   1 &  4.97 & -0.35 ~~&  0.60 ~& -1.26 ~~&  0.45 ~& -7.53 &  4.67 ~~&  6.68 ~~&    89.77 \\

   2 &  6.15 & -0.31 ~~&  0.47 ~& -1.13 ~~&  0.35 ~& -6.34 &  4.60 ~~&  5.96 ~~&    63.43 \\

   3 &  6.71 & -0.31 ~~&  0.51 ~& -1.13 ~~&  0.38 ~& -5.79 &  4.60 ~~&  5.74 ~~&    49.56 \\

   4 &  6.54 & -0.32 ~~&  0.55 ~& -1.18 ~~&  0.41 ~& -5.96 &  4.64 ~~&  5.99 ~~&    70.46 \\

   5 &  6.52 & -0.34 ~~&  0.59 ~& -1.24 ~~&  0.44 ~& -5.97 &  4.72 ~~&  6.19 ~~&   109.98 \\

   6 &  6.68 & -0.34 ~~&  0.57 ~& -1.22 ~~&  0.43 ~& -5.81 &  4.72 ~~&  6.13 ~~&   104.13 \\

   7 &  7.61 & -0.32 ~~&  0.47 ~& -1.16 ~~&  0.35 ~& -4.89 &  4.60 ~~&  5.38 ~~&    35.56 \\

   8 &  7.20 & -0.33 ~~&  0.62 ~& -1.20 ~~&  0.47 ~& -5.30 &  4.61 ~~&  5.59 ~~&    44.19 \\

  10 &  7.51 & -0.31 ~~&  0.63 ~& -1.14 ~~&  0.48 ~& -4.98 &  4.55 ~~&  5.29 ~~&    30.05 \\

  11 &  8.18 & -0.33 ~~&  0.50 ~& -1.20 ~~&  0.37 ~& -4.32 &  4.55 ~~&  5.05 ~~&    25.34 \\

  12 &  7.37 & -0.26 ~~&  0.69 ~& -0.93 ~~&  0.52 ~& -5.12 &  4.46 ~~&  5.10 ~~&    22.54 \\

  13 &  8.42 & -0.28 ~~&  0.59 ~& -1.02 ~~&  0.44 ~& -4.07 &  4.52 ~~&  4.86 ~~&    20.73 \\

  14 &  8.54 & -0.30 ~~&  0.58 ~& -1.09 ~~&  0.43 ~& -3.95 &  4.45 ~~&  4.66 ~~&    16.04 \\

  15 &  8.12 & -0.32 ~~&  0.68 ~& -1.18 ~~&  0.51 ~& -4.37 &  4.52 ~~&  4.98 ~~&    22.36 \\

  16 &  8.67 & -0.24 ~~&  0.59 ~& -0.87 ~~&  0.44 ~& -3.83 &  4.41 ~~&  4.51 ~~&    13.90 \\

  17 &  9.28 & -0.30 ~~&  0.47 ~& -1.06 ~~&  0.35 ~& -3.22 &  4.47 ~~&  4.43 ~~&    15.10 \\

  18 &  8.38 & -0.26 ~~&  0.67 ~& -0.94 ~~&  0.51 ~& -4.11 &  4.40 ~~&  4.62 ~~&    14.80 \\

  19 &  8.93 & -0.30 ~~&  0.56 ~& -1.10 ~~&  0.42 ~& -3.56 &  4.49 ~~&  4.59 ~~&    16.70 \\

  20 &  9.13 & -0.27 ~~&  0.53 ~& -0.97 ~~&  0.40 ~& -3.37 &  4.42 ~~&  4.35 ~~&    12.88 \\

  21 &  9.21 & -0.28 ~~&  0.52 ~& -1.02 ~~&  0.39 ~& -3.29 &  4.41 ~~&  4.30 ~~&    12.29 \\

  22 & 10.07 & -0.23 ~~&  0.34 ~& -0.83 ~~&  0.25 ~& -2.42 &  4.41 ~~&  3.95 ~~&    10.65 \\

  23 &  9.72 & -0.22 ~~&  0.44 ~& -0.80 ~~&  0.33 ~& -2.78 &  4.52 ~~&  4.34 ~~&    16.48 \\

  25 &  9.58 & -0.24 ~~&  0.48 ~& -0.85 ~~&  0.35 ~& -2.92 &  4.52 ~~&  4.40 ~~&    16.90 \\

  26 &  9.63 & -0.26 ~~&  0.47 ~& -0.95 ~~&  0.35 ~& -2.86 &  4.37 ~~&  4.06 ~~&    10.43 \\

  27 &  9.00 & -0.26 ~~&  0.62 ~& -0.95 ~~&  0.47 ~& -3.49 &  4.41 ~~&  4.38 ~~&    12.87 \\

  28 &  9.42 & -0.31 ~~&  0.55 ~& -1.10 ~~&  0.41 ~& -3.08 &  4.50 ~~&  4.43 ~~&    16.43 \\

  30 & 10.05 & -0.26 ~~&  0.44 ~& -0.94 ~~&  0.32 ~& -2.44 &  4.40 ~~&  3.94 ~~&    10.45 \\

  31 &  9.86 & -0.25 ~~&  0.48 ~& -0.89 ~~&  0.36 ~& -2.64 &  4.37 ~~&  3.96 ~~&     9.89 \\

  33 &  9.55 & -0.22 ~~&  0.55 ~& -0.80 ~~&  0.41 ~& -2.95 &  4.32 ~~&  3.97 ~~&     9.32 \\

  35 &  9.88 & -0.19 ~~&  0.50 ~& -0.66 ~~&  0.37 ~& -2.61 &  4.41 ~~&  4.03 ~~&    10.93 \\

  36 & 10.18 & -0.23 ~~&  0.45 ~& -0.84 ~~&  0.33 ~& -2.31 &  4.34 ~~&  3.77 ~~&     8.75 \\

  37 &  9.75 & -0.15 ~~&  *~~  ~& -0.65 ~~&  *~~  ~& -2.74 &  4.24 ~~&  3.71 ~~&     7.51 \\

  38 & 10.05 & -0.26 ~~&  0.51 ~& -0.93 ~~&  0.38 ~& -2.45 &  4.37 ~~&  3.89 ~~&     9.71 \\

  39 &  8.99 & -0.25 ~~&  0.74 ~& -0.90 ~~&  0.56 ~& -3.50 &  4.37 ~~&  4.31 ~~&    11.87 \\

  40 &  9.70 & -0.27 ~~&  0.60 ~& -0.97 ~~&  0.45 ~& -2.79 &  4.34 ~~&  3.96 ~~&     9.50 \\

  41 & 10.13 & -0.28 ~~&  0.51 ~& -0.98 ~~&  0.38 ~& -2.36 &  4.43 ~~&  3.98 ~~&    11.32 \\

  42 &  9.52 & -0.28 ~~&  0.65 ~& -0.99 ~~&  0.49 ~& -2.97 &  4.41 ~~&  4.17 ~~&    11.57 \\

  44 & 10.60 & -0.24 ~~&  0.45 ~& -0.87 ~~&  0.33 ~& -1.89 &  4.36 ~~&  3.64 ~~&     8.67 \\

  46 &  9.63 & -0.27 ~~&  0.66 ~& -0.98 ~~&  0.50 ~& -2.87 &  4.42 ~~&  4.17 ~~&    11.95 \\

  47 & 10.23 & -0.25 ~~&  0.54 ~& -0.89 ~~&  0.40 ~& -2.27 &  4.34 ~~&  3.75 ~~&     8.64 \\

