\documentstyle{l-aa}
\begin{document}
\begin{table*}          
\begin{center}         
\caption{\bf UV-FES continuum fluxes corrected for E(B-V)=0.035} 
\vspace{5mm}           
\small   
\begin{tabular}{|c|r|r|r|r|}  \hline\hline         
\multicolumn{1}{|c|}{JD} &           
\multicolumn{1}{c}{F$_{1171 \AA}$} & 
\multicolumn{1}{c}{F$_{1400 \AA}$} & 
\multicolumn{1}{c|}{F$_{1910 \AA}$} &
\multicolumn{1}{c|}{FES} \\          
\multicolumn{1}{|c|}{-2,443,000} &  \multicolumn{3}{c|}{10-14erg s-1 cm-2 A-1} & 
\multicolumn{1}{c|}{cts} \\            
\hline \hline          
  677 & 28.49$ \pm$ 4.42 & 19.47$ \pm$1.55 & 13.23$ \pm$0.60 & 99.2$ \pm$ 5.6\\    
  723 & 50.75$ \pm$ 5.38 & 29.85$ \pm$1.98 & 19.40$ \pm$0.58 & 109.3$ \pm$ 2.2\\   
  891 & 37.42$ \pm$ 4.42 & 23.92$ \pm$1.43 & 16.72$ \pm$0.69 & 105.1$ \pm$ 0.7\\   
  956 & 37.06$ \pm$ 6.79 & 21.79$ \pm$2.00 & 15.24$ \pm$0.45 & 109.3$ \pm$ 6.7\\   
 1414 & 31.78$ \pm$10.99 & 16.68$ \pm$3.38 & 10.44$ \pm$1.59 & 79.5$ \pm$ 0.7\\    
 1448 & 24.70$ \pm$ 4.14 & 20.12$ \pm$1.68 & 10.01$ \pm$0.38 & 78.1$ \pm$ 4.5\\    
 1605 & 16.07$ \pm$ 6.43 & 10.03$ \pm$0.98 &  7.05$ \pm$0.39 & 69.1$ \pm$ 3.3\\    
 1694 & 17.01$ \pm$ 5.56 & 11.76$ \pm$1.51 &  7.32$ \pm$0.45 & 61.3$ \pm$ 3.3\\    
 1757 & 18.09$ \pm$ 2.76 & 11.82$ \pm$0.84 &  7.66$ \pm$0.34 & 62.4$ \pm$ 2.2\\    
 1947 & 13.61$ \pm$ 2.98 & 10.76$ \pm$1.45 &  6.86$ \pm$0.49 & 59.1$ \pm$ 3.3\\    
 1957 & 15.01$ \pm$11.13 &  9.84$ \pm$1.10 &  6.77$ \pm$0.57 & 66.9$ \pm$ 3.3\\    
 1966 & 15.65$ \pm$ 6.38 &  9.58$ \pm$1.43 &  6.81$ \pm$0.66 & 69.1$ \pm$ 4.5\\    
 2022 & 17.75$ \pm$ 3.61 & 10.60$ \pm$1.19 &  7.57$ \pm$0.81 & 59.1$ \pm$ 2.2\\    
 2026 & 15.71$ \pm$ 6.12 &  9.51$ \pm$1.45 &  6.54$ \pm$0.64 & 59.1$ \pm$ 3.3\\    
 2247 &  8.50$ \pm$ 3.15 &  7.14$ \pm$1.45 &  3.98$ \pm$0.64 & 61.3$ \pm$ 3.3\\    
 2251 &  8.71$ \pm$ 5.14 &  6.00$ \pm$1.13 &  4.42$ \pm$0.56 & 61.3$ \pm$ 3.3\\    
 2266 & 15.43$ \pm$ 9.20 &  7.76$ \pm$1.52 &  3.47$ \pm$0.82 & 56.9$ \pm$ 3.3\\    
 2282 & 13.13$ \pm$ 2.46 &  7.99$ \pm$0.35 &  5.42$ \pm$0.43 & 62.4$ \pm$ 5.6\\    
 2618 &  3.67$ \pm$ 3.51 &  2.90$ \pm$0.51 &  2.00$ \pm$0.31 & 41.3$ \pm$ 2.2\\    
 2622 &  2.35$ \pm$ 1.55 &  3.46$ \pm$0.69 &  2.09$ \pm$0.29 & 36.8$ \pm$ 2.2\\    
 2819 &  4.09$ \pm$ 7.04 &  1.47$ \pm$1.83 &  0.74$ \pm$0.84 & 43.5$ \pm$ 2.2\\    
 2943 &  3.14$ \pm$ 4.68 &  1.11$ \pm$0.85 &  1.00$ \pm$0.29 & 53.5$ \pm$11.1\\    
 2991 &  6.20$ \pm$16.67 &  1.13$ \pm$1.13 &  0.81$ \pm$0.18 &................\\  
 2995 &  0.78$ \pm$ 1.71 &  0.97$ \pm$0.56 &  0.86$ \pm$0.27 &................\\  
 2999 &  1.37$ \pm$ 1.71 &  1.62$ \pm$0.45 &  1.07$ \pm$0.22 &................\\  
 3003 &  1.61$ \pm$ 1.33 &  0.85$ \pm$0.54 &  0.94$ \pm$0.14 &................\\  
 3272 &  5.92$ \pm$ 2.23 &  3.43$ \pm$0.46 &  2.43$ \pm$0.22 & 52.4$ \pm$ 3.3\\    
 3426 &  0.50$ \pm$ 2.07 &  2.52$ \pm$0.62 &  2.44$ \pm$0.18 & 50.2$ \pm$ 3.3\\    
 3533 & 10.39$ \pm$ 3.21 &  5.78$ \pm$0.52 &  3.81$ \pm$0.36 & 44.6$ \pm$ 4.5\\    
 3542 &  9.56$ \pm$ 2.23 &  6.97$ \pm$1.13 &  4.33$ \pm$0.32 & 50.2$ \pm$ 1.1\\    
 3564 & 11.93$ \pm$ 3.00 &  8.24$ \pm$0.73 &  5.23$ \pm$0.34 & 50.2$ \pm$ 1.1\\
 3654 &  3.75$ \pm$ 3.07 &  4.19$ \pm$0.47 &  3.15$ \pm$0.26 & 55.8$ \pm$ 3.3\\
 3729 & 11.13$ \pm$ 3.84 &  6.38$ \pm$0.65 &  4.26$ \pm$0.44 & 50.2$ \pm$ 2.2\\
 3731 &  9.34$ \pm$ 4.82 &  6.55$ \pm$0.69 &  4.82$ \pm$0.39 & 52.4$ \pm$ 2.2\\
 3794 &  5.67$ \pm$ 2.32 &  5.31$ \pm$0.80 &  3.76$ \pm$0.34 & 59.1$ \pm$ 7.8\\
 3820 & 10.93$ \pm$ 3.71 &  8.07$ \pm$0.62 &  5.47$ \pm$0.38 & 60.2$ \pm$ 4.5\\
 3924 & 11.75$ \pm$ 2.59 &  8.38$ \pm$1.31 &  5.62$ \pm$0.47 & 59.1$ \pm$ 5.6\\ 
 3964 & 13.61$ \pm$ 3.33 & 10.70$ \pm$1.06 &  6.72$ \pm$0.36 & 61.1$ \pm$ 0.9\\
 4020 & 12.94$ \pm$ 2.66 &  8.86$ \pm$1.00 &  6.66$ \pm$0.31 & 58.0$ \pm$ 2.2\\
 4381 & 13.48$ \pm$ 3.81 &  7.64$ \pm$0.77 &  5.68$ \pm$0.27 & 63.6$ \pm$ 8.9\\
 4448 & 12.94$ \pm$ 3.19 &  7.82$ \pm$0.76 &  5.24$ \pm$0.40 & ................\\
 4528 & 11.51$ \pm$ 4.38 &  9.97$ \pm$0.88 &  5.53$ \pm$0.30 & 64.7$ \pm$ 4.5\\   
 4656 &  3.88$ \pm$ 1.82 &  3.71$ \pm$0.47 &  3.00$ \pm$0.22 & 47.9$ \pm$ 1.1\\ 
 4729 &  9.21$ \pm$ 3.77 &  6.33$ \pm$0.85 &  3.82$ \pm$0.34 & 49.1$ \pm$ 3.3\\
