 52 36 03 25 28.4 47 03 08 0.18 0.09 148.32�6.06 03 28 52.4 48 32 34 03 32 26.4 48 42 42 0.12 0.08 148.32�5.85 03 29 34.5 48 43 22 03 33 09.1 48 53 27 0.12 0.12 148.33�5.09 03 32 20.0 49 19 53 03 35 56.5 49 29 49 0.10 0.08 148.34�6.32 03 28 03.6 48 18 59 03 31 37.0 48 29 10 0.12 0.11 148.34�8.02 03 22 21.3 46 55 16 03 25 50.7 47 05 46 0.08 0.07 148.35�4.47 03 34 39.2 49 49 24 03 38 17.2 49 59 11 0.24 0.19 148.36+4.65 04 14 02.3 56 49 07 04 18 08.1 56 56 26 0.17 0.07 ZOAG G148.36+04.65 148.36�5.11 03 32 23.1 49 17 49 03 35 59.5 49 27 45 0.08 0.08 148.37+4.51 04 13 23.0 56 42 54 04 17 28.3 56 50 16 0.21 0.09 148.37�3.71 03 37 35.5 50 25 33 03 41 15.5 50 35 10 0.19 0.17 148.37�5.38 03 31 29.1 49 04 36 03 35 04.8 49 14 35 0.13 0.09 148.37�7.49 03 24 16.5 47 20 27 03 27 47.2 47 30 51 0.19 0.18 148.37�7.48 03 24 16.4 47 21 04 03 27 47.1 47 31 28 0.32 0.13 148.38+6.42 04 23 25.6 58 03 50 04 27 37.8 58 10 32 0.20 0.14 IRAS 04233+5803 148.38+6.27 04 22 36.4 57 57 11 04 26 48.0 58 03 56 0.13 0.11 148.38+4.77 04 14 41.8 56 53 28 04 18 48.0 57 00 44 0.14 0.13 148.38�7.37 03 24 42.3 47 25 59 03 28 13.2 47 36 21 0.09 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 148.39+5.72 04 19 40.9 57 33 50 04 23 50.5 57 40 47 0.20 0.17 148.39�3.11 03 39 56.1 50 53 37 03 43 37.7 51 03 05 0.13 0.08 148.39�7.74 03 23 29.9 47 07 28 03 26 60.0 47 17 54 0.20 0.11 148.40�3.68 03 37 49.5 50 26 07 03 41 29.6 50 35 43 0.14 0.13 ZOAG G148.39-03.68 148.40�6.40 03 28 03.1 48 13 22 03 31 36.3 48 23 33 0.19 0.10 148.40�6.84 03 26 34.1 47 51 20 03 30 06.2 48 01 36 0.08 0.08 148.43�5.58 03 31 05.3 48 52 29 03 34 40.5 49 02 29 0.11 0.08 148.43�6.68 03 27 13.8 47 58 32 03 30 46.3 48 08 46 0.18 0.07 148.43�6.70 03 27 11.6 47 57 35 03 30 44.1 48 07 49 0.17 0.12 148.44�2.93 03 40 52.1 51 00 02 03 44 34.2 51 09 27 0.11 0.11 148.44�6.25 03 28 45.9 48 19 12 03 32 19.4 48 29 20 0.15 0.11 148.44�7.46 03 24 42.4 47 19 43 03 28 13.1 47 30 05 0.20 0.11 148.45�2.99 03 40 43.3 50 56 54 03 44 25.2 51 06 20 0.11 0.08 148.46+3.60 04 09 18.5 55 59 26 04 13 20.5 56 07 04 0.14 0.13 148.46+3.34 04 08 02.7 55 48 04 04 12 03.9 55 55 47 1.45 0.20 ZOAG G148.45+03.34 148.46�6.44 03 28 15.5 48 09 27 03 31 48.6 48 19 37 0.10 0.07 148.46�8.02 03 22 58.5 46 51 11 03 26 27.9 47 01 39 0.22 0.20 148.47+6.43 04 23 56.4 58 00 06 04 28 08.4 58 06 45 0.15 0.15 148.47+5.96 04 21 23.3 57 40 21 04 25 33.6 57 47 11 0.21 0.20 148.47�3.68 03 38 12.3 50 23 16 03 41 52.4 50 32 51 0.15 0.14 148.48�3.05 03 40 35.9 50 52 55 03 44 17.6 51 02 21 0.14 0.11 ZOAG G148.47-03.05 148.48�4.42 03 35 30.2 49 47 08 03 39 08.3 49 56 52 0.11 0.10 ZOAG G148.48-04.42 148.48�3.95 03 37 13.3 50 10 12 03 40 52.6 50 19 50 0.13 0.12 148.48�5.62 03 31 10.0 48 49 12 03 34 45.1 48 59 12 0.12 0.11 148.48�5.81 03 30 31.0 48 39 13 03 34 05.6 48 49 15 0.09 0.08 148.48�7.06 03 26 12.2 47 38 09 03 29 43.8 47 48 26 0.10 0.08 148.48�7.03 03 26 20.2 47 39 41 03 29 51.9 47 49 58 0.11 0.09 148.48�7.62 03 24 21.0 47 10 21 03 27 51.3 47 20 45 0.11 0.11 148.49�5.21 03 32 40.6 49 08 19 03 36 16.7 49 18 13 0.13 0.11 148.50�5.43 03 31 58.0 48 57 17 03 35 33.5 49 07 14 0.19 0.17 148.50�6.39 03 28 37.0 48 10 20 03 32 10.2 48 20 29 0.09 0.07 148.50�7.51 03 24 48.7 47 15 16 03 28 19.3 47 25 38 0.10 0.08 148.50�7.53 03 24 43.0 47 14 05 03 28 13.5 47 24 27 0.10 0.08 148.51�7.51 03 24 52.1 47 15 02 03 28 22.7 47 25 24 0.08 0.08 148.51�7.54 03 24 44.8 47 13 32 03 28 15.3 47 23 54 0.20 0.10 148.52�4.20 03 36 31.7 49 56 26 03 40 10.4 50 06 07 0.18 0.17 148.52�6.35 03 28 49.3 48 11 25 03 32 22.6 48 21 33 0.10 0.07 148.52�6.94 03 26 50.9 47 42 42 03 30 22.8 47 52 57 0.17 0.17 148.52�7.48 03 25 02.1 47 15 58 03 28 32.8 47 26 19 0.15 0.14 148.52�7.51 03 24 56.3 47 14 23 03 28 26.9 47 24 45 0.07 0.07 148.52�7.86 03 23 46.6 46 57 05 03 27 16.4 47 07 31 0.19 0.16 148.53�7.65 03 24 28.4 47 07 05 03 27 58.6 47 17 28 0.15 0.14 148.53�7.88 03 23 43.8 46 55 42 03 27 13.5 47 06 08 0.08 0.07 148.54+0.13 03 53 48.8 53 20 01 03 57 39.6 53 28 38 0.16 0.10 148.55+5.95 04 21 44.5 57 36 38 04 25 54.6 57 43 26 0.24 0.20 148.55�7.45 03 25 16.6 47 16 21 03 28 47.3 47 26 41 0.17 0.10 148.55�7.46 03 25 13.0 47 15 35 03 28 43.7 47 25 56 0.21 0.20 148.56�6.07 03 30 00.1 48 24 07 03 33 34.1 48 34 11 0.21 0.21 148.57+6.48 04 24 42.8 57 58 04 04 28 54.8 58 04 40 0.21 0.10 148.57�4.19 03 36 47.7 49 54 54 03 40 26.4 50 04 34 0.25 0.13 148.58+6.50 04 24 52.8 57 57 59 04 29 04.8 58 04 35 0.24 0.23 148.58�6.14 03 29 50.8 48 19 52 03 33 24.6 48 29 56 0.16 0.11 148.58�6.31 03 29 15.5 48 11 30 03 32 48.9 48 21 37 0.15 0.08 148.58�7.76 03 24 22.4 47 00 05 03 27 52.4 47 10 28 0.11 0.10 148.58�8.00 03 23 35.4 46 47 45 03 27 04.8 46 58 11 0.77 0.18 UGC 02737 148.59�5.86 03 30 50.5 48 33 16 03 34 25.0 48 43 17 0.09 0.08 148.59�6.21 03 29 39.7 48 16 22 03 33 13.3 48 26 27 0.22 0.22 148.59�6.48 03 28 44.1 48 03 00 03 32 17.1 48 13 08 0.11 0.09 148.60+4.39 04 13 57.8 56 27 46 04 18 02.3 56 35 05 0.22 0.10 148.60�4.77 03 34 50.6 49 26 01 03 38 27.8 49 35 48 0.20 0.07

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 148.60�6.15 03 29 56.5 48 18 41 03 33 30.3 48 28 45 0.32 0.22 148.61�5.90 03 30 49.5 48 30 58 03 34 23.9 48 40 59 0.11 0.08 148.61�7.92 03 23 59.5 46 50 44 03 27 29.1 47 01 09 0.16 0.11 148.62+3.39 04 09 06.0 55 43 52 04 13 07.1 55 51 30 0.11 0.08 148.62�7.59 03 25 08.6 47 07 07 03 28 39.0 47 17 28 0.14 0.11 148.63+6.31 04 24 04.7 57 48 17 04 28 16.0 57 54 56 0.23 0.11 148.64+6.32 04 24 14.2 57 47 53 04 28 25.5 57 54 31 0.19 0.11 148.64�5.15 03 33 39.5 49 05 59 03 37 15.7 49 15 50 0.52 0.21 IRAS 03336+4906? 148.65�6.45 03 29 06.5 48 02 33 03 32 39.5 48 12 40 0.08 0.07 148.65�6.95 03 27 25.7 47 37 31 03 30 57.5 47 47 44 0.08 0.07 148.65�7.62 03 25 09.7 47 04 42 03 28 40.0 47 15 03 0.21 0.10 148.66�4.64 03 35 35.0 49 30 14 03 39 12.5 49 39 58 0.24 0.20 ZOAG G148.65-04.63 148.67�7.27 03 26 27.4 47 21 14 03 29 58.5 47 31 30 0.15 0.14 148.67�7.35 03 26 11.1 47 17 22 03 29 42.0 47 27 39 0.19 0.18 148.68+6.82 04 27 09.3 58 06 54 04 31 22.3 58 13 21 0.15 0.12 148.68�3.25 03 40 52.2 50 36 23 03 44 33.3 50 45 48 0.07 0.06 148.69�4.01 03 38 02.8 49 59 19 03 41 41.9 50 08 54 0.18 0.11 148.69�4.83 03 35 02.6 49 20 13 03 38 39.6 49 29 59 0.11 0.10 148.70�5.93 03 31 09.6 48 26 05 03 34 43.9 48 36 05 0.15 0.12 148.71+5.91 04 22 22.8 57 28 07 04 26 32.5 57 34 53 0.20 0.08 148.71+5.88 04 22 14.9 57 26 39 04 26 24.5 57 33 25 0.19 0.07 148.71+5.85 04 22 02.7 57 25 40 04 26 12.2 57 32 27 0.17 0.16 148.71+3.76 04 11 22.8 55 55 54 04 15 25.0 56 03 24 0.12 0.10 148.71�4.80 03 35 16.1 49 20 37 03 38 53.2 49 30 22 0.15 0.14 ZOAG G148.70-04.79 148.72�4.81 03 35 16.9 49 19 58 03 38 53.9 49 29 43 0.22 0.14 ZOAG G148.71-04.80 148.72�7.83 03 24 50.0 46 51 50 03 28 19.8 47 02 12 0.11 0.09 148.73+5.88 04 22 22.1 57 25 58 04 26 31.7 57 32 44 0.10 0.07 148.73�2.69 03 43 15.9 51 01 26 03 46 58.5 51 10 42 0.11 0.07 148.73�5.36 03 33 20.5 48 52 56 03 36 56.2 49 02 48 0.14 0.11 148.73�7.00 