Table 3. Infrared photometry of ABCG 539 galaxies.

Galaxy Obs.date Ap. J H K (") A539-16 24/1/89 23.2 12.07 11.39 10.97 19.8 12.12 11.36 11.01 12.4 12.46 11.82

A539-17 25/1/88 23.2 12.77 11.80 11.27

A539-25 25/1/88 23.2 12.54 11.88 11.49

A539-31 25/1/88 23.2 12.57 11.91 11.67

A539-38 25/1/88 23.2 12.31 11.67 11.27

A539-47 25/1/88 23.2 12.23 11.37 11.03

A539-63 23/1/89 23.2 12.46 11.69 11.32 19.8 12.45 11.75 11.47 12.4 12.59 11.88 11.51

A539-68 24/1/89 23.2 11.76 10.97 10.60 19.8 11.85 11.07 10.70 12.4 12.13 11.39 11.04

A539-78 20/1/89 23.2 13.65 13.08: 12.27: 19.8 13.64 12.87: 12.42: 12.4 13.45 12.85 12.92:

A539-82 22/1/89 23.2 13.37 12.57 12.21 19.8 13.34 12.61 12.42 12.4 13.98 12.89 12.66

A539-83 22/1/89 19.8 13.66 12.83 12.41 12.4 14.17 13.35 13.42

A539-85 23/1/89 23.2 12.24 11.62 11.35 19.8 12.31 11.82 11.60 12.4 12.63 12.06 11.95