  48 &  9.76 & -0.27 ~~&  0.64 ~& -0.98 ~~&  0.48 ~& -2.74 &  4.42 ~~&  4.12 ~~&    11.81 \\

  51 & 10.19 & -0.25 ~~&  0.57 ~& -0.89 ~~&  0.43 ~& -2.31 &  4.37 ~~&  3.83 ~~&     9.47 \\

  52 &  9.53 & -0.29 ~~&  0.72 ~& -1.03 ~~&  0.55 ~& -2.96 &  4.34 ~~&  4.03 ~~&     9.82 \\

  53 & 10.99 & -0.21 ~~&  0.43 ~& -0.75 ~~&  0.32 ~& -1.51 &  4.34 ~~&  3.45 ~~&     7.81 \\

  54 & 10.72 & -0.23 ~~&  0.49 ~& -0.83 ~~&  0.36 ~& -1.78 &  4.34 ~~&  3.54 ~~&     7.98 \\

  56 & 10.89 & -0.21 ~~&  0.46 ~& -0.73 ~~&  0.34 ~& -1.60 &  4.28 ~~&  3.35 ~~&     6.72 \\

  58 & 10.84 & -0.19 ~~&  0.47 ~& -0.64 ~~&  0.35 ~& -1.66 &  4.24 ~~&  3.26 ~~&     6.08 \\

  59 & 10.96 & -0.23 ~~&  0.46 ~& -0.82 ~~&  0.34 ~& -1.53 &  4.34 ~~&  3.45 ~~&     7.83 \\

  60 & 11.20 & -0.21 ~~&  0.42 ~& -0.75 ~~&  0.31 ~& -1.29 &  4.29 ~~&  3.25 ~~&     6.61 \\

  62 & 11.19 & -0.21 ~~&  0.44 ~& -0.74 ~~&  0.33 ~& -1.31 &  4.29 ~~&  3.24 ~~&     6.56 \\

  63 & 10.80 & -0.19 ~~&  0.53 ~& -0.66 ~~&  0.39 ~& -1.69 &  4.25 ~~&  3.30 ~~&     6.25 \\

  64 & 11.25 & -0.22 ~~&  0.44 ~& -0.78 ~~&  0.33 ~& -1.24 &  4.31 ~~&  3.26 ~~&     6.84 \\

  65 & 11.42 & -0.18 ~~&  0.41 ~& -0.63 ~~&  0.31 ~& -1.07 &  4.23 ~~&  3.02 ~~&     5.47 \\

  68 & 11.09 & -0.18 ~~&  0.50 ~& -0.62 ~~&  0.37 ~& -1.41 &  4.23 ~~&  3.14 ~~&     5.71 \\

  69 & 10.73 & -0.24 ~~&  0.58 ~& -0.87 ~~&  0.43 ~& -1.76 &  4.36 ~~&  3.58 ~~&     8.46 \\

  70 & 11.26 & -0.18 ~~&  0.48 ~& -0.60 ~~&  0.36 ~& -1.24 &  4.22 ~~&  3.04 ~~&     5.41 \\

  71 & 11.47 & -0.13 ~~&  0.44 ~& -0.43 ~~&  0.33 ~& -1.03 &  4.11 ~~&  2.72 ~~&     4.23 \\

  72 & 10.88 & -0.22 ~~&  0.57 ~& -0.80 ~~&  0.43 ~& -1.61 &  4.32 ~~&  3.44 ~~&     7.43 \\

  73 & 11.19 & -0.22 ~~&  0.51 ~& -0.78 ~~&  0.38 ~& -1.31 &  4.31 ~~&  3.29 ~~&     6.88 \\

  75 & 11.14 & -0.21 ~~&  0.55 ~& -0.76 ~~&  0.41 ~& -1.35 &  4.30 ~~&  3.28 ~~&     6.72 \\

  76 & 11.54 & -0.19 ~~&  0.47 ~& -0.65 ~~&  0.35 ~& -0.96 &  4.24 ~~&  3.00 ~~&     5.56 \\

  77 & 10.72 & -0.23 ~~&  0.65 ~& -0.85 ~~&  0.49 ~& -1.78 &  4.35 ~~&  3.56 ~~&     8.20 \\

  78 & 11.35 & -0.20 ~~&  0.52 ~& -0.69 ~~&  0.39 ~& -1.14 &  4.26 ~~&  3.11 ~~&     5.95 \\

  79 & 11.92 & -0.04 ~~&  0.40 ~& -0.07 ~~&  0.29 ~& -0.58 &  3.99 ~~&  2.28 ~~&     3.22 \\

  80 & 11.36 & -0.19 ~~&  0.52 ~& -0.66 ~~&  0.39 ~& -1.13 &  4.25 ~~&  3.07 ~~&     5.71 \\

  81 & 11.93 & -0.17 ~~&  0.40 ~& -0.57 ~~&  0.29 ~& -0.56 &  4.20 ~~&  2.75 ~~&     4.76 \\

  82 & 11.17 &  0.13 ~~&  *~~  ~& -0.15 ~~&  *~~  ~& -1.32 &  3.92 ~~&  2.49 ~~&     4.63 \\

  83 & 11.20 & -0.13 ~~&  0.56 ~& -0.42 ~~&  0.42 ~& -1.30 &  4.11 ~~&  2.82 ~~&     4.42 \\

  84 & 11.23 & -0.48 ~~&  *~~  ~& -0.06 ~~&  *~~  ~& -1.27 &  3.93 ~~&  2.46 ~~&     3.32 \\

  85 & 11.73 & -0.20 ~~&  0.46 ~& -0.67 ~~&  0.34 ~& -0.77 &  4.25 ~~&  2.94 ~~&     5.55 \\

  87 & 11.05 & -0.14 ~~&  0.61 ~& -0.46 ~~&  0.45 ~& -1.45 &  4.13 ~~&  2.92 ~~&     4.70 \\

  88 & 10.82 & -0.19 ~~&  0.66 ~& -0.66 ~~&  0.49 ~& -1.67 &  4.25 ~~&  3.29 ~~&     6.24 \\

  89 & 11.46 & -0.20 ~~&  0.52 ~& -0.70 ~~&  0.39 ~& -1.04 &  4.26 ~~&  3.08 ~~&     5.93 \\

  90 & 11.84 & -0.18 ~~&  0.45 ~& -0.60 ~~&  0.33 ~& -0.66 &  4.21 ~~&  2.81 ~~&     4.95 \\

  91 & 11.46 & -0.17 ~~&  0.54 ~& -0.58 ~~&  0.40 ~& -1.03 &  4.21 ~~&  2.94 ~~&     5.14 \\

  92 & 11.73 & -0.17 ~~&  0.48 ~& -0.57 ~~&  0.36 ~& -0.76 &  4.20 ~~&  2.82 ~~&     4.86 \\

  95 & 11.76 & -0.17 ~~&  0.48 ~& -0.57 ~~&  0.36 ~& -0.73 &  4.20 ~~&  2.81 ~~&     4.85 \\

  97 & 10.27 & -0.28 ~~&  0.81 ~& -0.99 ~~&  0.62 ~& -2.22 &  4.43 ~~&  3.93 ~~&    11.19 \\

  98 & 12.29 & -0.15 ~~&  0.38 ~& -0.50 ~~&  0.28 ~& -0.21 &  4.15 ~~&  2.48 ~~&     4.00 \\

  99 & 11.68 & -0.19 ~~&  0.51 ~& -0.65 ~~&  0.38 ~& -0.81 &  4.24 ~~&  2.94 ~~&     5.44 \\

