Name α1950 Δα δ1950 Δδ S608 ΔS Res ψ Δψ ϕ Δϕ χ R Speak/N Atten Weight

h m s s o^{0 00 00} mJy^{00 00} o o^{00}

75W0009 6 33 42.57 0.14 45 48 22.7 1.5 134. 10. R 20 8 111 5 1.29 23.3 7.33 1.00 75W0010 6 33 50.63 0.19 45 25 17.1 2.4 33.3 4.0 U 0.98 9.66 5.78 1.00 75W0011 6 33 51.47 0.18 45 3 46.7 2.2 48.0 5.5 U 0.94 10.5 7.98 1.00 75W0015 6 33 57.95 0.18 45 28 32.9 2.3 32.9 3.8 U 1.00 10.2 5.29 1.00 75W0017 6 34 6.99 0.23 44 55 48.4 3.2 34.9 5.5 U 0.99 6.91 8.59 1.00 75W0019 6 34 9.36 0.29 45 25 7.5 4.1 14.7 2.9 U 1.00 5.27 4.76 1.22 75W0025 6 34 41.57 0.12 45 17 17.9 1.0 143. 9. R 10 4 21 21 1.01 61.7 3.76 1.00 75W0035 6 35 29.93 0.12 45 45 25.7 1.1 49.9 3.2 U 0.96 31.9 2.66 1.00 75W0037 6 35 33.02 0.27 44 59 9.2 3.8 6.0 1.1 U 0.49 5.80 3.57 1.35 75W0038 6 35 34.71 0.14 45 36 6.6 1.6 25.0 2.0 U 1.03 16.8 2.35 1.00 75W0040 6 35 39.78 0.26 44 46 56.0 3.7 21.5 3.4 U 1.13 6.76 5.17 1.05 75W0041 6 35 39.92 0.17 46 23 43.1 2.0 52.8 5.7 U 0.86 11.7 8.65 1.00 75W0042 6 35 41.83 0.14 46 13 52.0 1.4 64.8 5.2 U 1.04 19.1 5.31 1.00 75W0048 6 35 58.90 0.12 46 24 44.2 1.0 313. 21. U 0.96 67.5 7.95 1.00 75W0051 6 36 10.74 0.12 45 22 58.3 1.0 74.8 4.2 R 11 4 131 36 6 1.06 60.9 1.88 1.00 75W0054 6 36 14.86 0.19 45 0 31.5 2.5 12.0 1.5 U 0.84 9.10 2.61 1.26 75W0056 6 36 23.04 0.37 45 50 9.5 5.1 17.4 2.5 R 26 13 79 12 23 1.87 7.73 2.05 1.59 75W0060 6 36 29.10 0.26 44 45 23.9 3.7 13.8 2.5 U 0.99 5.94 3.97 1.26 75W0061 6 36 30.17 0.13 45 56 40.2 1.2 37.7 2.5 U 1.02 26.6 2.25 1.00 75W0065 6 36 48.79 0.20 45 59 57.1 2.6 18.6 2.0 U 1.26 10.7 2.23 1.25 75W0067 6 36 55.12 0.17 45 31 5.1 2.1 9.4 1.0 U 0.91 11.4 1.47 1.53 75W0070 6 37 2.24 0.28 45 41 29.9 3.9 5.1 0.9 U 1.02 5.68 1.51 2.77 75W0071 6 37 4.88 0.30 45 10 47.1 4.2 5.5 1.0 U 1.07 5.59 1.64 2.56 75W0075 6 37 12.50 0.19 44 48 52.0 2.4 16.2 1.9 U 1.00 9.55 2.78 1.19 75W0076 6 37 12.63 0.17 45 45 26.7 2.0 20.5 1.7 R 19 10 107 18 18 1.38 15.9 1.51 1.25 75W0077 6 37 13.81 0.12 45 26 49.6 1.1 34.6 2.0 R 13 6 82 6 1.10 37.2 1.36 1.00 75W0079 6 37 21.71 0.25 46 32 15.6 3.3 37.1 5.5 U 1.14 7.53 7.67 1.00 75W0080 6 37 23.80 0.28 46 20 39.9 3.7 8.1 1.5 U 0.60 5.70 4.03 1.28 75W0088 6 37 34.65 0.20 44 42 19.4 2.6 55.1 4.8 R 35 10 38 7 1.77 15.5 3.29 1.00 75W0090 6 37 39.31 0.28 45 1 42.2 3.9 5.5 1.0 U 0.97 5.57 1.71 2.44 75W0091 6 37 40.77 0.19 44 44 35.4 2.5 13.1 1.6 U 0.81 9.22 2.93 1.18 75W0093 6 37 44.71 0.25 45 40 2.2 3.4 4.2 0.7 U 0.86 6.44 1.27 2.94 75W0094 6 37 46.80 0.13 44 29 44.2 1.3 105. 8. U 1.09 26.7 5.91 1.00 75W0097 6 37 59.46 0.12 45 12 55.7 1.0 53.0 2.9 U 0.98 66.7 1.31 1.00 75W0098 6 38 1.73 0.12 46 9 40.2 0.9 368. 20. R 9 1 15 16 1.01 262. 2.26 1.00 75W0099 6 38 5.10 0.11 45 29 28.4 0.9 106. 5. R 13 2 97 9 6 1.12 134. 1.15 1.00 75W0102 6 38 13.92 0.12 44 36 15.8 1.1 239. 15. R 36 5 25 18 4 1.68 61.1 3.81 1.00 75W0103 6 38 21.64 0.16 44 56 13.3 1.8 13.3 1.2 U 0.93 13.3 1.74 1.27 75W0106 6 38 25.71 0.12 44 44 11.0 1.1 121. 7. R 25 4 90 5 9 1.52 49.6 2.60 1.00 75W0108 6 38 29.56 0.14 45 33 55.3 1.6 13.9 1.0 U 1.11 18.4 1.09 1.37 75W0109 6 38 31.04 0.14 45 17 38.4 1.4 24.4 1.6 R 25 8 37 19 6 1.36 25.3 1.15 1.14 75W0111 6 38 40.89 0.15 44 30 57.4 1.7 54.2 4.6 U 1.13 16.6 4.71 1.00 75W0112 6 38 41.21 0.12 45 14 0.8 1.0 40.1 2.2 R 12 4 21 22 1.03 53.3 1.17 1.00 75W0113 6 38 45.16 0.27 45 58 44.4 3.6 3.4 0.6 U 0.66 5.94 1.49 2.67 75W0114* 6 38 45.52 0.35 45 26 7.8 4.7 51.4 3.0 E 370 15 91 5 44 2.30 33.9 1.06 1.04 75W0114A 6 38 27.36 0.98 45 26 15.0 14.4 9.2 2.0 R 40 13 68 23 44 3.24 4.76 1.10 7.78 75W0114B 6 38 43.86 0.27 45 26 54.4 3.7 5.5 0.8 U 1.23 7.19 1.06 3.25 75W0114C 6 38 46.40 0.13 45 25 56.2 1.2 27.7 1.6 R 17 6 93 6 11 1.24 33.9 1.06 1.04 75W0114D 6 39 2.54 0.42 45 26 7.6 6.1 8.9 1.3 R 30 13 77 14 21 2.05 7.15 1.03 3.41 75W0115 6 38 45.68 0.25 44 30 24.9 3.5 16.2 2.7 U 0.90 6.40 4.81 1.11 75W0116 6 38 45.75 0.27 45 17 47.4 3.7 3.1 0.6 U 