03 27 38.1 47 32 22 03 31 09.8 47 42 34 0.15 0.10 148.74+5.91 04 22 30.7 57 26 49 04 26 40.4 57 33 34 0.11 0.09 148.74�6.89 03 28 04.6 47 37 44 03 31 36.6 47 47 55 0.14 0.13 148.74�7.53 03 25 54.8 47 06 01 03 29 25.3 47 16 19 0.30 0.26 148.75�5.34 03 33 30.9 48 53 05 03 37 06.6 49 02 57 0.26 0.11 IRAS 03335+4853 148.75�6.07 03 30 54.7 48 17 13 03 34 28.6 48 27 14 0.17 0.11 148.76+6.09 04 23 33.2 57 33 27 04 27 43.5 57 40 08 0.18 0.09 148.76+5.92 04 22 42.4 57 26 16 04 26 52.1 57 33 01 0.19 0.18 148.76+3.54 04 10 34.8 55 44 13 04 14 36.2 55 51 46 0.20 0.17 148.76�4.56 03 36 20.6 49 30 19 03 39 58.2 49 40 00 0.20 0.15 ZOAG G148.75-04.56 148.76�4.66 03 36 00.8 49 25 44 03 39 38.2 49 35 27 0.19 0.09 ZOAG G148.75-04.66 148.76�5.71 03 32 13.7 48 34 43 03 35 48.5 48 44 39 0.08 0.08 148.76�6.00 03 31 13.3 48 20 12 03 34 47.4 48 30 12 0.09 0.07 148.77�5.30 03 33 44.3 48 54 20 03 37 20.1 49 04 11 0.22 0.22 148.78+5.57 04 20 55.0 57 10 46 04 25 03.4 57 17 38 0.29 0.14 148.80+4.30 04 14 31.7 56 16 07 04 18 35.7 56 23 24 0.20 0.11 ZOAG G148.79+04.30 148.80+2.83 04 07 20.9 55 11 51 04 11 20.0 55 19 36 0.15 0.11 148.80�6.40 03 30 00.2 47 59 43 03 33 33.3 48 09 47 0.18 0.07 7C 0330+4759 148.81�7.34 03 26 53.2 47 12 59 03 30 24.1 47 23 14 0.38 0.07 148.82�4.12 03 38 17.7 49 49 19 03 41 56.5 49 58 53 0.28 0.11 ZOAG G148.82-04.12 148.82�4.64 03 36 22.6 49 24 30 03 40 00.0 49 34 11 0.19 0.11 ZOAG G148.82-04.64 148.82�6.85 03 28 35.4 47 37 04 03 32 07.5 47 47 13 0.98 0.52 UGC 02773 148.82�7.02 03 28 00.4 47 28 14 03 31 32.0 47 38 25 0.10 0.09 148.82�6.54 03 29 35.9 47 51 59 03 33 08.7 48 02 04 0.14 0.07 148.82�7.56 03 26 11.0 47 01 34 03 29 41.4 47 11 51 0.17 0.07 148.84+5.59 04 21 23.1 57 09 09 04 25 31.5 57 15 59 0.29 0.22 148.84+5.91 04 23 02.2 57 22 32 04 27 11.7 57 29 15 0.13 0.11 148.84�3.95 03 39 00.9 49 57 03 03 42 40.1 50 06 35 0.31 0.12 148.86+5.97 04 23 28.8 57 24 09 04 27 38.5 57 30 50 0.19 0.10 148.86�7.54 03 26 26.7 47 01 26 03 29 57.1 47 11 42 0.22 0.11 IRAS 03264+4701 148.87+5.92 04 23 18.1 57 21 42 04 27 27.6 57 28 24 0.13 0.12

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 148.87�7.02 03 28 15.1 47 26 37 03 31 46.7 47 36 47 0.20 0.10 148.88+5.93 04 23 21.8 57 21 58 04 27 31.3 57 28 40 0.17 0.10 148.88+5.96 04 23 31.8 57 22 59 04 27 41.4 57 29 40 0.13 0.11 148.88�4.96 03 35 30.2 49 07 02 03 39 06.8 49 16 46 0.11 0.10 148.88�6.30 03 30 46.0 48 01 46 03 34 19.3 48 11 47 0.21 0.19 148.89+3.03 04 08 47.8 55 16 34 04 12 47.4 55 24 14 0.10 0.08 148.89�5.82 03 32 27.8 48 24 59 03 36 02.3 48 34 54 0.09 0.09 148.89�6.97 03 28 30.4 47 28 45 03 32 02.2 47 38 54 0.16 0.15 148.90�5.08a 03 35 09.7 49 00 28 03 38 46.0 49 10 14 0.12 0.09 IRAS 03351+4900 148.90�5.08b 03 35 09.7 49 00 46 03 38 46.0 49 10 32 0.14 0.07 IRAS 03351+4900? 148.92�4.62 03 36 53.7 49 21 55 03 40 31.1 49 31 34 0.19 0.08 148.93�5.93 03 32 18.4 48 17 52 03 35 52.6 48 27 48 0.09 0.08 148.94+5.98 04 23 57.7 57 20 56 04 28 07.3 57 27 35 0.07 0.07 148.94�4.38 03 37 56.6 49 32 49 03 41 34.7 49 42 25 0.18 0.15 148.94�4.74 03 36 33.7 49 15 21 03 40 10.8 49 25 02 0.20 0.15 ZOAG G148.93-04.74 148.94�6.97 03 28 43.7 47 27 00 03 32 15.4 47 37 08 0.44 0.09 148.94�7.49 03 26 59.6 47 01 32 03 30 30.2 47 11 46 0.21 0.11 148.95�5.99 03 32 12.1 48 14 29 03 35 46.2 48 24 25 0.18 0.16 148.96+5.75 04 22 50.4 57 10 55 04 26 59.1 57 17 39 0.33 0.10 148.96�5.66 03 33 22.7 48 30 20 03 36 57.6 48 40 12 0.10 0.07 148.96�5.33 03 34 34.0 48 46 07 03 38 09.7 48 55 55 0.15 0.09 148.96�6.02 03 32 07.0 48 12 42 03 35 41.0 48 22 39 0.14 0.13 148.96�6.70 03 29 46.3 47 39 27 03 33 18.7 47 49 32 0.14 0.11 148.97�4.00 03 39 28.0 49 49 51 03 43 07.0 49 59 21 0.10 0.07 148.97�5.98 03 32 16.7 48 14 21 03 35 50.8 48 24 17 0.18 0.10 148.97�7.02 03 28 45.2 47 23 22 03 32 16.8 47 33 30 0.10 0.10 148.98+5.92 04 23 47.8 57 16 48 04 27 57.1 57 23 28 0.15 0.07 148.98�4.44 03 37 53.7 49 28 17 03 41 31.6 49 37 53 0.17 0.12 ZOAG G148.98-04.44 148.99+6.01 04 24 23.6 57 20 11 04 28 33.2 57 26 49 0.11 0.08 148.99�5.84 03 32 54.1 48 20 31 03 36 28.5 48 30 25 0.43 0.42 UGC 02794 148.99�7.06 03 28 42.8 47 20 41 03 32 14.3 47 30 49 0.11 0.08 149.00+5.85 04 23 34.9 57 12 59 04 27 43.9 57 19 40 0.15 0.13 149.00�4.00 03 39 37.2 49 49 04 03 43 16.2 49 58 34 0.14 0.12 149.00�6.20 03 31 38.9 48 02 25 03 35 12.4 48 12 23 0.11 0.07 149.01+6.10 04 24 57.8 57 22 57 04 29 07.7 57 29 32 0.11 0.07 87GB[BWE91] 0425+5722 149.02+6.43 04 26 46.5 57 36 08 04 30 57.5 57 42 36 0.24 0.18 149.03�2.19 03 46 44.8 51 13 38 03 50 28.6 51 22 42 0.13 0.11 149.03�7.43 03 27 36.6 47 00 56 03 31 07.2 47 11 08 0.15 0.09 149.04+5.70 04 22 59.0 57 04 57 04 27 07.4 57 11 40 0.19 0.19 149.04�6.26 03 31 39.2 47 58 15 03 35 12.6 48 08 13 0.24 0.08 149.04�6.24 03 31 45.0 47 59 21 03 35 18.4 48 09 19 0.12 0.12 149.05�6.21 03 31 52.8 48 00 13 03 35 26.3 48 10 10 0.22 0.20 149.05�6.80 03 29 50.0 47 31 24 03 33 22.1 47 41 29 0.15 0.14 149.06�7.34 03 28 04.0 47 04 24 03 31 34.9 47 14 35 0.20 0.13 149.07�7.06 03 29 03.1 47 18 14 03 32 34.6 47 28 21 0.57 0.41 MCG +08-07-005 149.07�6.41 03 31 19.3 47 49 53 03 34 52.3 47 59 52 0.15 0.13 149.09+5.96 04 24 35.1 57 13 43 04 28 44.3 57 20 20 0.14 0.11 149.09+5.94 04 24 27.1 57 13 01 04 28 36.3 57 19 39 0.18 0.13 149.09�5.44 03 34 47.4 48 36 32 03 38 22.7 48 46 19 0.26 0.24 149.10�3.92 03 40 24.8 49 49 06 03 44 04.0 49 58 33 0.11 0.11 149.10�4.97 03 36 30.8 48 58 45 03 40 07.3 49 08 26 0.12 0.11 149.10�6.21 03 32 08.1 47 58 11 03 35 41.6 48 08 07 0.10 0.07 149.11+5.84 04 24 03.7 57 07 53 04 28 12.5 57 14 32 0.09 0.07 149.11�5.66 03 34 07.8 48 24 51 03 37 42.6 48 34 40 0.17 0.11 149.12+6.41 04 27 10.3 57 30 51 04 31 21.0 57 37 18 0.18 0.09 149.12+5.33 04 21 25.4 56 45 54 04 25 32.4 56 52 44 0.23 0.10 149.12+2.64 04 08 05.6 54 50 02 04 12 03.7 54 57 44 0.09 0.07 IRAS 04080+5449 149.12�6.54 03 31 04.3 47 41 35 03 34 37.0 47 51 35 0.30 0.10 149.12�7.57 03 27 34.8 46 51 28 03 31 05.1 47 01 40 0.11 0.07 149.13+5.71 04 23 29.0 57 02 04 04 27 37.3 57 08 45 0.16 0.11