 101 & 10.30 & -0.27 ~~&  0.81 ~& -0.97 ~~&  0.62 ~& -2.20 &  4.42 ~~&  3.89 ~~&    10.73 \\

 102 & 11.55 & -0.19 ~~&  0.56 ~& -0.66 ~~&  0.42 ~& -0.94 &  4.25 ~~&  3.00 ~~&     5.59 \\

 103 & 11.58 &  0.14 ~~&  *~~  ~& -0.52 ~~&  *~~  ~& -0.92 &  3.91 ~~&  2.33 ~~&     4.13 \\

 104 & 11.30 & -0.22 ~~&  0.62 ~& -0.80 ~~&  0.47 ~& -1.20 &  4.32 ~~&  3.27 ~~&     6.98 \\

 105 & 12.50 & -0.11 ~~&  0.37 ~& -0.34 ~~&  0.28 ~& -0.00 &  4.08 ~~&  2.22 ~~&     3.30 \\

 106 & 11.93 & -0.17 ~~&  0.50 ~& -0.58 ~~&  0.37 ~& -0.57 &  4.21 ~~&  2.76 ~~&     4.80 \\

 107 & 11.47 & -0.20 ~~&  0.60 ~& -0.70 ~~&  0.45 ~& -1.02 &  4.27 ~~&  3.08 ~~&     5.94 \\

 108 & 11.69 &  0.08 ~~&  *~~  ~& -0.32 ~~&  *~~  ~& -0.81 &  3.94 ~~&  2.29 ~~&     3.95 \\

 109 & 11.39 & -0.16 ~~&  0.62 ~& -0.53 ~~&  0.47 ~& -1.10 &  4.18 ~~&  2.90 ~~&     4.87 \\

 110 & 11.71 &  0.23 ~~&  *~~  ~&  0.02 ~~&  *~~  ~& -0.78 &  3.88 ~~&  2.25 ~~&     4.04 \\

 111 & 11.83 & -0.10 ~~&  0.54 ~& -0.29 ~~&  0.40 ~& -0.67 &  4.06 ~~&  2.44 ~~&     3.59 \\

 112 & 11.79 & -0.21 ~~&  0.56 ~& -0.73 ~~&  0.42 ~& -0.70 &  4.28 ~~&  2.98 ~~&     5.78 \\

 113 & 11.05 & -0.22 ~~&  0.72 ~& -0.79 ~~&  0.54 ~& -1.45 &  4.32 ~~&  3.36 ~~&     7.21 \\

 118 & 11.95 & -0.17 ~~&  0.53 ~& -0.59 ~~&  0.39 ~& -0.55 &  4.21 ~~&  2.76 ~~&     4.86 \\

 119 & 11.84 &  0.53 ~~&  *~~  ~& -0.01 ~~&  *~~  ~& -0.66 &  3.79 ~~&  2.23 ~~&     4.28 \\

 120 & 11.88 & -0.21 ~~&  *~~  ~& -0.10 ~~&  *~~  ~& -0.62 &  4.00 ~~&  2.30 ~~&     3.27 \\

 122 & 11.93 &  0.44 ~~&  *~~  ~&  0.15 ~~&  *~~  ~& -0.57 &  3.81 ~~&  2.19 ~~&     4.08 \\

 124 & 12.45 & -0.15 ~~&  0.45 ~& -0.49 ~~&  0.34 ~& -0.05 &  4.14 ~~&  2.39 ~~&     3.82 \\

 125 & 12.79 & -0.06 ~~&  0.38 ~& -0.12 ~~&  0.28 ~& 0.291 &  4.00 ~~&  1.95 ~~&     2.78 \\

 126 & 11.96 &  0.11 ~~&  *~~  ~& -0.13 ~~&  *~~  ~& -0.53 &  3.92 ~~&  2.18 ~~&     3.61 \\

 127 & 11.76 & -0.19 ~~&  0.60 ~& -0.65 ~~&  0.45 ~& -0.74 &  4.24 ~~&  2.91 ~~&     5.38 \\

 128 & 12.69 & -0.13 ~~&  0.41 ~& -0.43 ~~&  0.31 ~& 0.187 &  4.11 ~~&  2.23 ~~&     3.48 \\

 129 & 12.59 & -0.12 ~~&  0.44 ~& -0.36 ~~&  0.32 ~& 0.090 &  4.09 ~~&  2.21 ~~&     3.33 \\

 130 & 11.41 & -0.20 ~~&  0.69 ~& -0.70 ~~&  0.52 ~& -1.08 &  4.27 ~~&  3.10 ~~&     6.01 \\

 131 & 12.69 & -0.12 ~~&  0.42 ~& -0.37 ~~&  0.31 ~& 0.189 &  4.09 ~~&  2.17 ~~&     3.31 \\

 133 & 12.06 & -0.21 ~~&  *~~  ~&       ~~&       ~& -0.43 &  4.29 ~~&  2.89 ~~&     5.69 \\

 136 & 12.24 & -0.10 ~~&  0.56 ~& -0.28 ~~&  0.42 ~& -0.26 &  4.05 ~~&  2.27 ~~&     3.33 \\

 137 & 11.85 & -0.14 ~~&  0.64 ~& -0.48 ~~&  0.48 ~& -0.64 &  4.14 ~~&  2.62 ~~&     4.14 \\

 138 & 12.32 &  0.23 ~~&  *~~  ~& -0.17 ~~&  *~~  ~& -0.18 &  3.88 ~~&  2.01 ~~&     3.40 \\

 141 & 11.57 & -0.17 ~~&  0.73 ~& -0.57 ~~&  0.55 ~& -0.92 &  4.21 ~~&  2.89 ~~&     5.01 \\

 142 & 12.12 & -0.12 ~~&  0.61 ~& -0.38 ~~&  0.46 ~& -0.37 &  4.10 ~~&  2.41 ~~&     3.65 \\

 143 & 11.75 & -0.06 ~~&  0.69 ~& -0.13 ~~&  0.52 ~& -0.74 &  4.00 ~~&  2.37 ~~&     3.38 \\

 144 & 12.27 & -0.14 ~~&  0.59 ~& -0.45 ~~&  0.44 ~& -0.23 &  4.13 ~~&  2.43 ~~&     3.79 \\

 145 & 12.39 &  0.41 ~~&  *~~  ~&  0.01 ~~&  *~~  ~& -0.10 &  3.82 ~~&  2.00 ~~&     3.55 \\

 146 & 12.39 &  0.16 ~~&  *~~  ~& -0.15 ~~&  *~~  ~& -0.10 &  3.90 ~~&  2.00 ~~&     3.19 \\

 148 & 12.59 & -0.11 ~~&  0.54 ~& -0.33 ~~&  0.40 ~& 0.092 &  4.07 ~~&  2.17 ~~&     3.24 \\

 149 & 11.70 & -0.18 ~~&  0.73 ~& -0.61 ~~&  0.55 ~& -0.79 &  4.22 ~~&  2.89 ~~&     5.17 \\

 150 & 13.04 & -0.07 ~~&  0.44 ~& -0.20 ~~&  0.33 ~& 0.536 &  4.02 ~~&  1.89 ~~&     2.75 \\

 151 & 12.60 & -0.13 ~~&  0.54 ~& -0.42 ~~&  0.40 ~& 0.103 &  4.11 ~~&  2.25 ~~&     3.49 \\

 152 & 12.53 & -0.08 ~~&  0.56 ~& -0.22 ~~&  0.42 ~& 0.026 &  4.03 ~~&  2.11 ~~&     3.04 \\