0.81 5.85 1.11 4.25 75W0117 6 38 46.46 0.16 44 9 58.9 1.9 50.3 4.9 U 1.07 13.7 6.66 1.00 75W0118 6 38 46.58 0.18 44 0 57.0 2.4 30.7 3.6 U 0.94 9.94 6.37 1.00 75W0122* 6 38 56.15 0.35 44 44 10.4 5.0 32.4 4.0 E 96 3 45 5 2.18 9.68 2.45 1.24 75W0122A 6 38 55.68 0.18 44 43 25.0 2.4 13.2 1.6 U 0.89 9.68 2.53 1.24 75W0122B 6 38 56.29 0.44 44 45 14.7 6.4 7.2 1.7 U 1.32 4.42 2.35 2.23 75W0122C 6 38 56.52 0.36 44 44 15.3 5.2 11.9 2.1 U 1.45 5.99 2.44 1.68 75W0127 6 39 4.73 0.13 44 1 45.9 1.3 52.7 4.0 U 0.88 22.2 5.22 1.00 75W0129 6 39 5.35 0.25 44 22 29.8 3.6 23.7 3.2 U 1.40 7.78 6.53 2.03 75W0130 6 39 5.94 0.18 43 26 35.8 2.4 52.0 6.1 U 1.07 10.3 9.09 1.00 75W0134 6 39 16.71 0.26 44 17 3.9 3.7 15.8 2.8 U 1.01 6.04 5.25 1.10 75W0135 6 39 20.26 0.30 45 4 21.5 4.3 2.3 0.5 U 0.58 5.08 1.31 4.10 75W0137 6 39 22.36 0.28 45 22 42.7 3.9 2.5 0.5 U 0.74 5.52 1.03 5.88 75W0138 6 39 24.02 0.18 44 46 34.8 2.3 23.5 2.2 R 19 11 106 17 7 1.32 13.3 2.17 1.14 75W0141 6 39 29.29 0.30 44 51 19.7 4.3 7.2 1.2 U 1.21 6.05 1.83 2.10 75W0142 6 39 35.33 0.12 43 22 30.0 1.2 160. 11. R 16 6 55 10 1.16 34.8 7.68 1.00 75W0144 6 39 40.76 0.11 43 28 17.3 0.9 243. 15. U 0.98 80.2 5.95 1.00 75W0145* 6 39 43.98 0.19 45 16 25.4 2.4 19.3 1.4 E 72 4 42 5 3 1.66 17.4 1.07 1.43 75W0145A 6 39 40.69 0.29 45 15 47.1 4.1 5.6 0.9 U 1.29 6.89 1.08 3.37 75W0145B 6 39 45.33 0.15 45 16 41.1 1.7 13.7 1.0 U 1.18 17.4 1.07 1.43 75W0147 6 39 45.45 0.25 44 23 22.8 3.6 14.7 2.4 U 1.07 6.53 4.47 1.14 75W0151 6 39 54.57 0.12 43 56 42.8 1.3 40.1 2.8 U 0.98 24.3 3.26 1.00 75W0152 6 39 55.58 0.13 45 57 10.2 1.3 19.4 1.3 U 1.01 22.9 1.36 1.11 75W0154 6 40 0.07 0.11 44 54 11.0 0.9 478. 25. R 14 1 51 9 1.10 423. 1.67 1.00 75W0159 6 40 10.29 0.14 45 0 29.6 1.5 18.7 1.4 U 1.11 19.2 1.41 1.18 75W0160 6 40 11.91 0.14 43 59 12.8 1.6 37.7 2.8 R 22 9 149 17 6 1.27 20.5 2.81 1.00 75W0161 6 40 16.06 0.25 43 56 43.9 3.6 17.0 2.2 U 1.41 8.82 2.73 1.25 75W0162 6 40 18.29 0.15 43 34 39.2 1.9 27.4 2.5 U 1.06 13.9 3.59 1.00 75W0163 6 40 21.21 0.26 46 12 47.2 3.5 16.0 2.0 U 1.41 8.76 2.18 1.41 75W0166 6 40 22.78 0.11 45 13 41.8 0.9 162. 8. R 8 1 16 17 1.01 231. 1.12 1.00 75W0168 6 40 25.96 0.20 44 6 11.9 2.7 10.1 1.3 U 0.90 8.54 2.56 1.31 75W0169 6 40 27.41 0.11 45 15 41.2 0.9 73.3 3.8 U 1.00 107. 1.10 1.00 75W0170 6 40 28.87 0.18 45 4 27.6 2.4 7.0 0.8 U 0.88 9.72 1.31 1.86 75W0172 6 40 30.58 0.18 46 25 13.4 2.1 58.1 4.9 R 27 10 141 20 8 1.50 16.6 3.80 1.00 75W0175 6 40 37.26 0.11 43 21 41.6 1.0 151. 9. R 18 4 171 11 1.10 58.7 4.55 1.00 75W0176 6 40 38.04 0.30 44 2 57.5 4.3 4.0 0.8 U 0.68 5.08 2.32 1.99 75W0180 6 40 42.27 0.19 45 54 4.7 2.3 7.4 0.9 U 0.95 9.63 1.31 1.88 75W0183 6 40 46.67 0.23 44 45 32.1 3.2 17.0 2.1 U 1.32 9.24 2.33 1.32 75W0185 6 40 48.18 0.13 45 8 29.7 1.3 30.5 1.9 R 22 7 62 5 1.32 30.0 1.24 1.03 75W0186 6 40 48.34 0.12 44 57 51.6 1.2 31.1 1.9 U 1.05 30.5 1.57 1.00 75W0188 6 40 52.33 0.12 46 34 23.0 1.1 153. 11. R 13 6 142 26 5 1.08 35.0 6.63 1.00 75W0189 6 40 54.74 0.12 45 33 50.4 1.0 30.3 1.7 U 1.01 45.5 1.06 1.00 75W0190 6 40 56.02 0.12 45 35 33.4 1.1 21.6 1.3 U 1.03 31.5 1.07 1.07 75W0191 6 40 56.19 0.25 44 53 40.8 3.5 7.2 1.1 U 1.06 6.67 1.79 1.97 75W0192 6 40 56.37 0.13 44 17 9.8 1.4 29.1 2.1 U 1.09 22.3 2.31 1.00 75W0193 6 40 58.62 0.13 46 0 49.2 1.2 42.1 2.5 R 19 6 108 18 11 1.29 33.8 1.57 1.00 75W0194 6 40 59.46 0.12 43 51 37.5 1.1 31.7 2.0 U 0.97 30.7 2.07 1.00 75W0198 6 41 4.37 0.29 45 33 43.0 4.1 8.3 1.1 R 26 13 119 21 1.56 8.30 1.07 2.64 75W0199 6 41 6.04 0.12 46 2 22.9 1.1 28.9 1.8 U 0.94 29.9 1.66 1.00 75W0202* 6 41 7.80 0.15 43 31 8.9 1.7 90.6 5.9 E 46 3 10 5 9 2.10 30.9 2.74 1.00

Name α1950 Δα δ1950 Δδ S608 ΔS Res ψ Δψ ϕ Δϕ χ R Speak/N Atten Weight

h m s s o^{0 00 00} mJy^{00 00} o o^{00}