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 149.13�6.57 03 31 01.6 47 40 16 03 34 34.2 47 50 16 0.09 0.09 149.14+6.37 04 27 03.3 57 28 53 04 31 13.9 57 35 20 0.21 0.21 149.14�6.57 03 31 04.7 47 39 26 03 34 37.3 47 49 26 0.21 0.11 149.14+0.35 03 57 49.1 53 06 51 04 01 40.1 53 15 13 0.11 0.08 149.15�4.96 03 36 48.4 48 57 23 03 40 24.9 49 07 03 0.20 0.19 149.15�6.91 03 29 58.3 47 22 34 03 33 30.1 47 32 38 0.11 0.09 149.15�7.14 03 29 10.6 47 10 59 03 32 41.9 47 21 06 0.15 0.14 149.16�5.84 03 33 42.5 48 14 09 03 37 16.8 48 24 00 0.22 0.15 149.16�7.14 03 29 14.6 47 11 10 03 32 45.9 47 21 17 0.11 0.07 149.16�7.57 03 27 48.8 46 49 56 03 31 19.1 47 00 08 0.14 0.14 V Zw 351 149.17+3.92 04 14 33.0 55 44 13 04 18 35.2 55 51 30 0.20 0.11 ZOAG G149.17+03.92 149.17�7.56 03 27 52.3 46 50 14 03 31 22.6 47 00 25 0.14 0.11 149.18+6.32 04 26 59.7 57 24 53 04 31 10.0 57 31 20 0.18 0.10 149.18+6.09 04 25 44.2 57 15 38 04 29 53.8 57 22 10 0.13 0.12 149.18+6.10 04 25 50.0 57 15 48 04 29 59.6 57 22 20 0.11 0.08 149.19�4.14 03 40 01.9 49 35 13 03 43 40.4 49 44 41 0.11 0.11 149.19�4.84 03 37 27.6 49 01 32 03 41 04.4 49 11 09 0.31 0.08 ZOAG G149.19-04.84 149.20�3.66 03 41 52.5 49 57 51 03 45 32.3 50 07 13 0.13 0.09 149.21+5.57 04 23 07.8 56 52 35 04 27 15.5 56 59 18 0.21 0.08 149.21�5.02 03 36 54.0 48 52 11 03 40 30.3 49 01 51 0.11 0.07 149.21�6.70 03 30 58.5 47 30 39 03 34 30.8 47 40 40 0.07 0.07 149.22+4.00 04 15 10.1 55 45 28 04 19 12.5 55 52 43 0.55 0.54 IRAS 04151+5545 149.22�6.34 03 32 16.5 47 47 46 03 35 49.6 47 57 42 0.57 0.13 [RC3] 033217.1+47480 149.23�4.52 03 38 48.1 49 15 43 03 42 25.7 49 25 16 0.09 0.08 149.23�7.34 03 28 53.6 46 58 33 03 32 24.4 47 08 41 0.21 0.21 149.24�4.15 03 40 14.5 49 32 35 03 43 53.0 49 42 02 0.10 0.07 ZOAG G149.24-04.15 149.24�5.63 03 34 52.8 48 21 47 03 38 27.6 48 31 34 0.08 0.07 149.24�6.23 03 32 43.9 47 52 21 03 36 17.3 48 02 15 0.07 0.07 149.25�4.93 03 37 23.3 48 55 12 03 40 59.8 49 04 50 0.10 0.07 149.25�6.58 03 31 34.0 47 35 37 03 35 06.6 47 45 35 0.10 0.07 149.26�6.75b 03 31 02.2 47 26 53 03 34 34.4 47 36 53 0.16 0.07 149.26�6.75a 03 31 00.5 47 26 35 03 34 32.7 47 36 35 0.15 0.12 149.27�5.63 03 34 59.5 48 21 03 03 38 34.3 48 30 49 0.42 0.20 149.27�6.12 03 33 13.7 47 56 54 03 36 47.3 48 06 47 0.20 0.15 149.28�6.90 03 30 34.9 47 18 30 03 34 06.7 47 28 32 0.20 0.09 149.30+5.36 04 22 31.3 56 39 39 04 26 38.1 56 46 24 0.12 0.07 149.30�7.25 03 29 30.8 47 00 42 03 33 01.8 47 10 48 0.14 0.10 149.31+3.18 04 11 39.8 55 06 11 04 15 39.4 55 13 40 0.09 0.09 IRAS 04116+5506 149.31+5.33 04 22 24.9 56 38 02 04 26 31.6 56 44 48 0.11 0.07 149.31�5.04 03 37 18.0 48 47 29 03 40 54.2 48 57 07 0.11 0.08 IRAS 03372+4847 149.32+6.28 04 27 31.0 57 17 14 04 31 41.0 57 23 39 0.15 0.11 149.32�4.21 03 40 23.8 49 26 55 03 44 02.1 49 36 22 0.34 0.34 IRAS 03404+4927 149.33�6.81 03 31 09.4 47 21 37 03 34 41.4 47 31 37 0.11 0.07 149.34�7.13 03 30 06.3 47 05 17 03 33 37.6 47 15 21 0.21 0.11 149.36�4.63 03 39 01.4 49 05 38 03 42 38.6 49 15 10 0.10 0.09 149.37�2.29 03 48 01.6 50 56 10 03 51 44.9 51 05 09 0.11 0.11 149.37�3.99 03 41 28.1 49 36 18 03 45 07.0 49 45 41 0.19 0.08 149.37�7.09 03 30 23.2 47 06 03 03 33 54.5 47 16 06 0.19 0.16 149.38�4.85 03 38 21.8 48 54 35 03 41 58.5 49 04 09 0.22 0.18 ZOAG G149.38-04.84 149.38�5.66 03 35 23.6 48 15 14 03 38 58.3 48 24 59 0.19 0.16 149.38�5.59 03 35 40.8 48 18 49 03 39 15.7 48 28 33 0.44 0.37 IRAS 03356+4818 149.39�6.27 03 33 19.6 47 45 43 03 36 52.9 47 55 35 0.29 0.07 149.40+5.33 04 22 51.9 56 34 09 04 26 58.5 56 40 53 0.13 0.10 149.40�6.70 03 31 52.3 47 24 02 03 35 24.5 47 33 59 0.09 0.07 149.41�4.13 03 41 08.6 49 27 35 03 44 47.1 49 36 59 0.08 0.08 149.42+5.44 04 23 30.9 56 38 11 04 27 37.8 56 44 52 0.56 0.47 IRAS 04235+5638 149.43�4.38 03 40 19.8 49 15 12 03 43 57.6 49 24 39 0.19 0.19 ZOAG G149.43-04.37 149.44+6.99 04 31 56.1 57 40 42 04 36 08.3 57 46 49 0.29 0.26 149.44�6.52 03 32 40.7 47 31 31 03 36 13.3 47 41 26 0.10 0.09 149.45�2.99 03 45 39.5 50 20 08 03 49 20.9 50 29 16 0.10 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 149.46�6.55 03 32 42.0 47 29 18 03 36 14.6 47 39 13 0.11 0.09 149.46�6.57 03 32 37.3 47 28 17 03 36 09.8 47 38 12 0.11 0.09 149.46�6.24 03 33 46.0 47 44 25 03 37 19.3 47 54 16 0.22 0.16 149.47�4.34 03 40 40.2 49 15 20 03 44 18.1 49 24 46 0.10 0.07 149.47�6.52 03 32 48.3 47 30 24 03 36 20.9 47 40 18 0.31 0.10 149.47�6.57 03 32 39.4 47 28 20 03 36 11.9 47 38 15 0.15 0.15 149.47�6.64 03 32 25.1 47 25 01 03 35 57.5 47 34 57 0.16 0.15 149.48�5.75 03 35 36.5 48 07 36 03 39 11.0 48 17 20 0.29 0.11 149.48�7.19 03 30 35.4 46 57 23 03 34 06.5 47 07 25 0.11 0.07 149.49�4.61 03 39 46.7 49 01 57 03 43 23.9 49 11 26 0.33 0.10 ZOAG G149.49-04.61 149.49�5.05 03 38 07.7 48 40 54 03 41 43.8 48 50 29 0.19 0.09 149.51�4.71 03 39 27.7 48 56 28 03 43 04.7 49 05 58 0.16 0.08 149.52�4.41 03 40 38.7 49 10 16 03 44 16.4 49 19 42 0.18 0.16 ZOAG G149.51-04.41 149.53�4.40 03 40 44.7 49 10 25 03 44 22.4 49 19 51 0.11 0.11 149.54�4.37 03 40 53.5 49 11 16 03 44 31.3 49 20 41 0.11 0.10 ZOAG G149.54-04.37 149.55+1.21 04 03 42.6 53 29 42 04 07 35.8 53 37 42 0.58 0.40 149.55+3.98 04 16 44.5 55 30 51 04 20 46.4 55 37 59 0.08 0.08 149.55�4.63 03 39 58.4 48 58 32 03 43 35.6 49 08 00 0.48 0.15 ZOAG G149.55-04.63 149.56�4.31 03 41 10.0 49 13 40 03 44 47.9 49 23 04 0.19 0.11 ZOAG G149.55-04.31 149.56�4.87 03 39 07.0 48 46 48 03 42 43.6 48 56 20 0.18 0.09 149.58+5.59 04 25 06.9 56 37 44 04 29 14.1 56 44 19 0.18 0.10 149.58�4.46 03 40 42.4 49 05 52 03 44 20.0 49 15 18 0.11 0.11 149.59+7.16 04 33 39.4 57 41 16 04 37 51.9 57 47 16 0.09 0.08 149.60�4.15 03 41 58.3 49 20 05 03 45 36.6 49 29 26 0.10 0.10 149.60�4.46 03 40 50.7 49 04 44 03 44 28.2 49 14 09 0.15 0.15 149.61�4.18 03 41 56.8 49 18 12 03 45 35.1 49 27 33 0.30 0.21 ZOAG G149.60-04.18 149.62�4.12 03 42 12.0 49 20 20 03 45 50.4 49 29 40 0.12 0.12 149.62�4.30 03 41 31.9 49 12 07 03 45 09.9 49 21 30 0.21 0.18 ZOAG G149.61-04.30 149.64�6.58 03 33 24.8 47 21 51 03 36 57.3 47 31 43 0.21 0.19 149.65+7.06 04 33 24.1 57 34 31 04 37 36.1 57 40 32 0.20 0.09 149.65�3.56 03 44 27.5 49 46 22 03 48 07.3 49 55 34 0.13 0.11 87GB 034428.2+494637 149.66�3.59 03 44 24.4 49 43 50 03 48 04.1 49 53 02 0.22 0.07 149.66�3.56 03 44 30.2 49 45 50 03 48 10.0 49 55 02 0.19 0.17 IRAS 03444+4946 149.67�4.27 03 41 51.9 49 11 38 03 45 29.9 49 21 00 0.15 0.13 ZOAG G149.66-04.27 149.67�4.80 03 39 54.3 48 46 08 03 43 31.0 48 55 37 0.20 0.13 IRAS 03398+4846 149.68�3.54 03 44 40.6 49 46 00 03 48 20.5 49 55 11 0.24 0.22 ZOAG G149.67-03.54 149.68�4.14 03 42 25.4 49 17 41 03 46 03.7 49 27 01 0.15 0.13 149.68�4.10 03 42 33.8 49 19 08 03 46 12.2 49 28 27 0.14 0.13 149.69�3.55 03 44 43.3 49 45 03 03 48 23.1 49 54 14 0.15 0.11 149.69�4.20 03 42 16.6 49 14 14 03 45 54.8 49 23 34 0.19 0.16 ZOAG G149.69-04.19 149.70�4.46 03 41 20.7 49 01 30 03 44 58.2 49 10 54 0.13 0.13 149.70�5.71 03 36 47.4 48 01 27 03 40 21.9 48 11 07 0.10 0.07 149.70�3.80 03 43 48.2 49 33 08 03 47 27.4 49 42 23 0.11 0.09 149.71�4.45 03 41 23.6 49 01 23 03 45 01.1 49 10 46 0.11 0.08 149.71�5.74 03 36 41.9 47 59 57 03 40 16.3 48 09 37 0.11 0.10 149.71�6.70 03 33 22.5 47 13 29 03 36 54.7 47 23 21 0.18 0.07 149.72�5.65 03 37 04.5 48 03 40 03 40 39.1 48 13 19 0.18 0.18 149.72�6.62 03 33 41.9 47 16 58 03 37 14.2 47 26 49 0.10 0.07 149.73+6.76 04 32 08.2 57 18 34 04 36 19.0 57 24 40 0.16 0.11 149.73�6.60 03 33 46.2 47 17 43 03 37 18.6 47 27 34 0.12 0.12 149.74+6.72 04 31 55.9 57 16 49 04 36 06.6 57 22 56 0.18 0.08 149.74+5.50 04 25 26.4 56 26 40 04 29 33.0 56 33 14 0.16 0.08 149.76�3.83 03 43 57.4 49 29 27 03 47 36.5 49 38 41 0.22 0.21 ZOAG G149.75-03.82 149.76�6.60 03 33 56.5 47 16 14 03 37 28.9 47 26 04 0.09 0.07 149.77�3.76 03 44 18.9 49 32 15 03 47 58.2 49 41 28 0.19 0.19 149.77�4.90 03 40 02.5 48 38 04 03 43 38.9 48 47 32 0.22 0.19 149.77�5.41 03 38 10.6 48 13 27 03 41 45.8 48 23 02 0.10 0.08 149.78+4.16 04 18 48.5 55 28 49 04 22 50.6 55 35 49 0.19 0.18 IRAS 04188+5528 149.78�4.33 03 42 12.5 49 04 37 03 45 50.3 49 13 57 0.18 0.10 149.78�5.41 03 38 13.9 48 12 54 03 41 49.0 48 22 29 0.19 0.07