 153 & 12.49 & -0.14 ~~&  0.57 ~& -0.46 ~~&  0.43 ~& -0.00 &  4.13 ~~&  2.35 ~~&     3.71 \\

 154 & 11.26 & -0.23 ~~&  0.85 ~& -0.82 ~~&  0.65 ~& -1.24 &  4.33 ~~&  3.32 ~~&     7.34 \\

 155 & 12.74 & -0.10 ~~&  0.54 ~& -0.28 ~~&  0.40 ~& 0.238 &  4.05 ~~&  2.08 ~~&     3.05 \\

 156 & 13.52 &  0.00 ~~&  0.38 ~&  0.03 ~~&  0.28 ~& 1.019 &  3.97 ~~&  1.59 ~~&     2.33 \\

 157 & 12.89 & -0.11 ~~&  0.51 ~& -0.34 ~~&  0.38 ~& 0.393 &  4.08 ~~&  2.06 ~~&     3.12 \\

 158 & 12.68 & -0.16 ~~&  *~~  ~& -0.39 ~~&  *~~  ~& 0.176 &  4.10 ~~&  2.20 ~~&     3.37 \\

 159 & 11.84 & -0.07 ~~&  0.74 ~& -0.19 ~~&  0.56 ~& -0.66 &  4.02 ~~&  2.36 ~~&     3.39 \\

 160 & 12.70 &  0.14 ~~&  *~~  ~& -0.14 ~~&  *~~  ~& 0.198 &  3.92 ~~&  1.88 ~~&     2.60 \\

 161 & 12.57 & -0.07 ~~&  0.59 ~& -0.18 ~~&  0.44 ~& 0.068 &  4.02 ~~&  2.07 ~~&     2.95 \\

 162 & 12.72 & -0.00 ~~&  *~~  ~& -0.35 ~~&  *~~  ~& 0.215 &  3.97 ~~&  1.92 ~~&     2.69 \\

 163 & 12.72 &  0.02 ~~&  *~~  ~& -0.34 ~~&  *~~  ~& 0.215 &  3.96 ~~&  1.90 ~~&     2.66 \\

 166 & 12.74 &  0.04 ~~&  *~~  ~& -0.25 ~~&  *~~  ~& 0.237 &  3.96 ~~&  1.89 ~~&     2.64 \\

 167 & 12.56 & -0.06 ~~&  0.60 ~& -0.14 ~~&  0.45 ~& 0.055 &  4.01 ~~&  2.05 ~~&     2.92 \\

 168 & 11.47 & -0.19 ~~&  0.84 ~& -0.66 ~~&  0.64 ~& -1.03 &  4.25 ~~&  3.03 ~~&     5.66 \\

 169 & 12.78 & -0.11 ~~&  0.57 ~& -0.36 ~~&  0.42 ~& 0.284 &  4.08 ~~&  2.13 ~~&     3.23 \\

 170 & 12.84 & -0.03 ~~&  *~~  ~& -0.15 ~~&  *~~  ~& 0.337 &  4.01 ~~&  1.95 ~~&     2.79 \\

 171 & 12.84 &  0.11 ~~&  *~~  ~& -0.17 ~~&  *~~  ~& 0.337 &  3.93 ~~&  1.83 ~~&     2.54 \\

 172 & 12.92 & -0.08 ~~&  0.54 ~& -0.22 ~~&  0.41 ~& 0.423 &  4.03 ~~&  1.95 ~~&     2.84 \\

 173 & 12.20 & -0.08 ~~&  0.71 ~& -0.22 ~~&  0.53 ~& -0.29 &  4.03 ~~&  2.24 ~~&     3.22 \\

 174 & 12.93 &  0.09 ~~&  *~~  ~& -0.37 ~~&  *~~  ~& 0.426 &  3.94 ~~&  1.80 ~~&     2.51 \\

 175 & 12.95 &  0.06 ~~&  *~~  ~& -0.33 ~~&  *~~  ~& 0.445 &  3.95 ~~&  1.80 ~~&     2.52 \\

 176 & 12.96 &  0.52 ~~&  *~~  ~&  0.05 ~~&  *~~  ~& 0.455 &  3.79 ~~&  1.78 ~~&     3.11 \\

 177 & 12.96 & -0.01 ~~&  *~~  ~& -0.03 ~~&  *~~  ~& 0.459 &  3.97 ~~&  1.82 ~~&     2.58 \\

 178 & 13.30 & -0.06 ~~&  0.49 ~& -0.14 ~~&  0.36 ~& 0.804 &  4.01 ~~&  1.75 ~~&     2.57 \\

 179 & 12.47 & -0.08 ~~&  0.68 ~& -0.22 ~~&  0.51 ~& -0.02 &  4.03 ~~&  2.13 ~~&     3.07 \\

 180 & 13.03 &  0.23 ~~&  *~~  ~&  0.01 ~~&  *~~  ~& 0.529 &  3.88 ~~&  1.73 ~~&     2.40 \\

 181 & 13.05 &  0.10 ~~&  *~~  ~& -0.10 ~~&  *~~  ~& 0.545 &  3.93 ~~&  1.75 ~~&     2.45 \\

 182 & 11.79 & -0.12 ~~&  0.83 ~& -0.39 ~~&  0.63 ~& -0.71 &  4.10 ~~&  2.55 ~~&     3.88 \\

 183 & 12.21 & -0.13 ~~&  0.74 ~& -0.41 ~~&  0.56 ~& -0.29 &  4.11 ~~&  2.41 ~~&     3.69 \\

 184 & 13.06 &  0.86 ~~&  *~~  ~&       ~~&       ~& 0.563 &  3.71 ~~&  1.81 ~~&     3.41 \\

 185 & 13.06 &  0.03 ~~&  *~~  ~& -0.12 ~~&  *~~  ~& 0.563 &  3.96 ~~&  1.76 ~~&     2.49 \\

 186 & 13.07 &  0.70 ~~&  *~~  ~&  0.13 ~~&  *~~  ~& 0.567 &  3.75 ~~&  1.76 ~~&     3.17 \\

 187 & 12.29 & -0.13 ~~&  0.74 ~& -0.41 ~~&  0.56 ~& -0.20 &  4.11 ~~&  2.37 ~~&     3.64 \\

 188 & 13.14 &  0.50 ~~&  *~~  ~& -0.02 ~~&  *~~  ~& 0.643 &  3.80 ~~&  1.70 ~~&     2.92 \\

 189 & 11.52 & -0.19 ~~&  0.91 ~& -0.66 ~~&  0.69 ~& -0.97 &  4.25 ~~&  3.02 ~~&     5.65 \\

 190 & 13.18 &  0.13 ~~&  *~~  ~& -0.18 ~~&  *~~  ~& 0.681 &  3.92 ~~&  1.69 ~~&     2.37 \\

 192 & 13.21 &  0.63 ~~&  *~~  ~& -0.02 ~~&  *~~  ~& 0.708 &  3.77 ~~&  1.69 ~~&     3.00 \\

 193 & 13.21 & -0.02 ~~&  *~~  ~& -0.11 ~~&  *~~  ~& 0.710 &  3.98 ~~&  1.73 ~~&     2.49 \\

 194 & 11.67 & -0.14 ~~&  0.89 ~& -0.47 ~~&  0.68 ~& -0.82 &  4.13 ~~&  2.68 ~~&     4.22 \\

 195 & 13.24 &  0.13 ~~&  *~~  ~& -0.20 ~~&  *~~  ~& 0.742 &  3.92 ~~&  1.67 ~~&     2.34 \\