75W0202A 6 41 7.38 0.12 43 30 43.6 1.2 40.9 2.8 U 1.04 27.4 2.78 1.00 75W0202B 6 41 8.15 0.12 43 31 29.7 1.2 49.7 3.2 R 14 7 78 13 9 1.15 30.9 2.71 1.00 75W0204 6 41 9.30 0.41 44 50 60.0 5.9 8.3 1.6 U 1.47 5.34 1.99 2.19 75W0205 6 41 9.98 0.22 46 26 49.3 2.8 35.4 4.1 U 1.29 10.2 4.41 1.00 75W0206 6 41 10.37 0.12 45 11 14.9 1.0 40.4 2.2 U 0.94 56.0 1.24 1.00 75W0213 6 41 20.80 0.17 45 22 8.4 2.1 9.4 0.9 U 1.09 12.2 1.13 1.75 75W0215 6 41 22.78 0.15 44 16 48.4 1.7 28.5 2.1 R 24 9 47 16 8 1.40 20.1 1.96 1.00 75W0216 6 41 26.26 0.18 44 36 15.0 2.5 10.6 1.3 U 0.96 8.74 3.00 2.79 75W0217 6 41 29.10 0.08 44 59 52.4 0.7 106. 5. R 14 2 157 7 2 1.08 104. 1.61 2.00 75W0218 6 41 30.73 0.39 46 0 7.4 5.5 7.4 1.4 U 1.47 5.67 1.65 2.50 75W0219 6 41 31.47 0.11 45 8 26.1 0.9 128. 7. R 18 2 55 24 8 1.18 129. 1.36 1.00 75W0221 6 41 35.70 0.30 45 44 56.7 4.1 8.9 1.2 U 1.52 7.92 1.25 2.34 75W0225 6 41 44.32 0.12 46 35 6.8 0.9 434. 29. U 0.97 92.1 7.96 1.00 75W0226 6 41 47.15 0.08 44 26 31.0 0.6 337. 14. U 1.00 324. 2.06 2.00 75W0230 6 41 53.81 0.22 44 2 26.7 3.1 5.5 0.8 U 1.01 7.29 1.49 2.14 75W0233 6 42 4.06 0.12 44 46 9.5 1.4 26.9 1.8 U 0.96 19.2 3.55 2.05 75W0234 6 42 4.46 0.20 43 37 19.1 2.8 6.0 0.8 U 0.82 8.19 1.76 1.70 75W0236* 6 42 6.78 0.25 43 16 13.5 3.7 30.6 3.4 E 42 3 170 5 1.74 10.5 3.21 1.07 75W0236A 6 42 6.44 0.18 43 16 34.6 2.5 15.2 1.8 U 1.00 9.33 3.17 1.13 75W0236B 6 42 7.10 0.17 43 15 52.7 2.3 15.4 1.7 U 0.88 10.5 3.25 1.07 75W0240 6 42 17.80 0.12 45 51 0.2 0.9 78.4 4.2 R 14 3 36 13 1 1.05 77.3 1.57 1.00 75W0243 6 42 19.60 0.23 46 20 29.9 3.0 16.5 2.5 U 0.95 7.27 4.01 1.14 75W0244 6 42 21.60 0.24 45 28 34.6 3.3 5.1 0.8 U 0.96 6.70 1.32 2.66 75W0245 6 42 24.70 0.12 43 38 54.3 1.2 22.8 1.4 U 1.00 28.2 1.57 1.00 75W0246 6 42 25.21 0.31 46 3 44.1 4.2 12.9 1.9 U 1.44 7.31 2.17 1.59 75W0247 6 42 26.02 0.14 45 59 25.7 1.5 19.9 1.6 U 0.95 17.4 1.94 1.07 75W0248 6 42 26.29 0.14 43 28 6.6 1.7 14.4 1.2 U 0.93 15.0 1.99 1.13 75W0251 6 42 31.86 0.16 46 7 27.1 1.9 18.1 1.8 U 0.94 12.5 2.51 1.11 75W0252 6 42 33.57 0.08 44 44 12.4 0.7 64.8 2.9 U 1.01 52.8 2.89 2.00 75W0253 6 42 35.50 0.12 43 58 3.3 1.2 22.1 1.3 R 13 7 142 10 1.07 31.7 1.26 1.00 75W0254 6 42 35.70 0.12 43 50 45.2 1.2 21.2 1.3 R 14 7 148 19 5 1.09 28.8 1.30 1.03 75W0256 6 42 37.36 0.25 46 11 51.6 3.3 12.2 1.9 U 1.03 6.81 3.00 1.36 75W0257* 6 42 38.82 0.18 43 24 25.2 2.4 44.1 3.3 E 50 3 165 5 11 2.02 19.9 2.11 1.00 75W0257A 6 42 38.22 0.16 43 24 50.1 2.1 21.6 1.8 R 21 11 38 30 11 1.30 15.4 2.09 1.09 75W0257B 6 42 39.40 0.13 43 24 1.3 1.4 22.5 1.7 U 1.03 19.9 2.13 1.00 75W0258 6 42 39.51 0.13 43 42 47.2 1.4 14.5 1.0 U 0.97 20.7 1.40 1.14 75W0262 6 42 47.46 0.12 43 52 44.2 1.2 16.8 1.1 U 1.00 26.5 1.23 1.08 75W0264 6 42 50.42 0.21 43 36 1.9 2.9 4.5 0.6 U 0.76 7.81 1.51 1.99 75W0266 6 42 51.13 0.24 45 57 3.0 3.2 16.6 2.0 R 21 13 74 10 1.40 9.55 2.04 1.40 75W0268 6 42 52.82 0.11 44 2 18.0 0.9 99.2 5.1 R 10 1 85 7 4 1.06 152. 1.19 1.00 75W0269 6 42 53.03 0.08 44 54 31.3 0.6 753. 31. R 7 0 25 27 1.00 584. 2.56 2.00 75W0270 6 42 54.68 0.14 44 19 14.2 1.5 14.5 1.1 U 1.09 18.8 1.37 1.21 75W0272 6 42 57.10 0.17 45 24 57.6 2.1 9.7 1.0 U 0.90 11.2 1.55 1.49 75W0273 6 42 58.34 0.21 44 39 53.5 2.9 19.5 2.0 R 31 12 171 10 1.46 11.4 2.26 1.21 75W0275 6 42 59.56 0.14 45 32 51.5 1.5 22.7 1.6 R 15 9 61 10 1.15 20.5 1.56 1.09 75W0280 6 43 7.91 0.29 45 53 30.5 3.9 5.5 1.1 U 0.83 5.44 2.05 2.09 75W0281 6 43 8.05 0.21 44 17 57.9 2.9 4.5 0.6 U 0.87 7.92 1.29 2.27 75W0279 6 43 8.15 0.33 43 0 2.3 5.1 40.3 5.6 R 27 13 94 6 14 1.83 8.05 5.50 1.00 75W0283 6 43 10.67 0.11 44 42 28.9 1.3 43.7 2.5 R 26 8 106 5 1.53 27.3 2.40 2.00 75W0284 6 43 10.96 0.23 45 37 27.8 3.1 7.3 1.1 U 1.02 7.14 1.68 1.96 75W0287 6 43 15.02 0.08 44 30 14.5 0.7 111. 5. U 0.99 132. 1.62 2.00 75W0288* 6 43 15.33 0.14 43 50 13.6 1.6 25.2 1.6 E 62 3 84 5 5 1.57 26.6 1.16 1.11 75W0288A 6 43 13.55 0.12 43 50 11.7 1.3 17.3 1.1 U 1.08 26.6 1.17 1.11 75W0288B 6 43 19.29 0.21 43 50 18.1 2.9 7.8 0.9 U 1.28 10.2 1.15 1.99 75W0290 6 43 15.79 0.36 43 39 2.8 5.5 4.2 0.8 U 1.33 5.34 1.33 3.62 75W0289 6 43 15.80 0.23 46 9 7.8 3.1 14.3 2.1 U 1.01 7.21 3.30 1.25 75W0292 6 43 17.94 0.15 45 53 57.7 1.7 19.1 1.7 U 0.98 14.5 2.18 1.10 75W0293 6 43 18.03 0.12 46 3 31.4 0.9 407. 