\documentstyle[12pt]{article}
\setlength{\topmargin}{-4.5cm}
\setlength{\parindent}{2cm}
\setlength{\textwidth}{18cm}
\setlength{\textheight}{29cm}
\setlength{\oddsidemargin}{-1.5cm}
\setlength{\evensidemargin}{\oddsidemargin}
\pagestyle{empty}
\begin{document}
\tabcolsep=0.105cm
\footnotesize
\begin{table}
\caption[]{Equivalent Widths in \AA}
\tiny
\begin{tabular}{lccccccccccccccccccc}
\noalign{\bigskip}
\hline
\noalign{\smallskip}                   
\multicolumn{20}{c}{ISIS/IR DATA}\\
\noalign{\smallskip} 
\noalign{\smallskip} 
~&\multicolumn{2}{c}{Br14+HeI}&\multicolumn{2}{c}{HeI}&\multicolumn{2}{c}{Br13}&\multicolumn{13}{l}{}\\
~&\multicolumn{2}{c}{1.5855-1.5915}&\multicolumn{2}{c}{1.6062-1.6090}&\multicolumn{2}{c}{1.6090-1.6140}&\multicolumn{13}{l}{}\\

BS2456       &  \multicolumn{2}{c}{0.6}         &      &      &       \multicolumn{2}{c}{0.8}&\multicolumn{13}{c}{}\\
O7&\multicolumn{19}{c}{}\\

BS1879       & \multicolumn{2}{c}{1.6}            &  \multicolumn{2}{c}{0.2}&          \multicolumn{2}{c}{1.4}&\multicolumn{13}{c}{}\\
O8&\multicolumn{19}{c}{}\\

BS1123       &  \multicolumn{2}{c}{1.7}            &  \multicolumn{2}{c}{0.4}&           \multicolumn{2}{c}{1.8}&\multicolumn{13}{c}{}\\
B0V&\multicolumn{19}{c}{}\\

BS5056        &   \multicolumn{2}{c}{1.7}          &    \multicolumn{2}{c}{1.0}&           \multicolumn{2}{c}{2.4}&\multicolumn{13}{c}{}\\
B1V&\multicolumn{19}{c}{}\\

BS4590       &    \multicolumn{2}{c}{2.1}          &    \multicolumn{2}{c}{0.8}&           \multicolumn{2}{c}{1.7}&\multicolumn{13}{c}{}\\
B1.5V&\multicolumn{19}{c}{}\\

BS4456        &   \multicolumn{2}{c}{3.0}             &   & & \multicolumn{2}{c}{3.7}        &\multicolumn{13}{c}{}\\
B4V&\multicolumn{19}{c}{}\\

BS1790       &    \multicolumn{2}{c}{2.6}        &      \multicolumn{2}{c}{0.7}&           \multicolumn{2}{c}{2.4}&\multicolumn{13}{c}{}\\
B2III&\multicolumn{19}{c}{}\\