 196 & 13.28 & -0.11 ~~&  *~~  ~&       ~~&       ~& 0.778 &  4.07 ~~&  1.90 ~~&     2.94 \\

 197 & 13.28 &  0.81 ~~&  *~~  ~&  0.10 ~~&  *~~  ~& 0.784 &  3.88 ~~&  1.63 ~~&     2.54 \\

 198 & 13.29 &  0.78 ~~&  *~~  ~&  0.44 ~~&  *~~  ~& 0.791 &  3.73 ~~&  1.69 ~~&     3.07 \\

 199 & 13.32 &  0.53 ~~&  *~~  ~& -0.01 ~~&  *~~  ~& 0.819 &  3.79 ~~&  1.64 ~~&     2.83 \\

 200 & 13.33 &  0.51 ~~&  *~~  ~&       ~~&       ~& 0.829 &  3.80 ~~&  1.63 ~~&     2.80 \\

 201 & 13.34 &  0.23 ~~&  *~~  ~&       ~~&       ~& 0.842 &  3.88 ~~&  1.61 ~~&     2.25 \\

 202 & 13.37 &  0.19 ~~&  *~~  ~& -0.23 ~~&  *~~  ~& 0.868 &  3.90 ~~&  1.60 ~~&     2.26 \\

 203 & 13.39 &  0.49 ~~&  *~~  ~&  0.10 ~~&  *~~  ~& 0.888 &  3.87 ~~&  1.58 ~~&     2.48 \\

 204 & 13.41 &  0.83 ~~&  *~~  ~&  0.41 ~~&  *~~  ~& 0.905 &  3.72 ~~&  1.66 ~~&     3.04 \\

 205 & 13.43 &  0.17 ~~&  *~~  ~&  0.04 ~~&  *~~  ~& 0.929 &  3.91 ~~&  1.58 ~~&     2.24 \\

 206 & 13.43 &  0.33 ~~&  *~~  ~& -0.31 ~~&  *~~  ~& 0.929 &  3.84 ~~&  1.57 ~~&     2.54 \\

 207 & 11.91 & -0.16 ~~&  0.88 ~& -0.52 ~~&  0.67 ~& -0.58 &  4.17 ~~&  2.68 ~~&     4.42 \\

 208 & 13.44 &  0.03 ~~&  *~~  ~& -0.32 ~~&  *~~  ~& 0.935 &  3.96 ~~&  1.61 ~~&     2.33 \\

 209 & 12.08 & -0.18 ~~&  0.85 ~& -0.60 ~~&  0.65 ~& -0.41 &  4.22 ~~&  2.72 ~~&     4.83 \\

 210 & 13.45 &  0.16 ~~&  *~~  ~& -0.29 ~~&  *~~  ~& 0.948 &  3.91 ~~&  1.58 ~~&     2.24 \\

 211 & 13.46 &  0.24 ~~&  *~~  ~& -0.13 ~~&  *~~  ~& 0.963 &  3.88 ~~&  1.56 ~~&     2.20 \\

 212 & 13.49 &  0.88 ~~&  *~~  ~&  0.18 ~~&  *~~  ~& 0.991 &  3.71 ~~&  1.65 ~~&     3.04 \\

 213 & 13.50 &  0.16 ~~&  *~~  ~& -0.13 ~~&  *~~  ~& 0.997 &  3.91 ~~&  1.56 ~~&     2.22 \\

 214 & 13.50 &  0.68 ~~&  *~~  ~& -0.23 ~~&  *~~  ~& 1.004 &  3.76 ~~&  1.58 ~~&     2.84 \\

 215 & 13.52 &  0.74 ~~&  *~~  ~&  0.28 ~~&  *~~  ~& 1.017 &  3.74 ~~&  1.59 ~~&     2.92 \\

 216 & 13.53 &  0.14 ~~&  *~~  ~& -0.26 ~~&  *~~  ~& 1.029 &  3.92 ~~&  1.55 ~~&     2.21 \\

 217 & 13.53 &  0.42 ~~&  *~~  ~& -0.05 ~~&  *~~  ~& 1.031 &  3.81 ~~&  1.54 ~~&     2.59 \\

 218 & 13.56 &  0.19 ~~&  *~~  ~& -0.12 ~~&  *~~  ~& 1.058 &  3.90 ~~&  1.53 ~~&     2.17 \\

 219 & 13.59 &  0.30 ~~&  *~~  ~& -0.01 ~~&  *~~  ~& 1.087 &  3.86 ~~&  1.50 ~~&     2.13 \\

 220 & 13.59 &  0.05 ~~&  *~~  ~& -0.28 ~~&  *~~  ~& 1.094 &  3.95 ~~&  1.54 ~~&     2.25 \\

 221 & 13.60 &  0.78 ~~&  *~~  ~& -0.22 ~~&  *~~  ~& 1.096 &  3.73 ~~&  1.57 ~~&     2.91 \\

 222 & 13.62 &  0.17 ~~&  *~~  ~& -0.28 ~~&  *~~  ~& 1.116 &  3.91 ~~&  1.51 ~~&     2.16 \\

 223 & 13.62 &  0.29 ~~&  *~~  ~& -0.15 ~~&  *~~  ~& 1.119 &  3.86 ~~&  1.49 ~~&     2.12 \\

 224 & 13.65 &  0.37 ~~&  *~~  ~&       ~~&       ~& 1.146 &  3.83 ~~&  1.49 ~~&     2.45 \\

 225 & 13.65 &  0.74 ~~&  *~~  ~&  0.41 ~~&  *~~  ~& 1.152 &  3.74 ~~&  1.54 ~~&     2.83 \\

 226 & 13.67 &  0.01 ~~&  *~~  ~& -0.27 ~~&  *~~  ~& 1.168 &  3.96 ~~&  1.52 ~~&     2.26 \\

 228 & 13.69 &  0.53 ~~&  *~~  ~&  0.17 ~~&  *~~  ~& 1.191 &  3.79 ~~&  1.49 ~~&     2.57 \\

 230 & 13.73 &  0.20 ~~&  *~~  ~& -0.14 ~~&  *~~  ~& 1.227 &  3.89 ~~&  1.46 ~~&     2.10 \\

 231 & 13.73 &  0.11 ~~&  *~~  ~& -0.19 ~~&  *~~  ~& 1.228 &  3.93 ~~&  1.47 ~~&     2.15 \\

 234 & 13.76 &  0.09 ~~&  *~~  ~& -0.28 ~~&  *~~  ~& 1.255 &  3.94 ~~&  1.46 ~~&     2.15 \\

 235 & 13.76 &  0.11 ~~&  *~~  ~&       ~~&       ~& 1.264 &  3.93 ~~&  1.46 ~~&     2.14 \\

 236 & 13.78 &  0.70 ~~&  *~~  ~&       ~~&       ~& 1.280 &  3.75 ~~&  1.48 ~~&     2.68 \\

 237 & 12.12 & -0.19 ~~&  0.92 ~& -0.65 ~~&  0.70 ~& -0.37 &  4.24 ~~&  2.76 ~~&     4.91 \\

 238 & 13.83 &  0.27 ~~&  *~~  ~&  0.07 ~~&  *~~  ~& 1.331 &  3.87 ~~&  1.41 ~~&     2.03 \\

 239 & 13.84 &  0.31 ~~&  *~~  ~& -0.17 ~~&  *~~  ~& 1.343 &  3.85 ~~&  1.40 ~~&     2.02 \\

 240 & 13.86 &  0.05 ~~&  *~~  ~& -0.24 ~~&  *~~  ~& 1.364 &  3.95 ~~&  1.44 ~~&     2.16 \\