23. U 1.00 239. 2.78 1.00 75W0294 6 43 20.76 0.26 44 3 54.8 3.7 5.4 0.8 U 1.31 7.74 1.11 2.76 75W0296 6 43 25.12 0.26 45 59 4.6 3.6 13.8 2.0 U 1.25 7.62 2.56 1.40 75W0298 6 43 27.56 0.29 43 22 6.9 4.3 5.4 1.0 U 1.07 5.50 1.97 2.15 75W0299 6 43 29.23 0.25 46 1 0.6 3.4 9.8 1.6 U 0.94 6.33 2.76 1.49 75W0302* 6 43 30.31 0.27 44 45 41.2 3.9 15.3 1.9 E 86 5 26 5 1.80 6.97 2.58 1.45 75W0302A 6 43 27.94 0.28 44 44 48.3 4.0 4.9 0.9 U 0.73 5.46 2.51 1.76 75W0302B 6 43 31.44 0.27 44 46 6.3 3.8 10.4 1.6 U 1.22 6.97 2.62 1.45 75W0301* 6 43 31.25 0.18 43 42 48.4 2.5 13.5 1.0 E 36 3 48 5 1.84 11.6 1.21 1.71 75W0301A 6 43 29.97 0.16 43 42 35.9 2.1 6.5 0.7 U 0.89 11.6 1.22 1.71 75W0301B 6 43 32.46 0.20 43 43 0.2 2.8 7.0 0.8 U 1.15 9.59 1.21 2.02 75W0303 6 43 32.94 0.12 44 13 22.1 1.1 17.7 1.1 U 0.97 30.4 1.15 1.05 75W0304 6 43 35.78 0.11 44 24 44.0 0.9 132. 7. U 0.99 187. 1.37 1.00 75W0306 6 43 37.69 0.28 45 9 24.0 3.9 13.7 2.6 U 0.68 5.52 7.54 1.00 75W0307 6 43 38.69 0.28 46 22 18.5 3.7 34.6 5.2 U 1.27 7.28 6.73 1.00 75W0308 6 43 39.04 0.09 45 52 19.0 0.8 124. 6. R 14 3 106 8 2 1.12 80.5 2.38 2.00 75W0309* 6 43 39.26 0.09 45 35 5.0 0.8 154. 5. E 75 1 11 5 1.99 66.2 1.94 2.00 75W0309A 6 43 38.61 0.09 45 34 30.1 0.8 81.2 3.7 U 1.05 66.2 1.93 2.00 75W0309B 6 43 39.98 0.09 45 35 43.9 0.8 73.0 3.3 U 1.02 62.2 1.96 2.00 75W0310 6 43 39.73 0.11 43 22 12.7 1.0 48.9 2.8 U 1.00 49.7 1.91 1.00 75W0315 6 43 43.35 0.23 43 24 35.5 3.3 6.4 1.0 U 1.06 7.19 1.76 1.87 75W0317 6 43 44.16 0.08 45 51 47.2 0.7 105. 5. R 11 4 3 5 7 1.08 70.1 2.43 2.00 75W0318 6 43 44.75 0.16 45 32 58.6 2.1 13.9 1.4 U 1.07 11.7 1.99 2.56 75W0320 6 43 47.31 0.17 44 8 46.9 2.1 5.5 0.6 U 0.89 11.1 1.08 1.96 75W0322 6 43 49.38 0.20 43 44 54.8 2.8 6.9 0.8 U 1.20 9.84 1.14 2.08 75W0326 6 43 57.66 0.24 43 50 21.9 3.4 2.8 0.5 U 0.82 6.52 1.07 3.74 75W0327 6 43 59.28 0.27 42 56 19.8 4.0 16.3 3.1 U 0.96 5.60 6.09 1.06 75W0331 6 44 1.49 0.23 43 58 27.8 3.2 3.5 0.5 U 0.95 7.03 1.03 3.53 75W0333 6 44 4.55 0.35 44 12 39.3 5.2 4.8 0.8 U 1.49 6.32 1.09 3.83 75W0338 6 44 9.28 0.21 44 7 55.1 3.0 4.0 0.6 U 0.99 7.64 1.04 3.04 75W0339 6 44 9.69 0.08 45 28 30.7 0.7 125. 5. R 10 2 91 10 1.04 99.0 2.34 2.00 75W0343 6 44 12.90 0.16 44 22 54.7 2.0 7.6 0.8 U 0.98 12.0 1.25 1.65 75W0342* 6 44 13.55 0.83 43 16 21.5 13.2 30.6 5.4 E 82 3 2 5 35 4.51 7.32 2.23 1.56 75W0342A 6 44 13.44 0.26 43 15 45.6 3.8 5.9 1.1 U 0.88 5.90 2.28 1.78 75W0342B 6 44 13.57 0.69 43 16 28.7 10.9 24.7 3.6 R 50 13 62 29 35 3.64 7.32 2.22 1.56 75W0346 6 44 16.82 0.08 45 15 8.9 0.8 60.2 2.8 U 0.97 46.9 2.70 2.00 75W0349 6 44 25.44 0.07 45 10 21.4 0.8 61.7 2.7 U 0.93 47.1 3.10 3.00 75W0350 6 44 26.14 0.11 43 13 7.0 1.0 88.2 5.1 R 10 3 159 22 1.02 66.8 2.51 1.00 75W0351 6 44 26.79 0.31 44 25 0.2 4.6 3.5 0.7 U 1.13 5.45 1.29 3.70 75W0352 6 44 29.03 0.15 45 40 31.4 1.9 19.8 1.7 U 0.83 14.0 3.85 2.27 75W0355 6 44 29.98 0.24 43 2 28.5 3.5 11.1 1.9 U 0.84 6.40 4.14 1.19 75W0357 6 44 35.62 0.42 44 55 5.9 6.2 13.7 2.7 U 1.55 5.39 3.64 1.39 75W0361 6 44 41.98 0.15 44 17 5.8 1.8 9.9 0.8 U 1.13 15.1 1.12 1.52

Name α1950 Δα δ1950 Δδ S608 ΔS Res ψ Δψ ϕ Δϕ χ R Speak/N Atten Weight

h m s s o^{0 00 00} mJy^{00 00} o o^{00}