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 149.78�5.92 03 36 23.8 47 48 46 03 39 57.7 47 58 27 0.15 0.07 149.79�4.88 03 40 10.8 48 38 03 03 43 47.2 48 47 31 0.22 0.21 ZOAG G149.79-04.88 149.81�4.31 03 42 24.1 49 04 54 03 46 01.9 49 14 14 0.08 0.08 149.81�6.61 03 34 06.1 47 14 17 03 37 38.4 47 24 07 0.19 0.18 V Zw 356 149.82+6.87 04 33 10.5 57 19 04 04 37 21.5 57 25 06 0.13 0.08 149.82�6.58 03 34 16.2 47 15 04 03 37 48.6 47 24 53 0.24 0.14 149.83+0.40 04 01 29.9 52 42 12 04 05 20.4 52 50 20 0.10 0.09 149.85�6.73 03 33 53.5 47 07 03 03 37 25.5 47 16 53 0.21 0.18 149.86�4.82 03 40 45.6 48 38 31 03 44 22.2 48 47 57 0.14 0.13 149.87+6.55 04 31 43.6 57 04 09 04 35 53.5 57 10 17 0.33 0.07 149.87�4.54 03 41 50.7 48 51 47 03 45 28.0 49 01 09 0.15 0.10 149.88+7.41 04 36 29.3 57 37 58 04 40 42.0 57 43 47 0.27 0.09 149.89�4.71 03 41 17.6 48 42 52 03 44 54.4 48 52 16 0.15 0.08 149.89�7.02 03 33 04.7 46 51 24 03 36 36.1 47 01 17 0.20 0.09 149.90�5.44 03 38 40.7 48 07 33 03 42 15.7 48 17 06 0.22 0.10 149.90�5.12 03 39 50.7 48 23 03 03 43 26.5 48 32 32 0.09 0.08 149.92+5.34 04 25 29.0 56 12 16 04 29 34.7 56 18 50 0.29 0.12 149.94+6.46 04 31 34.0 56 57 33 04 35 43.4 57 03 42 0.11 0.11 149.94+5.41 04 26 00.1 56 14 24 04 30 06.0 56 20 55 0.15 0.10 149.95+6.49 04 31 44.6 56 57 49 04 35 54.1 57 03 57 0.19 0.11 149.95+4.91 04 23 27.2 55 52 53 04 27 31.5 55 59 35 0.13 0.08 149.96+6.14 04 29 55.4 56 43 51 04 34 03.7 56 50 06 0.18 0.10 149.96+5.89 04 28 33.6 56 33 09 04 32 41.1 56 39 30 0.19 0.18 149.96�5.07 03 40 20.6 48 23 01 03 43 56.5 48 32 28 0.10 0.09 149.97�3.81 03 45 02.7 49 22 33 03 48 41.7 49 31 43 0.24 0.23 ZOAG G149.96-03.81 149.97�6.24 03 36 11.2 47 26 33 03 39 44.3 47 36 15 0.29 0.28 149.99�6.36 03 35 50.5 47 20 15 03 39 23.3 47 29 58 0.15 0.12 150.00�5.09 03 40 26.1 48 20 34 03 44 01.9 48 30 01 0.27 0.10 150.00�1.88 03 52 44.9 50 51 28 03 56 28.9 51 00 09 0.33 0.32 IRAS 03527+5051 150.02�4.03 03 44 27.7 49 10 10 03 48 06.1 49 19 22 0.21 0.07 IRAS 03444+4910 150.03�5.37 03 39 34.9 48 05 48 03 43 10.0 48 15 18 0.09 0.08 150.03�5.59 03 38 47.5 47 55 39 03 42 22.1 48 05 12 0.16 0.07 150.04�3.87 03 45 11.9 49 16 53 03 48 50.7 49 26 02 0.15 0.13 150.04+0.84 04 04 29.9 52 53 28 04 08 21.5 53 01 25 0.10 0.08 F3R 4357 150.06�5.36 03 39 45.7 48 05 38 03 43 20.9 48 15 07 0.11 0.07 150.07+5.52 04 27 13.0 56 13 13 04 31 19.1 56 19 40 0.29 0.10 150.07+4.59 04 22 25.6 55 34 41 04 26 28.7 55 41 27 0.19 0.16 150.08�4.11 03 44 28.8 49 04 19 03 48 07.0 49 13 31 0.14 0.14 150.09�5.78 03 38 22.4 47 44 13 03 41 56.6 47 53 47 0.18 0.08 150.11�5.32 03 40 07.0 48 05 54 03 43 42.2 48 15 22 0.19 0.14 150.12�6.38 03 36 23.2 47 14 16 03 39 55.9 47 23 57 0.24 0.09 150.13+6.47 04 32 31.3 56 49 03 04 36 40.4 56 55 08 0.16 0.07 150.13�3.84 03 45 44.7 49 15 01 03 49 23.6 49 24 08 0.15 0.13 150.13�6.57 03 35 47.2 47 04 36 03 39 19.5 47 14 20 0.09 0.07 150.14�3.98b 03 45 14.9 49 08 17 03 48 53.4 49 17 26 0.43 0.17 ZOAG G150.13-03.97 150.14�3.98a: 03 45 13.7 49 08 16 03 48 52.2 49 17 25 0.20 0.20 150.15�5.93 03 38 09.5 47 34 54 03 41 43.3 47 44 29 0.19 0.11 150.16�5.04 03 41 24.3 48 17 14 03 45 00.2 48 26 37 0.11 0.07 150.17+7.35 04 37 32.7 57 22 41 04 41 44.6 57 28 25 0.11 0.08 150.18+7.32 04 37 24.2 57 21 08 04 41 36.0 57 26 53 0.11 0.07 150.18�6.87 03 34 56.6 46 48 36 03 38 28.2 46 58 23 0.11 0.11 150.19�6.06 03 37 50.9 47 27 34 03 41 24.4 47 37 10 0.19 0.13 150.19�5.67 03 39 13.1 47 45 51 03 42 47.5 47 55 22 0.46 0.45 150.20�6.38 03 36 45.7 47 11 24 03 40 18.4 47 21 04 0.30 0.11 150.22+7.00 04 35 51.5 57 06 50 04 40 02.2 57 12 41 0.12 0.07 150.22+5.58a 04 28 12.9 56 09 13 04 32 18.9 56 15 35 0.39 0.10 150.22+5.58b 04 28 13.1 56 09 20 04 32 19.1 56 15 42 0.29 0.29 150.23+5.19 04 26 16.3 55 52 28 04 30 21.0 55 58 58 0.24 0.24 150.26�6.63 03 36 12.6 46 57 27 03 39 44.7 47 07 09 0.10 0.07 150.27�6.17 03 37 51.1 47 19 06 03 41 24.3 47 28 42 0.10 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 150.30+8.14 04 42 41.5 57 47 55 04 46 55.8 57 53 18 0.21 0.10 150.30+7.94 04 41 31.6 57 40 20 04 45 45.3 57 45 48 0.32 0.14 150.33+8.08 04 42 27.4 57 44 32 04 46 41.5 57 49 56 0.12 0.10 150.33+7.79 04 40 46.6 57 32 56 04 44 59.7 57 38 27 0.24 0.12 150.33�6.70 03 36 17.6 46 51 37 03 39 49.5 47 01 19 0.13 0.12 150.37+7.58 04 39 48.8 57 23 01 04 44 01.1 57 28 36 0.14 0.09 150.38�4.40 03 44 50.2 48 39 25 03 48 27.5 48 48 36 0.11 0.09 150.39+5.53 04 28 48.5 55 59 29 04 32 54.0 56 05 49 0.30 0.10 150.42+8.23 04 43 47.0 57 45 48 04 48 01.4 57 51 06 0.11 0.11 150.42+7.94 04 42 06.9 57 34 49 04 46 20.3 57 40 14 0.14 0.12 150.42�5.62 03 40 29.1 47 39 54 03 44 03.5 47 49 21 0.15 0.10 150.44�6.49 03 37 31.2 46 57 32 03 41 03.6 47 07 09 0.36 0.08 150.45+8.27 04 44 06.5 57 46 05 04 48 20.9 57 51 22 0.11 0.09 150.46�2.99 03 50 35.8 49 42 29 03 54 16.6 49 51 18 0.18 0.11 ZOAG G150.46-02.99 150.48+6.58 04 34 49.0 56 38 01 04 38 57.8 56 43 57 0.49 0.12 150.48�5.93 03 39 39.5 47 23 06 03 43 13.1 47 32 36 0.11 0.08 150.48�5.87 03 39 53.3 47 25 44 03 43 27.1 47 35 13 0.12 0.08 150.48�5.57 03 40 57.5 47 40 16 03 44 32.0 47 49 41 0.22 0.10 150.48�6.05 03 39 15.1 47 17 11 03 42 48.5 47 26 42 0.08 0.07 150.49�5.88 03 39 54.1 47 25 16 03 43 27.9 47 34 45 0.32 0.10 150.49�5.83 03 40 02.8 47 27 26 03 43 36.7 47 36 54 0.10 0.08 150.50�4.81 03 43 49.9 48 15 22 03 47 26.2 48 24 37 0.08 0.07 150.52+4.66 04 24 57.4 55 17 59 04 28 60.0 55 24 35 0.13 0.12 150.53+6.67 04 35 32.7 56 39 31 04 39 41.7 56 45 24 0.13 0.08 150.53+6.11 04 32 32.4 56 17 21 04 36 39.6 56 23 26 0.13 0.11 150.53�3.75 03 47 59.6 49 04 30 03 51 38.5 49 13 29 0.11 0.09 150.54+6.69 04 35 42.6 56 40 23 04 39 51.6 56 46 15 0.22 0.08 150.55�6.04 03 39 35.3 47 15 18 03 43 08.7 47 24 48 0.21 0.09 150.57+6.46 04 34 37.8 56 29 40 04 38 46.0 56 35 36 0.51 0.17 150.57�5.97 03 39 57.6 47 17 41 03 43 31.1 47 27 10 0.10 0.07 150.59+5.75 04 30 55.2 56 00 14 04 35 01.1 56 06 26 0.19 0.09 150.62�6.23 03 39 14.8 47 03 53 03 42 47.7 47 13 24 0.12 0.10 150.66�0.80: 04 00 26.1 51 15 00 04 04 12.5 51 23 12 0.33 0.22 IRAS 04004+5114 150.68�4.94 03 44 12.5 48 03 00 03 47 48.4 48 12 13 0.12 0.12 ZOAG G150.67-04.94 150.68�5.73 03 41 19.9 47 25 33 03 44 53.9 47 34 57 0.33 0.07 150.69+6.02 04 32 49.4 56 06 29 04 36 56.0 56 12 33 0.12 0.11 150.70+6.04 04 32 57.7 56 06 55 04 37 04.3 56 12 58 0.19 0.11 150.72�5.76 03 41 23.7 47 22 29 03 44 57.6 47 31 52 0.20 0.19 150.72�5.48 03 42 25.2 47 36 01 03 45 59.8 47 45 21 0.13 0.12 150.74�4.60 03 45 46.0 48 16 40 03 49 22.7 48 25 47 0.20 0.07 ZOAG G150.74-04.60 150.76�5.89 03 41 08.2 47 15 00 03 44 41.8 47 24 24 0.11 0.10 150.78�0.56: 04 02 01.5 51 20 44 04 05 48.5 51 28 50 0.39 0.38 150.79+7.90 04 43 36.3 57 16 31 04 47 48.8 57 21 50 0.49 0.11 150.79+5.32 04 29 39.5 55 33 45 04 33 43.7 55 40 02 0.09 0.07 150.79�4.78 03 45 19.9 48 06 32 03 48 56.1 48 15 41 0.10 0.09 150.79�6.07 03 40 37.2 47 05 31 03 44 10.4 47 14 57 0.31 0.14 150.80+6.82 04 37 39.8 56 33 45 04 41 48.7 56 39 29 0.22 0.10 150.80�2.58 03 53 48.9 49 48 07 03 57 30.5 49 56 44 0.18 0.07 IRAS 03537+4947 150.81+8.30 04 46 00.8 57 31 01 04 50 14.5 57 36 10 0.20 0.10 150.82�4.54 03 46 20.9 48 16 36 03 49 57.7 48 25 41 0.10 0.07 150.82�6.20 03 40 18.3 46 58 08 03 43 51.2 47 07 35 0.27 0.11 150.82�0.57 04 02 08.8 51 19 12 04 05 55.7 51 27 18 0.45 0.40 V Zw 369 150.83+6.82 04 37 49.5 56 32 24 04 41 58.4 56 38 07 0.12 0.08 150.83�4.85 03 45 15.7 48 01 43 03 48 51.7 48 10 52 0.09 0.07 150.84+8.19 04 45 32.1 57 25 13 04 49 45.4 57 30 24 0.30 0.22 150.85+6.81 04 37 52.1 56 30 51 04 42 00.9 56 36 34 0.26 0.10 150.86+6.40 04 35 41.3 56 14 19 04 39 48.8 56 20 11 0.23 0.13 150.86�1.12 04 00 03.1 50 52 43 04 03 48.5 51 00 57 0.33 0.32 IRAS 04000+5052 150.88�5.47 03 43 12.3 47 30 38 03 46 46.8 47 39 55 0.12 0.09 150.89+6.54 04 36 34.7 56 18 12 04 40 42.6 56 24 00 0.22 0.20