 241 & 13.89 &  0.45 ~~&  *~~  ~& -0.02 ~~&  *~~  ~& 1.387 &  3.81 ~~&  1.40 ~~&     2.39 \\

 242 & 13.90 &  0.22 ~~&  *~~  ~& -0.03 ~~&  *~~  ~& 1.402 &  3.89 ~~&  1.38 ~~&     2.02 \\

 245 & 13.94 &  0.11 ~~&  *~~  ~& -0.13 ~~&  *~~  ~& 1.440 &  3.93 ~~&  1.39 ~~&     2.07 \\

 246 & 13.94 &  0.32 ~~&  *~~  ~& -0.08 ~~&  *~~  ~& 1.442 &  3.85 ~~&  1.36 ~~&     1.98 \\

 247 & 13.94 &  0.15 ~~&  *~~  ~& -0.24 ~~&  *~~  ~& 1.443 &  3.91 ~~&  1.38 ~~&     2.05 \\

 248 & 13.97 &  0.16 ~~&  *~~  ~& -0.12 ~~&  *~~  ~& 1.466 &  3.91 ~~&  1.37 ~~&     2.04 \\

 251 & 13.98 &  0.11 ~~&  *~~  ~& -0.03 ~~&  *~~  ~& 1.478 &  3.93 ~~&  1.37 ~~&     2.06 \\

 252 & 14.00 &  0.09 ~~&  *~~  ~&  0.01 ~~&  *~~  ~& 1.498 &  3.94 ~~&  1.37 ~~&     2.07 \\

 253 & 14.01 &  0.68 ~~&  *~~  ~&  0.20 ~~&  *~~  ~& 1.506 &  3.76 ~~&  1.39 ~~&     2.52 \\

 256 & 14.03 &  0.91 ~~&  *~~  ~&       ~~&       ~& 1.534 &  3.70 ~~&  1.44 ~~&     2.82 \\

 259 & 14.11 &  0.18 ~~&  *~~  ~& -0.12 ~~&  *~~  ~& 1.608 &  3.90 ~~&  1.31 ~~&     1.97 \\

 260 & 11.30 & -0.21 ~~&  1.16 ~& -0.75 ~~&  0.90 ~& -1.20 &  4.29 ~~&  3.21 ~~&     6.56 \\

 264 & 14.15 &  0.26 ~~&  *~~  ~&  0.14 ~~&  *~~  ~& 1.652 &  3.87 ~~&  1.28 ~~&     1.91 \\

 265 & 14.16 &  0.69 ~~&  *~~  ~&  0.12 ~~&  *~~  ~& 1.661 &  3.76 ~~&  1.32 ~~&     2.43 \\

 267 & 14.19 &  0.90 ~~&  *~~  ~&       ~~&       ~& 1.694 &  3.70 ~~&  1.37 ~~&     2.69 \\

 269 & 14.21 &  0.41 ~~&  *~~  ~&  0.26 ~~&  *~~  ~& 1.714 &  3.82 ~~&  1.27 ~~&     1.87 \\

 270 & 14.24 &  0.25 ~~&  *~~  ~& -0.19 ~~&  *~~  ~& 1.739 &  3.88 ~~&  1.24 ~~&     1.88 \\

 271 & 14.25 &  0.64 ~~&  *~~  ~& -0.12 ~~&  *~~  ~& 1.747 &  3.77 ~~&  1.28 ~~&     2.33 \\

 275 & 14.31 &  0.23 ~~&  *~~  ~& -0.19 ~~&  *~~  ~& 1.814 &  3.89 ~~&  1.22 ~~&     1.87 \\

 276 & 14.32 &  0.77 ~~&  *~~  ~&       ~~&       ~& 1.816 &  3.74 ~~&  1.28 ~~&     2.43 \\

 277 & 14.34 &  0.33 ~~&  *~~  ~& -0.05 ~~&  *~~  ~& 1.837 &  3.84 ~~&  1.21 ~~&     1.83 \\

 278 & 14.34 &  0.20 ~~&  *~~  ~& -0.14 ~~&  *~~  ~& 1.844 &  3.89 ~~&  1.21 ~~&     1.87 \\

 280 & 12.16 & -0.15 ~~&  1.03 ~& -0.52 ~~&  0.79 ~& -0.34 &  4.17 ~~&  2.57 ~~&     4.22 \\

 281 & 14.40 &  0.34 ~~&  *~~  ~& -0.22 ~~&  *~~  ~& 1.903 &  3.84 ~~&  1.18 ~~&     1.80 \\

 283 & 14.41 &  0.92 ~~&  *~~  ~&       ~~&       ~& 1.909 &  3.69 ~~&  1.30 ~~&     2.58 \\

 284 & 14.41 &  0.21 ~~&  *~~  ~& -0.19 ~~&  *~~  ~& 1.912 &  3.89 ~~&  1.18 ~~&     1.85 \\

 285 & 14.42 &  0.38 ~~&  *~~  ~&  0.14 ~~&  *~~  ~& 1.921 &  3.83 ~~&  1.18 ~~&     1.80 \\

 286 & 14.43 &  0.74 ~~&  *~~  ~&       ~~&       ~& 1.927 &  3.74 ~~&  1.23 ~~&     2.33 \\

 287 & 14.43 &  0.24 ~~&  *~~  ~& -0.24 ~~&  *~~  ~& 1.934 &  3.88 ~~&  1.17 ~~&     1.82 \\

 288 & 14.44 &  0.28 ~~&  *~~  ~& -0.17 ~~&  *~~  ~& 1.940 &  3.87 ~~&  1.16 ~~&     1.80 \\

 289 & 14.45 &  0.30 ~~&  *~~  ~&       ~~&       ~& 1.950 &  3.86 ~~&  1.16 ~~&     1.79 \\

 290 & 14.45 &  0.54 ~~&  *~~  ~&       ~~&       ~& 1.952 &  3.79 ~~&  1.18 ~~&     2.13 \\

 293 & 14.49 &  0.30 ~~&  *~~  ~&  0.07 ~~&  *~~  ~& 1.986 &  3.87 ~~&  1.14 ~~&     1.79 \\

 295 & 14.51 &  0.54 ~~&  *~~  ~&       ~~&       ~& 2.009 &  3.79 ~~&  1.16 ~~&     2.10 \\

 296 & 14.52 &  0.40 ~~&  *~~  ~& -0.14 ~~&  *~~  ~& 2.016 &  3.82 ~~&  1.14 ~~&     1.76 \\

 297 & 14.53 &  0.37 ~~&  *~~  ~&       ~~&       ~& 2.025 &  3.83 ~~&  1.14 ~~&     1.76 \\

 298 & 14.53 &  0.82 ~~&  *~~  ~&       ~~&       ~& 2.029 &  3.72 ~~&  1.21 ~~&     2.36 \\

 300 & 14.54 &  0.66 ~~&  *~~  ~&       ~~&       ~& 2.037 &  3.77 ~~&  1.17 ~~&     2.20 \\

 301 & 14.55 &  0.99 ~~&  *~~  ~&       ~~&       ~& 2.052 &  3.68 ~~&  1.28 ~~&     2.41 \\

 302 & 14.56 &  0.60 ~~&  *~~  ~&       ~~&       ~& 2.060 &  3.78 ~~&  1.15 ~~&     2.13 \\

 305 & 14.58 &  0.41 ~~&  *~~  ~&       ~~&       ~& 2.083 &  3.82 ~~&  1.12 ~~&     1.74 \\

 306 & 14.59 &  0.74 ~~&  *~~  ~&       ~~&       ~& 2.087 &  3.74 ~~&  1.17 ~~&     2.29 \\

