HS 0955+4823 z=1.680

4000 5000 6000 7000 [Å] Wavelength

0123[10e-16]

Flux

HS 1714+5351 z=1.711

4000 5000 6000 [Å] Wavelength

0100200Flux

HS 0948+4631 z=1.771

4000 5000 6000 7000 [Å] Wavelength

0123456[10e-16]

HS 0710+6024 z=1.773

4000 5000 6000 [Å] Wavelength

012[10e-15]

HS 0944+4836 z=1.806

4000 5000 6000 [Å] Wavelength

-20246[10e-16]

HS 1232+4659 z=1.860

4000 5000 6000 [Å] Wavelength

12[10e-16]

HS 0945+4646 z=1.908

4000 5000 6000 [Å] Wavelength

0.51[10e-15]

HS 1232+4811 z=1.916

4000 5000 6000 [Å] Wavelength

0.51.52[10e-16]

HS 0701+6405 z=1.921

4000 5000 6000 [Å] Wavelength

02468[10e-16]

HS 1231+4528 z=1.958

4000 5000 6000 [Å] Wavelength

0.51.52[10e-15]

HS 0655+6940 z=1.967

4000 5000 6000 [Å] Wavelength

HS 1242+4920 z=1.977

4000 5000 6000 [Å] Wavelength

1234[10e-16]