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 150.89+5.92 04 33 17.9 55 53 44 04 37 23.8 55 59 46 0.56 0.54 150.90+7.56 04 42 13.3 56 58 10 04 46 24.4 57 03 35 0.16 0.09 150.93�5.95 03 41 42.2 47 05 46 03 45 15.6 47 15 08 0.19 0.08 150.93�3.39 03 51 14.5 49 05 50 03 54 54.0 49 14 37 0.11 0.08 150.93�3.42 03 51 09.0 49 04 22 03 54 48.4 49 13 09 0.15 0.09 150.93�3.47 03 50 57.2 49 02 10 03 54 36.5 49 10 58 0.19 0.19 ZOAG G150.93-03.47 150.94+3.77 04 22 33.8 54 22 46 04 26 33.0 54 29 31 0.11 0.10 150.98+4.36 04 25 37.9 54 45 55 04 29 38.8 54 52 28 0.09 0.08 150.98�6.19 03 41 03.2 46 52 48 03 44 36.0 47 02 13 0.10 0.08 151.02+5.25 04 30 23.4 55 21 00 04 34 27.0 55 27 14 0.15 0.11 151.03�5.49 03 43 49.4 47 23 55 03 47 23.8 47 33 10 0.15 0.11 151.06+7.69 04 43 40.5 56 56 10 04 47 51.7 57 01 29 0.33 0.07 151.06+6.80 04 38 48.8 56 21 07 04 42 57.2 56 26 46 0.32 0.15 151.07+7.34 04 41 49.7 56 41 52 04 45 59.7 56 47 19 0.20 0.07 151.09�5.48 03 44 08.8 47 22 03 03 47 43.2 47 31 16 0.35 0.11 151.12�5.47 03 44 17.7 47 21 36 03 47 52.1 47 30 49 0.16 0.07 151.13+5.62 04 32 50.8 55 30 53 04 36 55.3 55 36 57 0.19 0.19 151.13�5.91 03 42 46.9 47 00 14 03 46 20.3 47 09 32 0.11 0.08 151.16�4.52 03 48 02.4 48 04 50 03 51 39.0 48 13 49 0.09 0.08 151.20�3.94 03 50 22.9 48 30 18 03 54 00.9 48 39 08 0.10 0.09 [WB92] 0350+4832 151.21+5.86 04 34 28.8 55 37 01 04 38 33.9 55 42 58 0.17 0.16 151.21+3.28 04 21 24.9 53 50 49 04 25 22.2 53 57 39 0.22 0.11 151.21�5.72 03 43 48.3 47 06 28 03 47 22.1 47 15 43 0.11 0.08 151.22�5.24 03 45 36.3 47 28 49 03 49 11.2 47 37 57 0.28 0.13 151.22�6.09b 03 42 33.9 46 48 41 03 46 06.9 46 58 00 0.19 0.08 151.22�6.09a 03 42 32.6 46 48 45 03 46 05.6 46 58 04 0.09 0.08 151.23�4.75 03 47 30.6 47 51 21 03 51 06.6 48 00 22 0.50 0.50 IRAS 03475+4751 151.24�5.55 03 44 35.8 47 13 31 03 48 10.0 47 22 43 0.12 0.09 151.24�2.78 03 55 07.9 49 22 12 03 58 48.7 49 30 45 0.15 0.14 ZOAG G151.24-02.77 151.25�3.19 03 53 33.2 49 02 57 03 57 13.0 49 11 36 0.18 0.09 151.26+6.51 04 38 08.4 56 00 45 04 42 15.5 56 06 27 0.21 0.11 151.26+5.36 04 32 04.9 55 14 37 04 36 08.4 55 20 44 0.12 0.10 151.26�5.23 03 45 50.7 47 28 01 03 49 25.6 47 37 08 0.29 0.12 151.26�5.91 03 43 24.1 46 55 41 03 46 57.4 47 04 57 0.32 0.07 151.26�3.20 03 53 32.3 49 02 25 03 57 12.1 49 11 04 0.21 0.11 151.28+6.67 04 39 07.6 56 06 01 04 43 15.1 56 11 39 0.16 0.11 151.28�2.75 03 55 24.6 49 22 21 03 59 05.5 49 30 53 0.10 0.07 151.29+4.98 04 30 17.2 54 58 06 04 34 19.5 55 04 20 0.19 0.15 ZOAG G151.28+04.98 151.33+5.74b 04 34 24.0 55 26 43 04 38 28.5 55 32 40 0.16 0.09 151.33+5.74a 04 34 22.6 55 27 04 04 38 27.2 55 33 01 0.22 0.13 151.34�5.89 03 43 47.5 46 53 27 03 47 20.8 47 02 42 0.20 0.11 151.35+5.74 04 34 30.1 55 26 16 04 38 34.6 55 32 13 0.41 0.38 151.36�4.16 03 50 19.3 48 13 57 03 53 56.7 48 22 48 0.11 0.11 151.37+2.81 04 19 59.2 53 24 14 04 23 55.0 53 31 10 0.25 0.14 ZOAG G151.36+02.81 151.39�4.50 03 49 11.2 47 56 56 03 52 47.7 48 05 51 0.21 0.20 ZOAG G151.39-04.50 151.40�4.21 03 50 18.2 48 10 22 03 53 55.4 48 19 13 0.11 0.08 151.41�5.31 03 46 14.8 47 18 29 03 49 49.4 47 27 35 0.11 0.07 151.41+1.02 04 11 56.9 52 05 31 04 15 47.6 52 12 59 0.10 0.07 IRAS 04119+5205 151.43+7.63 04 45 05.2 56 37 04 04 49 15.4 56 42 17 0.38 0.19 [RC3] 044508.5+56365 151.43�4.43 03 49 34.7 47 58 47 03 53 11.4 48 07 40 0.22 0.19 151.45�2.63 03 56 39.6 49 20 55 04 00 20.6 49 29 22 0.17 0.09 ZOAG G151.44-02.63 151.45�3.27 03 54 10.4 48 51 34 03 57 49.9 49 00 10 0.10 0.07 151.47+7.18 04 42 46.8 56 17 34 04 46 55.5 56 22 57 0.14 0.11 151.47�3.01 03 55 16.2 49 02 41 03 58 56.3 49 11 13 0.22 0.11 151.53+7.39 04 44 13.1 56 23 14 04 48 22.4 56 28 31 0.20 0.08 151.54�4.39 03 50 15.9 47 56 08 03 53 52.6 48 04 59 0.30 0.12 ZOAG G151.54-04.39 151.55+5.85 04 36 00.6 55 21 43 04 40 05.1 55 27 34 0.18 0.09 151.55+5.69 04 35 10.0 55 15 00 04 39 14.0 55 20 54 0.09 0.08 151.55�5.79 03 45 06.1 46 50 26 03 48 39.6 46 59 36 0.19 0.09 151.55�3.22 03 54 49.3 48 49 45 03 58 28.8 48 58 19 0.08 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 151.56�5.48 03 46 19.4 47 04 51 03 49 53.6 47 13 56 0.10 0.09 151.56�5.64 03 45 43.8 46 57 03 03 49 17.6 47 06 11 0.22 0.14 151.56�5.62 03 45 46.9 46 58 23 03 49 20.7 47 07 30 0.30 0.11 151.56�5.61 03 45 47.4 46 58 39 03 49 21.3 47 07 46 0.16 0.11 151.56�5.78 03 45 13.4 46 50 36 03 48 46.9 46 59 46 0.15 0.12 151.57�5.72 03 45 28.6 46 53 08 03 49 02.2 47 02 17 0.09 0.08 151.58�5.17 03 47 30.7 47 18 33 03 51 05.6 47 27 34 0.11 0.09 151.58�2.95 03 56 01.5 49 01 23 03 59 41.6 49 09 52 0.15 0.13 151.59+5.81 04 35 57.9 55 18 30 04 40 02.2 55 24 21 0.22 0.07 151.60+7.75 04 46 31.2 56 33 38 04 50 41.4 56 38 45 0.18 0.11 151.60+6.83 04 41 27.6 55 57 50 04 45 35.0 56 03 18 0.15 0.14 151.60+5.70 04 35 26.0 55 13 03 04 39 29.9 55 18 56 0.58 0.20 IRAS 04353+5512? 151.63+3.37 04 23 52.6 53 36 23 04 27 49.6 53 43 03 0.17 0.10 IRAS 04238+5336 151.64+3.83 04 26 09.8 53 55 04 04 30 08.1 54 01 35 0.19 0.09 151.64�4.19 03 51 30.0 48 02 07 03 55 07.1 48 10 53 0.19 0.19 151.65�4.96 03 48 38.8 47 25 47 03 52 14.1 47 34 44 0.15 0.09 151.66+6.42 04 39 33.9 55 39 07 04 43 39.9 55 44 43 0.22 0.13 151.66�5.71 03 45 57.2 46 50 22 03 49 30.8 46 59 29 0.37 0.30 MCG +08-07-017 151.67+1.85: 04 16 53.1 52 30 33 04 20 45.8 52 37 41 0.19 0.13 151.68+5.93 04 37 00.9 55 19 03 04 41 05.4 55 24 50 0.17 0.14 151.70+6.06 04 37 45.8 55 23 15 04 41 50.6 55 28 59 0.20 0.07 151.70�5.11 03 48 20.0 47 16 53 03 51 54.9 47 25 51 0.13 0.08 151.70�2.53 03 58 14.1 49 16 00 04 01 55.2 49 24 21 0.14 0.11 151.70�2.47 03 58 28.7 49 18 15 04 02 09.9 49 26 35 0.21 0.20 151.72+3.33 04 24 06.8 53 30 52 04 28 03.6 53 37 31 0.08 0.07 151.74+7.36 04 45 02.7 56 12 10 04 49 11.4 56 17 23 0.10 0.07 151.74+5.72 04 36 11.2 55 08 06 04 40 15.0 55 13 56 0.18 0.10 151.74�3.82 03 53 20.4 48 15 03 03 56 58.3 48 23 42 0.15 0.11 151.75+7.38 04 45 12.4 56 12 30 04 49 21.1 56 17 43 0.10 0.09 151.77+5.62 04 35 