 5117 & 10.88$ \pm$ 3.99 &  8.31$ \pm$0.93 &  5.95$ \pm$0.25 &  ................\\ 
 5219 &  1.92$ \pm$ 4.93 &  4.48$ \pm$0.75 &  3.81$ \pm$0.70 &  ................\\
 5268 & 11.47$ \pm$ 3.09 &  8.72$ \pm$0.86 &  6.10$ \pm$0.45 &  ................\\ 
 5331 &  5.64$ \pm$ 2.25 &  6.68$ \pm$1.18 &  4.50$ \pm$0.22 & ................\\ 
 5540 &  5.66$ \pm$ 5.12 &  5.59$ \pm$0.93 &  3.42$ \pm$0.27 & ................\\ 
 5553 &  7.42$ \pm$ 1.82 &  6.16$ \pm$0.55 &  4.12$ \pm$0.30 & ................\\
 5568 &  4.83$ \pm$ 3.49 &  6.21$ \pm$0.98 &  4.38$ \pm$0.57 & ................\\ 
 5580 &  5.52$ \pm$ 2.35 &  6.48$ \pm$1.03 &  4.88$ \pm$0.32 & ................\\ 
\hline \hline          
\end{tabular}          
\end{center}           
\small   
NOTE: The wavelenghts are the observed ones.         
%\vspace{4.5cm}        
\end{table*}            

\clearpage             
\setcounter{table}{9}         
\begin{table*}          
\begin{center}         
\caption{\bf Lyman {alpha} and NV {$\lambda$}1240 components}          
\vspace{5mm}           
\footnotesize          
\begin{tabular}{|r|r|r|r|r|r|r|r|} \hline \hline   
JD & F (1400 \AA) & Narrow & Central & Red & Blue & NV(Narrow)   
& NV(Red) \\           
\hline \hline          
  677 & 19.47$ \pm$1.55 & 308.1$ \pm$21.5 & 593.0$ \pm$27.4 &       
756.7$ \pm$ 60.8 & 574.7$ \pm$172.7 &  97.3$ \pm$ 38.4 &            
201.1$ \pm$158.0\\      
  723 & 29.85$ \pm$1.98 & 180.2$ \pm$27.9 & 843.7$ \pm$31.5         
&1067.2$ \pm$ 78.3 & 728.0$ \pm$165.0 & 121.6$ \pm$ 34.5 &          
289.6$ \pm$143.9\\      
  891 & 23.92$ \pm$1.43 & 328.3$ \pm$39.1 &1091.7$ \pm$35.3 &       
906.0$ \pm$115.1 & 672.6$ \pm$189.7 & 118.9$ \pm$ 87.0 &            
282.6$ \pm$214.0\\      
  956 & 21.79$ \pm$2.00 & 364.4$ \pm$25.3 &1196.8$ \pm$27.8         
&1082.8$ \pm$ 80.5 & 554.6$ \pm$130.1 &  75.1$ \pm$ 53.4 &          
332.6$ \pm$217.4\\      
 1414 & 16.68$ \pm$3.38 & 420.8$ \pm$23.1 & 872.2$ \pm$51.8 &       
791.8$ \pm$132.9 & 686.2$ \pm$205.1 & 146.4$ \pm$ 82.3 &            
182.4$ \pm$280.9\\      
 1448 & 20.12$ \pm$1.68 & 304.9$ \pm$ 8.6 &1098.1$ \pm$10.4 &       
634.8$ \pm$ 57.2 & 531.1$ \pm$ 65.9 & 139.9$ \pm$ 36.2 &            
116.5$ \pm$239.2\\      
 1605 & 10.03$ \pm$0.98 & 423.4$ \pm$ 9.0 & 818.7$ \pm$14.4 &       
365.2$ \pm$ 77.8 & 662.1$ \pm$112.7 & 198.4$ \pm$ 35.4 &            
153.0$ \pm$150.0\\      
 1694 & 11.76$ \pm$1.51 & 299.3$ \pm$ 8.5 & 835.9$ \pm$16.3 &       
528.0$ \pm$ 82.8 & 417.9$ \pm$ 99.3 & 126.4$ \pm$ 34.7 &            
67.0$ \pm$154.2\\       
 1757 & 11.82$ \pm$0.84 & 280.8$ \pm$ 8.4 & 933.7$ \pm$11.3 &       
554.6$ \pm$ 53.0 & 575.8$ \pm$ 78.4 & 109.2$ \pm$ 29.1 &            
124.7$ \pm$158.8\\      
 1947 & 10.76$ \pm$1.45 & 286.8$ \pm$15.8 & 936.7$ \pm$10.7 &       
560.7$ \pm$ 52.2 & 436.4$ \pm$ 80.8 & 113.3$ \pm$ 26.6 &            
119.7$ \pm$142.7\\      
 1957 &  9.84$ \pm$1.10 & 362.2$ \pm$ 5.9 & 910.5$ \pm$12.3 &       
512.3$ \pm$ 59.1 & 426.4$ \pm$ 97.6 & 121.6$ \pm$ 24.3 &            
103.9$ \pm$169.9\\      
 1966 &  9.58$ \pm$1.43 & 234.8$ \pm$12.6 & 773.6$ \pm$17.0 &       
429.7$ \pm$105.4 & 421.4$ \pm$147.4 &  76.6$ \pm$ 29.8 &            
116.9$ \pm$197.8\\      
 2022 & 10.60$ \pm$1.19 & 579.4$ \pm$ 4.8 & 658.9$ \pm$15.9 &       
618.7$ \pm$ 40.6 & 465.3$ \pm$ 53.3 & 147.9$ \pm$ 23.0 &            
100.7$ \pm$198.0\\      
 2026 &  9.51$ \pm$1.45 & 542.7$ \pm$ 6.0 & 676.7$ \pm$24.3 &       
477.5$ \pm$ 96.3 & 447.2$ \pm$ 96.2 & 162.0$ \pm$ 35.7 & 124.4$ \pm$ 
91.0\\   
 2247 &  7.14$ \pm$1.45 & 268.7$ \pm$ 4.9 & 985.1$ \pm$10.5 &       
315.6$ \pm$ 83.6 & 279.5$ \pm$ 76.9 &  92.9$ \pm$ 28.3 &            
44.1$ \pm$118.5\\       
 2251 &  6.00$ \pm$1.13 & 215.4$ \pm$ 7.0 & 870.0$ \pm$11.6 &       
395.6$ \pm$ 64.6 & 469.6$ \pm$ 98.7 & 141.6$ \pm$ 38.6 &            
114.2$ \pm$124.5\\      
 2266 &  7.76$ \pm$1.52 & 215.1$ \pm$13.9 & 854.0$ \pm$19.3 &       
389.8$ \pm$138.8 & 325.1$ \pm$182.1 & 146.1$ \pm$ 34.6 &            
................\\     
 2282 &  7.99$ \pm$0.35 & 215.0$ \pm$ 5.8 & 755.8$ \pm$ 7.1 &       
495.4$ \pm$ 35.4 & 426.8$ \pm$ 68.3 & 148.0$ \pm$ 16.6 &            
157.3$ \pm$120.5\\      
 2618 &  2.90$ \pm$0.51 & 331.1$ \pm$ 1.2 & 298.3$ \pm$ 7.7 &       