BS4133       &    \multicolumn{2}{c}{1.7}       &       \multicolumn{2}{c}{0.7}&           \multicolumn{2}{c}{2.4}&\multicolumn{13}{c} {}\\
B1Ib&\multicolumn{19}{c}{}\\
\noalign{\smallskip} 
\noalign{\smallskip} 
~      &  CO  &   SiI &   FeI &   SiI &   FeI &   FeI &  SiI &  CO &    FeI  &   OH  &  SiI  &   SiI &   FeI &   CO &   CaI&  FeI &  FeI  &  FeI  &  NiI \\
~      & 1.58 &  +FeI &  1.58 &  1.59 &  \multicolumn{1}{c}{1.591}&  1.592& 1.60 & 1.60&   1.60  & 1.60  & +FeI  &  +FeI &  +CaI &  1.62&  1.62&  +OH & +1.629&  1.63 & +SiI \\
\noalign{\smallskip} 
BS788    & 2.2  &  1.6  &  0.7  &  3.1  &  0.7  &  0.7  & 2.3  & 0.5 &   1.5   & 0.7   & 1.0   & 3.6   & 1.6   & 1.8  & 1.5  & 1.6  & 0.8   & 0.9   & 1.1\\
F9V      &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS4983   & 1.8  &  1.3  &  0.6  &  2.8  &  0.6  &  0.6  & 1.9  & 0.4 &   1.4   & 0.9   & 0.9   & 3.0   & 1.4   & 1.5  & 1.5  & 1.1  & 0.8   & 1.3   & 1.4\\
G0V      &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS4550  & 1.6  &  0.5  &  0.2  &  1.6  &  0.3  &  0.4  & 1.2  & 0.4 &   0.5   & 0.6   & 0.4   & 1.5   & 0.6   & 0.7  & 0.8  & 0.4  & 0.4   & 0.8:  & 0.1:\\
G8V mp&   &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
HD112758 & 2.7  &  1.3  &  0.7  &  3.3  &  0.7  &  0.5  & 2.1  & 0.6 &   1.1   & 0.6   & 1.1   & 2.2   & 1.4   & 1.8  & 1.8  & 1.4  & 0.4   & 1.1   & 1.4\\
K0V      &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
HD93800  & 3.4  &  2.6  &  0.8  &  4.4  &  1.3  &  0.9  & 3.1  & 0.9 &   1.9   & 1.2   & 1.5   & 3.7   & 2.1   & 2.7  & 2.6  & 1.9  & 0.4   & 1.5   & 2.5\\
K0V SMR  &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
HD115404 & 3.3  &  2.2  &  0.9  &  4.0  &  0.9  &  0.9  & 3.0  & 1.0 &   1.8   & 1.1   & 1.6   & 3.1   & 1.9   & 2.4  & 2.1  & 1.6  & 0.3   & 1.1   & 1.6\\
K2V      &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
Gl382    & 3.0  &  1.6  &  0.6  &  2.5  &  0.6  &  0.9  & 1.8  & 0.8 &   1.5   & 1.6   & 1.5   & 2.8   & 2.3   & 2.1  & 2.3  & 2.3  & 0.7   & 1.7   & 1.8\\
M2V      &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS4883   & 1.3  &  1.1  &  0.6  &  2.2  &  0.6  &  0.6  & 1.7  & 0.5 &   0.8   & 0.6   & 0.5   & 2.0   & 0.9   & 1.1  & 1.2  & 1.1  & 0.7   & 1.0   & 0.7\\
G0III mp& &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS3903   & 2.6  &  1.7  &  0.7  &  3.6  &  0.9  &  0.7  & 2.4  & 0.7 &   1.9   & 1.2   & 1.3   & 4.3   & 1.9   & 2.2  & 2.1  & 1.9  & 1.2   & 1.8   & 1.9\\
G7III mp&      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS5020   & 2.8  &  2.1  &  0.7  &  3.7  &  0.8  &  0.6  & 2.1  & 0.5 &   1.8   & 1.1   & 1.3   & 3.8   & 1.6   & 2.0  & 1.7  & 1.5  & 0.8   & 1.3   & 1.7\\