75W0362 6 44 42.11 0.31 45 35 23.7 4.3 4.7 1.0 U 0.53 5.04 3.01 1.64 75W0368 6 44 51.10 0.41 45 46 5.6 5.8 11.2 2.2 U 1.43 5.22 3.41 1.47 75W0369 6 44 52.54 0.30 45 37 49.8 4.2 5.8 1.2 U 0.58 5.15 3.33 1.51 75W0372 6 44 55.47 0.11 43 43 4.6 1.0 36.7 1.9 U 0.98 64.8 1.12 1.00 75W0373 6 44 58.72 0.20 44 16 39.2 2.7 4.4 0.6 U 0.90 8.50 1.12 2.45 75W0378 6 45 6.20 0.12 43 58 20.2 1.1 16.4 0.9 U 0.91 34.9 1.01 1.05 75W0383 6 45 13.21 0.35 44 49 21.7 5.1 12.7 2.1 U 1.52 6.43 2.80 1.46 75W0384 6 45 14.29 0.13 43 9 33.7 1.5 33.1 2.5 U 1.11 19.7 2.94 1.00 75W0385 6 45 17.03 0.30 45 13 0.3 4.3 8.1 1.5 U 1.13 5.73 2.83 1.56 75W0388 6 45 18.80 0.12 43 23 7.7 1.1 30.5 1.9 U 0.96 35.0 1.76 1.00 75W0389 6 45 18.85 0.14 44 15 46.0 1.5 10.2 0.8 U 0.96 18.2 1.12 1.36 75W0391 6 45 19.72 0.11 43 59 31.7 0.9 379. 19. R 23 2 78 13 9 1.40 515. 1.01 1.00 75W0390 6 45 19.99 0.23 43 7 13.1 3.4 12.7 1.9 U 1.09 7.40 3.29 1.24 75W0393* 6 45 27.95 0.15 43 36 24.0 1.9 19.9 1.2 E 83 2 31 5 1.80 16.7 1.28 1.33 75W0393A 6 45 25.67 0.17 43 35 43.5 2.3 8.5 0.9 U 1.10 11.6 1.29 1.66 75W0393B 6 45 29.67 0.14 43 36 54.5 1.6 11.3 0.9 U 1.03 16.7 1.27 1.33 75W0399 6 45 35.03 0.12 43 55 48.9 1.2 18.6 1.1 R 17 7 44 10 1.15 30.1 1.04 1.11 75W0397 6 45 37.44 0.27 44 11 22.3 3.8 3.1 0.6 U 0.99 5.78 1.09 4.61 75W0404 6 45 39.83 0.40 43 22 18.9 6.2 9.9 1.6 R 34 13 31 7 1.79 6.37 1.85 1.99 75W0402 6 45 39.94 0.11 43 19 20.2 0.9 461. 25. U 1.00 435. 2.05 1.00 75W0403 6 45 40.25 0.27 45 10 32.4 3.8 6.4 1.2 U 0.90 5.76 2.50 1.70 75W0405 6 45 41.31 0.09 44 33 40.7 0.9 50.7 2.5 R 12 4 109 6 1.02 61.8 1.65 2.00 75W0407 6 45 42.21 0.13 43 30 37.5 1.4 13.9 1.0 U 0.86 21.3 1.47 1.10 75W0412 6 45 48.59 0.21 43 23 37.2 2.9 15.4 1.6 R 21 12 126 37 20 1.45 11.4 1.80 1.35 75W0413 6 45 49.86 0.30 44 33 40.4 4.4 3.9 0.8 U 0.93 5.02 1.67 2.86 75W0414 6 45 54.65 0.15 45 8 29.2 1.9 15.8 1.5 U 1.08 12.7 2.37 2.16 75W0415 6 45 55.38 0.19 44 29 24.5 2.5 25.4 2.0 R 34 9 134 21 14 1.87 17.5 1.50 1.19 75W0416 6 45 56.16 0.15 45 44 25.5 1.7 13.5 1.2 U 0.87 14.3 2.11 1.12 75W0417 6 45 58.71 0.09 44 47 47.4 0.8 99.5 4.5 R 26 4 55 10 3 1.47 57.2 2.78 2.00 75W0419 6 46 4.26 0.19 43 45 19.6 2.5 5.2 0.6 U 0.92 9.31 1.17 2.13 75W0420 6 46 5.37 0.15 45 59 51.0 1.6 30.5 2.4 R 15 10 66 6 1.18 18.7 2.70 1.00 75W0422 6 46 8.80 0.13 45 49 8.8 1.3 23.4 1.7 U 1.01 21.6 2.10 1.00 75W0423 6 46 11.10 0.17 43 8 32.2 2.4 20.8 2.3 U 1.08 10.9 3.37 1.04 75W0431 6 46 25.90 0.16 45 30 55.6 1.8 13.3 1.1 U 1.09 14.6 1.64 1.25 75W0432 6 46 29.37 0.32 44 4 2.1 4.7 7.1 1.0 R 31 13 146 5 1.65 7.68 1.15 2.68 75W0433 6 46 29.58 0.28 44 16 12.1 4.1 3.1 0.6 U 0.90 5.40 1.27 3.87 75W0435 6 46 30.06 0.29 43 45 22.2 4.3 2.5 0.5 U 0.78 5.14 1.25 4.41 75W0439 6 46 34.75 0.12 43 41 25.1 1.3 19.6 1.3 U 1.09 26.0 1.33 1.06 75W0438 6 46 34.75 0.21 46 8 49.3 2.7 10.9 1.5 U 0.89 8.12 3.02 1.24 75W0441 6 46 38.55 0.30 44 0 0.1 4.3 2.7 0.5 U 0.90 5.07 1.17 5.23 75W0442 6 46 38.65 0.12 45 23 37.9 1.0 68.0 3.7 R 16 3 126 18 5 1.13 74.8 1.56 1.00 75W0443 6 46 40.22 0.12 45 26 48.1 1.1 24.5 1.5 U 1.02 30.6 1.53 1.00 75W0444 6 46 41.04 0.16 45 48 49.8 1.8 11.7 1.1 U 0.94 13.7 1.77 1.25 75W0446 6 46 43.92 0.30 45 2 25.3 4.2 2.8 0.6 U 0.54 5.12 2.05 2.21 75W0447 6 46 44.55 0.12 46 0 1.9 0.9 78.4 4.4 U 0.98 71.0 2.20 1.00 75W0448 6 46 44.64 0.27 43 19 2.0 4.1 5.5 1.1 U 0.84 5.51 2.41 1.80 75W0450 6 46 46.20 0.27 46 8 30.3 3.6 19.8 2.5 R 24 13 81 10 1.54 9.08 2.82 1.21 75W0453 6 46 50.98 0.20 43 6 42.0 2.9 17.3 2.4 U 1.02 8.20 4.17 1.06 75W0454 6 46 51.24 0.24 43 4 2.9 3.5 15.2 2.5 U 0.98 6.47 4.78 1.11 75W0455 6 46 52.98 0.20 45 8 13.5 2.7 7.0 0.9 U 0.95 8.41 1.75 1.67 75W0456 6 46 57.69 0.29 43 55 33.0 4.2 5.1 0.8 U 1.29 6.77 1.25 2.81 75W0457 6 46 58.23 0.28 45 59 28.8 3.7 9.1 1.3 U 1.28 7.37 2.04 1.65 75W0460 6 47 1.39 0.23 43 38 17.6 3.3 4.2 0.7 U 0.83 6.75 1.53 2.25 75W0462 6 47 5.93 0.21 45 5 55.4 2.8 21.1 1.9 R 29 10 51 40 17 1.71 13.9 1.73 1.25 75W0465 6 47 9.92 0.12 46 32 36.3 0.9 378. 25. U 0.98 94.2 8.01 1.00 75W0466 6 47 10.11 0.28 44 34 37.1 4.0 5.6 1.1 U 0.96 5.46 2.14 2.01 75W0469 6 47 14.95 0.27 44 22 57.5 3.8 4.4 0.8 U 0.94 5.74 1.64 2.48 75W0470 6 47 16.50 0.15 45 38 51.8 1.7 14.8 1.1 R 16 10 118 21 7 1.20 17.7 1.36 1.25 75W0474 6 47 24.62 0.32 46 11 53.4 4.4 20.4 2.6 R 26 13 87 6 16 1.78 8.53 2.70 1.28 75W0475 6 47 25.22 0.12 45 35 33.8 0.9 65.0 3.4 R 9 2 157 23 1.00 98.2 1.29 1.00 75W0476 6 47 28.43 0.32 43 1 11.5 5.0 24.6 4.3 U 1.35 6.05 6.63 1.00 75W0480 6 47 34.80 0.18 44 52 9.0 2.3 12.3 1.4 U 1.02 10.5 2.22 1.27 75W0481* 6 47 36.05 0.11 45 13 0.1 0.9 2851. 