47.2 55 02 41 04 39 50.6 55 08 33 0.31 0.10 IRAS 04358+5502 151.77�5.27b 03 48 01.5 47 06 49 03 51 36.0 47 15 48 0.14 0.08 151.77�5.27a 03 48 00.6 47 06 45 03 51 35.1 47 15 44 0.10 0.07 151.78+7.02 04 43 19.5 55 57 28 04 47 27.1 56 02 49 0.09 0.07 151.79+3.56 04 25 32.6 53 37 57 04 29 29.9 53 44 31 0.07 0.07 151.79+3.77 04 26 35.5 53 46 33 04 30 33.4 53 53 02 0.10 0.09 151.80+6.49 04 40 33.7 55 35 48 04 44 39.6 55 41 20 0.32 0.21 151.80+4.55 04 30 29.2 54 17 45 04 34 29.4 54 23 58 0.15 0.07 ZOAG G151.80+04.54 151.80+3.80 04 26 45.8 53 46 50 04 30 43.8 53 53 19 0.11 0.07 151.80�4.15 03 52 22.4 47 57 57 03 55 59.5 48 06 40 0.08 0.07 151.81+3.74 04 26 29.5 53 44 07 04 30 27.3 53 50 37 0.14 0.07 151.82+7.05 04 43 40.0 55 56 22 04 47 47.6 56 01 41 0.09 0.08 151.82+6.07 04 38 22.1 55 18 17 04 42 26.7 55 23 58 0.29 0.21 151.82+5.57 04 35 47.3 54 58 14 04 39 50.4 55 04 06 0.27 0.18 151.83+7.42 04 45 44.5 56 10 45 04 49 53.2 56 15 55 0.24 0.15 151.84+3.32 04 24 37.3 53 25 22 04 28 33.9 53 31 59 0.20 0.09 ZOAG G151.84+03.32 151.85+7.40 04 45 44.1 56 08 42 04 49 52.7 56 13 53 0.20 0.13 151.85+7.02 04 43 39.4 55 54 09 04 47 46.8 55 59 28 0.29 0.17 151.86+6.27 04 39 39.0 55 24 05 04 43 44.1 55 29 41 0.30 0.16 [HR89] 043938.6+55240 151.87+6.90 04 43 05.4 55 48 17 04 47 12.4 55 53 39 0.07 0.07 151.87+6.27 04 39 42.1 55 23 44 04 43 47.2 55 29 20 0.17 0.08 151.88�5.55 03 47 31.2 46 49 25 03 51 05.0 46 58 26 0.24 0.07 151.89+6.30 04 39 54.7 55 24 14 04 43 59.9 55 29 49 0.11 0.09 151.89+3.82 04 27 16.0 53 44 18 04 31 13.9 53 50 45 0.09 0.08 151.90+3.70 04 26 45.7 53 38 38 04 30 43.3 53 45 07 0.09 0.07 151.90�5.31 03 48 27.5 47 00 07 03 52 01.9 47 09 05 0.18 0.10 151.92+5.20 04 34 19.5 54 39 10 04 38 21.4 54 45 08 0.10 0.08 151.92+4.62 04 31 26.0 54 15 39 04 35 26.2 54 21 49 0.54 0.11 ZOAG G151.91+04.62 151.93+5.78 04 37 23.4 55 02 06 04 41 27.0 55 07 51 0.19 0.16 151.93+5.96 04 38 21.8 55 08 53 04 42 25.9 55 14 34 0.20 0.10 151.93+3.66 04 26 40.9 53 35 40 04 30 38.3 53 42 09 0.07 0.07

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 151.96+7.09 04 44 32.0 55 51 53 04 48 39.4 55 57 09 0.09 0.09 151.97+3.76 04 27 21.5 53 38 05 04 31 19.1 53 44 31 0.18 0.11 151.97+3.63 04 26 45.6 53 32 44 04 30 42.9 53 39 13 0.14 0.08 ZOAG G151.96+03.63 151.97�1.98 04 01 43.5 49 30 13 04 05 25.8 49 38 21 0.20 0.18 IRAS 04017+4930 151.98+3.76 04 27 24.3 53 38 06 04 31 21.9 53 44 32 0.17 0.11 151.98�3.85 03 54 20.1 48 04 37 03 57 57.8 48 13 13 0.21 0.20 151.98�4.82 03 50 39.9 47 19 56 03 54 15.3 47 28 45 0.12 0.07 151.99+1.56 04 17 05.4 52 04 35 04 20 56.9 52 11 42 0.27 0.15 ZOAG G152.00+01.56 152.00+3.60 04 26 45.0 53 30 16 04 30 42.1 53 36 45 0.15 0.10 152.01+5.41 04 35 48.5 54 43 28 04 39 50.8 54 49 20 0.16 0.12 152.01+1.20 04 15 31.0 51 48 07 04 19 21.4 51 55 21 0.18 0.16 152.04+4.76 04 32 39.8 54 15 52 04 36 40.2 54 21 57 0.19 0.17 ZOAG G152.03+04.76 152.07+1.69 04 18 02.7 52 07 05 04 21 54.4 52 14 09 0.36 0.09 152.08+5.80 04 38 11.2 54 55 42 04 42 14.5 55 01 24 0.27 0.09 152.09+6.47 04 41 48.6 55 21 51 04 45 53.9 55 27 18 0.22 0.20 152.10+7.12 04 45 18.7 55 46 44 04 49 25.9 55 51 56 0.24 0.07 152.12�4.01 03 54 20.2 47 51 45 03 57 57.4 48 00 21 0.19 0.15 152.13+4.75 04 33 00.7 54 11 19 04 37 00.9 54 17 22 0.08 0.08 152.14+5.86 04 38 47.1 54 55 26 04 42 50.5 55 01 05 0.11 0.08 [WB92] 0438+5457 152.14�5.01 03 50 40.9 47 05 08 03 54 15.8 47 13 57 0.08 0.07 152.15+6.89 04 44 18.0 55 35 22 04 48 24.4 55 40 39 0.18 0.09 152.15+5.16 04 35 12.9 54 27 17 04 39 14.3 54 33 11 0.15 0.07 152.15+3.32 04 26 05.2 53 12 08 04 30 01.3 53 18 39 0.09 0.07 152.15+1.29 04 16 35.0 51 46 19 04 20 25.5 51 53 28 0.10 0.08 152.17+5.20 04 35 30.8 54 27 50 04 39 32.2 54 33 43 0.22 0.08 152.17+3.88 04 28 53.2 53 34 16 04 32 50.9 53 40 36 0.16 0.07 152.17+1.30 04 16 45.3 51 46 03 04 20 35.8 51 53 12 0.19 0.17 152.18+4.72 04 33 05.7 54 08 23 04 37 05.8 54 14 26 0.19 0.07 152.21+4.77 04 33 26.9 54 08 52 04 37 27.0 54 14 53 0.11 0.10 ZOAG G152.20+04.76 152.21�3.26 03 57 40.5 48 22 40 04 01 19.4 48 31 03 0.09 0.07 152.22+4.80 04 33 42.0 54 09 35 04 37 42.2 54 15 35 0.53 0.14 IRAS 04336+5409 152.22�2.96 03 58 54.7 48 35 39 04 02 34.3 48 43 57 0.21 0.11 152.23+4.78 04 33 36.2 54 08 33 04 37 36.3 54 14 34 0.21 0.20 ZOAG G152.22+04.78 152.26+4.59 04 32 48.8 53 59 26 04 36 48.3 54 05 30 0.09 0.07 152.28�3.54 03 56 55.0 48 06 58 04 00 33.2 48 15 24 0.12 0.11 ZOAG G152.27-03.54 152.28+3.30 04 26 35.9 53 05 44 04 30 31.8 53 12 13 0.21 0.11 ZOAG G152.28+03.30 152.30�4.00 03 55 14.4 47 45 22 03 58 51.5 47 53 54 0.13 0.11 152.31+5.85 04 39 29.8 54 47 27 04 43 32.9 54 53 04 0.49 0.49 152.31�5.55 03 49 28.1 46 33 28 03 53 01.7 46 42 22 0.16 0.15 152.32+5.77 04 39 06.7 54 44 15 04 43 09.5 54 49 53 0.37 0.17 152.34+6.50 04 43 01.8 55 11 47 04 47 06.7 55 17 09 0.51 0.16 152.34+6.33 04 42 10.9 55 04 52 04 46 15.3 55 10 17 0.48 0.48 152.37+6.91 04 45 25.1 55 25 55 04 49 31.1 55 31 07 0.19 0.10 152.39+4.48 04 32 51.8 53 49 22 04 36 50.8 53 55 26 0.40 0.11 ZOAG G152.38+04.48 152.40�4.94 03 52 06.4 46 58 16 03 55 41.3 47 07 00 0.31 0.17 ZOAG G152.39-04.94 152.41+5.05 04 35 48.5 54 11 19 04 39 49.1 54 17 11 0.21 0.09 152.42�3.80 03 56 30.4 47 49 44 04 00 07.9 47 58 11 0.19 0.10 ZOAG G152.41-03.80 152.42+1.49 04 18 42.2 51 43 27 04 22 32.9 51 50 28 0.22 0.22 IRAS 04186+5143 152.43�4.55 03 53 44.4 47 15 02 03 57 20.2 47 23 40 0.13 0.11 152.50�0.21 04 11 34.8 50 27 16 04 15 21.0 50 34 45 0.21 0.21 IRAS 04115+5027 152.51+6.55 04 44 05.4 55 05 43 04 48 10.1 55 11 00 0.30 0.19 IRAS 04440+5505 152.52�4.48 03 54 23.0 47 14 32 03 57 58.9 47 23 08 0.33 0.19 ZOAG G152.52-04.49 152.54�4.51 03 54 19.7 47 12 35 03 57 55.5 47 21 11 0.18 0.17 ZOAG G152.53-04.52 152.55�3.76 03 57 16.1 47 46 34 04 00 53.6 47 54 59 0.11 0.08 ZOAG G152.54-03.76 152.55�4.22 03 55 30.1 47 25 17 03 59 06.5 47 33 48 0.11 0.07 ZOAG G152.55-04.23 152.56�4.69 03 53 45.6 47 03 53 03 57 21.0 47 12 31 0.18 0.07 ZOAG G152.55-04.69 152.57+2.25 04 22 54.4 52 09 29 04 26 47.0 52 16 13 0.11 0.07 152.58�3.54 03 58 15.9 47 55 34 04 01 53.9 48 03 55 0.19 0.15 IRAS 03582+4755 152.59+4.51 04 33 54.1 53 41 48 04 37 52.9 53 47 48 0.15 0.10 152.61�0.11 04 12 31.3 50 26 45 04 16 17.6 50 34 11 0.18 0.16