G8III mp& &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS4695   & 2.7  &  1.9  &  0.4  &  3.5  &  0.9  &  0.5  & 1.4  & 1.2 &   1.6   & 0.8   & 1.4   & 2.4   & 1.5   & 2.3  & 2.0  & 2.0  & 0.8   & 2.1   & 2.2\\
K0III mp &&       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS5315   & 3.4  &  1.9  &  0.5  &  3.5  &  0.8  &  0.4  & 1.7  & 1.4 &   2.0   & 1.2   & 1.6   & 2.7   & 1.4   & 2.7  & 2.2  & 2.1  & 0.7   & 1.2   & 1.8\\
K3III mp &&       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
HD111180 & 6.3  &  3.6  &  1.1  &  4.6  &  1.2  &  0.9  & 2.6  & 3.0 &   3.4   & 1.6   & 2.4   & 2.9   & 1.6   & 4.4  & 3.4  & 3.4  & 0.3   & 1.0   & 1.3\\
K3III SMR&      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
HD109655   & 4.6  &  2.4  &  0.6  &  4.1  &  1.0  &  0.9  & 2.2  & 2.7 &   2.8   & 1.6   & 2.1   & 2.2   & 1.1   & 3.8  & 3.3  & 3.4  & 0.5   & 1.1   & 1.6\\
BS2731, K5III &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS4127   & 5.8  &  3.2  &  0.6  &  4.2  &  1.0  &  0.9  & 1.8  & 2.8 &   3.0   & 1.8   & 2.2   & 2.6   & 1.3   & 3.8  & 3.8  & 4.0  & 0.8   & 1.8   & 1.8\\
M1III    &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS4902   & 5.5  &  3.6  &  0.9  &  4.7  &  1.4  &  1.4  & 2.6  & 3.4 &   3.8   & 2.2   & 3.9   & 2.9   & 1.7   & 4.3  & 3.8  & 4.3  & 0.8   & 2.5   & 2.6\\
M3III    &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS3459   & 2.7  &  2.1  &  1.1  &  4.5  &  1.1  &  1.0  & 2.4  & 0.8 &   2.0   & 0.9   & 1.4   & 5.2   & 1.9   & 2.2  & 2.1  & 2.5  & 1.2   & 1.5   & 1.7\\
G1I mp&   &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS2764   & 7.4  &  4.5  &  1.0  &  4.9  &  1.4  &  1.1  & 2.7  & 3.8 &   4.7   & 2.1   & 2.8   & 4.1   & 2.0   & 5.0  & 4.5  & 5.1  & 1.8   & 2.7   & 2.4\\
K3I SMR  &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS1112   & 7.2  &  4.6  &  1.3  &  5.3  &  1.5  &  1.4  & 3.4  & 3.0 &   4.2   & 2.1   & 2.8   & 4.3   & 2.3   & 4.5  & 3.7  & 4.3  & 1.4   & 1.9   & 2.1\\
K4Ib     &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS3170   & 8.5  &  5.6  &  1.4  &  5.5  &  1.7  &  1.7  & 3.3  & 3.9 &   5.1   & 2.5   & 3.5   & 4.4   & 2.4   & 5.1  & 4.5  & 5.3  & 1.3   & 2.6   & 2.3\\
M1Ib     &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\
BS3364   & 9.4  &  5.8  &  1.3  &  5.6  &  1.6  &  1.7  & 2.8  & 4.2 &   5.6   & 2.8   & 3.9   & 4.3   & 2.2   & 5.3  & 5.0  & 5.8  & 1.5   & 2.8   & 2.5\\
M2I      &      &       &       &       &       &       &      &     &         &       &       &       &       &      &      &      &       &       &\\