152.6$ \pm$ 28.6 & 178.2$ \pm$ 28.3 &  90.1$ \pm$  6.7 &  31.3$ \pm$ 
98.9\\   
 2622 &  3.46$ \pm$0.69 & 284.0$ \pm$ 0.9 & 380.1$ \pm$ 2.9 &       
181.7$ \pm$ 17.5 & 122.8$ \pm$ 26.1 &  78.0$ \pm$  4.6 &  21.3$ \pm$ 
76.3\\   
 2819 &  1.47$ \pm$1.83 & 160.5$ \pm$ 5.6 & 342.4$ \pm$19.4 &       
226.5$ \pm$ 83.8 & 194.4$ \pm$131.7 &  49.2$ \pm$ 77.6 &            
................\\     
 2943 &  1.11$ \pm$0.85 & 145.9$ \pm$ 1.8 & 207.6$ \pm$ 5.1 &       
141.5$ \pm$ 38.4 &  96.0$ \pm$ 88.2 &  25.4$ \pm$ 12.0 &            
................\\     
 2991 &  1.13$ \pm$1.13 & 125.7$ \pm$ 1.0 & 116.0$ \pm$ 5.8 &       
44.9$ \pm$ 60.2 &   ................ &  18.9$ \pm$ 12.8 &          
................\\     
 2995 &  0.97$ \pm$0.56 & 162.9$ \pm$ 1.0 &  59.2$ \pm$11.8 &       
58.3$ \pm$ 22.8 &  52.9$ \pm$ 40.8 &  40.5$ \pm$  6.0 &             
................\\     
 2999 &  1.62$ \pm$0.45 & 180.4$ \pm$ 1.0 &  92.6$ \pm$10.1 &       
80.8$ \pm$ 38.5 &  74.9$ \pm$ 50.3 &  29.6$ \pm$ 11.8 &             
................\\     
 3003 &  0.85$ \pm$0.54 & 128.8$ \pm$ 0.5 & 133.1$ \pm$ 3.1 &       
83.4$ \pm$ 21.7 &  79.7$ \pm$ 19.3 &  34.7$ \pm$  3.2 &  18.2$ \pm$  
48.4\\   
 3272 &  3.43$ \pm$0.46 & 196.3$ \pm$ 3.3 & 204.7$ \pm$17.2 &       
208.9$ \pm$ 27.0 & 144.4$ \pm$ 55.1 &  44.1$ \pm$ 13.9 &  60.0$ \pm$ 
54.6\\   
 3426 &  2.52$ \pm$0.62 & 290.8$ \pm$ 1.6 & 290.4$ \pm$10.1 &       
256.5$ \pm$ 23.3 & 136.7$ \pm$ 46.5 &  66.9$ \pm$  9.4 &  53.4$ \pm$ 
68.7\\   
 3533 &  5.78$ \pm$0.52 & 169.2$ \pm$ 4.1 & 334.6$ \pm$11.7 &       
274.8$ \pm$ 39.7 & 174.0$ \pm$ 74.6 &  54.7$ \pm$ 16.5 &  66.2$ \pm$ 
52.8\\   
 3542 &  6.97$ \pm$1.13 & 176.4$ \pm$ 4.4 & 250.7$ \pm$11.5 &       
341.3$ \pm$ 28.6 & 172.7$ \pm$ 66.3 &  37.1$ \pm$ 20.2 &            
62.3$ \pm$103.8\\       
 3564 &  8.24$ \pm$0.73 & 135.2$ \pm$ 4.0 & 430.3$ \pm$11.5 &       
356.6$ \pm$ 39.8 & 216.3$ \pm$ 79.7 &  55.3$ \pm$ 23.1 &            
95.3$ \pm$112.1\\       
 3654 &  4.19$ \pm$0.47 & 172.6$ \pm$ 2.6 & 451.0$ \pm$ 6.0 &       
242.6$ \pm$ 27.1 & 214.0$ \pm$ 45.4 &  28.7$ \pm$ 11.5 & 105.1$ \pm$ 
78.9\\   
 3729 &  6.38$ \pm$0.65 & 330.2$ \pm$ 4.8 & 257.6$ \pm$28.1 &       
319.5$ \pm$ 51.8 & 205.7$ \pm$ 92.3 &  89.7$ \pm$ 29.2 &  82.7$ \pm$ 
71.0\\   
 3731 &  6.55$ \pm$0.69 & 353.8$ \pm$ 3.5 & 218.2$ \pm$26.8 &       
276.9$ \pm$ 43.8 & 283.8$ \pm$ 52.4 &  91.3$ \pm$ 21.0 &            
89.1$ \pm$105.6\\       
 3794 &  5.31$ \pm$0.80 & 235.9$ \pm$ 2.3 & 384.2$ \pm$ 9.8 &       
248.0$ \pm$ 34.3 & 179.0$ \pm$ 74.9 &  50.0$ \pm$ 13.5 & 100.2$ \pm$ 
68.6\\   
 3820 &  8.07$ \pm$0.62 & 409.4$ \pm$ 5.2 & 176.0$ \pm$47.2 &       
335.4$ \pm$ 46.2 & 308.5$ \pm$ 92.7 &  51.9$ \pm$ 19.0 & 145.0$ \pm$ 
91.9\\   
 3924 &  8.38$ \pm$1.31 & 306.2$ \pm$ 4.8 & 335.0$ \pm$16.5 &       
376.4$ \pm$ 40.9 & 238.2$ \pm$ 70.7 &  74.9$ \pm$ 21.1 &            
78.7$ \pm$103.2\\       
 3964 & 10.70$ \pm$1.06 & 209.6$ \pm$ 4.9 & 440.3$ \pm$11.2 &       
385.2$ \pm$ 41.2 & 228.1$ \pm$ 74.8 &  71.1$ \pm$ 16.6 &            
88.6$ \pm$117.7\\       
 4020 &  8.86$ \pm$1.00 & 331.4$ \pm$ 5.3 & 436.9$ \pm$24.1 &       
406.6$ \pm$ 44.1 & 283.0$ \pm$134.5 &  67.9$ \pm$ 45.7 & 169.9$ \pm$ 
67.6\\   
 4381 &  7.64$ \pm$0.77 & 396.1$ \pm$ 5.8 & 330.7$ \pm$14.3 &       
394.5$ \pm$ 45.5 & 349.1$ \pm$ 87.1 & 101.4$ \pm$ 23.9 & 101.2$ \pm$ 
89.0\\   
 4448 &  7.82$ \pm$0.76 & 167.1$ \pm$10.9 & 516.9$ \pm$15.0 &       
475.3$ \pm$ 61.7 & 286.3$ \pm$ 99.9 &  84.5$ \pm$ 43.8 &            
130.9$ \pm$108.2\\      
 4528 &  9.97$ \pm$0.88 & 405.5$ \pm$ 3.8 & 325.0$ \pm$29.3 &       
264.7$ \pm$ 59.3 & 140.2$ \pm$113.1 &  69.9$ \pm$ 23.4 & 102.2$ \pm$ 
72.7\\   
 4656 &  3.71$ \pm$0.47 & 411.8$ \pm$ 2.4 & 291.2$ \pm$16.0 &       
197.8$ \pm$ 37.0 & 188.6$ \pm$ 58.5 & 119.8$ \pm$ 12.1 &  62.9$ \pm$ 
84.2\\   
 4729 &  6.33$ \pm$0.85 & 361.4$ \pm$ 3.7 & 237.1$ \pm$30.5 &       
338.2$ \pm$ 35.0 & 191.9$ \pm$ 63.3 &  61.1$ \pm$ 19.0 &  80.9$ \pm$ 
91.2\\   
 5117 &  8.31$ \pm$0.93 & 354.9$ \pm$ 4.1 & 500.5$ \pm$10.5 &       
449.0$ \pm$ 39.1 & 233.7$ \pm$ 43.8 &  72.3$ \pm$ 14.0 &            
91.7$ \pm$115.2\\       
 5219 &  4.48$ \pm$0.75 & 315.9$ \pm$ 8.1 & 416.4$ \pm$27.7 &       
326.6$ \pm$ 76.6 & 204.1$ \pm$120.9 & 107.4$ \pm$ 26.2 &            