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 152.62+0.90 04 16 58.4 51 09 41 04 20 47.3 51 16 49 0.11 0.07 152.64+6.18 04 42 40.7 54 45 36 04 46 44.1 54 50 59 0.27 0.26 152.64�1.72 04 05 50.5 49 14 35 04 09 32.8 49 22 27 0.19 0.09 WEIN 023 152.66+6.07 04 42 13.5 54 40 12 04 46 16.5 54 45 37 0.40 0.21 152.66�3.77 03 57 43.8 47 41 42 04 01 21.2 47 50 05 0.24 0.14 IRAS 03577+4741 152.70�2.40 04 03 19.9 48 41 58 04 07 00.5 48 49 59 0.19 0.15 IRAS 04032+4842? 152.70+0.04 04 13 33.6 50 29 19 04 17 20.2 50 36 41 0.24 0.22 152.71+5.19 04 37 51.8 54 03 32 04 41 52.3 54 09 15 0.11 0.08 152.72+6.14 04 42 50.3 54 40 19 04 46 53.4 54 45 42 0.16 0.07 152.72�4.55 03 55 00.5 47 03 46 03 58 36.1 47 12 19 0.33 0.19 ZOAG G152.71-04.55 152.79�3.59 03 59 02.7 47 44 50 04 02 40.4 47 53 08 0.22 0.07 ZOAG G152.79-03.59 152.79+3.35 04 29 09.1 52 45 36 04 33 04.4 52 51 55 0.11 0.07 152.87�3.79 03 58 36.7 47 32 32 04 02 13.9 47 40 52 0.21 0.13 152.89�2.52 04 03 42.4 48 29 23 04 07 22.6 48 37 23 0.14 0.09 ZOAG G152.88-02.52 152.90�4.52 03 55 53.7 46 58 22 03 59 29.2 47 06 52 0.20 0.19 ZOAG G152.89-04.53 152.91�3.92 03 58 18.0 47 25 13 04 01 54.9 47 33 34 0.10 0.09 153.01�3.44 04 00 34.0 47 42 52 04 04 11.9 47 51 04 0.22 0.09 153.01�4.43 03 56 46.1 46 58 18 04 00 21.7 47 06 45 0.14 0.09 153.01�4.37 03 57 00.6 47 01 02 04 00 36.4 47 09 28 0.11 0.09 153.06�3.86 03 59 12.0 47 21 56 04 02 48.9 47 30 13 0.07 0.07 153.08�3.38 04 01 06.7 47 43 00 04 04 44.7 47 51 10 0.09 0.07 153.08+3.75 04 32 21.6 52 49 13 04 36 17.5 52 55 19 0.18 0.10 153.11�4.39 03 57 21.0 46 56 19 04 00 56.7 47 04 43 0.33 0.18 ZOAG G153.10-04.39 153.13+5.15 04 39 34.5 53 43 01 04 43 34.1 53 48 37 0.08 0.07 153.13�3.93 03 59 12.8 47 15 48 04 02 49.5 47 24 05 0.14 0.11 ZOAG G153.13-03.94 153.14�4.22 03 58 06.2 47 02 37 04 01 42.2 47 10 58 0.10 0.07 153.17+2.14 04 25 07.2 51 39 01 04 28 58.7 51 45 36 0.41 0.22 IRAS 04251+5138 153.20�1.84 04 07 51.8 48 46 58 04 11 33.3 48 54 42 0.16 0.07 153.21+5.53 04 41 51.3 53 54 12 04 45 51.8 53 59 39 0.10 0.10 153.22+5.74 04 42 57.3 54 02 13 04 46 58.4 54 07 35 0.17 0.08 153.27�4.21 03 58 45.3 46 58 03 04 02 21.2 47 06 22 0.11 0.07 153.28+3.97 04 34 19.0 52 49 27 04 38 15.2 52 55 25 0.10 0.07 153.28+3.84 04 33 40.5 52 43 50 04 37 36.3 52 49 51 0.20 0.11 ZOAG G153.28+03.84 153.33�3.99 03 59 50.7 47 05 29 04 03 27.1 47 13 44 0.21 0.16 153.38�1.56 04 09 49.7 48 52 07 04 13 31.7 48 59 43 0.09 0.07 153.48+1.98 04 25 46.2 51 18 51 04 29 36.8 51 25 24 0.11 0.07 153.51�3.84 04 01 14.9 47 05 21 04 04 51.5 47 13 31 0.14 0.07 ZOAG G153.50-03.85 153.63+2.49 04 28 47.1 51 33 54 04 32 38.9 51 40 15 0.18 0.10 153.64+5.69 04 44 32.3 53 40 52 04 48 32.4 53 46 08 0.21 0.10 153.64+5.35 04 42 47.0 53 27 59 04 46 46.2 53 33 22 0.08 0.07 153.66+5.01 04 41 08.4 53 13 39 04 45 06.7 53 19 09 0.27 0.14 153.68�1.02 04 13 24.2 49 02 39 04 17 07.2 49 10 01 0.19 0.10 WEIN 024 153.71+0.42 04 19 45.2 50 03 33 04 23 31.6 50 10 30 0.27 0.17 ZOAG G153.71+00.42 153.74+5.24 04 42 43.0 53 19 02 04 46 41.8 53 24 25 0.19 0.10 153.76�0.92 04 14 11.6 49 04 13 04 17 54.7 49 11 32 0.11 0.10 WEIN 025 153.77�3.84 04 02 22.3 46 55 13 04 05 58.7 47 03 18 0.11 0.08 153.82+0.41 04 20 10.7 49 58 43 04 23 57.0 50 05 38 0.18 0.18 153.95+4.66 04 40 38.4 52 46 51 04 44 35.3 52 52 23 0.15 0.08 87GB 044038.5+524709 154.08�2.64 04 08 28.1 47 35 59 04 12 06.9 47 43 41 0.21 0.09 154.08+3.34 04 34 45.4 51 48 27 04 38 38.7 51 54 23 0.21 0.18 ZOAG G154.08+03.33 154.12�2.98 04 07 17.9 47 19 26 04 10 55.9 47 27 12 0.10 0.09 154.16�2.68 04 08 41.4 47 30 40 04 12 20.0 47 38 21 0.14 0.12 154.19+1.27 04 25 39.0 50 18 37 04 29 26.9 50 25 10 0.22 0.18 154.22�3.02 04 07 34.0 47 13 05 04 11 11.8 47 20 50 0.26 0.10 154.28+1.20 04 25 41.2 50 12 04 04 29 28.8 50 18 37 0.14 0.09 154.29�3.02 04 07 54.0 47 10 32 04 11 31.8 47 18 16 0.34 0.20 154.30+1.17 04 25 39.0 50 09 49 04 29 26.5 50 16 22 0.18 0.11 154.34�3.15 04 07 34.2 47 02 29 04 11 11.6 47 10 14 0.13 0.11 ZOAG G154.33-03.16 154.36+1.32 04 26 35.6 50 13 44 04 30 23.4 50 20 14 0.22 0.08 IRAS 04266+5013 154.37+2.31 04 31 11.3 50 53 35 04 35 01.5 50 59 46 0.22 0.18

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 154.55+3.43 04 37 14.5 51 30 49 04 41 07.2 51 36 35 0.23 0.15 154.61�1.04 04 17 24.5 48 23 11 04 21 06.4 48 30 18 0.10 0.07 154.64+5.17 04 46 10.2 52 35 19 04 50 07.2 52 40 28 0.11 0.10 154.74+4.34 04 42 27.9 51 58 36 04 46 22.6 52 04 01 0.11 0.07 ZOAG G154.74+04.34 154.75+3.74 04 39 36.4 51 34 23 04 43 29.6 51 39 59 0.30 0.08 154.76+4.29 04 42 18.4 51 55 56 04 46 13.0 52 01 21 0.18 0.15 154.82+5.50 04 48 36.3 52 39 34 04 52 33.7 52 44 33 0.19 0.10 154.86+5.49 04 48 42.1 52 37 14 04 52 39.4 52 42 13 0.07 0.07 154.86+4.17 04 42 08.6 51 46 02 04 46 02.7 51 51 28 0.10 0.10 154.86+3.38 04 38 18.5 51 15 01 04 42 10.6 51 20 43 0.16 0.08 154.87+5.16 04 47 04.7 52 24 11 04 51 01.2 52 29 16 0.13 0.07 154.88+5.46 04 48 40.1 52 35 21 04 52 37.3 52 40 20 0.17 0.11 154.91+5.24 04 47 40.4 52 25 42 04 51 37.0 52 30 45 0.15 0.08 154.93+5.03 04 46 41.4 52 16 56 04 50 37.5 52 22 03 0.10 0.07 154.97+4.45 04 43 58.8 51 51 58 04 47 53.4 51 57 16 0.10 0.07 154.98+4.33 04 43 25.6 51 47 11 04 47 19.9 51 52 32 0.22 0.11 155.00+4.46 04 44 09.6 51 51 38 04 48 04.2 51 56 56 0.11 0.10 155.00+3.40 04 39 00.9 51 09 39 04 42 52.9 51 15 18 0.40 0.14 ZOAG G155.00+03.40 155.03+3.29 04 38 36.1 51 03 41 04 42 27.7 51 09 22 0.26 0.18 87GB[BWE91] 0438+5103 155.05+2.85 04 36 36.6 50 45 41 04 40 27.2 50 51 30 0.31 0.31 ZOAG G155.04+02.85 155.07�2.40 04 13 41.3 47 05 25 04 17 19.7 47 12 46 0.11 0.11 IRAS 04136+4705 155.07+5.68 04 50 34.0 52 35 15 04 54 31.4 52 40 06 0.20 0.09 155.07+4.91 04 46 40.1 52 05 49 04 50 35.6 52 10 56 0.08 0.08 155.07+4.52 04 44 43.9 51 50 21 04 48 38.5 51 55 36 0.24 0.09 155.10�1.57 04 17 13.7 47 40 09 04 20 53.9 47 47 16 0.10 0.09 155.15+4.57 04 45 18.9 51 48 40 04 49 13.5 51 53 53 0.20 0.08 155.16+5.14 04 48 11.9 52 10 10 04 52 07.8 52 15 11 0.24 0.08 IRAS 04481+5210 155.17+3.25 04 38 57.9 50 56 10 04 42 49.2 51 01 49 0.59 0.17 ZOAG G155.17+03.25 155.19+4.98 04 47 31.7 52 02 24 04 51 27.2 52 07 28 0.14 0.10 155.21+4.20 04 43 44.0 51 31 38 04 47 37.6 51 36 57 0.15 0.08 155.24+5.17 04 48 39.9 52 07 42 04 52 35.8 52 12 41 0.18 0.07 155.24+5.13 04 48 28.1 52 06 03 04 52 23.9 52 11 03 0.11 0.10 155.25+3.18 04 39 02.1 50 49 41 04 42 53.1 50 55 20 0.20 0.11 155.26+2.96 04 38 01.7 50 40 35 04 41 52.2 50 46 18 0.22 0.19 155.27+5.45 04 50 11.5 52 17 05 04 54 08.0 52 21 57 0.11 0.07 155.27+2.93 04 37 53.4 50 39 09 04 41 43.8 50 44 53 0.19 0.07 155.27+2.85 04 37 30.5 50 35 30 04 41 20.7 50 41 15 0.20 0.10 155.28+4.20 04 44 03.3 51 28 16 04 47 56.7 51 33 34 0.11 0.09 155.28+0.24 04 25 42.4 48 48 40 04 29 26.5 48 55 13 0.15 0.09 155.36+5.10 04 48 48.6 51 59 13 04 52 44.1 52 04 11 0.12 0.10 7C 0448+5158 155.36+5.04 04 48 32.3 51 57 12 04 52 27.6 52 02 11 0.10 0.08 155.37+5.07 04 48 43.8 51 58 11 04 52 39.2 52 03 10 0.14 0.09 155.37+5.12 04 48 56.9 51 59 51 04 52 52.4 52 04 49 0.10 0.10 3C 130 155.37+5.05 04 48 37.8 51 56 56 04 52 33.1 52 01 55 0.13 0.07 155.39+5.12 04 49 02.9 51 58 31 04 52 58.4 52 03 28 0.11 0.08 155.40+5.10 04 48 59.4 51 57 48 04 52 54.8 52 02 45 0.11 0.08 155.40+3.33 04 40 20.2 50 48 48 04 44 11.3 50 54 21 0.17 0.11 155.42+5.04 04 48 47.0 51 54 36 04 52 42.2 51 59 34 0.10 0.08 155.43+4.57 04 46 31.3 51 35 56 04 50 25.4 51 41 04 0.17 0.08 ZOAG G155.43+04.58 155.44+5.13 04 49 17.6 51 56 44 04 53 13.0 52 01 40 0.17 0.10 155.44+5.09 04 49 07.8 51 55 30 04 53 03.1 52 00 27 0.11 0.10 155.45+3.86 04 43 06.0 51 07 39 04 46 58.3 51 13 01 0.24 0.08 155.46+4.97 04 48 35.3 51 49 40 04 52 30.3 51 54 39 0.12 0.08 155.48+5.04 04 48 59.9 51 51 47 04 52 55.0 51 56 44 0.25 0.07 155.49+4.94 04 48 35.2 51 47 20 04 52 30.1 51 52 19 0.19 0.08 ZOAG G155.49+04.94 155.49+3.55 04 41 46.6 50 53 43 04 45 38.1 50 59 11 0.19 0.19 155.51�1.69 04 18 29.0 47 17 43 04 22 08.5 47 24 45 0.11 0.08 155.53+5.29 04 50 30.2 51 59 00 04 54 25.8 52 03 51 0.13 0.09 155.53+5.03 04 49 12.2 51 49 03 04 53 07.2 51 54 00 0.12 0.10 155.56�1.72 04 18 32.5 47 14 11 04 22 11.9 47 21 13 0.11 0.08