\noalign{\smallskip} 
\noalign{\smallskip}                                                                                                                                       
\multicolumn{20}{c}{IRSPEC DATA}\\
\noalign{\smallskip} 
         &  CO  &   SiI &   FeI &   SiI &   FeI &   FeI &   SiI&   CO &    FeI &   OH  &  SiI  &   SiI &   FeI &   CO &  CaI &  FeI &  FeI  &  FeI  &  NiI\\
         & 1.58 &  +FeI &  1.58 &  1.59 &  \multicolumn{1}{c}{1.591}&  1.592&  1.60&  1.60&   1.60 &  1.60 & +FeI  &  +FeI &  +CaI &  1.62& 1.62 &  +OH & +1.629&  1.63 & +SiI\\
\noalign{\smallskip}                                                                                                                                                           
HD160691 &      &       &       &       &       &       &   2.4&  0.6 &   1.2  &  1.0  &  0.6  &  2.2  &  1.3  &  1.4 &   1.2&  0.5 &  0.2  &  1.1  &  2.0\\
G5V SMR  &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       & \\    
                                                                                                                                                         
HD93800  & 3.5  &  2.3  &  0.4  &  3.7  &  1.1  &  0.8  &   2.5&  0.9 &   1.6  &  1.4  &  1.0  &  2.7  &  1.6  &  1.9 &   1.9&  1.1 &  0.4  &  1.4  &  2.2\\
K0V SMR  &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       & \\    
                                                                                                                                                         
HD130871 & 3.2  &  2.1  &  0.4  &  3.3  &  0.8  &  0.6  &   2.0&  0.6 &   1.2  &  1.1  &  0.7  &  2.0  &  1.4  &  1.5 &   1.3&  0.8 &  0.3  &  1.4  &  2.1\\
K2V      &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       & \\    
                                                                                                                                                         
HD157881 & 4.0  &  2.1  &  0.4  &  3.5  &  0.9  &  0.6  &   2.0&  0.7 &   1.1  &  1.3  &  0.8  &  1.8  &  2.1  &  2.1 &   1.8&  1.1 &  0.2  &  1.5  &  2.3\\
K7V SMR  &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       & \\    
                                                                                                                                                         
Gl382    & 2.1  &  0.7  &  0.1  &  1.6  &  0.4  &  0.4  &   0.7&  0.4 &   0.5  &  0.9  &  1.0  &  1.2  &  1.9  &  1.4 &   1.6&  1.2 &  0.3  &  0.9  &  1.2\\
M2V      &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       &\\     
                                                                                                                                                         
BS5020   & 1.1  &  1.1  &  0.2  &  2.8  &  0.7  &  0.4  &   1.6&  0.6 &   1.1  &  0.9  &  0.6  &  2.6  &  1.2  &  1.6 &   1.4&  0.8 &  0.3  &  1.1  &  2.1\\ 
G8III    &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       &  \\   
                                                                                                                                                         
BS4695   & 2.1  &  1.3  &  0.3  &  3.0  &  0.7  &  0.3  &   1.0&  0.9 &   1.4  &  0.9  &  0.6  &  1.6  &  0.8  &  1.8 &   1.3&  1.1 &  0.3  &  0.9  &  1.6\\
K0III mp& &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       & \\    
                                                                                                                                                         
BS5824  & 3.1  &  2.0  &  0.4  &  3.5  &  1.0  &  0.7  &   2.1&  1.5 &   2.0  &  1.5  &  0.7  &  2.3  &  1.4  &  2.7 &   2.0&  1.6 &  0.5  &  1.1  &  1.9\\
BS6973, K3III mp& &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       & \\   

                                                                                                                                                         
HD175674 & 3.9  &  3.0  &  0.5  &  3.5  &  1.0  &  0.8  &   1.9&  1.5 &   2.0  &  0.9  &  1.0  &  1.8  &  1.1  &  2.6 &   1.1&      &       &       & \\    
K3III SMR&      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       & \\    
                                                                                                                                                         
BS4174   & 4.5  &  2.5  &  0.3  &  3.2  &  0.9  &  0.5  &   1.2&  1.9 &   2.3  &  1.6  &  1.8  &  1.7  &  1.0  &  2.7 &   2.9&  2.6 &  0.4  &  1.1  &  1.9\\
M0III    &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       &    \\ 
                                                                                                                                                         
BS4902   & 5.0  &  2.9  &  0.4  &  3.6  &  0.9  &  0.8  &   1.4&  2.6 &   2.9  &  1.3  &  2.0  &  1.4  &  1.6  &  4.0 &   4.0&  3.6 &  0.1  &  1.2  &  1.6\\
M3III    &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       &   \\  
                                                                                                                                                         
BS5645   & 5.7  &  3.8  &  0.5  &  3.8  &  1.0  &  0.7  &   1.6&  2.6 &   2.9  &  1.7  &  1.7  &  1.6  &  1.2  &  3.9 &   3.0&  2.7 &  0.4  &  1.2  &  2.0\\
K4I      &      &       &       &       &       &       &      &      &        &       &       &       &       &      &      &      &       &       &\\
\hline
\end{tabular}
\end{table}
\end{document}




