HS 0138+0802 z=1.171

4000 5000 6000 [Å] Wavelength

1234[10e-16]

Flux

HS 0704+6335 z=1.194

4000 5000 6000 [Å] Wavelength

02468[10e-16]

HS 0954+4643 z=1.277

4000 5000 6000 7000 [Å] Wavelength

012[10e-16]

HS 1004+4515 z=1.288

4000 5000 6000 7000 [Å] Wavelength

0.51[10e-15]

HS 0956+4648 z=1.299

4000 5000 6000 7000 [Å] Wavelength

HS 0943+4849 z=1.308

4000 5000 6000 7000 [Å] Wavelength HS 1248+4712 z=1.334

4000 5000 6000 [Å] Wavelength

123[10e-16]

HS 0839+2858 z=1.343

4000 5000 6000 [Å] Wavelength HS 1707+6145 z=1.348

4000 5000 6000 7000 8000 [Å] Wavelength

0100200Flux

HS 1229+4807 z=1.373

4000 5000 6000 [Å] Wavelength

0.51.5[10e-16]

HS 1242+4925 z=1.389

4000 5000 6000 [Å] Wavelength

0.20.50.81[10e-15]

HS 1723+6550 z=1.443

4000 5000 6000 [Å] Wavelength

0.51.5[10e-15]