148. E 35 3 136 5 8 1.90 2124. 1.37 1.00 75W0481A 6 47 34.70 0.11 45 13 15.0 0.9 1204. 62. R 13 1 124 35 8 1.09 1563. 1.37 1.00 75W0481B 6 47 37.03 0.11 45 12 49.2 0.9 1647. 85. R 13 1 110 21 7 1.10 2124. 1.37 1.00 75W0482 6 47 37.87 0.20 45 21 31.6 2.5 7.3 0.8 U 1.13 10.1 1.25 1.88 75W0483 6 47 38.82 0.12 45 33 47.2 1.1 25.6 1.5 R 17 6 151 29 1.11 36.6 1.22 1.00 75W0485 6 47 44.23 0.39 44 21 16.1 5.8 6.2 1.2 U 1.44 5.40 1.81 2.38 75W0486* 6 47 44.89 0.28 46 18 38.7 3.9 20.2 2.5 E 79 5 1 5 1.94 6.76 3.31 1.28 75W0486A 6 47 44.80 0.27 46 17 47.1 3.6 7.0 1.3 U 0.77 5.87 3.19 1.43 75W0486B 6 47 44.94 0.29 46 19 6.3 4.0 13.2 2.1 U 1.26 6.76 3.38 1.28 75W0489 6 47 46.25 0.23 45 41 1.6 3.0 13.6 1.3 R 25 11 86 6 18 1.69 12.4 1.25 1.61 75W0490 6 47 47.48 0.14 45 9 44.0 1.6 10.7 0.9 U 0.93 16.1 1.39 1.29 75W0491 6 47 49.41 0.14 43 22 54.4 1.7 19.2 1.6 U 0.85 15.7 2.79 1.00 75W0495 6 47 53.54 0.12 45 50 54.9 1.1 27.4 1.6 R 12 6 148 32 1.04 36.5 1.40 1.00 75W0498 6 47 55.18 0.12 44 2 16.7 1.1 28.8 1.8 U 1.05 33.4 1.59 1.00 75W0499 6 47 55.76 0.12 44 0 34.8 1.1 27.0 1.6 U 0.98 33.4 1.59 1.00 75W0500 6 47 56.86 0.11 45 14 14.9 0.9 83.2 4.3 R 9 2 154 26 1.00 127. 1.27 1.00 75W0502 6 48 3.35 0.12 43 44 42.0 1.0 43.3 2.5 U 1.03 44.7 1.83 1.00 75W0504 6 48 3.66 0.08 44 48 4.1 0.7 90.7 3.9 R 13 3 143 26 1.03 84.4 2.33 2.00 75W0503 6 48 3.81 0.31 46 13 8.4 4.2 11.3 1.7 U 1.39 7.00 2.50 1.49 75W0505 6 48 4.22 0.13 43 57 27.8 1.4 29.6 1.9 R 22 8 123 6 1.30 26.5 1.66 1.00 75W0506 6 48 5.08 0.28 45 43 38.3 3.8 3.0 0.6 U 0.87 5.66 1.22 3.81 75W0507 6 48 5.95 0.26 44 30 44.8 3.7 7.6 1.3 U 1.03 6.10 2.50 1.63 75W0510 6 48 8.32 0.14 46 2 1.3 1.5 19.7 1.4 U 1.12 19.9 1.72 1.06 75W0511 6 48 8.45 0.13 43 51 31.6 1.3 18.9 1.3 U 0.92 22.7 1.75 1.00 75W0512 6 48 9.10 0.23 43 32 9.0 3.3 7.0 1.1 U 0.86 6.86 2.38 1.56 75W0513 6 48 9.68 0.14 44 27 33.9 1.7 20.7 1.6 U 1.16 16.1 2.35 2.08 75W0514 6 48 10.17 0.18 45 24 28.6 2.2 8.3 0.8 U 1.17 12.2 1.13 1.76 75W0515 6 48 11.23 0.15 43 37 41.9 1.7 32.8 2.4 R 28 9 36 5 1.43 20.8 2.14 1.00 75W0518 6 48 12.46 0.22 46 21 59.0 2.8 15.0 2.0 U 1.05 8.32 3.57 1.13 75W0527 6 48 33.12 0.19 44 9 18.4 2.5 17.5 1.7 R 23 12 152 23 9 1.33 12.5 2.03 1.22 75W0528 6 48 33.89 0.33 45 58 5.5 4.6 8.0 1.2 R 23 13 110 5 1.57 7.24 1.47 2.18 75W0531 6 48 37.96 0.08 44 27 47.6 0.7 175. 7. R 12 2 151 5 1.04 129. 2.81 2.00 75W0532 6 48 38.76 0.13 45 37 30.5 1.2 23.6 1.4 R 20 6 121 5 1.25 33.8 1.08 1.04 75W0533 6 48 40.65 0.24 43 59 12.3 3.4 11.0 1.4 U 1.28 8.51 2.06 1.49 75W0534* 6 48 40.87 0.49 43 8 43.6 7.5 293. 20. E 311 15 93 5 48 6.90 17.2 7.03 1.00 75W0534A 6 48 21.41 0.92 43 9 2.1 14.6 60.2 9.7 R 53 13 63 27 48 4.47 6.72 5.97 1.00 75W0534B 6 48 22.59 0.28 43 7 55.9 4.1 33.6 4.8 U 1.42 7.69 6.36 1.00 75W0534C 6 48 49.82 0.39 43 8 46.0 6.0 199. 17. R 65 10 93 6 40 4.69 17.2 7.46 1.00

Name α1950 Δα δ1950 Δδ S608 ΔS Res ψ Δψ ϕ Δϕ χ R Speak/N Atten Weight

h m s s o^{0 00 00} mJy^{00 00} o o^{00}

75W0535 6 48 43.28 0.12 46 38 38.7 0.9 913. 60. U 0.98 206. 8.82 1.00 75W0537 6 48 45.21 0.24 45 32 31.1 3.2 3.2 0.5 U 0.88 6.89 1.05 3.55 75W0542 6 48 51.60 0.18 43 32 19.8 2.4 23.8 2.4 U 1.23 12.0 3.12 1.03 75W0545 6 48 52.26 0.29 44 56 22.2 4.2 4.5 0.8 U 1.07 5.58 1.62 2.59 75W0546 6 48 53.03 0.12 46 4 3.6 0.9 954. 51. R 14 1 155 25 1.06 1050. 1.67 1.00 75W0547 6 48 53.09 0.13 43 47 49.7 1.4 24.7 1.9 U 1.01 19.8 2.39 1.00 75W0544 6 48 53.20 0.22 45 17 32.8 2.9 4.2 0.6 U 0.99 7.68 1.09 2.84 75W0551 6 48 56.18 0.12 45 50 30.5 0.9 72.0 3.7 U 1.00 114. 