93.6$ \pm$165.5\\       
 5268 &  8.72$ \pm$0.86 & 385.0$ \pm$ 5.4 & 282.1$ \pm$27.2 &       
432.0$ \pm$ 44.8 & 257.0$ \pm$ 87.7 &  79.5$ \pm$ 24.7 &            
108.3$ \pm$113.5\\      
 5331 &  6.68$ \pm$1.18 & 348.4$ \pm$ 5.0 & 330.1$ \pm$21.9 &       
380.6$ \pm$ 44.1 & 180.2$ \pm$ 89.4 &  85.8$ \pm$ 24.6 &            
101.3$ \pm$104.8\\      
 5540 &  5.59$ \pm$0.93 & 323.1$ \pm$ 3.4 & 225.6$ \pm$11.9 &       
290.5$ \pm$ 26.0 & 185.9$ \pm$ 49.7 &  76.1$ \pm$ 11.9 &  68.2$ \pm$ 
99.7\\   
 5553 &  6.16$ \pm$0.55 & 341.0$ \pm$ 2.4 & 308.9$ \pm$10.1 &       
344.9$ \pm$ 21.4 & 215.1$ \pm$ 41.3 &  73.2$ \pm$ 12.5 & 118.0$ \pm$ 
84.5\\   
 5568 &  6.21$ \pm$0.98 & 337.3$ \pm$ 3.8 & 292.2$ \pm$18.3 &       
319.2$ \pm$ 35.3 & 179.1$ \pm$ 57.8 &  68.9$ \pm$ 17.8 &  60.3$ \pm$ 
96.7\\   
 5580 &  6.48$ \pm$1.03 & 314.7$ \pm$ 2.5 & 317.8$ \pm$12.9 &       
378.5$ \pm$ 32.3 & 227.9$ \pm$ 38.5 &  75.1$ \pm$ 12.3 &  61.0$ \pm$ 
87.3\\   
\hline \hline          
\end{tabular}          
\end{center}           
NOTE: JD=JD-2,443,000;  F(1400 \AA) in  10-14erg s-1 cm-2 A-1 and the line components in E-14*erg s-1 cm-2 \\
\vspace{3.5cm}         
\end{table*}            

\clearpage             
         
\begin{table*}          
\begin{center}         
\caption{\bf Si IV {$\lambda$}1397 components}     
\vspace{5mm}           
\small   
\begin{tabular}{|r|r|r|r|r|r|} \hline \hline       
JD & F (1400 \AA) & Narrow & Central & Red & Blue \\             
\hline \hline          
  677 & 19.47$ \pm$1.55 &   ............. & 109.4$ \pm$ 41.0 &     
166.4$ \pm$113.1 & 100.8$ \pm$102.1\\  
  723 & 29.85$ \pm$1.98 &   ............. &  40.7$ \pm$ 43.0 &     
333.0$ \pm$ 94.5 & 266.0$ \pm$120.5\\  
  891 & 23.92$ \pm$1.43 &   ............. & 156.0$ \pm$ 45.7 &     
223.9$ \pm$ 69.9 & 124.9$ \pm$127.6\\  
  956 & 21.79$ \pm$2.00 &   ............. & 217.3$ \pm$ 50.8 &     
238.6$ \pm$122.5 & 104.9$ \pm$121.3\\  
 1414 & 16.68$ \pm$3.38 &   ............. &   ............. &     
............. &   .............\\    
 1448 & 20.12$ \pm$1.68 &   ............. &  77.3$ \pm$ 90.8 &     
............. &  62.9$ \pm$223.6\\    
 1605 & 10.03$ \pm$0.98 &   ............. & 130.5$ \pm$ 19.1 &     
113.3$ \pm$ 95.1 & 118.5$ \pm$106.0\\  
 1694 & 11.76$ \pm$1.51 &   ............. &   ............. &     
............. &   .............\\    
 1757 & 11.82$ \pm$0.84 &   ............. &  97.0$ \pm$ 29.6 &     
104.9$ \pm$ 73.3 &  98.0$ \pm$ 54.9\\  
 1947 & 10.76$ \pm$1.45 &   ............. & 112.0$ \pm$ 13.6 &     
41.3$ \pm$ 69.4 &  74.5$ \pm$ 78.5\\   
 1957 &  9.84$ \pm$1.10 &  14.4$ \pm$ 3.5 &  97.8$ \pm$ 11.1 &      
81.1$ \pm$ 96.6 &  68.4$ \pm$ 55.9\\   
 1966 &  9.58$ \pm$1.43 &   ............. &  81.0$ \pm$ 15.4 &     
46.0$ \pm$126.2 &   .............\\   
 2022 & 10.60$ \pm$1.19 &   ............. & 103.1$ \pm$ 11.3 &     
61.0$ \pm$ 84.1 &  36.1$ \pm$ 76.1\\   
 2026 &  9.51$ \pm$1.45 &   ............. &  90.8$ \pm$ 26.7 &     
141.4$ \pm$103.6 & 117.8$ \pm$157.3\\  
 2247 &  7.14$ \pm$1.45 &   ............. &  93.7$ \pm$ 31.4 &     
............. &  47.9$ \pm$152.4\\    
 2251 &  6.00$ \pm$1.13 &   ............. &  83.1$ \pm$ 22.5 &     
48.0$ \pm$115.8 &  94.3$ \pm$ 60.9\\   
 2266 &  7.76$ \pm$1.52 &   ............. & 172.0$ \pm$210.5 &     
............. &   .............\\    
 2282 &  7.99$ \pm$0.35 &  20.4$ \pm$13.6 &  69.7$ \pm$ 14.6 &      
92.7$ \pm$ 61.1 &  63.4$ \pm$ 73.6\\   
 2618 &  2.90$ \pm$0.51 &   ............. &  33.1$ \pm$ 16.2 &     
27.0$ \pm$ 33.5 &  25.4$ \pm$ 65.1\\   
 2622 &  3.46$ \pm$0.69 &   ............. &  59.3$ \pm$ 76.4 &     
............. &   .............\\    
 2819 &  1.47$ \pm$1.83 &   ............. &  63.9$ \pm$ 92.4 &     
95.4$ \pm$195.0 &   .............\\   
 2943 &  1.11$ \pm$0.85 &   ............. &   ............. &     
............. &   .............\\    
 2991 &  1.13$ \pm$1.13 &   ............. &   ............. &     
............. &   .............\\    
 2995 &  0.97$ \pm$0.56 &   ............. &   ............. &     
............. &   .............\\    
 2999 &  1.62$ \pm$0.45 &   ............. &   ............. &     
............. &   .............\\    
 3003 &  0.85$ \pm$0.54 &   ............. &  23.3$ \pm$ 10.5 &     