 307 & 14.60 &  0.49 ~~&  *~~  ~&       ~~&       ~& 2.098 &  3.80 ~~&  1.12 ~~&     1.61 \\

 309 & 14.60 &  0.97 ~~&  *~~  ~&       ~~&       ~& 2.101 &  3.68 ~~&  1.24 ~~&     2.44 \\

 310 & 14.60 &  0.25 ~~&  *~~  ~& -0.18 ~~&  *~~  ~& 2.101 &  3.88 ~~&  1.10 ~~&     1.77 \\

 311 & 14.64 &  0.21 ~~&  *~~  ~&       ~~&       ~& 2.144 &  3.89 ~~&  1.09 ~~&     1.77 \\

 312 & 14.65 &  0.23 ~~&  *~~  ~&       ~~&       ~& 2.150 &  3.88 ~~&  1.08 ~~&     1.76 \\

 313 & 14.66 &  0.32 ~~&  *~~  ~&       ~~&       ~& 2.157 &  3.85 ~~&  1.08 ~~&     1.71 \\

 316 & 14.69 &  0.39 ~~&  *~~  ~&       ~~&       ~& 2.193 &  3.82 ~~&  1.07 ~~&     1.70 \\

 317 & 14.70 &  0.15 ~~&  *~~  ~&       ~~&       ~& 2.199 &  3.91 ~~&  1.08 ~~&     1.82 \\

 320 & 14.73 &  0.24 ~~&  *~~  ~& -0.19 ~~&  *~~  ~& 2.225 &  3.88 ~~&  1.05 ~~&     1.74 \\

 321 & 14.74 &  0.18 ~~&  *~~  ~&       ~~&       ~& 2.237 &  3.90 ~~&  1.06 ~~&     1.77 \\

 323 & 14.78 &  0.56 ~~&  *~~  ~&       ~~&       ~& 2.280 &  3.79 ~~&  1.05 ~~&     1.56 \\

 325 & 14.79 &  0.69 ~~&  *~~  ~& -0.21 ~~&  *~~  ~& 2.292 &  3.76 ~~&  1.07 ~~&     2.09 \\

 326 & 14.80 &  0.36 ~~&  *~~  ~&       ~~&       ~& 2.304 &  3.83 ~~&  1.02 ~~&     1.66 \\

 327 & 14.82 &  0.28 ~~&  *~~  ~&       ~~&       ~& 2.322 &  3.87 ~~&  1.01 ~~&     1.68 \\

 328 & 14.84 &  0.96 ~~&  *~~  ~&       ~~&       ~& 2.341 &  3.69 ~~&  1.14 ~~&     2.31 \\

 330 & 14.86 &  0.54 ~~&  *~~  ~&       ~~&       ~& 2.361 &  3.79 ~~&  1.02 ~~&     1.53 \\

 331 & 14.87 &  0.38 ~~&  *~~  ~&       ~~&       ~& 2.366 &  3.83 ~~&  1.00 ~~&     1.64 \\

 334 & 14.88 &  0.32 ~~&  *~~  ~&       ~~&       ~& 2.379 &  3.85 ~~&  0.99 ~~&     1.64 \\

 335 & 14.90 &  0.43 ~~&  *~~  ~&       ~~&       ~& 2.396 &  3.81 ~~&  1.00 ~~&     1.63 \\

 337 & 14.90 &  0.40 ~~&  *~~  ~&       ~~&       ~& 2.400 &  3.82 ~~&  0.99 ~~&     1.63 \\

 338 & 14.94 &  0.88 ~~&  *~~  ~&       ~~&       ~& 2.438 &  3.71 ~~&  1.07 ~~&     2.29 \\

 339 & 14.95 &  0.31 ~~&  *~~  ~&       ~~&       ~& 2.451 &  3.85 ~~&  0.96 ~~&     1.63 \\

 340 & 14.95 &  0.13 ~~&  *~~  ~&       ~~&       ~& 2.454 &  3.92 ~~&  0.98 ~~&     1.83 \\

 341 & 14.96 &  0.55 ~~&  *~~  ~&       ~~&       ~& 2.456 &  3.79 ~~&  0.98 ~~&     1.50 \\

 342 & 14.96 &  0.57 ~~&  *~~  ~&       ~~&       ~& 2.457 &  3.78 ~~&  0.98 ~~&     1.50 \\

 343 & 14.97 &  1.10 ~~&  *~~  ~&       ~~&       ~& 2.468 &  3.66 ~~&  1.14 ~~&     1.95 \\

 345 & 14.99 &  0.52 ~~&  *~~  ~&       ~~&       ~& 2.491 &  3.79 ~~&  0.97 ~~&     1.57 \\

 346 & 15.01 &  0.88 ~~&  *~~  ~&       ~~&       ~& 2.505 &  3.71 ~~&  1.04 ~~&     2.24 \\

 349 & 15.03 &  0.52 ~~&  *~~  ~&       ~~&       ~& 2.527 &  3.79 ~~&  0.95 ~~&     1.55 \\

 350 & 15.05 &  0.45 ~~&  *~~  ~&       ~~&       ~& 2.548 &  3.81 ~~&  0.94 ~~&     1.58 \\

 353 & 15.08 &  0.84 ~~&  *~~  ~&       ~~&       ~& 2.580 &  3.72 ~~&  1.00 ~~&     2.14 \\

 356 & 15.11 &  0.90 ~~&  *~~  ~&       ~~&       ~& 2.609 &  3.70 ~~&  1.01 ~~&     2.22 \\

 357 & 15.11 &  0.77 ~~&  *~~  ~&       ~~&       ~& 2.614 &  3.74 ~~&  0.96 ~~&     2.01 \\

 358 & 15.15 &  0.60 ~~&  *~~  ~&       ~~&       ~& 2.646 &  3.78 ~~&  0.91 ~~&     1.44 \\

 359 & 15.15 &  0.76 ~~&  *~~  ~&       ~~&       ~& 2.649 &  3.74 ~~&  0.95 ~~&     1.98 \\

 360 & 15.16 &  0.45 ~~&  *~~  ~&       ~~&       ~& 2.655 &  3.81 ~~&  0.90 ~~&     1.54 \\

 361 & 15.18 &  0.52 ~~&  *~~  ~&  0.17 ~~&  *~~  ~& 2.675 &  3.79 ~~&  0.89 ~~&     1.54 \\

 363 & 15.18 &  0.44 ~~&  *~~  ~&       ~~&       ~& 2.682 &  3.81 ~~&  0.88 ~~&     1.53 \\

 364 & 15.19 &  0.98 ~~&  *~~  ~&       ~~&       ~& 2.685 &  3.68 ~~&  1.01 ~~&     2.15 \\

 365 & 15.20 &  0.31 ~~&  *~~  ~&       ~~&       ~& 2.702 &  3.85 ~~&  0.86 ~~&     1.57 \\

 369 & 11.65 & -0.19 ~~&  1.32 ~& -0.67 ~~&  1.04 ~& -0.85 &  4.25 ~~&  2.97 ~~&     5.55 \\

 371 & 15.22 &  0.32 ~~&  *~~  ~&       ~~&       ~& 2.724 &  3.85 ~~&  0.85 ~~&     1.55 \\

 372 & 15.23 &  0.30 ~~&  *~~  ~&       ~~&       ~& 2.727 &  3.86 ~~&  0.84 ~~&     1.56 \\

 373 & 15.23 &  0.56 ~~&  *~~  ~&       ~~&       ~& 2.731 &  3.79 ~~&  0.87 ~~&     1.41 \\