1.22 1.00 75W0552 6 48 58.59 0.16 45 18 41.5 1.9 6.9 0.7 U 1.00 12.4 1.08 1.80 75W0553 6 48 58.65 0.27 46 35 21.2 3.6 19.8 3.5 U 0.98 5.95 6.89 1.00 75W0555 6 49 4.55 0.09 44 28 37.1 0.9 55.6 2.8 U 1.06 36.0 3.46 2.00 75W0556 6 49 4.71 0.12 45 0 56.3 1.1 32.1 1.9 R 13 6 127 7 1.09 40.5 1.42 1.00 75W0557 6 49 6.11 0.15 45 58 8.8 1.7 12.1 1.0 U 1.08 15.3 1.41 1.32 75W0559 6 49 12.79 0.16 44 54 32.5 1.8 17.1 1.4 R 17 10 52 31 10 1.23 16.2 1.67 1.18 75W0560 6 49 14.15 0.11 45 13 10.0 0.9 183. 9. R 21 2 68 22 13 1.33 237. 1.13 1.00 75W0562 6 49 16.35 0.30 46 16 29.5 4.1 5.4 1.1 U 0.85 5.13 2.52 1.84 75W0563 6 49 18.65 0.27 45 48 40.1 3.6 3.7 0.6 U 1.07 6.41 1.16 3.36 75W0565 6 49 19.97 0.36 45 23 30.9 5.1 3.0 0.6 U 1.24 5.20 1.02 7.24 75W0566 6 49 22.12 0.20 43 55 33.6 2.7 12.1 1.6 U 1.00 8.50 2.79 1.26 75W0569 6 49 26.46 0.30 43 22 2.8 4.5 21.8 3.6 U 1.30 6.46 5.64 1.04 75W0570 6 49 28.73 0.22 45 43 53.7 2.8 6.3 0.7 U 1.21 9.42 1.09 2.27 75W0573 6 49 38.85 0.27 43 34 38.5 4.0 20.7 3.0 U 1.34 7.54 4.29 1.09 75W0576* 6 49 41.69 0.19 44 51 34.1 2.5 14.5 1.3 E 135 3 150 5 1.47 10.9 1.81 1.41 75W0576A 6 49 39.00 0.17 44 52 22.8 2.1 8.5 0.9 U 0.86 10.9 1.76 1.41 75W0576B 6 49 45.47 0.23 44 50 25.7 3.1 6.0 0.9 U 0.89 7.24 1.87 1.77 75W0577 6 49 45.63 0.11 44 38 40.1 1.3 49.6 3.0 R 20 8 43 17 13 1.34 27.3 2.98 2.00 75W0578 6 49 48.57 0.22 43 34 31.4 3.2 14.0 2.1 U 0.83 7.08 4.70 1.08 75W0580* 6 49 49.89 0.58 45 32 21.0 8.5 6.6 1.1 E 93 11 145 5 3.20 4.49 1.00 17.05 75W0580A 6 49 48.16 0.68 45 32 47.1 9.9 4.3 1.0 R 35 12 60 9 2.11 4.49 1.00 17.05 75W0580B 6 49 53.25 0.40 45 31 30.3 5.7 2.2 0.5 U 1.19 4.42 1.00 19.85 75W0581 6 49 52.32 0.29 44 24 10.0 4.2 17.3 3.4 U 1.03 5.36 6.56 1.05 75W0582 6 49 52.83 0.14 46 37 11.8 1.4 71.8 5.8 U 0.91 20.4 7.55 1.00 75W0583* 6 49 53.09 0.23 45 19 32.9 3.1 6.0 0.6 E 47 4 2 5 1.41 8.21 1.04 2.77 75W0583A 6 49 53.02 0.21 45 19 11.9 2.7 3.4 0.5 U 0.79 8.21 1.04 2.77 75W0583B 6 49 53.18 0.26 45 19 59.8 3.6 2.6 0.5 U 0.86 6.02 1.04 4.66 75W0585 6 49 54.20 0.23 45 56 26.6 3.1 4.9 0.7 U 1.04 7.35 1.34 2.37 75W0587 6 49 55.15 0.12 44 11 20.5 1.1 63.1 4.2 U 0.94 33.6 3.86 1.00 75W0588 6 49 59.79 0.31 44 37 36.2 4.4 12.9 2.1 U 1.35 6.66 3.13 1.34 75W0594* 6 50 5.95 0.14 46 5 16.5 1.5 46.0 2.2 E 199 1 34 5 1.60 34.4 1.69 1.00 75W0594A 6 50 2.15 0.12 46 4 13.3 1.1 26.8 1.6 U 0.93 34.4 1.63 1.00 75W0594B 6 50 4.92 0.29 46 5 42.4 4.0 3.6 0.7 U 0.80 5.38 1.71 2.55 75W0594C 6 50 12.72 0.14 46 6 59.2 1.5 15.6 1.2 U 1.01 16.9 1.79 1.12 75W0593 6 50 5.97 0.13 45 58 36.1 1.3 17.7 1.2 U 1.07 22.7 1.41 1.09 75W0598 6 50 12.77 0.08 44 25 56.6 0.7 203. 9. R 18 3 91 4 1.21 75.4 5.94 2.00 75W0599 6 50 13.22 0.12 46 19 0.7 1.0 65.3 3.9 U 0.96 47.5 2.81 1.00 75W0601* 6 50 15.98 0.29 43 33 49.9 4.4 48.5 5.8 E 122 6 13 5 8 2.00 7.86 6.27 1.00 75W0601A 6 50 15.40 0.29 43 33 22.5 4.4 37.3 5.3 U 1.54 7.86 6.30 1.00 75W0601B 6 50 17.91 0.30 43 35 21.5 4.4 11.2 2.3 U 0.74 5.03 6.15 1.11 75W0603 6 50 18.09 0.23 45 10 6.6 3.2 4.5 0.7 U 1.09 7.54 1.18 2.65 75W0604 6 50 20.58 0.16 46 10 58.3 1.8 13.5 1.2 U 0.96 13.3 2.05 1.17 75W0605 6 50 26.91 0.16 43 27 35.9 2.1 49.3 5.4 U 0.99 11.3 8.48 1.00 75W0609 6 50 33.03 0.12 45 28 22.0 1.1 22.2 1.2 R 14 6 136 11 1.08 38.7 1.03 1.00 75W0610 6 50 33.07 0.20 45 41 48.8 2.6 5.2 0.6 U 1.05 9.19 1.09 2.32 75W0613 6 50 44.28 0.11 45 18 11.9 0.9 487. 25. R 9 1 154 26 1.00 858. 1.10 1.00 75W0615 6 50 46.13 0.39 46 35 48.3 5.3 29.2 5.3 U 1.50 5.94 7.28 1.00 75W0616 6 50 46.55 0.15 45 10 49.4 1.8 7.7 0.7 U 0.88 14.1 1.21 1.52 75W0617 6 50 50.18 0.33 44 28 56.1 4.8 21.4 3.6 U 1.40 6.41 5.23 1.07 75W0620 6 50 52.43 0.25 45 34 3.0 3.4 3.4 0.6 U 0.99 6.40 1.07 3.91 75W0621* 6 50 52.70 0.13 44 46 31.1 1.4 51.5 2.7 E 46 2 25 5 9 1.52 29.2 2.29 1.00 75W0621A 6 50 51.39 0.15 44 46 0.6 1.8 14.5 1.3 U 0.88 13.7 2.33 1.10 75W0621B 6 50 53.21 0.12 44 46 43.1 1.2 37.0 2.4 U 1.09 29.2 2.28 1.00 75W0622 6 50 55.46 0.15 46 4 51.4 1.6 15.2 1.2 U 1.04 16.1 1.77 1.15 75W0624 6 51 0.67 0.12 44 5 49.1 1.1 129. 