29.1$ \pm$ 31.0 &  21.0$ \pm$ 40.0\\   
 3272 &  3.43$ \pm$0.46 &   ............. &  29.8$ \pm$ 21.3 &     
53.8$ \pm$ 33.5 &  33.0$ \pm$ 39.9\\   
 3426 &  2.52$ \pm$0.62 &  27.7$ \pm$ 8.4 &  22.0$ \pm$ 22.8 &      
57.5$ \pm$ 31.9 &  26.9$ \pm$ 68.3\\   
 3533 &  5.78$ \pm$0.52 &   ............. &  29.3$ \pm$ 33.8 &     
72.1$ \pm$ 87.3 &   .............\\   
 3542 &  6.97$ \pm$1.13 &   ............. &  14.4$ \pm$ 26.1 &     
88.6$ \pm$ 63.2 &  31.2$ \pm$ 49.8\\   
 3564 &  8.24$ \pm$0.73 &   ............. &  52.5$ \pm$ 39.3 &     
54.8$ \pm$ 97.1 &  65.4$ \pm$ 80.9\\   
 3654 &  4.19$ \pm$0.47 &   9.4$ \pm$ 0.8 &  30.1$ \pm$ 12.5 &      
40.9$ \pm$ 52.0 &  60.0$ \pm$ 23.1\\   
 3729 &  6.38$ \pm$0.65 &   ............. &  63.9$ \pm$ 41.9 &     
............. &  42.9$ \pm$111.8\\    
 3731 &  6.55$ \pm$0.69 &   ............. &  53.8$ \pm$ 17.2 &     
83.2$ \pm$ 97.5 &   .............\\   
 3794 &  5.31$ \pm$0.80 &   ............. &  56.0$ \pm$ 14.1 &     
53.7$ \pm$ 76.2 &  23.3$ \pm$ 57.6\\   
 3820 &  8.07$ \pm$0.62 &   ............. &  45.9$ \pm$ 82.4 &     
81.3$ \pm$114.6 &   .............\\   
 3924 &  8.38$ \pm$1.31 &   ............. &  62.3$ \pm$ 42.8 &     
95.7$ \pm$ 95.4 &   .............\\   
 3964 & 10.70$ \pm$1.06 &   ............. &  51.7$ \pm$ 54.1 &     
55.3$ \pm$139.8 &   .............\\   
 4020 &  8.86$ \pm$1.00 &   ............. &  73.0$ \pm$ 41.6 &     
81.9$ \pm$ 88.5 &  58.1$ \pm$124.8\\   
 4381 &  7.64$ \pm$0.77 &   ............. &  37.6$ \pm$ 47.8 &     
80.1$ \pm$ 60.1 &  47.3$ \pm$101.8\\   
 4448 &  7.82$ \pm$0.76 &   ............. &  41.4$ \pm$ 52.5 &     
127.7$ \pm$ 73.3 &  70.3$ \pm$120.6\\  
 4528 &  9.97$ \pm$0.88 &   ............. &  48.3$ \pm$ 39.1 &     
80.5$ \pm$107.8 &   .............\\   
 4656 &  3.71$ \pm$0.47 &   ............. &  53.3$ \pm$ 20.3 &     
46.9$ \pm$ 77.3 &   .............\\   
 4729 &  6.33$ \pm$0.85 &   ............. &  39.0$ \pm$ 32.0 &     
............. &  36.5$ \pm$ 87.3\\    
 5117 &  8.31$ \pm$0.93 &   ............. &  54.7$ \pm$ 39.2 &     
88.4$ \pm$ 89.2 &  85.7$ \pm$ 56.1\\   
 5219 &  4.48$ \pm$0.75 &   ............. &  79.3$ \pm$ 42.7 &     
68.4$ \pm$ 79.6 &  56.3$ \pm$ 79.9\\   
 5268 &  8.72$ \pm$0.86 &   ............. &  50.6$ \pm$ 16.2 &     
98.9$ \pm$ 69.9 &  69.3$ \pm$ 48.3\\   
 5331 &  6.68$ \pm$1.18 &   ............. &  81.4$ \pm$ 21.1 &     
38.7$ \pm$105.6 &   .............\\   
 5540 &  5.59$ \pm$0.93 &   ............. &  63.0$ \pm$ 17.1 &     
............. &  31.9$ \pm$ 94.6\\    
 5553 &  6.16$ \pm$0.55 &   ............. &  47.4$ \pm$ 14.7 &     
69.3$ \pm$ 61.0 &  47.6$ \pm$ 25.0\\   
 5568 &  6.21$ \pm$0.98 &   ............. &  36.6$ \pm$ 60.7 &     
............. &  45.7$ \pm$116.2\\    
 5580 &  6.48$ \pm$1.03 &   ............. &  84.0$ \pm$ 16.8 &     
51.8$ \pm$ 53.5 &  63.1$ \pm$ 60.9\\   
\hline \hline          
\end{tabular}          
\end{center}           
NOTE: JD=JD-2,443,000;  F(1400 \AA) in  10-14erg s-1 cm-2 A-1 and the line components in E-14*erg s-1 cm-2 \\
\vspace{3.5cm}         
\end{table*}            

\clearpage             
         
\begin{table*}          
\begin{center}         
\caption{\bf C IV {$\lambda$}1549 components}      
\vspace{5mm}           
\small   
\begin{tabular}{|r|r|r|r|r|r|r|} \hline \hline     
JD & F (1400 \AA) & Narrow & Central & Red & Blue & Another blue 
\\       
\hline \hline          
  677 & 19.47$ \pm$1.55 & 157.5$ \pm$ 19.0 & 172.2$ \pm$ 31.5 &     
294.9$ \pm$114.7 & 244.6$ \pm$ 76.8 &  87.0$ \pm$116.4\\            
  723 & 29.85$ \pm$1.98 &  53.1$ \pm$ 30.1 & 350.5$ \pm$ 13.2 &     
328.8$ \pm$ 58.7 & 212.6$ \pm$ 46.8 &  58.2$ \pm$196.7\\            
  891 & 23.92$ \pm$1.43 &  71.8$ \pm$ 84.5 & 360.6$ \pm$ 39.6 &     
273.5$ \pm$138.8 & 318.6$ \pm$111.8 &   ................\\         
  956 & 21.79$ \pm$2.00 & 117.0$ \pm$ 34.8 & 326.4$ \pm$ 39.2 &     
232.9$ \pm$165.6 & 249.0$ \pm$154.8 &   ................\\         
 1414 & 16.68$ \pm$3.38 & 161.1$ \pm$ 18.1 & 406.8$ \pm$ 49.7 &     
122.2$ \pm$297.0 & 280.0$ \pm$113.8 &  78.0$ \pm$187.7\\            
 1448 & 20.12$ \pm$1.68 & 120.0$ \pm$ 27.6 & 391.3$ \pm$ 20.4 &     
234.0$ \pm$207.8 & 282.5$ \pm$ 93.6 &  62.1$ \pm$ 43.3\\            