 374 & 15.24 &  1.10 ~~&  *~~  ~&       ~~&       ~& 2.739 &  3.66 ~~&  1.03 ~~&     1.81 \\

 375 & 15.26 &  0.40 ~~&  *~~  ~&       ~~&       ~& 2.761 &  3.82 ~~&  0.85 ~~&     1.51 \\

 377 & 15.29 &  0.55 ~~&  *~~  ~&       ~~&       ~& 2.787 &  3.79 ~~&  0.85 ~~&     1.50 \\

 379 & 15.29 &  0.42 ~~&  *~~  ~&  0.37 ~~&  *~~  ~& 2.792 &  3.81 ~~&  0.84 ~~&     1.50 \\

 380 & 15.34 &  0.64 ~~&  *~~  ~&       ~~&       ~& 2.837 &  3.77 ~~&  0.84 ~~&     1.39 \\

 381 & 15.35 &  0.41 ~~&  *~~  ~&       ~~&       ~& 2.851 &  3.82 ~~&  0.81 ~~&     1.49 \\

 382 & 15.36 &  0.30 ~~&  *~~  ~&       ~~&       ~& 2.859 &  3.86 ~~&  0.79 ~~&     1.53 \\

 383 & 15.36 &  0.39 ~~&  *~~  ~&       ~~&       ~& 2.860 &  3.83 ~~&  0.81 ~~&     1.50 \\

 385 & 15.40 &  0.47 ~~&  *~~  ~&       ~~&       ~& 2.900 &  3.80 ~~&  0.80 ~~&     1.47 \\

 386 & 15.40 &  0.80 ~~&  *~~  ~&       ~~&       ~& 2.900 &  3.73 ~~&  0.86 ~~&     1.90 \\

 387 & 15.43 &  0.52 ~~&  *~~  ~&       ~~&       ~& 2.930 &  3.79 ~~&  0.79 ~~&     1.47 \\

 388 & 15.43 &  0.84 ~~&  *~~  ~&       ~~&       ~& 2.932 &  3.72 ~~&  0.85 ~~&     1.93 \\

 391 & 15.47 &  0.61 ~~&  *~~  ~&       ~~&       ~& 2.969 &  3.77 ~~&  0.79 ~~&     1.34 \\

 393 & 15.52 &  0.70 ~~&  *~~  ~&       ~~&       ~& 3.021 &  3.75 ~~&  0.78 ~~&     1.36 \\

 400 & 15.56 &  0.46 ~~&  *~~  ~&       ~~&       ~& 3.059 &  3.80 ~~&  0.73 ~~&     1.43 \\

 406 & 15.61 &  0.57 ~~&  *~~  ~&  0.18 ~~&  *~~  ~& 3.106 &  3.78 ~~&  0.72 ~~&     1.30 \\

 407 & 15.63 &  0.68 ~~&  *~~  ~&       ~~&       ~& 3.129 &  3.76 ~~&  0.73 ~~&     1.31 \\

 412 & 15.73 &  0.32 ~~&  *~~  ~& -0.15 ~~&  *~~  ~& 3.231 &  3.85 ~~&  0.65 ~~&     1.49 \\

 413 & 15.76 &  0.36 ~~&  *~~  ~&       ~~&       ~& 3.264 &  3.83 ~~&  0.64 ~~&     1.42 \\

 414 & 15.77 &  0.68 ~~&  *~~  ~&       ~~&       ~& 3.268 &  3.76 ~~&  0.68 ~~&     1.26 \\

 415 & 15.80 &  0.36 ~~&  *~~  ~&       ~~&       ~& 3.298 &  3.83 ~~&  0.63 ~~&     1.41 \\

 416 & 15.81 &  0.44 ~~&  *~~  ~&       ~~&       ~& 3.310 &  3.81 ~~&  0.63 ~~&     1.36 \\

 418 & 15.81 &  0.46 ~~&  *~~  ~&       ~~&       ~& 3.311 &  3.81 ~~&  0.63 ~~&     1.36 \\

 419 & 15.84 &  0.28 ~~&  *~~  ~&       ~~&       ~& 3.343 &  3.87 ~~&  0.60 ~~&     1.60 \\

 422 & 15.88 &  0.55 ~~&  *~~  ~&  0.03 ~~&  *~~  ~& 3.375 &  3.86 ~~&  0.59 ~~&     1.57 \\

 426 & 15.92 &  0.37 ~~&  *~~  ~&       ~~&       ~& 3.424 &  3.83 ~~&  0.58 ~~&     1.39 \\

 428 & 15.95 &  1.01 ~~&  *~~  ~&       ~~&       ~& 3.450 &  3.67 ~~&  0.72 ~~&     1.00 \\

 429 & 16.01 &  0.37 ~~&  *~~  ~&       ~~&       ~& 3.510 &  3.83 ~~&  0.54 ~~&     1.37 \\

 430 & 16.01 &  0.20 ~~&  *~~  ~&       ~~&       ~& 3.512 &  3.90 ~~&  0.54 ~~&     1.67 \\

 431 & 16.06 &  0.53 ~~&  *~~  ~&       ~~&       ~& 3.563 &  3.79 ~~&  0.54 ~~&     1.29 \\

 432 & 16.08 &  0.80 ~~&  *~~  ~&       ~~&       ~& 3.579 &  3.73 ~~&  0.58 ~~&     1.26 \\

 435 & 16.13 &  0.77 ~~&  *~~  ~&       ~~&       ~& 3.631 &  3.74 ~~&  0.56 ~~&     1.18 \\

 437 & 16.15 &  0.57 ~~&  *~~  ~&       ~~&       ~& 3.653 &  3.78 ~~&  0.51 ~~&     1.17 \\

 438 & 16.17 &  0.70 ~~&  *~~  ~&       ~~&       ~& 3.668 &  3.75 ~~&  0.52 ~~&     1.14 \\

 441 & 16.25 &  0.41 ~~&  *~~  ~&       ~~&       ~& 3.745 &  3.82 ~~&  0.45 ~~&     1.31 \\

 443 & 16.28 &  0.94 ~~&  *~~  ~&       ~~&       ~& 3.776 &  3.69 ~~&  0.56 ~~&     1.05 \\

 449 & 16.43 &  0.46 ~~&  *~~  ~&       ~~&       ~& 3.927 &  3.81 ~~&  0.39 ~~&     1.30 \\

 450 & 16.50 &  1.22 ~~&  *~~  ~&       ~~&       ~& 4.001 &  3.63 ~~&  0.57 ~~&     1.00 \\

 454 & 16.67 &  0.54 ~~&  *~~  ~&       ~~&       ~& 4.173 &  3.79 ~~&  0.30 ~~&     1.16 \\

 459 & 16.79 &  1.20 ~~&  *~~  ~&       ~~&       ~& 4.290 &  3.64 ~~&  0.45 ~~&     1.00 \\

 460 & 16.83 &  0.58 ~~&  *~~  ~&       ~~&       ~& 4.328 &  3.78 ~~&  0.24 ~~&     1.11 \\

 461 & 16.90 &  0.21 ~~&  *~~  ~&       ~~&       ~& 4.401 &  3.89 ~~&  0.19 ~~&     1.61 \\

 462 & 16.99 &  0.63 ~~&  *~~  ~&       ~~&       ~& 4.494 &  3.77 ~~&  0.18 ~~&     0.98 \\

 465 & 17.22 &  0.32 ~~&  *~~  ~&       ~~&       ~& 4.716 &  3.85 ~~&  0.05 ~~&     1.47 \\