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id. 155.58+4.52 04 46 51.0 51 26 48 04 50 44.7 51 31 54 0.15 0.11 155.62+3.56 04 42 21.1 50 48 09 04 46 12.5 50 53 34 0.13 0.11 155.62�1.46 04 19 54.0 47 22 37 04 23 33.9 47 29 34 0.18 0.10 155.67+4.52 04 47 14.4 51 23 12 04 51 07.9 51 28 17 0.12 0.11 IRAS 04472+5123 155.70+4.41 04 46 48.0 51 17 34 04 50 41.2 51 22 41 0.14 0.12 155.71+4.52 04 47 21.7 51 21 14 04 51 15.2 51 26 18 0.38 0.21 155.73+4.80 04 48 52.8 51 31 02 04 52 46.9 51 36 00 0.15 0.11 ZOAG G155.73+04.80 155.82+3.14 04 41 10.0 50 22 21 04 45 00.0 50 27 51 0.18 0.10 155.83�1.31 04 21 23.3 47 19 53 04 25 03.3 47 26 44 0.16 0.07 IRAS 04213+4719 155.85+4.37 04 47 14.1 51 08 57 04 51 07.0 51 14 02 0.11 0.11 155.92+3.21 04 41 55.4 50 20 44 04 45 45.4 50 26 11 0.13 0.12 155.94+3.43 04 43 02.4 50 28 13 04 46 52.9 50 33 35 0.09 0.07 156.01+4.54 04 48 41.8 51 07 48 04 52 34.8 51 12 47 0.44 0.20 156.02+3.03 04 41 28.0 50 09 10 04 45 17.5 50 14 39 0.17 0.16 156.07+0.26 04 29 08.2 48 15 26 04 32 51.4 48 21 46 0.21 0.21 ZOAG G156.06+00.26 156.08+3.26 04 42 47.2 50 15 24 04 46 37.1 50 20 47 0.16 0.08 156.08+3.28 04 42 53.9 50 16 19 04 46 43.9 50 21 42 0.23 0.08 156.08�1.53 04 21 29.0 47 00 11 04 25 08.2 47 07 01 0.27 0.12 IRAS 04214+4700 156.09+4.41 04 48 24.2 50 59 19 04 52 16.7 51 04 19 0.18 0.07 156.11+3.32 04 43 12.4 50 16 36 04 47 02.4 50 21 58 0.18 0.09 156.13+1.80 04 36 12.5 49 15 04 04 39 59.0 49 20 55 0.42 0.22 WEIN 026 156.14+2.89 04 41 18.4 49 58 26 04 45 07.4 50 03 56 0.16 0.15 156.16+1.78 04 36 16.1 49 13 02 04 40 02.5 49 18 52 0.73 0.52 WEIN 027 156.18+4.46 04 48 59.9 50 57 21 04 52 52.4 51 02 18 0.19 0.08 156.19+2.31 04 38 48.6 49 32 53 04 42 36.2 49 38 33 0.17 0.16 156.20+4.03 04 46 59.4 50 39 50 04 50 50.9 50 44 56 0.20 0.19 156.22+4.03 04 47 03.9 50 38 47 04 50 55.3 50 43 53 0.11 0.09 156.23+4.62 04 49 59.1 51 01 16 04 53 51.9 51 06 09 0.15 0.07 156.26+3.03 04 42 24.8 49 58 14 04 46 13.9 50 03 39 0.11 0.08 156.27+3.05 04 42 35.5 49 58 33 04 46 24.6 50 03 57 0.07 0.07 156.27�0.24 04 27 46.6 47 45 57 04 31 28.4 47 52 22 0.11 0.10 156.28+2.98 04 42 18.8 49 55 06 04 46 07.7 50 00 31 0.10 0.09 156.28+3.06 04 42 41.4 49 58 37 04 46 30.5 50 04 01 0.10 0.07 156.33+4.16 04 48 07.5 50 39 02 04 51 59.1 50 44 03 0.15 0.12 87GB 044808.9+503925 156.33+0.80 04 32 33.5 48 26 20 04 36 17.5 48 32 26 0.14 0.11 156.34+3.55 04 45 15.1 50 14 55 04 49 05.3 50 20 08 0.24 0.10 156.40+3.04 04 43 06.0 49 52 16 04 46 54.9 49 57 38 0.39 0.37 156.40+2.88 04 42 19.7 49 46 03 04 46 08.2 49 51 28 0.19 0.10 156.41�0.66 04 26 32.0 47 22 47 04 30 12.7 47 29 17 0.18 0.10 156.43+1.15 04 34 31.8 48 35 37 04 38 16.4 48 41 35 0.44 0.41 WEIN 028 156.44+4.15 04 48 30.2 50 33 17 04 52 21.5 50 38 17 0.29 0.18 IRAS 04484+5033 156.45+3.58 04 45 48.5 50 11 06 04 49 38.5 50 16 17 0.21 0.07 156.52+3.93 04 47 45.8 50 21 09 04 51 36.5 50 26 12 0.17 0.08 156.53+4.14 04 48 51.7 50 28 47 04 52 42.9 50 33 45 0.11 0.08 156.53+3.47 04 45 37.5 50 02 48 04 49 27.1 50 08 00 0.10 0.10 156.57+2.86 04 42 53.9 49 37 45 04 46 42.1 49 43 08 0.19 0.18 156.63+3.64 04 46 49.4 50 04 56 04 50 39.3 50 10 03 0.20 0.15 156.63+3.18 04 44 39.3 49 46 58 04 48 28.1 49 52 14 0.40 0.12 ZOAG G156.63+03.18 156.77+2.73 04 43 06.7 49 23 18 04 46 54.3 49 28 40 0.09 0.09 156.80+2.73 04 43 12.4 49 21 51 04 46 60.0 49 27 13 0.09 0.09 156.82+3.08 04 44 56.1 49 34 34 04 48 44.4 49 39 49 0.21 0.19 IRAS 04448+4934 156.82+2.50 04 42 12.7 49 12 02 04 45 59.7 49 17 28 0.15 0.10 156.82�0.02 04 30 56.2 47 31 04 04 34 37.8 47 37 16 0.11 0.09 156.84+1.48 04 37 39.2 48 30 25 04 41 24.0 48 36 10 0.18 0.07 156.89+1.46 04 37 46.8 48 27 26 04 41 31.5 48 33 10 0.15 0.12 156.92+3.44 04 47 01.4 49 44 10 04 50 50.4 49 49 16 0.22 0.19 157.10+3.43 04 47 42.0 49 35 39 04 51 30.7 49 40 42 0.26 0.07 157.11+3.71 04 49 04.1 49 45 33 04 52 53.3 49 50 30 0.17 0.16 ZOAG G157.11+03.71 157.11+1.10 04 37 02.7 48 03 42 04 40 46.3 48 09 29 0.18 0.15 157.18+2.97 04 45 51.4 49 13 38 04 49 38.9 49 18 49 0.19 0.10

ZOAG G ff (1950) ffi (1950) ff (2000) ffi (2000) ff R cross id.

157.26+3.42 04 48 16.7 49 27 49 04 52 05.1 49 32 50 0.21 0.20 ZOAG G157.25+03.42 157.26+2.43 04 43 38.5 48 49 18 04 47 24.7 48 54 38 0.54 0.29 IRAS 04436+4849 157.27+3.48 04 48 38.0 49 29 39 04 52 26.5 49 34 38 0.22 0.21 157.28+3.45 04 48 30.6 49 28 00 04 52 19.0 49 33 00 0.29 0.10 ZOAG G157.28+03.45 157.28+2.90 04 45 55.8 49 06 38 04 49 43.0 49 11 48 0.26 0.18 ZOAG G157.28+02.90 157.34+3.34 04 48 12.1 49 21 01 04 52 00.2 49 26 02 0.14 0.12 157.37+3.42 04 48 43.8 49 22 46 04 52 32.0 49 27 45 0.40 0.15 157.44+3.07 04 47 18.9 49 05 59 04 51 06.2 49 11 04 0.15 0.05 157.46+2.86 04 46 25.8 48 56 37 04 50 12.6 49 01 45 0.29 0.19 157.46+2.85 04 46 24.4 48 56 16 04 50 11.2 49 01 24 0.09 0.07 157.46+1.86 04 41 49.2 48 17 57 04 45 33.9 48 23 25 0.19 0.17 157.47+2.85 04 46 26.1 48 55 59 04 50 12.9 49 01 07 0.15 0.08 157.48+2.85 04 46 27.8 48 55 49 04 50 14.6 49 00 57 0.18 0.10 157.51+2.42 04 44 35.1 48 37 20 04 48 20.9 48 42 36 0.09 0.09 157.62+2.16 04 43 51.5 48 22 15 04 47 36.6 48 27 34 0.43 0.08 157.75+2.89 04 47 44.7 48 44 43 04 51 31.1 48 49 46 0.38 0.21 157.80+1.61 04 42 03.6 47 52 50 04 45 47.3 47 58 17 0.40 0.14 ZOAG G157.79+01.62 157.80+1.80 04 42 53.3 47 59 55 04 46 37.4 48 05 18 0.11 0.09 157.84+2.50 04 46 14.3 48 25 24 04 49 59.8 48 30 33 0.20 0.19 158.06+2.68 04 47 55.9 48 22 27 04 51 41.4 48 27 29 0.12 0.11 158.08+2.66b 04 47 57.5 48 20 40 04 51 42.9 48 25 42 0.11 0.08 158.08+2.66a 04 47 55.4 48 20 41 04 51 40.8 48 25 43 0.11 0.07 158.08+1.43 04 42 19.5 47 32 42 04 46 02.4 47 38 08 0.08 0.07 ZOAG G158.07+01.43 158.12+2.08 04 45 24.0 47 56 32 04 49 08.2 48 01 45 0.19 0.17 158.14+2.30 04 46 30.7 48 03 53 04 50 15.3 48 09 01 0.11 0.10 158.15+1.22 04 41 40.2 47 21 39 04 45 22.6 47 27 07 0.18 0.09 158.27+1.68 04 44 10.0 47 34 04 04 47 53.1 47 39 22 0.15 0.11 158.28+1.66 04 44 05.9 47 32 47 04 47 49.0 47 38 05 0.13 0.12 158.29+2.62 04 48 32.4 48 09 41 04 52 17.4 48 14 41 0.11 0.11 158.29+1.45 04 43 14.0 47 24 05 04 46 56.7 47 29 27 0.18 0.11 32P 094 158.30+2.61 04 48 31.4 48 08 35 04 52 16.4 48 13 35 0.08 0.07 158.30+1.43 04 43 13.1 47 22 52 04 46 55.7 47 28 14 0.11 0.11 158.31+1.38 04 43 00.3 47 20 34 04 46 42.8 47 25 57 0.18 0.07 32P 092 158.44+1.76 04 45 12.1 47 29 13 04 48 55.2 47 34 27 0.15 0.09 158.51+2.12 04 47 05.1 47 39 57 04 50 48.8 47 45 03 0.18 0.08 158.56+1.32 04 43 40.0 47 06 58 04 47 22.0 47 12 18 0.15 0.07 158.71+1.65 04 45 43.2 47 12 47 04 49 25.6 47 17 58 0.14 0.10 159.12+1.58 04 46 59.6 46 51 17 04 50 41.3 46 56 23 0.22 0.11