 1605 & 10.03$ \pm$0.98 & 176.6$ \pm$ 20.7 & 323.0$ \pm$ 36.1 &     
151.1$ \pm$202.3 & 241.2$ \pm$110.8 &   ................\\         
 1694 & 11.76$ \pm$1.51 &  93.3$ \pm$ 12.2 & 413.1$ \pm$  9.6 &     
121.7$ \pm$ 72.2 & 221.5$ \pm$ 55.5 &  36.9$ \pm$159.5\\            
 1757 & 11.82$ \pm$0.84 &  93.1$ \pm$  9.4 & 418.6$ \pm$  8.9 &     
105.1$ \pm$ 56.5 & 257.3$ \pm$ 38.9 &  37.6$ \pm$113.0\\            
 1947 & 10.76$ \pm$1.45 &  93.2$ \pm$  9.6 & 414.3$ \pm$ 11.4 &     
104.3$ \pm$ 97.9 & 203.8$ \pm$ 53.9 &  26.1$ \pm$ 80.6\\            
 1957 &  9.84$ \pm$1.10 &  95.9$ \pm$ 23.7 & 387.8$ \pm$ 18.2 &     
88.2$ \pm$189.8 & 236.8$ \pm$ 88.9 &   ................\\          
 1966 &  9.58$ \pm$1.43 & 118.6$ \pm$  8.1 & 278.8$ \pm$ 11.4 &     
67.3$ \pm$115.0 & 205.1$ \pm$ 39.5 &  31.8$ \pm$111.6\\             
 2022 & 10.60$ \pm$1.19 & 107.8$ \pm$ 12.9 & 452.5$ \pm$ 14.9 &     
68.9$ \pm$126.6 & 184.0$ \pm$ 67.9 &   ................\\          
 2026 &  9.51$ \pm$1.45 & 110.3$ \pm$ 14.4 & 388.5$ \pm$ 13.4 &     
85.4$ \pm$183.6 & 280.6$ \pm$ 56.2 &   ................\\          
 2247 &  7.14$ \pm$1.45 &  98.3$ \pm$ 13.9 & 366.8$ \pm$ 17.6 &     
47.8$ \pm$117.7 & 210.6$ \pm$ 78.1 &  45.7$ \pm$165.1\\             
 2251 &  6.00$ \pm$1.13 & 135.0$ \pm$ 11.0 & 294.9$ \pm$ 27.1 &     
91.9$ \pm$148.7 & 256.7$ \pm$ 72.5 &   ................\\          
 2266 &  7.76$ \pm$1.52 &  50.0$ \pm$ 34.4 & 447.3$ \pm$ 37.7 &     
................ & 275.6$ \pm$180.4 & 102.5$ \pm$195.8\\           
 2282 &  7.99$ \pm$0.35 & 121.3$ \pm$  7.2 & 347.1$ \pm$  9.6 &     
111.5$ \pm$ 89.6 & 228.2$ \pm$ 37.2 &  48.3$ \pm$ 42.4\\            
 2618 &  2.90$ \pm$0.51 & 146.4$ \pm$  4.3 & 201.4$ \pm$ 12.0 &     
71.4$ \pm$ 57.8 & 126.0$ \pm$ 39.7 &  23.4$ \pm$ 61.4\\             
 2622 &  3.46$ \pm$0.69 & 116.0$ \pm$  1.8 & 217.0$ \pm$  3.6 &     
59.6$ \pm$ 26.4 & 122.8$ \pm$ 13.4 &  28.7$ \pm$ 62.7\\             
 2819 &  1.47$ \pm$1.83 &  32.3$ \pm$247.1 & 280.1$ \pm$ 74.6 &     
................ &   ................ &   ................\\     
 2943 &  1.11$ \pm$0.85 &  30.3$ \pm$ 67.7 & 160.8$ \pm$110.7 &     
................ &   ................ &   ................\\     
 2991 &  1.13$ \pm$1.13 &  76.9$ \pm$  2.4 &  24.6$ \pm$ 25.4 &     
................ &  36.8$ \pm$ 42.1 &  19.9$ \pm$ 60.0\\           
 2995 &  0.97$ \pm$0.56 &  98.3$ \pm$  1.9 &   ................ &  
 ................ &  47.1$ \pm$ 57.0 &  17.7$ \pm$ 18.8\\          
 2999 &  1.62$ \pm$0.45 &  89.9$ \pm$  1.2 &  46.7$ \pm$ 13.3 &     
50.1$ \pm$ 48.2 &  57.7$ \pm$ 26.9 &   8.3$ \pm$ 30.6\\             
 3003 &  0.85$ \pm$0.54 &  25.7$ \pm$ 37.3 & 121.9$ \pm$ 65.7 &     
................ &   ................ &   ................\\     
 3272 &  3.43$ \pm$0.46 &  59.9$ \pm$  5.5 & 133.3$ \pm$ 11.4 &     
67.7$ \pm$ 54.2 &  69.4$ \pm$ 52.7 &   ................\\          
 3426 &  2.52$ \pm$0.62 &  77.5$ \pm$  6.4 & 148.1$ \pm$ 16.2 &     
123.2$ \pm$ 74.4 &  82.5$ \pm$ 69.2 &   ................\\         
 3533 &  5.78$ \pm$0.52 &  75.2$ \pm$  8.5 & 164.4$ \pm$ 14.9 &     
104.3$ \pm$ 85.1 & 170.7$ \pm$ 83.3 &   ................\\         
 3542 &  6.97$ \pm$1.13 &  71.1$ \pm$  7.5 & 189.6$ \pm$ 10.0 &     
82.9$ \pm$ 65.1 & 110.2$ \pm$ 49.9 &  10.6$ \pm$ 72.1\\             
 3564 &  8.24$ \pm$0.73 &  85.9$ \pm$ 14.5 & 183.5$ \pm$ 30.2 &     
88.1$ \pm$ 55.3 & 115.5$ \pm$ 82.3 &   ................\\          
 3654 &  4.19$ \pm$0.47 &  87.8$ \pm$  4.4 & 144.9$ \pm$ 11.2 &     
124.9$ \pm$ 61.7 &  89.3$ \pm$ 31.6 &  39.2$ \pm$ 45.0\\            
 3729 &  6.38$ \pm$0.65 &  74.2$ \pm$ 10.7 & 221.9$ \pm$ 13.6 &     
94.5$ \pm$110.9 & 106.3$ \pm$ 89.7 &   ................\\          
 3731 &  6.55$ \pm$0.69 &  95.2$ \pm$  6.8 & 200.3$ \pm$ 20.4 &     
102.0$ \pm$111.7 &  72.0$ \pm$ 66.8 &  19.1$ \pm$ 49.6\\            
 3794 &  5.31$ \pm$0.80 &  81.5$ \pm$  4.0 & 104.8$ \pm$ 21.8 &     
155.3$ \pm$ 38.3 & 153.9$ \pm$ 35.8 &  27.1$ \pm$ 96.2\\            
 3820 &  8.07$ \pm$0.62 &  98.1$ \pm$ 10.0 & 188.9$ \pm$ 20.1 &     
125.4$ \pm$ 65.6 & 132.5$ \pm$ 60.2 &  12.0$ \pm$ 94.8\\            
 3924 &  8.38$ \pm$1.31 & 145.3$ \pm$  6.4 & 128.5$ \pm$ 47.0 &     
102.8$ \pm$ 97.0 & 135.9$ \pm$ 55.2 &  46.8$ \pm$ 74.4\\            
