\documentstyle[12pt]{article}
\setlength{\topmargin}{-4.5cm}
\setlength{\parindent}{2cm}
\setlength{\textwidth}{18cm}
\setlength{\textheight}{29cm}
\setlength{\oddsidemargin}{-1.5cm}
\setlength{\evensidemargin}{\oddsidemargin}
\pagestyle{empty}
\begin{document}
\tabcolsep=0.105cm
\footnotesize
\begin{table}
\caption[]{Line identification}
\tiny
\begin{tabular}{llll}
\noalign{\bigskip}
\noalign{\bigskip}
\hline
\noalign{\smallskip}
ident. &$\lambda$&reference &integration \\
       &         &name&bounds\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}                   
HI 4-15      &1.5701     &        &\\             
MgI          &1.5750     &        &  \\           
\multicolumn{3}{l}~--------------------------------------------- &1.5755\\
OH(3,1)P(7)  &1.5760     &        &  \\           
MgI          &1.5770     &        &\\           
FeI          &1.5778     &CO 1.58 &\\           
CO(4,1)      &1.5780     &        &\\           
FeI          &1.5793    &        &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.5805\\           
FeI          &1.5817     &        &\\           
FeI          &1.5820     &        &\\           
SiI          &1.5838     &SiI+FeI &\\           
FeI          &1.5840     &        &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.5854\\           
FeI          &1.5868     &        &\\           
FeI          &1.5870     &FeI     &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.5872\\           
HI 4-14      &1.5881     &        &             \\           
SiI          &1.5892     &SiI 1.59&     \\           
\multicolumn{3}{l}~--------------------------------------------- &1.5903\\           
FeI          &1.5909     &FeI 1.591&\\           
\multicolumn{3}{l}~--------------------------------------------- &1.5914\\           
FeI          &1.5916     &        &\\           
FeI          &1.5925     &FeI 1.592&\\           
\multicolumn{3}{l}~--------------------------------------------- &1.5934\\
FeI          &1.5938     &        &              \\           
SiI          &1.5964     &SiI 1.60&                      \\           
\multicolumn{3}{l}~--------------------------------------------- &1.5973\\           
CO(5,2)      &1.598      &CO 1.60 &\\           
FeI          &1.5985     &        &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.5996\\           
FeI          &1.6013     &FeI 1.60&               \\           
\multicolumn{3}{l}~--------------------------------------------- &1.6030\\           
OH(3,1)P(9)  &1.604      &OH 1.60 &\\           
FeI          &1.6046     &        &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6058\\           
SiI          &1.6064     &        &\\           
FeI          &1.6074     &SiI+FeI &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6085\\           
SiI          &1.6099     &        &\\           
FeI          &1.6107     &        &\\           
HI 4-13      &1.6109     &SiI+FeI &             \\             
FeI          &1.6130     &        &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6143\\           
CaI          &1.6155     &        &              \\           
FeI          &1.6158     &FeI+CaI &\\  
\multicolumn{3}{l}~--------------------------------------------- &1.6171\\           
FeI          &1.6184     &        &              \\           
CO(6,3)      &1.6187     &CO 1.62 &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6190\\           
CaI+FeI      &1.6201     &CaI 1.62&\\           
SiI+FeI      &1.6220     &        &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6225\\           
FeI          &1.6236     &        &\\           
SiI          &1.6246     &FeI+OH  &\\           
OH(2,0)P(15) &1.626      &        &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6266\\           
FeI          &1.6289     &FeI 1.629&\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6296\\           
FeI          &1.6325     &        &\\           
FeI          &1.6329     &FeI 1.63&\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6343\\           
NiI          &1.6368     &        &\\           
SiI          &1.6385     &NiI+SiI &\\           
\multicolumn{3}{l}~--------------------------------------------- &1.6387\\           
FeI          &1.6402     &        &\\           
CO(7,4)      &1.640      &CO 1.64 &             \\           
HI 4-12      &1.6407     &        &              \\           
\multicolumn{3}{l}~--------------------------------------------- &1.6424\\           
\end{tabular}
\end{table}
\end{document}