9. U 0.95 35.8 7.36 1.00 75W0625 6 51 1.43 0.19 45 39 7.6 2.3 11.7 1.0 R 21 11 90 5 7 1.45 14.1 1.11 1.59 75W0626 6 51 4.28 0.28 45 3 33.4 4.0 3.2 0.6 U 0.83 5.45 1.42 3.17 75W0629 6 51 7.41 0.12 46 16 16.8 0.9 282. 16. R 21 2 103 14 8 1.34 152. 2.71 1.00 75W0630 6 51 7.97 0.17 46 20 6.2 2.0 25.8 2.4 U 1.16 13.6 3.20 1.00 75W0631 6 51 9.41 0.22 45 25 36.5 3.0 7.5 0.8 U 1.34 9.87 1.10 2.15 75W0634 6 51 14.15 0.25 45 55 20.2 3.3 5.6 0.8 U 1.11 7.27 1.44 2.22 75W0637 6 51 18.32 0.22 44 47 31.2 3.1 9.5 1.3 U 1.08 7.91 2.33 1.44 75W0638 6 51 18.80 0.18 44 36 7.3 2.4 18.8 2.2 U 0.99 9.77 3.81 1.03 75W0641* 6 51 24.80 0.23 45 50 54.8 3.0 14.4 1.2 E 75 5 148 5 14 1.49 13.8 1.36 1.43 75W0641A 6 51 23.50 0.15 45 51 16.7 1.8 9.5 0.8 U 0.98 13.8 1.36 1.43 75W0641B 6 51 27.31 0.37 45 50 12.4 5.2 4.9 0.9 U 1.42 5.73 1.35 3.18 75W0642 6 51 28.43 0.25 46 11 56.8 3.3 7.7 1.2 U 0.96 6.65 2.41 1.58 75W0643 6 51 30.15 0.13 44 53 0.1 1.3 31.5 2.1 R 17 8 148 6 1.13 27.2 2.00 1.00 75W0651 6 51 43.61 0.13 45 35 6.7 1.2 16.9 1.1 U 1.00 27.4 1.20 1.08 75W0653* 6 51 47.35 0.14 45 20 29.1 1.5 31.5 1.6 E 135 2 38 5 17 1.55 31.6 1.25 1.00 75W0653A 6 51 42.00 0.19 45 19 16.1 2.5 10.1 1.0 U 1.33 11.9 1.24 1.66 75W0653B 6 51 49.88 0.12 45 21 3.6 1.1 21.4 1.3 U 1.05 31.6 1.25 1.00 75W0656 6 51 47.65 0.18 45 15 16.5 2.2 7.7 0.8 U 1.04 11.0 1.31 1.69 75W0658 6 51 51.76 0.12 45 56 14.7 1.1 32.8 2.0 R 15 6 129 16 1.10 35.5 1.63 1.00 75W0661 6 51 56.09 0.12 46 15 33.4 1.1 43.6 2.9 U 0.92 30.7 3.03 1.00 75W0662 6 52 0.15 0.19 45 14 9.1 2.4 5.2 0.6 U 0.79 9.29 1.38 1.85 75W0666* 6 52 10.23 0.18 46 21 53.2 2.1 114. 8. E 38 3 68 5 7 2.21 23.6 4.24 1.00 75W0666A 6 52 8.37 0.15 46 21 45.3 1.7 52.3 4.2 R 19 9 67 24 7 1.29 18.9 4.18 1.00 75W0666B 6 52 11.80 0.14 46 21 60.0 1.4 62.0 4.5 R 16 8 69 20 3 1.20 23.6 4.29 1.00 75W0668 6 52 13.78 0.21 45 59 8.8 2.8 9.4 1.2 U 1.12 8.94 1.89 1.52 75W0671 6 52 18.42 0.26 44 54 54.0 3.6 3.4 0.6 U 0.51 6.11 2.23 1.77 75W0673 6 52 20.34 0.14 45 37 23.2 1.5 21.6 1.5 R 22 8 43 41 13 1.32 23.0 1.38 1.10 75W0678 6 52 33.05 0.28 44 34 45.4 4.0 13.9 2.7 U 0.96 5.43 5.43 1.13 75W0681 6 52 38.54 0.23 46 16 9.5 3.0 11.7 1.8 U 0.89 7.14 3.71 1.19 75W0685* 6 52 50.11 0.33 45 29 19.8 4.6 16.0 1.9 E 44 3 89 5 6 2.05 9.97 1.53 1.63 75W0685A 6 52 48.86 0.24 45 29 19.5 3.3 11.7 1.3 R 27 13 147 14 6 1.50 9.97 1.53 1.63 75W0685B 6 52 53.08 0.38 45 29 20.4 5.5 4.3 0.9 U 1.26 4.89 1.56 3.26 75W0687 6 52 51.83 0.11 45 20 50.9 0.9 506. 27. U 1.00 617. 1.60 1.00 75W0688 6 52 52.36 0.18 46 14 43.3 2.2 17.2 1.9 U 0.86 10.4 3.74 1.00 75W0693 6 53 7.35 0.21 44 45 42.3 2.8 42.4 4.1 R 32 11 154 24 9 1.62 13.0 3.93 1.00 75W0695 6 53 10.87 0.13 44 41 32.1 1.4 46.9 3.7 U 0.96 20.0 4.80 1.00 75W0698 6 53 19.98 0.15 44 38 51.4 1.7 46.0 4.1 U 1.01 15.5 5.78 1.00

Name α1950 Δα δ1950 Δδ S608 ΔS Res ψ Δψ ϕ Δϕ χ R Speak/N Atten Weight

h m s s o^{0 00 00} mJy^{00 00} o o^{00}

75W0699 6 53 24.00 0.32 46 7 2.7 4.3 8.5 1.7 U 1.05 5.16 3.36 1.50 75W0714 6 53 54.86 0.24 45 57 36.1 3.3 9.5 1.5 U 0.92 6.67 3.11 1.35 75W0715 6 53 59.64 0.28 44 50 47.4 3.9 12.1 2.3 U 0.97 5.54 4.56 1.22 75W0717 6 54 4.80 0.13 44 44 16.4 1.4 58.8 4.8 U 0.97 19.2 6.19 1.00 75W0716 6 54 4.90 0.14 45 58 7.7 1.4 38.6 2.9 U 1.08 20.8 3.38 1.00 75W0718 6 54 7.11 0.15 45 39 39.9 1.7 19.8 1.7 U 1.01 15.2 2.51 1.02 75W0720 6 54 9.16 0.27 44 50 26.3 3.9 18.2 2.9 U 1.19 6.75 4.97 1.07 75W0729 6 54 41.53 0.11 45 6 26.7 0.9 281. 17. U 1.00 137. 4.03 1.00 75W0730 6 54 43.41 0.15 45 8 39.1 1.8 38.4 3.3 U 1.19 16.1 3.92 1.00 75W0733 6 54 49.40 0.12 44 48 22.2 1.0 211. 14. R 11 4 155 25 1.04 52.4 7.64 1.00 75W0735 6 54 53.17 0.24 44 57 1.7 3.2 13.0 2.1 U 0.67 6.82 5.76 1.00 75W0740 6 55 13.62 0.30 44 50 38.9 4.3 20.9 4.4 U 0.97 5.01 8.85 1.00 75W0744 6 55 43.03 0.22 45 46 30.3 2.9 22.4 3.3 U 0.93 7.59 6.33 1.00 75W0746 6 55 49.39 0.28 45 1 4.3 3.9 24.0 4.6 U 0.95 5.62 9.10 1.00