 3964 & 10.70$ \pm$1.06 & 236.2$ \pm$  6.0 &   ................ &  
202.8$ \pm$ 94.7 &  81.8$ \pm$115.3 &   ................\\         
 4020 &  8.86$ \pm$1.00 &  48.9$ \pm$  6.1 & 302.1$ \pm$ 18.0 &     
44.5$ \pm$ 96.2 &  44.2$ \pm$ 39.3 &   ................\\          
 4381 &  7.64$ \pm$0.77 &  76.6$ \pm$  9.1 & 207.6$ \pm$ 17.5 &     
128.0$ \pm$ 73.8 &  76.5$ \pm$ 99.7 &   ................\\         
 4448 &  7.82$ \pm$0.76 & 107.5$ \pm$  7.2 & 194.4$ \pm$ 20.5 &     
219.1$ \pm$ 41.1 & 160.9$ \pm$ 55.3 &  17.3$ \pm$ 95.8\\            
 4528 &  9.97$ \pm$0.88 &  81.1$ \pm$ 12.6 & 243.4$ \pm$ 17.7 &     
90.0$ \pm$ 89.1 &  93.2$ \pm$ 94.5 &   ................\\          
 4656 &  3.71$ \pm$0.47 & 118.1$ \pm$  2.3 & 215.4$ \pm$  8.4 &     
131.0$ \pm$ 25.3 & 102.2$ \pm$ 28.9 &  20.6$ \pm$ 66.5\\            
 4729 &  6.33$ \pm$0.85 &  78.3$ \pm$  7.1 & 206.4$ \pm$ 20.9 &     
134.9$ \pm$ 66.3 & 133.2$ \pm$ 63.3 &  34.5$ \pm$ 71.5\\            
 5117 &  8.31$ \pm$0.93 & 101.3$ \pm$ 17.0 & 224.8$ \pm$ 23.4 &     
141.4$ \pm$103.3 & 180.3$ \pm$ 76.4 &   ................\\         
 5219 &  4.48$ \pm$0.75 &  82.8$ \pm$  3.5 & 206.3$ \pm$ 13.5 &     
101.8$ \pm$ 92.0 & 136.2$ \pm$ 43.8 &  53.0$ \pm$136.5\\            
 5268 &  8.72$ \pm$0.86 &  97.1$ \pm$ 11.7 & 219.7$ \pm$ 17.3 &     
159.4$ \pm$ 68.0 & 112.1$ \pm$ 86.8 &  44.3$ \pm$ 85.6\\            
 5331 &  6.68$ \pm$1.18 & 108.6$ \pm$  6.5 & 211.0$ \pm$ 13.1 &     
157.1$ \pm$ 50.0 & 133.9$ \pm$ 60.4 &  18.6$ \pm$ 85.6\\            
 5540 &  5.59$ \pm$0.93 & 131.5$ \pm$  7.8 & 101.6$ \pm$ 51.2 &     
123.6$ \pm$ 92.7 &  94.3$ \pm$ 88.4 &   ................\\         
 5553 &  6.16$ \pm$0.55 &  85.6$ \pm$  2.0 & 215.1$ \pm$  7.0 &     
68.1$ \pm$ 62.7 & 160.1$ \pm$ 23.6 &  34.3$ \pm$ 42.0\\             
 5568 &  6.21$ \pm$0.98 &  48.5$ \pm$  4.0 & 197.9$ \pm$  6.4 &     
107.5$ \pm$ 66.7 & 235.1$ \pm$ 36.6 &  20.3$ \pm$ 94.2\\            
 5580 &  6.48$ \pm$1.03 &  58.6$ \pm$  3.2 & 284.1$ \pm$  8.4 &     
101.4$ \pm$ 52.8 & 202.4$ \pm$ 24.5 &  37.1$ \pm$ 97.3\\            
\hline \hline          
\end{tabular}          
\end{center}           
NOTE: JD=JD-2,443,000;  F(1400 \AA) in 10-14erg s-1 cm-2 A-1 and the line components in E-14*erg s-1 cm-2 \\
\vspace{3.5cm}         
\end{table*}            

\clearpage             
         
\begin{table*}          
\begin{center}         
\caption{\bf Mg II {$\lambda$}2798 components}     
\vspace{5mm}           
\small   
\begin{tabular}{|r|r|r|r|r|r|} \hline \hline       
JD & F (1400 \AA) & Narrow & Central & Red & Blue \\             
\hline \hline          
  677 & 19.47$ \pm$1.55 &   ............. & 116.4$ \pm$  6.0 &     
31.7$ \pm$ 51.4 &  22.6$ \pm$ 70.8\\   
  723 & 29.85$ \pm$1.98 &  20.6$ \pm$ 2.9 & 112.2$ \pm$  7.7 &      
56.1$ \pm$ 37.1 &  19.1$ \pm$ 78.3\\   
  891 & 23.92$ \pm$1.43 &   ............. & 101.4$ \pm$ 42.1 &     
67.6$ \pm$ 98.7 &   .............\\   
  956 & 21.79$ \pm$2.00 &   ............. &   ............. &     
............. &   .............\\    
 1414 & 16.68$ \pm$3.38 &   ............. & 110.2$ \pm$173.1 &     
............. &   .............\\    
 1448 & 20.12$ \pm$1.68 &  34.3$ \pm$58.3 &  88.4$ \pm$118.1 &      
............. &   .............\\    
 1605 & 10.03$ \pm$0.98 &  21.5$ \pm$ 8.2 &  88.6$ \pm$ 26.5 &      
46.2$ \pm$ 79.3 &  73.8$ \pm$ 80.3\\   
 1694 & 11.76$ \pm$1.51 &   ............. &   ............. &     
............. &   .............\\    
 1757 & 11.82$ \pm$0.84 &   6.9$ \pm$16.3 &  94.8$ \pm$  4.9 &      
44.0$ \pm$ 24.9 &  28.2$ \pm$ 43.4\\   
 1947 & 10.76$ \pm$1.45 &   ............. &   ............. &     
............. &   .............\\    
 1957 &  9.84$ \pm$1.10 &  35.2$ \pm$17.9 &  66.3$ \pm$ 96.5 &      
75.1$ \pm$130.3 &   .............\\   
 1966 &  9.58$ \pm$1.43 &  17.2$ \pm$20.7 &  98.9$ \pm$ 11.6 &      
63.0$ \pm$ 60.9 &  59.4$ \pm$ 63.6\\   
 2022 & 10.60$ \pm$1.19 &   ............. & 160.0$ \pm$ 40.2 &     
57.0$ \pm$132.1 &   .............\\   
 2026 &  9.51$ \pm$1.45 &   ............. &   ............. &     
............. &   .............\\    
 2247 &  7.14$ \pm$1.45 &  50.9$ \pm$96.6 &  80.1$ \pm$246.2 &      
............. &   .............\\    
 2251 &  6.00$ \pm$1.13 &   ............. &   ............. &     
............. &   .............\\    
 2266 &  7.76$ \pm$1.52 &   ............. &   ............. &     
............. &   .............\\    
 2282 &  7.99$ \pm$0.35 &  12.4$ \pm$ 2.9 &  80.7$ \pm$ 12.0 &      
44.2$ \pm$ 47.0 &  39.0$ \pm$ 55.1\\   
 2618 &  2.90$ \pm$0.51 &  27.3$ \pm$ 2.3 &  79.5$ \pm$  4.7 &      
38.8$ \pm$ 23.5 &  35.9$ \pm$ 24.6\\   
 2622 &  3.46$ \pm$0.69 &  15.2$ \pm$ 2.9 &  94.3$ \pm$  3.2 &      
33.8$ \pm$ 20.9 &  21.8$ \pm$ 24.5\\   
 2819 &  1.47$ \pm$1.83 &   ............. &   ............. &     
............. &   .............\\    
 2943 &  1.11$ \pm$0.85 &  29.4$ \pm$ 0.9 &  43.4$ \pm$  3.5 &      
37.9$ \pm$  9.8 &  27.8$ \pm$ 16.9\\   
 2991 &  1.13$ \pm$1.13 &   ............. &   ............. &     
............. &   .............\\    
 2995 &  0.97$ \pm$0.56 &  24.2$ \pm$ 4.4 &  14.6$ \pm$ 30.6 &      
25.4$ \pm$ 45.1 &   .............\\   
 2999 &  1.62$ \pm$0.45 &  17.4$ \pm$ 0.9 &  47.4$ \pm$  3.5 &      
34.1$ \pm$ 11.2 &  25.6$ \pm$ 13.7\\   
 3003 &  0.85$ \pm$0.54 &   ............. &   ............. &     
............. &   .............\\    
 3272 &  3.43$ \pm$0.46 &  17.0$ \pm$ 1.8 &  71.5$ \pm$  2.8 &      
55.6$ \pm$ 21.1 &  29.7$ \pm$ 18.3\\   
 3426 &  2.52$ \pm$0.62 &  22.5$ \pm$ 1.5 &  52.3$ \pm$  4.4 &      
86.1$ \pm$ 29.0 &  49.6$ \pm$ 12.6\\   
 3533 &  5.78$ \pm$0.52 &  21.1$ \pm$ 1.2 &  77.2$ \pm$  4.0 &      
27.8$ \pm$ 18.8 &  27.8$ \pm$ 19.4\\   
 3542 &  6.97$ \pm$1.13 &   5.7$ \pm$ 3.0 &  72.0$ \pm$  3.7 &      
24.9$ \pm$ 32.1 &   6.0$ \pm$ 14.8\\   
 3564 &  8.24$ \pm$0.73 &  16.5$ \pm$25.8 &  60.0$ \pm$ 46.5 &      
............. &   .............\\    
 3654 &  4.19$ \pm$0.47 &   ............. &   ............. &     
............. &   .............\\    
 3729 &  6.38$ \pm$0.65 &  22.8$ \pm$17.2 & 121.6$ \pm$ 46.3 &      
............. &   .............\\    
 3731 &  6.55$ \pm$0.69 &  10.7$ \pm$ 1.5 &  75.1$ \pm$  2.5 &      
28.6$ \pm$ 45.3 &  28.1$ \pm$ 18.8\\   
 3794 &  5.31$ \pm$0.80 &   9.3$ \pm$ 3.7 &  68.0$ \pm$  4.8 &      
44.7$ \pm$ 32.2 &  37.2$ \pm$ 26.7\\   
 3820 &  8.07$ \pm$0.62 &   9.9$ \pm$ 2.6 &  95.6$ \pm$  3.7 &      
23.2$ \pm$ 36.9 &  23.6$ \pm$ 18.2\\   
 3924 &  8.38$ \pm$1.31 &   7.7$ \pm$ 3.0 &  82.9$ \pm$  4.4 &      
53.2$ \pm$ 39.2 &  27.5$ \pm$ 17.8\\   
 3964 & 10.70$ \pm$1.06 &  24.8$ \pm$ 1.2 &  76.4$ \pm$  3.6 &      
12.5$ \pm$ 25.3 &  24.2$ \pm$ 20.0\\   
 4020 &  8.86$ \pm$1.00 &  16.6$ \pm$ 1.0 &  67.8$ \pm$  4.0 &      
20.5$ \pm$ 27.2 &  20.5$ \pm$ 30.4\\   
 4381 &  7.64$ \pm$0.77 &   5.1$ \pm$ 2.1 &  63.7$ \pm$  4.2 &      
32.9$ \pm$ 29.8 &  23.5$ \pm$ 19.1\\   
 4448 &  7.82$ \pm$0.76 &   6.2$ \pm$ 8.8 &  73.1$ \pm$  5.4 &      
40.7$ \pm$ 30.9 &  33.5$ \pm$ 35.0\\   
 4528 &  9.97$ \pm$0.88 &  13.6$ \pm$ 6.3 &  47.0$ \pm$  6.1 &      
45.5$ \pm$ 25.7 &  36.0$ \pm$ 34.4\\   
 4656 &  3.71$ \pm$0.47 &  22.0$ \pm$ 6.0 &  66.5$ \pm$  6.9 &      
42.0$ \pm$ 35.1 &  34.6$ \pm$ 34.6\\   
 4729 &  6.33$ \pm$0.85 &  21.5$ \pm$ 1.8 &  54.2$ \pm$  3.8 &      
53.6$ \pm$  9.8 &  18.9$ \pm$ 24.8\\   
 5117 &  8.31$ \pm$0.93 &   ............. &  77.4$ \pm$  3.4 &     
22.6$ \pm$ 35.2 &  29.0$ \pm$ 26.7\\   
 5219 &  4.48$ \pm$0.75 &   ............. &  52.9$ \pm$  4.4 &     
50.9$ \pm$ 31.2 &  47.6$ \pm$ 14.9\\   
 5268 &  8.72$ \pm$0.86 &  10.0$ \pm$ 4.3 &  45.4$ \pm$  6.3 &      
41.9$ \pm$ 20.9 &  24.9$ \pm$ 32.0\\   
 5331 &  6.68$ \pm$1.18 &  14.3$ \pm$ 2.9 &  63.0$ \pm$  4.3 &      
28.3$ \pm$ 14.8 &  19.9$ \pm$ 25.3\\   
 5540 &  5.59$ \pm$0.93 &  15.4$ \pm$ 2.8 &  58.9$ \pm$  4.2 &      
45.4$ \pm$ 14.4 &  22.6$ \pm$ 27.6\\   
 5553 &  6.16$ \pm$0.55 &  26.4$ \pm$ 2.8 &  38.2$ \pm$  6.0 &      
31.4$ \pm$ 14.4 &  20.5$ \pm$ 28.4\\   
 5568 &  6.21$ \pm$0.98 &   ............. &   ............. &     
............. &   .............\\    
 5580 &  6.48$ \pm$1.03 &   9.6$ \pm$ 6.1 &  75.5$ \pm$  4.4 &      
24.0$ \pm$ 34.7 &  25.6$ \pm$ 24.8\\   
\hline \hline          
\end{tabular}          
\end{center}           
NOTE: JD=JD-2,443,000;  F(1400 \AA) in  10-14erg s-1 cm-2 A-1 and the line components in E-14*erg s-1 cm-2 \\
\vspace{3.5cm}         
\end{table*}            
\end{document}
